BioMed Research International

Volume 2013 (2013), Article ID 795458, 13 pages

http://dx.doi.org/10.1155/2013/795458

Research Article

Chitosan Dermal Substitute and Chitosan Skin Substitute Contribute to Accelerated Full-Thickness Wound Healing in Irradiated Rats

Abu Bakar Mohd Hilmi,¹ Ahmad Sukari Halim,¹ Hasnan Jaafar,¹ Abu Bakar Asiah,² and Asma Hassan¹

¹Reconstructive Sciences Unit, School of Medical Sciences, Universiti Sains Malaysia, 16150 Kelantan, Malaysia

²Craniofacial Laboratory, School of Dental Sciences, Universiti Sains Malaysia, 16150 Kelantan, Malaysia

Received 4 July 2013; Revised 12 September 2013; Accepted 29 September 2013

Academic Editor: Esmaiel Jabbari

Copyright © 2013 Abu Bakar Mohd Hilmi et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Wounds with full-thickness skin loss are commonly managed by skin grafting. In the absence of a graft, reepithelialization is imperfect and leads to increased scar formation. Biomaterials can alter wound healing so that it produces more regenerative tissue and fewer scars. This current study use the new chitosan based biomaterial in full-thickness wound with impaired healing on rat model. Wounds were evaluated after being treated with a chitosan dermal substitute, a chitosan skin substitute, or duoderm CGF. Wounds treated with the chitosan skin substitute showed the most re-epithelialization (33.2 ± 2.8%), longest epithelial tongue (1.62 ± 0.13 mm), and shortest migratory tongue distance (7.11 ± 0.25 mm). The scar size of wounds treated with the chitosan dermal substitute (0.13 ± 0.02 cm) and chitosan skin substitute (0.16 ± 0.05 cm) were significantly decreased () compared with duoderm (0.45 ± 0.11 cm). Human leukocyte antigen (HLA) expression on days 7, 14, and 21 revealed the presence of human hair follicle stem cells and fibroblasts that were incorporated into and surviving in the irradiated wound. We have proven that a chitosan dermal substitute and chitosan skin substitute are suitable for wound healing in full-thickness wounds that are impaired due to radiation.

1. Introduction

Wound healing is a complex biological process that involves molecular and cellular responses. The function of wound healing is to rapidly and functionally produce skin layers and appendages that are free of scars and as physiologically fit as native skin. The reconstruction of skin after injury involves different types of wound healing depending on the wound classification. For example, skin with a superficial loss of the epidermis gradually heals over time without intervention. In a partial-thickness wound, the epidermis primarily heals by re-epithelialization, which is the resurfacing of a wound bed by neokeratinocytes. In a surgical setting, partial-thickness wounds heal by primary intention, also known as surgical wound healing. This type of healing employs sutures, staples, glue, or strips between both sides of the wound edge to close the wound bed. The major events in healing by primary intention are connective tissue deposition and re-epithelialization. There is no formation of granulation tissue or wound contraction [1].

Wounds with a full-thickness loss of the dermis and epidermis cannot be repaired by primary intention. In the case where a large amount of skin is removed or destroyed, a gap occurs in the wound or a nonviable wound margin is present. As a result, the wound edges cannot be approximated. The presence of a wound gap prevents re-epithelialization. In this case, wounds can only heal by grafting epidermis over the wounded area. In the absence of a graft, the wound will reepithelialize slowly and imperfectly via the ingrowths of cell from the wound edges, which leads to increased scar formation.

However, biomatrices may be an alternative to a graft. Biomatrices are made of biopolymers that are often resorbed or degraded in the body and are regularly used in therapeutic applications [2], especially in skin tissue engineering. With biomatrices, wound healing can be manipulated to produce more regenerative tissue than scar tissue [3]. Biomatrices or cell-biomatrix constructs create the optimal conditions for accelerated wound healing which result in less or no scar formation and easy handling for transplantation and replaces the use of skin grafts. In the current study, full-thickness wounds with impaired healing were treated with three biomaterials: a chitosan dermal substitute, a chitosan skin substitute, and duoderm CGF. Wounds were then histomorphometrically evaluated. We concluded that the chitosan dermal substitute and chitosan skin substitute contributed to the accelerated wound healing in irradiated rats.

2. Materials and Methods

This research was approved by the Animal Ethics Committee of Universiti Sains Malaysia. Approval code: USM/Animal Ethics Approval/2009/(44)(133). The animal procedures were conducted in accordance with the guidelines of the Animal Research and Service Centre, USM.

