BioMed Research International

Volume 2013 (2013), Article ID 585106, 9 pages

http://dx.doi.org/10.1155/2013/585106

Methodology Report

Novel One-Step Multiplex PCR-Based Method for HLA Typing and Preimplantational Genetic Diagnosis of -Thalassemia

Raquel M. Fernández,1,2 Ana Peciña,1,2 Maria Dolores Lozano-Arana,¹ Juan Carlos García-Lozano,¹ Salud Borrego,1,2 and Guillermo Antiñolo1,2

¹Department of Genetics, Reproduction and Fetal Medicine, Institute of Biomedicine of Seville (IBIS), University Hospital Virgen del Rocío/CSIC/University of Seville, Avenida Manuel Siurot, s/n, 41013 Seville, Spain

²Centre for Biomedical Network Research on Rare Diseases (CIBERER), 41013 Seville, Spain

Received 4 February 2013; Revised 14 March 2013; Accepted 14 March 2013

Academic Editor: Thomas Liehr

Copyright © 2013 Raquel M. Fernández et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Preimplantation genetic diagnosis (PGD) of single gene disorders, combined with HLA matching (PGD-HLA), has emerged as a tool for couples at risk of transmitting a genetic disease to select unaffected embryos of an HLA tissue type compatible with that of an existing affected child. Here, we present a novel one-step multiplex PCR to genotype a spectrum of STRs to simultaneously perform HLA typing and PGD for -thalassemia. This method is being routinely used for PGD-HLA cycles in our department, with a genotyping success rate of 100%. As an example, we present the first successful PGD-HLA typing in Spain, which resulted in the birth of a boy and subsequent successful HSC transplantation to his affected brother, who is doing well 4 years following transplantation. The advantage of our method is that it involves only a round of single PCR for multiple markers amplification (up to 10 markers within the HLA and 6 markers at the -globin loci). This strategy has allowed us to considerably reduce the optimization of the PCR method for each specific PGD-HLA family as well as the time to obtain molecular results in each cycle.

1. Introduction

The thalassemias are a group of autosomal recessive inherited anaemias caused by mutations in the α- and β-globin genes leading to decreased production of one of the globin chains of haemoglobin (Hb). Mutations in such globin genes are by far the most common group of monogenic disorders worldwide. Recent surveys suggest that between 300,000 and 400,000 babies are born with a serious hemoglobin disorder each year, and although information about the precise world distribution and frequency of these disorders is still limited, there is no doubt that they are going to pose an increasing burden on global health resources in the future [1]. Specifically, over 200 different mutations of the β-globin gene cluster have been described, and they result in either absent or reduced synthesis of the β-globin chains leading to β-thalassemia [2] (http://globin.bx.psu.edu/hbvar/). β-thalassemia (OMIM no. 613985) major patients suffer from severe anaemia with marked ineffective erythropoiesis, erythroid marrow expansion, osteopenia, and bone deformities. The high transfusion requirements result in iron overload, and the patients need chelating therapy. The majority of cases will ultimately develop organ damage, in particular, of the heart and liver, with reduced life quality and expectancy [3].

The human leukocyte antigen (HLA) system is the name of the major histocompatibility complex (MHC) in humans. The super locus resides on chromosome 6 and contains a large number of genes that encode cell-surface antigen-presenting proteins that, among several functions, play a major role in the immune system function in humans. This complex consists of three regions that contain genes encoding class I, class II, and class III antigens and represents one of the most polymorphic regions of the human genome. HLAs corresponding to MHC class I present peptides from inside the cell. These peptides are produced from digested proteins that are broken down in the proteasomes. In general, these particular peptides are small polymers, about 9 amino acids in length. Foreign antigens attract killer T-cells (also called CD8 positive- or cytotoxic T-cells) that destroy cells. HLAs corresponding to MHC class II present antigens from outside of the cell to T-lymphocytes. These particular antigens stimulate the multiplication of T-helper cells, which in turn stimulate antibody-producing B-cells to produce antibodies to that specific antigen. Self-antigens are suppressed by suppressor T-cells. Finally, HLAs corresponding to MHC class III encode components of the complement system. Diversity of HLAs in the human population is one aspect of disease defense, and, as a result, the chance of two unrelated individuals with identical HLA molecules on all loci is very low. HLA genes have historically been identified as a result of the ability to successfully transplant organs between HLA-similar individuals. In other words, HLA complex is responsible for rejection following organ/tissue transplantation. To date, the only available definitive cure for β-thalassemia major is haematopoietic stem cell transplantation (HSCT) from an HLA-identical donor. Matched sibling HSCT for patients under the age of 17 years without major organ damage has been regarded as the best therapy option with a 90% of success, because treatment-related mortality (TRM) is low, and serious morbidity is unusual. Results from matched unrelated and mismatched HSCT are less successful because of a high risk of graft rejection and TRM [4].

