BioMed Research International

Volume 2013 (2013), Article ID 640638, 4 pages

http://dx.doi.org/10.1155/2013/640638

Clinical Study

Cerebral Blood Flow Dynamics and Head-of-Bed Changes in the Setting of Subarachnoid Hemorrhage

David K. Kung,¹ Nohra Chalouhi,² Pascal M. Jabbour,² Robert M. Starke,³ Aaron S. Dumont,² H. Richard Winn,¹ Matthew A. Howard III,¹ and David M. Hasan¹

¹Department of Neurosurgery, University of Iowa Hospitals and Clinics, 200 Hawkins Drive, JCP 1616, Iowa City, IA 52242, USA

²Department of Neurosurgery, Thomas Jefferson University and Jefferson Hospital for Neuroscience, Philadelphia, PA, USA

³Department of Neurological Surgery, University of Virginia School of Medicine, Charlottesville, VA, USA

Received 16 September 2013; Accepted 30 October 2013

Academic Editor: Steven J. Monteith

Copyright © 2013 David K. Kung et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Head-of-bed (HOB) elevation is usually restricted in patients with aneurysmal subarachnoid hemorrhage (SAH). The goal of this study is to correlate HOB changes ( and ) with cerebral blood flow using transcranial Doppler (TCD) and thermal diffusion probe in SAH patients. Thirteen patients with SAH were prospectively enrolled in the study. Eight patients underwent placement of a thermal diffusion probe for regional CBF measurement. CBF values were measured with the patients in flat () and upright sitting positions () at days 3, 7, and 10. The average increase in blood flow velocity when changing HOB from to was 7.8% on day 3, 0.1% on day 7, and 13.1% on day 10. The middle cerebral artery had the least changes in velocity. The average regional CBF measurement was 22.7 ± 0.3 mL/100 g/min in the supine position and 23.6 ± 9.1 mg/100 g/min in the sitting position. The changes were not statistically significant. None of the patients developed clinical cerebral vasospasm. Changing HOB position in the setting of SAH did not significantly affect cerebral or regional blood flow. These data suggest that early mobilization should be considered given the detrimental effects of prolonged bed rest.

1. Introduction

Patients who suffer aneurysmal SAH are at risk of secondary injuries including cerebral edema and delayed cerebral vasospasm. Traditionally, as a part of the overall treatment protocol for SAH, patients are kept in prolonged bed rest. The assumption is that bed rest will help maintain adequate blood flow to the brain. However, the data supporting this assumption are limited [1].

Blood flow to the brain is critical and complex. CBF is influenced by multiple factors including systemic arterial pressure, distance of the head above the heart, venous and CSF drainage, and vascular tone of cerebral vessels [2]. In a normal individual, as the head is raised, the systemic arterial pressure is maintained by blood pressure reflexes. At the same time, the arterial perfusion pressure to the head is reduced by the distance the head is raised above the heart, but the intracranial pressure is also reduced because of the improved venous drainage. Together with an intact autoregulation response of the cerebral vasculature, the net effect is little change in CBF [3–5]. However, in patients with impaired autoregulation or with vasospasm following SAH, a raise in head position may theoretically diminish CBF. Conversely, in the case of significant cerebral edema after SAH, it may be important to raise the head to improve venous drainage and maximize cerebral perfusion pressure.

Prolonged bed rest, particularly in the elderly and the critically ill, carries its own morbidity [6]. Extensive research has documented the deleterious effects of prolonged bed rest in multiple organ systems, including cardiovascular, musculoskeletal, cognitive, hematologic, and respiratory [7–10]. Significant physiological deterioration begins on the first few days of bed rest. These complications add to the already devastating neurologic injury incurred by SAH.

Considering the potential deleterious effects of prolonged bed rest and its dubious benefit in maintaining cerebral blood flow, we investigated the effect of head position on cerebral blood flow in SAH patients. We hypothesize that the routine practice of placing SAH patients in prolonged bed rest is unnecessary to maintain stable CBF.