2.1. Animal Radiation

Three-month-old male Sprague Dawley rats, weighing 300–350 g, were randomized into three groups based on postwound time frames of 7, 14 or 21 days ( each). The rats were housed in separate cages at 22°C–26°C and alternating 12-hour light and dark cycles in a controlled room. The rats were fed a standard laboratory diet and water ad libitum. Prior to radiation, the rats were anesthetized with an intramuscular injection of ketamine (100 mg/kg) and xylazine (20 mg/kg). The dorsal area was shaved and marked. Skin irradiations were carried out using the source-skin distance technique (SSD) with a 6 MV photon beam from a linear accelerator (Siemens Primus, Germany). A SSD at 100 cm with a gantry angle of 0°, a collimator 0°, and a radiation field size of 3 cm × 10 cm was performed on the dorsum of each rat. The dorsum of each rat was given a single dose of 10 Gy. A 1.5 cm tissue-equivalent bolus of material was placed over the dorsal area to bring the full radiation dose to the skin surface [4, 5].

2.2. Biomaterials

Three bio-templates for skin regeneration were used: a chitosan dermal substitute, a chitosan skin substitute, and duoderm CGF. The chitosan sponge was fabricated as previously described [6]. In this study, it is named as chitosan dermal substitute. It was produced from ultrapure medical-grade chitosan powders of prawn shell. Chitosan powders were irradiated with 10 kGy of gamma radiation to produce a molecular weight of 440,000 Daltons and dissolved in 0.5 M acetic acid which formed a solution. To obtain a sponge layer, the chitosan solution is poured into a 10 cm by 10 cm polytetrafluoroethylene (PTFE) mold, deep-frozen at −20°C for 24 hours and freeze drying for 20 hours. Duoderm CGF is commercially produced (Convatec, USA). It composed of gel and matrix layers. To fabricate the chitosan skin substitute, chitosan sponge matrices were seeded with human dermal fibroblasts at a density of /cm² for two weeks, followed by being co-cultured or one week with primary human hair follicle stem cells (HFSCs) at a density of /cm². The isolation of HFSCs was described previously [7]. Briefly, the dermis containing hair follicle was incubated in 0.1% (w/v) collagenase type I (Gibco, USA) before being cultured in CnT-07 medium (CellnTech, Switzerland). The coculture was performed using a combination of Dulbecco’s Modified Eagle Medium/Ham’s F12 (DMEM/F12) (Invitrogen, USA) and supplemented with 5% fetal bovine serum (FBS) (Invitrogen, USA) and CnT-07 medium at ratio of 1 : 2. After three weeks in culture, the chitosan skin substitute was harvested for wound healing experiments.

2.3. Wound Creation

Two months postradiation, three full-thicknesses wounds 1 cm by 1 cm in size were excised on the irradiated dorsum of each rat. Prior to incision, the rats were anesthetized with an intramuscular injection of ketamine (100 mg/kg) and xylazine (20 mg/kg). The fur on the dorsal skin was shaved. The shaved area was scrubbed and sterilized with 70% alcohol and then sprayed with povidone-iodine. Animals were placed on a heated surgery table and incisional wound was created using a sterile scalpel and blade (size 10). Each of the wounds was randomly covered with one of the three different types of biomaterials as mentioned above.

2.4. Histomorphometrical Analysis

To determine the length of the epithelial tongue, the distance of the migratory tongue, and the scar size, a computer-based histological image analysis () was performed using the Mirax Viewer (Zeiss, Germany). The scar size was measured between the gaps in granulation tissues as mentioned previously [8] with modification. The percentage of re-epithelialization was measured as the ratio of the neoepidermis and the wound area [9]. The percentage of the wound size was calculated as the ratio of the wound size at day x over the wound size at day 0 [10].

2.5. Wound Assessment

The wound assessment was performed without removing the biomaterials or cleaning the debris from the wound bed during the healing process. Seven parameters were assessed on days 7, 14, and 21 using the following scoring system: infection (pus), 1 if absent or 2 if present; hematoma, 1 If absent or 2 if present; exudates, 1 if high, or 2 if intermediate, or 3 if low; odor, 1 if strong, or 2 if intermediate, or 3 if none; flexibility, 0 if not flexible or 3 if flexible; adherence of biomaterials, 0 if nonadherent or 3 if adhered strongly; and fluid accumulation on biomaterials, 0 if yes or 3 if no. Scoring was based on the wound edge because the wound bed was covered with permanent tissue-engineered biomaterials.

2.6. Dressing

Secondary wound dressings were performed using Hypafix (BSN Medical, Germany) and Tg fix (Lohmann & Rauscher, Germany). Prior to the dressing, the rats were anesthetized with inhaled isoflurane. To avoid attaching the biomaterials to the Hypafix which causes tears in the biomaterials after removing the Hypafix, gauze was used to cover the sticky side of a 1 cm by 1 cm piece of opsite flexi grid (Smith & Nephew, England) and this was applied over the biomaterial. Tg fix was used as a second layer of dressing before the wounds were covered with a bandage. The wound dressing was changed every three days.