Preimplantation genetic diagnosis (PGD) of single gene disorders, combined with HLA matching (PGD-HLA), represents one of the most relevant challenges in reproductive medicine. This strategy has emerged as a tool for couples at risk of transmitting a genetic disease to select unaffected embryos of an HLA tissue type compatible with that of an existing affected child. At delivery, HSC from the newborn umbilical cord blood can be used to treat the affected sibling. This approach is particularly valuable for β-thalassemia and other similar life-threatening disorders that require an HLA-compatible HSC donor, where HLA identity seems to provide the best chance of avoiding graft rejection and other serious complications of bone marrow transplantation. To date, very few cases of successful pregnancies and births of healthy HLA compatible donors for patients have been reported [5–10]. Here, we present a new one-step multiplex PCR to simultaneously perform HLA typing and PGD for β-thalassemia, which provides important advantages with respect to other methods. To date, we have successfully applied it for 4 couples with children affected by β-thalassemia, accounting for a total of 16 PGD-HLA cycles. As an example, we also present the results of the first successful PGD with HLA typing performed in Spain after the application of such method. Subsequent HSCT was performed successfully, and the transplanted sibling is currently doing well, 4 years following transplantation. All the procedures, included HSCs umbilical cord transplantation, were performed at the University Hospital Virgen del Rocio in Sevilla.

2. Materials and Methods

2.1. Selection of β-Globin and HLA Markers

A panel of six polymorphic short tandem repeats (STRs) located in the neighboring regions to the β-globin gene was selected (Figure 1). The selection was based on the heterozygosity values (>30%) detected for each marker in a group of 30 normal controls and in their specific location with respect to the β-globin gene (3 of them in the 5′region and the other 3 in the 3′region surrounding the gene), warranting the possibility to detect any recombination event at the known recombination hotspot in the beta-globin cluster [11].

Figure 1: Map of human β-globin gene, showing the location of the polymorphic markers that can be tested with our method. The informative STRs for the family here reported are represented as included within an ellipse. The mutations carried by the child and responsible for his clinical picture of β-thalassemia are also shown.

Regarding HLA typing, a first selection of up to 10 STRs was initially made according to their localization along the HLA locus (Figure 2). The policy was to select, for the subsequent PGD, the maximum number of informative STR markers evenly spaced throughout the HLA complex to obtain an accurate haplotyping, allowing identification of double recombination events, which if not detected may lead to misdiagnosis in HLA typing. Using this panel, we achieved the first successful PGD with HLA typing performed in Spain, which we will also present in this paper. Subsequently and following the ESHRE PGD guidelines [12], the method has been updated with the inclusion of a selection of another 10 markers along the HLA locus (Figure 3).

Figure 2: STR markers at the HLA locus that can be simultaneously tested with our method. In red, the new STRs included after the update of the method are indicated following ESHRE recommendations. The informative STRs for the family here reported are represented as included within an ellipse.

(a)

(b)

Figure 3: Profiles for the selected informative markers employed in the PGD for β-thalassemia (a) with HLA typing (b) in the family here reported.

Primers for the amplification of those markers were designed in order to let all of them be amplified with the same annealing temperature and conditions, using the Primer3 software (http://primer3.sourceforge.net/) (Table 1). As a previous requisite for the final inclusion of the couples in our PGD-HLA program, informativity testing for segregation analyses is always developed on the DNA samples from the corresponding family members (father, mother, and affected child) using standard PCR protocols to identify the “disease haplotypes” and the specific HLA combinations carried by the affected children in the context of their corresponding families.

Table 1: Primers sequences for the -thalassemia and HLA markers included in our method.