2. Material and Methods

The study protocol was approved by the University of Iowa Institutional Review Boards. In this prospective study, we used two complementary methods to investigate the effects of head position on CBF in SAH patients. SAH patients who underwent placement of ventriculostomy and thermal diffusion CBF monitor were included prospectively. Thermal diffusion probes (Hemedex, Cambridge, MA, USA) were inserted through the same burr hole as the ventriculostomy to a depth of 2 cm but at an angle so that the tip of the probe is away from the ventriculostomy tubing (Figure 1). Immediately after probe placement and before the patients were extubated, the end-tidal CO₂ were adjusted within normal limit to check for associated change in CBF in order to verify proper functioning of the probe (Figure 2). Another group of SAH patients was also enrolled and underwent TCD studies only. Changes in head position and the corresponding changes in CBF parameters were evaluated. Specifically, on days 3, 7, and 10, the patient’s CBF measurements (as measured by transcranial Doppler and thermal diffusion probe) were recorded in the supine and the 90-degree upright position 10 minutes later. TCD data were obtained in the medial cerebral arteries (MCA), the anterior cerebral arteries (ACA), and the posterior cerebral arteries (PCA) bilaterally using a handheld probe. Basic patient information such as age, sex, clinical exam, and hospital course was recorded. Delayed cerebral ischemia was defined as symptomatic vasospasm or infarction on CT attributable to vasospasm [11]. The percentage changes in mean blood flow velocity in each distribution from supine to sitting were calculated. Paired Student’s t-test was used to determine statistical significance.

Figure 1: Postoperative head CT scan demonstrating the position of the thermal diffusion blood flow probe.

Figure 2: A typical tracing of thermal diffusion CBF measurement in response to change in end-tidal CO₂.

3. Results

The demographic details of the patients enrolled are shown in Table 1. Thirteen patients were enrolled, and the average age was 63 (ranging from 21 to 85). Seventy-seven percent (10/13) were females. Eight patients were studied with both thermal diffusion probe and TCD; five patients were studied with TCD only. The average Fisher grade was SD, and the average Hunt-Hess grade on admission was SD (ranging from 1 to 5). None of the patients had an adverse event with the manipulation of the head-of-bed. None of the patients developed delayed cerebral ischemia.

Table 1: Patients demographic.

Patient
Age
Sex
Fisher grade
WFNS
Hunt-Hess
Aneurysm location
Thermal diffusion probe

1
53
Female
2
1
1
pcom
y

2
72
Female
4
4
3
acom
y

3
74
Female
4
5
5
PICA
y

4
42
Female
3
1
2
pcom
y

5
63
Female
3
2
2
pcom
y

6
85
Female
4
2
3
acom
y

7
39
Female
4
1
2
acom
y

8
21
Female
2
1
1
pcom
y

9
77
Male
3
4
4
pcom
n

10
76
Male
3
2
3
acom
n

11
69
Male
4
2
4
acom
n

12
81
Female
4
2
2
acom
n

13
71
Female
3
1
1
acom
n

3.1. TCD Results

The MCA, ACA, and PCA were individually insonated bilaterally in both the supine and the upright sitting positions. The average increase in blood flow velocity from supine to sitting was 7.8% on day 3, 0.1% on day 7, and 13.1% on day 10. When each vessel was examined individually, the MCA appears to have the least changes in velocity depending on position (average 0.9% on day 3, −3.2% on day 7, and 1% on day 10). The ACA had 11.1% increase in velocity on day 3, −9.2% on day 7, and 24.2% on day 10. The PCA had 12.9% increase on day 3, 11.3% on day 7, and 14.7% on day 10. The absolute velocities were illustrated in Table 2. None of the velocity changes reaches statistical significance except for MCA changes on day 7 (). TCD value changes did not have any associated clinical manifestations, irrespective of Fisher or Hunt-Hess grade.

Table 2: Average blood flow velocities and percentage changes in each vascular distribution.