2.7. Wound Evaluation

Rats in each group were sacrificed on postoperative days 7, 14, or 21 with an intramuscular injection of an over dose of ketamine (100 mg/kg) and xylazine (20 mg/kg). Images of the wounds were captured and measured before the wounds were excised. The excised area included the wound bed and intact skin and was then fixed with 10% formalin before histological analysis using H&E staining. The images of stained samples were captured, measured, and analyzed using a Mirax Desk Scanner (Zeiss, Germany).

2.8. Immunofluorescence

Immunofluorescent staining was performed on paraffin-embedded sections. Sections were placed on hot plate for two hours, deparaffinized in xylene, and rehydrated using a graded series of 100, 95, 80, 70, and 50% ethanol followed by distilled water. Pretreatment was performed using a water bath containing a target retrieval solution (pH 9) (Dako, Denmark) at 98°C for 15 minutes. Evaluation of the human tissue engrafted into the wound bed was performed using mouse monoclonal antibodies against human HLA (1 : 100) (Abcam, UK) or rat K10 (1 : 500) (Abcam, UK) for evaluation of the proliferation of the neoepidermis. To block nonspecific antibody-antigen binding, sections were preincubated with 10% normal serum in tris-buffered saline (TBS) for 20 minutes. Incubation with a primary antibody was performed at 4°C overnight. Sections were incubated with a fluorescent goat polyclonal secondary antibody against mouse IgG at room temperature for 45 minutes. Nuclei were counter stained with DAPI. Slides were mounted with fluoromount-G (Southern Biotech, USA) and viewed under Axioplant2 fluorescent microscope (Zeiss, Germany).

2.9. Statistics

The data on physical observation are presented as the means ± SEM. The rest, an ANOVA was used for analyses. A significant difference was considered when . Bonferroni test was used to identify statistically significant differences between specific intergroup mean values.

3. Results

Postradiation symptoms in rats can be observed physically and histologically (Figure 1). During the proliferation stage at day 7, the migratory tongue distance (MT), the epithelial tongue (ET), and re-epithelialization were analyzed for both the irradiated and nonirradiated groups. The ET in irradiated wounds treated with a chitosan skin substitute was longer ( mm) than those in the irradiated wounds treated with a chitosan dermal substitute ( mm) or duoderm ( mm) ( and , resp.) In the nonirradiated wounds, the ET was longer after wounds were treated with a chitosan dermal substitute ( mm) compared to a chitosan skin substitute ( mm) or duoderm ( mm) (Figure 2) .

(a)

(b)

(c)

Figure 1: Radiation-induced temporary hair loss at dorsal area (a). Hematoxylin and Eosin (H&E) stained images of irradiated rat (b) and nonirradiated rat (c). Irradiated skin has no hair; anatomical and functional changes in hair follicles and sebaceous glands. Scale bar: (a) 3 cm, (b) and (c): 200 µm.

Figure 2: H&E stained images of irradiated and nonirradiated wounds on day 7. The square dotted line indicates the epithelial tongue (ET). The dash dotted line shows the area between wound edge and unwounded skin. Scale bar: 500 µm. (SG: sebaceous gland, HF: hair follicle).

The MT distances in irradiated wounds treated with chitosan skin substitutes were shorter ( mm) than irradiated wounds treated with a chitosan dermal substitute ( mm) or duoderm ( mm) ( and , resp.). In nonirradiated wounds, the MT distances were shorter in wounds that were treated with duoderm ( mm) compared to the chitosan skin substitute ( mm) or the chitosan dermal substitute ( mm) (Figure 3) ( and , resp.).

Figure 3: H&E stained images of irradiated and nonirradiated wounds on day 7. The arrow head indicates the epithelial tongue. The dash dotted lines show the outline of the migratory tongue (MT) distance. All biomaterials were adsorbed in wound bed in nonirradiated group ((d), (e), (f)). Scale bar: 200 µm.

There was greater re-epithelialization in the irradiated wounds treated with the chitosan skin substitute (%) than those treated with the chitosan dermal substitute (%) or duoderm (%) ( and , resp.). In nonirradiated wounds, the re-epithelialization was higher after wounds were treated with the chitosan dermal substitute (%) compared to the chitosan skin substitute (%) or duoderm (%) () (Figure 4(a)).