Marker
Primer
Dye
Sequence
Size of fragment (bp)

HLA typing

    D6S1571
D6S1571F
PET
GGACCTACGCATCTGGTG
160–180

D6S1571R

TGGCTCTAATGGTTACTTTTTACA

    D6S1260
D6S1260F
NED
ACTGCTCCTGGGCATGGTTG
130–160

D6S1260R

GTACATGCCTTTGTTAACATC

    D6S1624
D6S1624F
6FAM
GGAAGTCTTCAGTGGAGAGAGT
200–220

D6S1624R

ACTCCAGGTGTTTGTGGTTT

    MOG-CA
MGCAF
VIC
TCACCTCGAGTGAGTCTCTTT
205–235

MOGCAR

ACCATGGGTAACTGAAGCAT

    MOG-TAAA
MOG3F
6FAM
GAAATGTGAGAATAAAGGAGA
125–150

MOG3R

GATAAAGGGGAACTACTACA

    D6S265
D6S265F
6FAM
ACGTTCGTACCCATTAACCT
110–125

D6S265R

CGAGGTAAACAGCAGAAAGA

    HLAC-CA
HLACCAF
VIC
TCCCTAGTAGCTGGGATTACA
155–175

HLACCAR

CGGCAAGAGACTCTGATGA

    MIB
MIBF
6FAM
CCACAGTCTCTATCAGTCCAGA
155–185

MIBR

TCAGCCTGCTAGCTTATCCT

    D6S273
D6S273F
6FAM
GGCCAAAGTTAAAACCAAAC
135–145

D6S273R

GCAACTTTTCTGTCAATCCA

    DRA-CA
DRACAF
VIC
GATACTTTCCTAATTCTCCTCCTTC
120–140

DRACAR

ATGGAATCTCATCAAGGTCAG

    D6S2443
D6S2443F
6FAM
CCATACCAAAGTAAAACCCAG
150–200

D6S2443R

GAGGATGAAGGGAAATTAGAG

    DQCAR
DQCARF
PET
CTTGGCCAATCAGAATCTTT
150–175

DQCARR

CTGCATTTCTCTTCCTTATCAC

    TAP1-CA
TAP1CAF
PET
GGACAATATTTTGCTCCTGA
195–215

TAP1CAR

TCATACATCTGCTTTGATCTCC

    RING3-CA
RING3CAF
6FAM
GGGCCGCAGTTTAAGTAAC
125–135

RING3CAR

TGTTAGGTCAGAACCACAGAA

    D6S1560
D6S1560F
6FAM
CTCCAGTCCCCACTGC
225–250

D6S1560R

CCCAAGGCCACATAGC

    D6S1583
D6S1583F
VIC
GCCCCTAACCTGCTTCTACTGA
150–200

D6S1583R

GCAGATGGCCCCACTGAC

    D6S1618
D6S1618F
NED
GGCCTGAGCAGTGCAT
130–170

D6S1618R

TGATTCCTAATCTGCGGG

    D6S1611
D6S1611F
PET
GAGCAAGACTCCATCTCAAA
225–250

D6S1611R

ACCTAAGTTCTCTGAAGGGC

    D6S1610
D6S1610F
PET
CCTGGTGAGATAGATGCTTG
100–140

D6S1610R

ATTTCCAGCAGAGCCTTG

    D6S1552
D6S1552F
VIC
AGCCTGAACGACAGAACAAG
160–200

D6S1552R

CTGCTTAACTTAGATCTTTGGTAT

-thalassemia locus

    D11S4181
D11S4181F
6FAM
AAGCTTCCTTCACATTCTTACAG
200–225

D11S4181R

GAACTGAGACCAAGAACATTATTCC

    D11S2351
D11S2351F
6FAM
GGGCACCTGTAATCCCA
150–180

D11S2351R

AGGAGTCACTGGATCTACTC

    D11S1871
D11S1871F
PET
AAGAAGTTGCCCTGATGTCT
160–200

D11S1871R

TAAAAGGAGCTGAATGCACA

    D11S4891
D11S4891F
6FAM
GGAAATGGACCTCTGTCTC
75–100

D11S4891R

CTTTTATTCCAGCCCCAC

    D11S1760
D11S1760F
PET
GATCTCAAGTGTTTCCCCAC
75–100

D11S1760R

AAACGATGTCTGTCCACTCA

    D11S1338
D11S1338F
6FAM
GACGGTTTAACTGTATATCTAAGAC
250–280

D11S1338R

TAATGCTACTTATTTGGAGTGTG

2.2. Multiplex PCR Protocol

A one-step multiplex single-cell fluorescent PCR is used for the simultaneous amplification of several combinations of markers at the HLA and β-globin loci, using the QIAGEN multiplex PCR kit (QIAGEN, GmbH; Hilden, Germany) and an adaptation from a protocol previously described [13]. Optimal cell lysis protocol and PCR conditions, further described, were set up on single cells biopsied from supernumerary IVF embryos not suitable for transfer or cryopreservation. Although such cells might give falsely high rates of PCR failure and/or ADO events, achievement of specific optimal PCR conditions under these “not-optimal” circumstances warranted to have a protocol suitable for single cells in real PGD cycles (with a much better quality). The reaction mix contains 0,2 μM each primer, 5× Sol Q, and 2× QIAGEN multiplex PCR master mix, for a final volume of 25 μL. The PCR program is as follows: 15 minutes at 95°C, 10 cycles of 30 seconds at 96°C, 30 seconds at 55°C, 30 seconds at 72°C, followed by 30 cycles of 30 seconds at 94°C, 30 seconds at 55°C, 30 seconds at 72°C, and a final extension of 15 minutes at 60°C. PCR products are analyzed on an ABI3730 automated sequencer (Applied Biosystems, Foster City, CA).

2.3. Assisted Reproductive Techniques and Embryo Biopsy