(a)

Average velocity (cm/s)
Day 3
Day 7
Day 10

Supine
Upright
Supine
Upright
Supine
Upright

MCA
79
73
111
106
90
92

SD
56
41
49
46
46
52

ACA
69
72
72
62
56
68

SD
42
46
23
23
26
39

PCA
70
75
59
68
67
72

(b)

Percentage changes from supine to upright (%)
Day 3
Day 7
Day 10

MCA
0.9
−3.2
1.0

ACA
11.1
−9.2
24.2

PCA
12.9
11.3
14.6

3.2. Thermal Diffusion CBF Measurement Results

3.2.1. PCO₂ Challenge and Regional CBF

Regional cerebral blood flow changed expectedly with changes in end-tidal PCO₂ induced by adjusting ventilation (Figure 1). The regional cerebral blood flow increased with increased PCO₂ and decreased with decreased PCO₂. The average CBF changed from 13.7 to 23.6 cc/100 g/min with end-tidal PCO₂ changes from 30 to 40 mmHg ().

3.2.2. Postural Changes and Regional CBF

Thermal diffusion CBF measurement was done in 8 patients. The average CBF measurement in the supine position was  mL/100 g/min. The average measurement in the 90-degree sitting position was  mg/100 g/min. There was no statistically significant difference between the two groups ().

4. Discussion

Prolonged bed rest results in multiple physiological changes that could be detrimental. Supine positioning decreases tidal volume and minute ventilator volume [12, 13] and impairs the ability to clear secretions, resulting in atelectasis and pneumonia. Prolonged immobilization also results in negative nitrogen balance, calcium loss, diminished muscle strength, and orthostatic intolerance [10]. The risk of oxygen desaturation is higher in the supine position [14]. These changes are particularly pronounced in the elderly [15]. The rationale for supine positioning of SAH is to avoid hypoperfusion of the brain, especially considering the risk of delayed cerebral ischemia after SAH. However, several studies have shown that the incidence of clinical vasospasm is lower in the elderly [16, 17]. Therefore, it is unclear whether the risks of bed rest outweigh its presumed benefit, particularly in the older SAH population.

Zhang and Rabinstein [18] investigated the effects of HOB positioning on mean flow velocity in SAH patients using TCD. Measurements were taken for two HOB positions: first at 30°–45° and then at 0°– 15°. The authors found that HOB position did not significantly affect mean flow velocity and concluded that HOB position does not need to be specifically considered when interpreting the results of TCD studies in SAH patients. Blissitt et al. [19] also used TCD to study the effect of HOB elevation (at 20 and 45 degrees) on cerebrovascular dynamics in patients with mild or moderate vasospasm and found no consistent pattern of CBF changes. The measurements in both studies, however, were restricted to only one cerebral artery territory (MCA), the measurements were done in only one time point, and other modalities for cerebral perfusion assessment were not employed. The results of our study are in line with those of previous studies.

4.1. Implications

The current preference of restricting patients with SAH to only flat bed rest should be reconsidered, and HOB should be liberated pending changes in clinical exam. Changes in clinical examination when HOB is elevated are possibly suggestive of loss of autoregulation in these patients and/or early signs of vasospasm although this remains speculative and no such changes were observed herein.

4.2. Limitations

This study is limited by the small number of patients enrolled and that none of the patients developed delayed cerebral ischemia. The thermal diffusion probe provided continuous and absolute bedside measurement of regional CBF. However, the probe only samples a very small area in the white matter. We, therefore, performed TCD studies in multiple vascular territories as well in order to cross-validate the findings from these two complimentary methods.

5. Conclusion

We used two complimentary methods of CBF measurement to study cerebral hemodynamic in association with postural changes in the SAH patients. Changing HOB did not significantly affect either cerebral blood flow velocity or regional cerebral blood flow. These data suggest that early mobilization is not harmful and should be considered given the detrimental effects of prolonged bed rest.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

References

A. W. Wojner-Alexandrov, Z. Garami, O. Y. Chernyshev, and A. V. Alexandrov, “Heads down: flat positioning improves blood flow velocity in acute ischemic stroke,” Neurology, vol. 64, no. 8, pp. 1354–1357, 2005.

T. Kulik, Y. Kusano, S. Aronhime, A. L. Sandler, and H. R. Winn, “Regulation of cerebral vasculature in normal and ischemic brain,” Neuropharmacology, vol. 55, no. 3, pp. 281–288, 2008.