(a) Reepithelialization on day 7

(b) Wound size in irradiated and nonirradiated (*) group after treatment with different biomaterials

Figure 4: Reepithelialization of irradiated and nonirradiated wounds on day 7 (a) and full-thickness wound size evaluation (b).

Between day 7 and day 21, nonirradiated wound sizes were decreased after coverage with skin substitutes. In irradiated wounds, the chitosan skin substitute was associated with a complete repair of the full-thickness wounds by day 21. Conversely, duoderm CGF was found to increase the wound size on day 21 compared to day 14. It was suggested that duoderm CGF cannot be used for long-term dressings for impaired healing (Figure 4(b)). Duoderm CGF can only be used for temporary primary dressing.

During the remodeling stage, sampled on day 21, the chitosan dermal substitutes and chitosan skin substitutes significantly contributed to the acceleration of wound repair in impaired healing when compared to duoderm in terms of scar size ( and , resp.). The scar size was smaller in wounds treated with the chitosan dermal substitute ( cm) and the chitosan skin substitute ( cm). However, with duoderm, the scars were longer ( cm). In nonirradiated wounds, treatment with the chitosan skin substitute was associated with smaller scar sizes ( cm) than those in wounds treated with the chitosan dermal substitute ( cm) or duoderm ( cm) (Figure 5). However, the difference was not significant ().

Figure 5: H&E stained images of irradiated and nonirradiated wounds on day 21. The double-headed arrows indicate the width of the scar. The dashed lines show the outline of the neodermis regeneration and granulation tissue. Scale bar: 1000 µm.

K10 expression along the migratory tongue was assessed on days 7, 14, and 21 (Figure 6). The mode of expression was different between irradiated and nonirradiated wounds. HLA expression on irradiated and nonirradiated wounds treated with the chitosan skin substitute was determined on days 7, 14, and 21 (Figure 7).

(a)

(b)

(c)

(d)

(e)

(f)

(g)

(h)

(i)

(j)

(k)

(l)

(m)

(n)

(o)

(p)

(q)

(r)

Figure 6: Expression of K10 along the migratory tongue. On day 7 postwound, there is no expressions in the irradiated rat ((b), (c)). However, the wound with chitosan skin substitute slightly expressed K10 (a with asterisk), and the nonirradiated rat showed similar results ((d), (e), (f)). K10 started to be slightly expressed in the irradiated rat on day 14 ((g), (h), (i)). K10 was highly expressed on day 14 in the nonirradiated rat ((j), (k), (l)) and on day 21 in the irradiated rat ((m), (n), (o)). The nonirradiated rats continuously expressed K10 on day 21 ((p), (q), (r)). Scale bar: 20 µm. (E: epidermis, D: dermis).

Figure 7: HLA (green fluorescence) was incorporated into wounds on days 7 ((a), (d)), 14 ((b), (e)), and 21 ((c), (f)). The positive control of human skin (g). The negative control of chitosan dermal substitute-treated wounds (h) and duoderm-treated wounds (i). The epidermis and dermis are demarcated via the dash dotted lines. Nuclei stained blue. Scale bar: 20 µm.

From physical observation, chitosan dermal substitute and chitosan skin substitute contributed to the acceleration of healing processes both in irradiated and nonirradiated full-thickness wounds with no pus, no haemorrhages, scant exudates, no odour, and no fluid accumulation while remaining in place (adhered to the wound) and retaining their flexibility (elasticity with motion) as shown in Tables 1 and 2. The events of wound healing were macroscopically summarized in Figure 8.

Table 1: Physical observation of irradiated wounds after treatment with three biomaterials.

Assessment (Score)
Mean ± SEM

Day 7
Day 14
Day 21

Infection-pus

    Chitosan skin substitute

    Chitosan dermal substitute

    Duoderm CGF

Hematoma

    Chitosan skin substitute

    Chitosan dermal substitute

    Duoderm CGF

Exudation

    Chitosan skin substitute

    Chitosan dermal substitute

    Duoderm CGF

Odor

    Chitosan skin substitute

    Chitosan dermal substitute

    Duoderm CGF

Flexibility

    Chitosan skin substitute

    Chitosan dermal substitute

    Duoderm CGF

Adherence

    Chitosan skin substitute

    Chitosan dermal substitute

    Duoderm CGF

Fluid accumulation

    Chitosan skin substitute

    Chitosan dermal substitute

The means were not significantly different between biomaterials (P > 0.05).

Table 2: Physical observation of nonirradiated wounds after treatment with three biomaterials.