Controlled ovarian stimulation is performed through a long protocol as previously described [14]. Oocytes are carefully denuded from cumulus cells, and intracytoplasmic sperm injection (ICSI) is used to prevent contamination with residual sperm adhered to the zona pellucida [15, 16]. Blastomere biopsy is performed the morning of day three after fertilization. Laser technology (Octax Laser) is used to create an opening in the zona pellucida, and one blastomere is gently aspirated for each embryo. Cells are transferred into thin walled 0.2 mL PCR tubes containing 2.5 μL of proteinase K/SDS lysis buffer and frozen at −80°C before cell lysis [13].

2.4. β-Globin and HLA Haplotyping of the Embryos

After 30 min at −80°C, cells are lysed by incubation for 90 min at 37°C and 15 min at 65°C.

HLA typing as well as β-globin genetic analysis of the embryos are subsequently performed using the previously selected combination of markers and the described one-step multiplex fluorescent PCR protocol at the single-cell level.

Prior to the analysis, it is established that embryos showing monosomy, trisomy, or uniparental disomy of chromosomes, 6 or 11 will be considered to be abnormal. The embryos with a recombination pattern at the HLA locus are considered to be HLA nonidentical and, therefore, not suitable for transfer.

2.5. Case Description of the First Successful PGD with HLA Typing Performed in Spain

A couple of a 29-year-old female and a 35-year-old male, with a 4-year-old son, affected with major β-thalassemia, were referred to our department for PGD in combination with HLA typing. Examination of the patient revealed that clinical status of the disease allowed HSCT. After extensive genetic counselling including information about the PGD procedures, success rate and possibility of misdiagnosis inherent to technique, the couple decided to go on with the treatment and was included in our PGD Program. Informed consent concerning PGD and related procedures as well as the fate of the nontransferred embryos was given.

DNA samples from the affected child and from his parents were obtained with standard protocols and used to perform molecular analyses on both the β-globin and HLA loci.

The disease in this child was found to be due to two different mutations: the IVS-1-nt1 (HBB:c.) from paternal origin, and the CD39 (HBB:c.118) inherited from his mother (HbVar ID817 and HbVar ID845, resp., according to the human hemoglobin variants and thalassemias database, http://globin.bx.psu.edu/hbvar/) (Figure 1).

3. Results

3.1. Analysis of the Efficiency of the Multiplex Protocol

After optimization of the corresponding independent PCR procedures for each marker, we proceeded to perform various assays combining different selections of STRs at both the β-globin and the HLA loci, to analyze the efficiency of the multiplex protocol. Initially, these multiplex protocols were tested using different serial dilutions of genomic DNA extracted from peripheral blood (from 100 ng/mL to 5 pg/mL). Finally, once the final multiplex PCR conditions were adjusted, we tested them on single cells consisting in blastomeres biopsied from supernumerary IVF embryos not suitable for transfer or cryopreservation. Our results showed that different combinations were possible, covering markers at the 5′ and 3′ regions of the β-globin locus as well as in the different regions of the HLA complex (Figure 3). We tested the combination of up to eight different markers (5 at the HLA locus and 3 in the β-globin). Since we had no available DNA from the parents of the embryos donated to this purpose, it was not possible to discriminate between ADO effects or homozygosis for some of the markers tested. Although the efficiency of the PCR varied depending on the marker, no PCR failure was detected for any of them, and the corresponding amplification levels with the final optimized conditions were adequate enough to perform the analysis.