K. March, P. Mitchell, S. Grady, and R. Winn, “Effect of backrest position on intracranial and cerebral perfusion pressures,” The Journal of Neuroscience Nursing, vol. 22, no. 6, pp. 375–381, 1990.

T. Lovell, A. C. Marshall, C. E. Elwell, M. Smith, and J. C. Goldstone, “Changes in cerebral blood volume with changes in position in awake and anesthetized subjects,” Anesthesia and Analgesia, vol. 90, no. 2, pp. 372–376, 2000.

G. Lefthériotis, M. P. Preckel, L. Fizanne, J. Victor, J. M. Dupuis, and J. L. Saumet, “Effect of head-upright tilt on the dynamic of cerebral autoregulation,” Clinical Physiology, vol. 18, no. 1, pp. 41–47, 1998.

R. A. Asher, “The dangers of going to bed,” The British Medical Journal, vol. 2, no. 4536, p. 967, 1947.

D. K. Dittmer and R. Teasell, “Complications of immobilization and bed rest—part 1: musculoskeletal and cardiovascular complications,” Canadian Family Physician, vol. 39, pp. 1428–1432, 1435–1437, 1993.

R. Teasell and D. K. Dittmer, “Complications of immobilization and bed rest—part 2: other complications,” Canadian Family Physician, vol. 39, pp. 1440–1445, 1993.

M. B. Drakulovic, A. Torres, T. T. Bauer, J. M. Nicolas, S. Nogué, and M. Ferrer, “Supine body position as a risk factor for nosocomial pneumonia in mechanically ventilated patients: a randomised trial,” The Lancet, vol. 354, no. 9193, pp. 1851–1858, 1999.

J. E. Deitrick, G. D. Whedon, and E. Shorr, “Effects of immobilization upon various metabolic and physiologic functions of normal men,” The American Journal of Medicine, vol. 4, no. 1, pp. 3–36, 1948.

J. A. Frontera, A. Fernandez, J. M. Schmidt et al., “Defining vasospasm after subarachnoid hemorrhage: what is the most clinically relevant definition?” Stroke, vol. 40, no. 6, pp. 1963–1968, 2009.

R. W. Stremel, V. A. Convertino, E. M. Bernauer, and J. E. Greenleaf, “Cardiorespiratory deconditioning with static and dynamic leg exercise during bed rest,” Journal of Applied Physiology, vol. 41, no. 6, pp. 905–909, 1976.

L. Svanberg, “Influence of posture on the lung volumes, ventilation and circulation in normals, a spirometric-bronchospirometric investigation,” Scandinavian Journal of Clinical & Laboratory Investigation, vol. 9, supplement 25, pp. 1–195, 1957.

T. Elizabeth, J. Singarayar, J. Ellul, D. Barer, and M. Lye, “Arterial oxygen saturation and posture in acute stroke,” Age and Ageing, vol. 22, no. 4, pp. 269–272, 1993.

E. D. O'Connor and J. Walsham, “Should we mobilise critically ill patients? A review,” Critical Care and Resuscitation, vol. 11, no. 4, pp. 290–300, 2009.

M. T. Torbey, T.-K. Hauser, A. Bhardwaj et al., “Effect of age on cerebral blood flow velocity and incidence of vasospasm after aneurysmal subarachnoid hemorrhage,” Stroke, vol. 32, no. 9, pp. 2005–2011, 2001.

C. Charpentier, G. Audibert, F. Guillemin et al., “Multivariate analysis of predictors of cerebral vasospasm occurrence after aneurysmal subarachnoid hemorrhage,” Stroke, vol. 30, no. 7, pp. 1402–1408, 1999.

Y. Zhang and A. A. Rabinstein, “Lower head of the bed position does not change blood flow velocity in subarachnoid hemorrhage,” Neurocritical Care, vol. 14, no. 1, pp. 73–76, 2011.

P. A. Blissitt, P. H. Mitchell, D. W. Newell, S. L. Woods, and B. Belza, “Cerebrovascular dynamics with head-of-bed elevation in patients with mild or moderate vasospasm after aneurysmal subarachnoid hemorrhage,” American Journal of Critical Care, vol. 15, no. 2, pp. 206–216, 2006.