Assessment (Score)
Mean ± SEM

Day 7
Day 14
Day 21

Infection-pus

    Chitosan skin substitute

    Chitosan dermal substitute

    Duoderm CGF

Hematoma

    Chitosan skin substitute

    Chitosan dermal substitute

    Duoderm CGF

Exudation

    Chitosan skin substitute

    Chitosan dermal substitute

    Duoderm CGF

Odor

    Chitosan skin substitute

    Chitosan dermal substitute

    Duoderm CGF

Flexibility

    Chitosan skin substitute

    Chitosan dermal substitute

    Duoderm CGF

Adherence

    Chitosan skin substitute

    Chitosan dermal substitute

    Duoderm CGF

Fluid accumulation

    Chitosan skin substitute

    Chitosan dermal substitute

The means were not significantly different between biomaterials (P > 0.05).

(a)

(b)

Figure 8: Macroscopic wound healing analysis in the irradiated (a) and nonirradiated wounds (b). On day 7, the wounds enlarged compared to day 0 due to inflammation. On day 14, the biomaterials adsorbed in (b) and the scars were clearly seen. Conversely, the biomaterials remain incorporated in (a). On day 21, a few wounds showed incomplete epithelialization presented with scab. The arrows showed the wound area. Scale bar 1 cm. (S: Scab).

4. Discussion

Radiation of rat skin at a high dose creates an ulcer that exhibits impaired wound repair. Histologically, irradiated skin has increased pigmentation, thickening, and fibrosis of the skin as well as alterations in sebaceous gland function. The resulting radiation damage affects the fibroblasts, keratinocytes and blood vessels and ultimately leads to skin hypoxia. Necrosis and tumorigenesis are further consequences of this impairment [11].

Full-thickness wounds are characterized by the destruction of the regenerative epithelial component. This type of wound heals by concurrent contraction and re-epithelialization. All excessive full-thickness wounds require skin grafting, as they show slow re-epithelialization. A lack of skin grafting can lead to extensive scarring with poor cosmetic and functional outcomes. Skin grafting creates damage at the donor site which generally heals with little scarring. The procedure causes pain at the donor site in addition to pain at the site of skin injury. Therefore, biomaterials for skin replacement are the best strategy for wound management in cases of excessive skin loss.

Our analyses have shown that the re-epithelialization in nonirradiated wounds was higher than that in irradiated wounds, but not in wounds with the chitosan skin substitute. This supports the conclusion that HFSCs, which play an important function in wound healing, do not normally respond in the healing process [12]. Re-epithelialization consists of the formation of a new epidermis by the synthesis of neokeratinocytes across a wound surface [13]. Re-epithelialization of a full-thickness wound occurs only at the edges of the wound and involves thickening and rolling beneath the edges. If the cells cannot continue to migrate across the wound bed, they build up an epithelial tongue along the edges of the wound (Figure 2) [14]. Immediately after-injury, epithelial cells start to migrate and change their phenotype. Epithelial cell mitosis is active in the migrating epithelial tongue and unwounded epidermis [15]. As a result, the migrating cells increase and the epithelial tongue develops. The migrating epidermis cells are also called the migrating epithelial tongue [16] or the migratory tongue. The cell migration terminates after the migrating epithelial tongue bridges both sides of the wound edge [17].

The epithelial tongue and migratory tongue distances were not significantly different between irradiated and nonirradiated wounds or between biomaterials (). This is because the measurement of the epithelial tongue formation and the migratory tongue distance were performed on day 7, which is considered a mature stage. Moreover, wound contraction had already started five days after the injury [18]. The combination of re-epithelialization and contraction increases the length of the epithelial tongue and shortens the migratory tongue distance. Therefore, an early assessment of the epithelial tongue and migratory tongue distance, for example, on day 4 is recommended to show a robust difference.

The appearance of a scar is a clinical manifestation of the remodelling stage of healing. It involves collagen synthesis, degradation of the vascular and cellular components of scar tissue, loss of scar tissue mass, and presentation of obvious changes in the visual appearance of wound site [1]. Collagen is deposited in the scar to strengthen the wound site and is also degraded in an attempt to remodel the wound. However, there is an imbalance between collagen deposition and degradation. In certain cases, the collagen production exceeds the collagen degradation, raising a thick scar [19]. However, wound healing can be manipulated to produce more regenerative tissue and less scar formation by using skin replacement products [20]. This study demonstrated that the chitosan skin substitute and chitosan dermal substitute generate significant tissue-engineered skin with less scaring than duoderm CGF () when used in an irradiated wound. In the nonirradiated wounds, the collagen production was interfered due to aggressive behaviour of the rats. They preferred to remove the dressing materials which cause starched to the wound bed and resulting poor collagen production. The wounds with the damaged biomaterials were not replaced with a new one, because a new biomaterial replacement will enhance wound healing and create bias to the experimental results. The irradiated rats were not aggressive compared with the nonirradiated rats. Therefore, the experimental results in the irradiated rats were consistent compared to those in the nonirradiated rats.