3.2. First Successful PGD with HLA Typing Performed in Spain

After analysis of the STR markers for HLA and β-globin haplotypes in the context of the family, we selected five markers for HLA typing (D6S1571, MOG-TAAA, D6S2443, D6S1583, and D6S1610) and another three for the typing of β-globin (D11S1871, D11S4891, and D11S1760). The selection of such STRs was made according to their amplification efficiency at the single-cell level, the informativity in the family, and their localization along the HLA and β-globin loci, respectively (see Supplemental Figure available online at http://dx.doi.org/10.1155/2013/585106). Primers sequences for all the markers susceptible to be analysed with our method are provided in Table 1.

The results of the clinical PGD-HLA cycles for this couple are shown in Table 2. All the embryos generated in the PGD-HLA cycles could be successfully diagnosed and HLA-typed. More specifically, two PGD cycles were performed, resulting in a successful pregnancy, with the birth at term of a healthy boy (Figure 2). Cord blood hematopoietic stem cells were obtained and frozen for later use. The stem cells number in the cord blood was high and HSCT was performed three months later, when the child was 7 years old. The child is currently doing well and off all treatments 4 years following transplantation.

Table 2: Results of the clinical PGD-HLA cycles.

PGD
Cycle 1
Cycle 2

Number of oocytes retrieved
20
25

MII oocytes
17
22

2-pronuclei zygotes
14
18

Embryos biopsied
11
17

Affected
2
8

Carriers
7
3

Noncarriers
2
6

HLA nonidentical
9
14

HLA-identical
2
3

HLA nonidentical and affected
1
7

HLA nonidentical and carriers
6
1

HLA nonidentical and noncarriers
2
6

HLA-identical and affected
1
1

HLA-identical and carriers
1
2

HLA-identical and noncarriers
0
0

Embryos transferred
1
1

Ongoing pregnancy
No
Yes

No allele dropout (ADO) and/or contaminations were detected. Recombination events were detected in the paternal β-globin allele in 1 out of the 28 tested embryos, between markers D11S1871 and D11S4891. Regarding HLA typing, a total of 2 recombinant HLA alleles were identified of either maternal or paternal origin, both of them between markers D6S1583 and D6S1610.

The remaining unaffected embryos resulting from both cycles that did not achieve enough quality to be cryopreserved, as well as the affected embryos, were retested for both β-globin and HLA loci, and the initial results were confirmed in all of them. A total of 12 unaffected and non-HLA-identical embryos suitable to be cryopreserved were vitrified using the VitKit Freeze kit (Irvine Scientific) and the protocol provided by manufacturers.

3.3. Update of the Multiplex Genotyping Method

In 2011, Harton et al. published the ESHRE PGD guidelines in which the general recommendations for HLA typing included a minimum one marker located upstream of HLA-A, minimum one marker between HLA-A and HLA-B, minimum one marker between HLA-B and HLA-DRA, one marker between HLA-DRA and HLA-DQB1, and minimum one marker downstream of HLA-DQB1 [12]. As our initial method did not cover the HLA-HLA-B areas and the HLA-B-HLA-DRA areas, these recommendations prompted us to update our protocol with the inclusion of 10 new markers. We proceeded to perform the same kind of assays previously described for the simultaneous amplification of different combinations of markers, taking into account the policy of covering all the HLA regions recommended by the ESHRE. Figure 4 shows as an example on the analysis of 2 different combinations of the new HLA markers after performance of the multiplex protocol on single blastomeres. Currently, up to 6 different combinations, including 5 HLA and 2 β-globin markers, have been tested and successfully amplified on single blastomeres (Table 3). The goal was to follow the ESHRE PGD guidelines covering all the 5 HLA regions recommended, together with at least 2 markers linked to the β-globin locus (5′ and 3′). Of note, we have applied 3 of those combinations (mixes 1 and 2 from Table 3) for the PGD-HLA typing of 3 other couples (14 cycles, 84 embryos), and all the embryos were successfully typed and diagnosed. Again, neither ADO events nor PCR failures were detected, although the efficiency of amplification varied among the markers.

Table 3: Combinations of markers successfully amplified with our one-step multiplex PCR protocol on a single cell, after the update of the method.