If the wound therapy is appropriate, on day 14, the wound edge will be dry, the biomaterial will be incorporated into the wound, and the amount of exudate must progressively diminish. The color and odor of the wound exudate are often used as indicators of wound infections. Pus (a yellow or green exudate) is a result of excessive bacterial loads and the demise of neutrophils after they have phagocytosed debris. Signs of infection can be observed if the wound has greater than 10⁵ bacteria. As a natural antimicrobial product, the chitosan dermal substitute and chitosan skin substitute significantly decreased the colonized bacterial growth in a full-thickness wound. Moreover, both of these chitosan substitutes were created as flexible elastic foams because of their ability to conform in proportion to the applied force [21]. The ability of a biomaterial to conform and return to its nominal shape or thickness is important in support surface systems. These two chitosans have been shown to be excellent hemostatic agents both in irradiated and nonirradiated full-thickness wounds. These findings were observed as early as day 3 during secondary dressing changes, where wound hemorrhages were not present. The ability of these two chitosans to absorb excess exudates may prevent trauma to the surrounding tissue.

K10 is a marker of differentiated epidermis. Its expression is low on the wound edge, but it is highly expressed on the migratory tongue adjacent to the wound [10]. K10 is not expressed on the wound bed as the neoepidermis is still proliferating and not fully differentiated or in a mature stage. HLA expression confirmed the mutual xenotransplantation incorporation with irradiated and nonirradiated wounds, as early as day 7 as described previously [22].

Rats are the most favourite wound healing animal models to recapitulate human physiology and forecast therapeutic outcomes. Rats have been widely used because of their availabilities, low cost, tractable nature, and ease of handling [23]. Additionally, established broad knowledge and promising results based on rat wound healing earned from previous studies are the main reason for rat utilizing. Inspired by the previous good results of the inflammatory evaluation in the rats treated with chitosan [24], we investigated the impact of using chitosan dermal substitute and chitosan skin substitute on impaired and nonimpaired wounds.

Irradiated rats have resulted in compromised skin integrity which compromised wound healing in irradiated tissue to lead the impede healing [25]. Meanwhile, the nonirradiated rats are fully immunocompetent. To date, human HFSCs cultured into chitosan have never been used to repair the wound in immunocompetent model. There are accumulative evidence of immunocompetent host tolerance to xenogenic fibroblasts, mesenchymal, or epithelial cells and they survived in the host for a few weeks [26–28]. The long-term survival of xenogenic cells and their proliferation up to four months in the fully immunocompetent host without sign of immune rejection have also been reported [29]. Fibroblasts are mostly immunologically toleranst [30]. Xenogenic fibroblasts have less tendency to tissue rejection as they expressed HLA without inducing T-cell proliferation [31]. Bone marrow stem cells and mesenchymal stem cells (MSCs) have shown the potential in vivo immune modulation and immune privileged properties [32–35]. Additional studies suggest that MSCs derived from human or animal express costimulatory antigens which results in immunoprivileged [27, 36, 37]. As none of the rats died of infection or presented with complication particularly at the wound site in the nonirradiated rats, HFSCs-chitosan constructs are suggested less or not prone to tissue rejection. The HFSCs resulted in immunoprivileged which MSCs have done in cell or tissue therapy. Moreover, the macroscopic image and physical observation of wounds have shown the comparable inflammatory response both in the irradiated or nonirradiated wounds. Since the rats were immunocompetent, the positive results are predicted due to the rat skin as an immunoprivileged site.

5. Conclusion

The radiation procedure has leaded the full-thickness wounds to have impaired healing. Direct observation of temporary hair loss on irradiated skin was present. In addition, histology analysis has proved anatomical changes of sebaceous gland as well as hair follicles. The use of chitosan dermal substitute and chitosan skin substitute has proven to accelerate full-thickness wound healing in irradiated rats as they significantly decreased the size of scar. The physical observation of wound assessment has shown that both of chitosan substitutes are ideal matrices for primary dressing. The use of HFSCs-chitosan construct on immunocompetent rat has shown their potential in vivo immune modulation and immune privileged properties.

Conflict of Interests

All authors declare that there is no conflict of interests regarding the research, authorship, and/or publication of this paper. The authors inform that all materials and trademarks mentioned were used just as a part of experimental protocol and there are no financial gains or favouritism of business.

Acknowledgments

The authors appreciated the assistance of Rageshwari Ramupillai from Carl Zeiss (M), who standardized the quality of the fluorescent analysis, the Animal Research and Service Centre staff, and the Craniofacial and Pathology laboratory staff for their technical assistance and advice. The authors thank the Universiti Sains Malaysia for awarding them the PRGS Grant 1001/PPSP/8144012 as well as the IAEA for Grant support.

References

C. Sussman and B. M. Bates-Jansen, “Wound healing physiology: acute and chronic,” in Wound Care a Collaborative Practice Manual for Health Professionals, C. Sussman and B. M. Bates-Jensen, Eds., pp. 21–51, Wolters Kluwer Health/Lippincott Williams & Wilkins, Philadelphia, Pa, USA, 2007.

A. D. Metcalfe and M. W. J. Ferguson, “Tissue engineering of replacement skin: the crossroads of biomaterials, wound healing, embryonic development, stem cells and regeneration,” Journal of the Royal Society Interface, vol. 4, no. 14, pp. 413–437, 2007.

E. S. Gil, B. Panilaitis, E. Bellas, and D. L. Kaplan, “Functionalized silk biomaterials for wound healing,” Advanced Healthcare Materials, vol. 2, pp. 206–217, 2013.

P. Kaspler, M. Pintilie, and R. P. Hill, “Dynamics of micronuclei in rat skin fibroblasts after X irradiation,” Radiation Research, vol. 172, no. 1, pp. 106–113, 2009.

M. A. Biel, T. Kim, and M. J. Trump, “Effect of radiation therapy and Photofrin on tissue response in a rat model,” Lasers in Surgery and Medicine, vol. 13, no. 6, pp. 672–676, 1993.

M. Hilmi, A. Bakar, A. S. Halim et al., “In vitro characterization of a chitosan skin regenerating template as a scaffold for cells cultivation,” SpringerPlus, vol. 2, no. 1, p. 79, 2013.

A. B. M. Hilmi, A. S. Halim, N. M. Noor, et al., “A simple culture method for epithelial stem cells derived from human hair follicle,” Central European Journal of Biology, vol. 8, pp. 432–439, 2013.

O. Ziv-Polat, M. Topaz, T. Brosh, and S. Margel, “Enhancement of incisional wound healing by thrombin conjugated iron oxide nanoparticles,” Biomaterials, vol. 31, no. 4, pp. 741–747, 2010.

T. Nishiyama, I. Kii, T. G. Kashima et al., “Delayed re-epithelialization in periostin-deficient mice during cutaneous wound healing,” PLoS ONE, vol. 6, no. 4, Article ID e18410, 2011.

X. Liang, S. Bhattacharya, G. Bajaj et al., “Delayed cutaneous wound healing and aberrant expression of hair follicle stem cell markers in mice selectively lacking ctip2 in epidermis,” PLoS ONE, vol. 7, no. 2, Article ID e29999, 2012.

J. L. Burns, J. S. Mancoll, and L. G. Phillips, “Impairments to wound healing,” Clinics in Plastic Surgery, vol. 30, no. 1, pp. 47–56, 2003.

M. Ito, Y. Liu, Z. Yang et al., “Stem cells in the hair follicle bulge contribute to wound repair but not to homeostasis of the epidermis,” Nature Medicine, vol. 11, pp. 1351–1354, 2005.

R. A. Bryant and D. P. Nix, Acute and Chronic Wounds: Current Management Concepts, Elsevier Mosby, Edinburgh, UK, 2007.

C. Sussman, “Assessment of the skin and wound,” in Wound Care a Collaborative Practice Manual for Health Professionals, C. Sussman and B. M. Bates-Jensen, Eds., pp. 85–122, Wolters Kluwer Health/Lippincott Williams & Wilkins, Philadelphia, Pa, USA, 3rd edition, 2007.

R. A. F. Clark, “Cutaneous tissue repair: basic biologic considerations. I,” Journal of the American Academy of Dermatology, vol. 13, no. 5, pp. 701–725, 1985.

C. R. Flach, G. Zhang, and R. Mendelsohn, “Raman microscopy and imaging: applications to skin pharmacology and wound healing,” in Emerging Raman Applications and Techniques in Biomedical and Pharmaceutical Fields, P. Matousek and M. D. Morris, Eds., pp. 365–384, Springer, Heidelberg, Germany, 2010.

C. B. Croft and D. Tarin, “Ultrastructural studies of wound healing in mouse skin. I. Epithelial behaviour,” Journal of Anatomy, vol. 106, no. 1, pp. 63–77, 1970.

S. Holloway, K. Harding, J. K. Stechmiller, and G. Schultz, “Acute and chronic wound healing,” in Wound Care Essentials: Practice Principles, S. Baranoski and E. A. Ayello, Eds., pp. 83–100, Lippincott Williams & Wilkins, Philadelphia, Pa, USA, 3rd edition, 2012.