-

5′Region
3′Region
Upstream HLAA
HLAA-HLAB
HLAB-HLADRA
HLADRA-HLADQB1
Downstream DQB1

1
D11S1338
D11S2351
D6S1624
HLAC-CA
MIB
DQCAR
RING3-CA

2
D11S1338
D11S2351
MOG-CA
D6S265
D6S273
DRA-CA
TAP1A-CA

3
D11S4891
D11S4181
D6S1624
HLAC-CA
MIB
DRA-CA
TAP1A-CA

4
D11S1760
D11S4181
MOG-CA
D6S265
D6S273
DQCAR
RING3-CA

5
D11S4891
D11S1871
D6S1571
D6S265
MIB
D6S2443
D6S1583

6
D11S1760
D11S1871
MOG-TAAA
HLAC-CA
D6S273
D6S2443
D6S1610

(a)

(b)

Figure 4: Profiles of 2 different combinations of markers throughout the HLA region after the update of the method on single blastomeres biopsied from nonrelated embryos. Although the efficiency of the PCR varies depending on the marker, the amplification levels obtained for them are adequate to perform the analysis simultaneously. Appropriate zoom of the -axis of the fluorescence level (proportional to the amplification level), let us to observe and analyze all the peaks, corresponding to the different markers.

4. Discussion

Preimplantation genetic diagnosis in combination with human leukocyte antigen typing offer to families not only the possibility of having unaffected children, but also a new therapeutic option for an affected sibling who has HSCT as the unique option of curative treatment. HLA typing on one cell is complex because the HLA locus is highly polymorphic and large (4 Mb) and recombination within the locus has been observed [17, 18]. Worldwide, HLA testing on preimplantation embryos is routinely performed using STRs. Multiple STRs throughout the HLA region allow 100% accuracy HLA typing and detect possible recombination events, as well as the copy number of chromosome 6 [19]. Efforts should be devoted to the development of a flexible and reliable methodology for PGD/HLA molecular analysis that would shorten as possible the preclinical development time necessary for future cases. For practical and cost-effective reasons, as well as for clinical and psychological ones, it is important that the time to develop a family-specific PCR protocol should be as short as possible. It is critical to design compatible multiple primer sequences and conditions when several PCR reactions may interfere reciprocally in a tube. In this sense, we have optimized a single-cell multiplex PCR method to simultaneously amplify a wide spectrum of STRs within the HLA and β-globin loci, which minimizes the preclinical development time for the families. Usually, multiplex PCR consists of two rounds of amplification. In the first amplification round, all the primers are added together in the reaction mix; in the second amplification round, the first mix is split into distinct mixtures containing two or three primer combinations. Alternatively, multiple displacement amplification (MDA) has been used for whole genome amplification as a previous step to genetic diagnosis and HLA typing of the embryos [8]. The advantage of our approach is that it involves only a round of single PCR for multiple markers amplification, with a considerable reduction of contamination possibility (more probable in two-rounds methods), and workup time to finally obtain a proper typing and diagnosis. Moreover, no ADO events are detected in comparison with other methods reported elsewhere. In addition, and very importantly, this method has demonstrated to be highly versatile, making the incorporation of new markers at both loci feasible. This has let us to include additional markers for subsequent PGD-HLA cycles, taking into consideration the recommendations provided in the ESHRE PGD consortium best practice guidelines [12], which were published after the initial optimization of our method, and even after its application to several PGD cycles in our unit which led to the first successful PGD with HLA typing performed in Spain.

5. Conclusions

This strategy has allowed us to considerably reduce the optimization of the PCR method for each specific PGD-HLA family as well as the time to obtain molecular results in each cycle (approximately 4 hours after embryo biopsy).

Disclosure

The authors declare no financial relation with the trademarks mentioned in this paper as well as no other conflict of interests.

Authors’ Contribution

R. M. Fernández and A. Peciña contributed equally.

References

T. N. Williams and D. J. Weatherall, “World distribution, population genetics, and health burden of the hemoglobinopathies,” Cold Spring Harbor Perspectives in Medicine, vol. 2, no. 9, Article ID a011692, 2012.

R. C. Hardison, D. H. K. Chui, C. R. Riemer et al., “Access to a syllabus of human hemoglobin variants (1996) via the world wide web,” Hemoglobin, vol. 22, no. 2, pp. 113–127, 1998.

N. F. Olivieri, “The β-thalassemias,” The New England Journal of Medicine, vol. 341, no. 2, pp. 9–109, 1999.

G. La Nasa, F. Argiolu, C. Giardini et al., “Unrelated bone marrow transplantation for β-thalassemia patients: the experience of the Italian bone marrow transplant group,” Annals of the New York Academy of Sciences, vol. 1054, pp. 186–195, 2005.

A. Kuliev, S. Rechitsky, O. Verlinsky et al., “Preimplantation diagnosis and HLA typing for haemoglobin disorders,” Reproductive BioMedicine Online, vol. 11, no. 3, pp. 362–370, 2005.

J. Reichenbach, H. D. van Velde, M. de Rycke et al., “First successful bone marrow transplantation for X-linked chronic granulomatous disease by using preimplantation female gender typing and HLA matching,” Pediatrics, vol. 122, no. 3, pp. e778–e782, 2008.

H. van de Velde, M. de Rycke, C. de Man et al., “The experience of two European preimplantation genetic diagnosis centres on human leukocyte antigen typing,” Human Reproduction, vol. 24, no. 3, pp. 732–740, 2009.

A. M. Hellani, S. M. Akoum, E. S. Fadel, H. M. Yousef, and K. K. Abu-Amero, “Successful pregnancies after combined human leukocyte antigen direct genotyping and preimplantation genetic diagnosis utilizing multiple displacement amplification,” Saudi Medical Journal, vol. 33, pp. 1059–1064, 2012.

F. Lamazou, J. Steffann, N. Frydman et al., “Preimplantation diagnosis with HLA typing: birth of the first double hope child in France,” Journal de Gynécologie Obstétrique et Biologie de la Reproduction, vol. 40, no. 7, pp. 682–686, 2011.

T. El-Toukhy, H. Bickerstaff, and S. Meller, “Preimplantation genetic diagnosis for haematologic conditions,” Current Opinion in Pediatrics, vol. 22, no. 1, pp. 28–34, 2010.

R. A. Smith, P. J. Ho, J. B. Clegg, J. R. Kidd, and S. L. Thein, “Recombination breakpoints in the human β-globin gene cluster,” Blood, vol. 92, no. 11, pp. 4415–4421, 1998.

G. L. Harton, M. de Rycke, F. Fiorentino et al., “ESHRE PGD consortium best practice guidelines for amplification-based PGD,” Human Reproduction, vol. 26, no. 1, pp. 33–40, 2011.

A. Peciña, M. D. Lozano-Arana, J. C. García-Lozano, S. Borrego, and G. Antiñolo, “One-step multiplex polymerase chain reaction for preimplantation genetic diagnosis of Huntington disease,” Fertility and Sterility, vol. 93, no. 7, pp. 2411–2412, 2010.

R. Carrillo-Vadillo, J. C. García-Lozano, M. D. Lozano-Arana, J. L. M. Rivera, P. Sánchez Martín, and G. Antiñolo, “Two sets of monozygotic twins after intracytoplasmic sperm injection and transfer of two embryos on day 2,” Fertility and Sterility, vol. 88, no. 6, pp. 1676.e3–1676.e5, 2007.

I. Liebaers, K. Sermon, C. Staessen et al., “Clinical experience with preimplantation genetic diagnosis and intracytoplasmic sperm injection,” Human Reproduction, vol. 13, supplement 1, pp. 186–195, 1998.

A. R. Thornhill, C. E. deDie-Smulders, J. P. Geraedts et al., “ESHRE PGD Consortium ‘best practice guidelines for clinical preimplantation genetic diagnosis (PGD) and preimplantation genetic screening (PGS)’,” Human Reproduction, vol. 20, no. 1, pp. 35–48, 2005.

L. Malfroy, M. P. Roth, M. Carrington et al., “Heterogeneity in rates of recombination in the 6-Mb region telomeric to the human major histocompatibility complex,” Genomics, vol. 43, no. 2, pp. 226–231, 1997.

M. Martin, D. Mann, and M. Carrington, “Recombination rates across the HLA complex: use of microsatellites as a rapid screen for recombinant chromosomes,” Human Molecular Genetics, vol. 4, no. 3, pp. 423–428, 1995.

H. van de Velde, I. Georgiou, M. de Rycke et al., “Novel universal approach for preimplantation genetic diagnosis of β-thalassaemia in combination with HLA matching of embryos,” Human Reproduction, vol. 19, no. 3, pp. 700–708, 2004.