W. B. Rockwell, I. K. Cohen, and H. P. Ehrlich, “Keloids and hypertrophic scars: a comprehensive review,” Plastic and Reconstructive Surgery, vol. 84, no. 5, pp. 827–837, 1989.

G. C. Gurtner, S. Werner, Y. Barrandon, and M. T. Longaker, “Wound repair and regeneration,” Nature, vol. 453, no. 7193, pp. 314–321, 2008.

NPUAP, “Support surface standard initiative. Terms and definitation related to support surfaces,” National Pressure Ulcer Advisory Panel, 2007

M. Kempf, Y. Miyamura, P. Y. Liu et al., “A denatured collagen microfiber scaffold seeded with human fibroblasts and keratinocytes for skin grafting,” Biomaterials, vol. 32, no. 21, pp. 4782–4792, 2011.

W. A. Dorsett-Martin, “Rat models of skin wound healing: a review,” Wound Repair and Regeneration, vol. 12, no. 6, pp. 591–599, 2004.

S. J. M. Yussof, A. S. Halim, A. Z. M. Saad, and H. Jaafar, “Evaluation of the biocompatibility of a bilayer chitosan skin regenerating template, human skin allograft, and integra implants in rats,” ISRN Materials Science, vol. 2011, Article ID 857483, 7 pages, 2011.

F. Haubner, E. Ohmann, F. Pohl, J. Strutz, and H. G. Gassner, “Wound healing after radiation therapy: review of the literature,” Radiation Oncology, vol. 7, p. 162, 2012.

F. Schwenter, B. L. Schneider, W. F. Pralong, N. Déglon, and P. Aebischer, “Survival of encapsulated human primary fibroblasts and erythropoietin expression under xenogeneic conditions,” Human Gene Therapy, vol. 15, no. 7, pp. 669–680, 2004.

A. Stoff, A. A. Rivera, N. S. Banerjee et al., “Promotion of incisional wound repair by human mesenchymal stem cell transplantation,” Experimental Dermatology, vol. 18, no. 4, pp. 362–369, 2009.

R. Periyasamy and M. Rathinasamy, “Nonimmunogenecity of human amniotic epithelial cells in circulation and subcutaneous tissue of the wistar albino rats,” International Journal of Basic and Applied Medical Sciences, vol. 3, no. 1, pp. 267–275, 2013.

A. de Mendonça Costa, D. F. Bueno, M. T. Martins et al., “Reconstruction of large cranial defects in nonimmunosuppressed experimental design with human dental pulp stem cells,” Journal of Craniofacial Surgery, vol. 19, no. 1, pp. 204–210, 2008.

V. C. Sandulache, Z. Zhou, A. Sherman, J. E. Dohar, and P. A. Hebda, “Impact of transplanted fibroblasts on rabbit skin wounds,” Archives of Otolaryngology, vol. 129, no. 3, pp. 345–350, 2003.

H. Ohyama, F. Nishimura, M. Meguro, S. Takashiba, Y. Murayama, and S. Matsushita, “Counter-antigen presentation: fibroblasts produce cytokines by signalling through HLA class II molecules without inducing T-cell proliferation,” Cytokine, vol. 17, no. 4, pp. 175–181, 2002.

A. Bartholomew, C. Sturgeon, M. Siatskas et al., “Mesenchymal stem cells suppress lymphocyte proliferation in vitro and prolong skin graft survival in vivo,” Experimental Hematology, vol. 30, no. 1, pp. 42–48, 2002.

M. D. Nicola, C. Carlo-Stella, M. Magni et al., “Human bone marrow stromal cells suppress T-lymphocyte proliferation induced by cellular or nonspecific mitogenic stimuli,” Blood, vol. 99, no. 10, pp. 3838–3843, 2002.

W. T. Tse, J. D. Pendleton, W. M. Beyer, M. C. Egalka, and E. C. Guinan, “Suppression of allogeneic T-cell proliferation by human marrow stromal cells: implications in transplantation,” Transplantation, vol. 75, no. 3, pp. 389–397, 2003.

T. Yi and S. Su, “Immunomodulatory properties of mesenchymal stem cells and their therapeutic applications,” Archives of Pharmacal Research, vol. 35, pp. 213–221, 2012.

E. Mansilla, G. H. Marin, F. Sturla et al., “Human mesenchymal stem cells are tolerized by mice and improve skin and spinal cord injuries,” Transplantation Proceedings, vol. 37, no. 1, pp. 292–294, 2005.

A. J. Nauta and W. E. Fibbe, “Immunomodulatory properties of mesenchymal stromal cells,” Blood, vol. 110, no. 10, pp. 3499–3506, 2007.