BioMed Research International

Volume 2013 (2013), Article ID 938937, 6 pages

http://dx.doi.org/10.1155/2013/938937

Research Article

High Genetic Diversity of Enterococcus faecium and Enterococcus faecalis Clinical Isolates by Pulsed-Field Gel Electrophoresis and Multilocus Sequence Typing from a Hospital in Malaysia

Poh Leng Weng,¹ Ramliza Ramli,² Mariana Nor Shamsudin,¹ Yoke-Kqueen Cheah,³ and Rukman Awang Hamat¹

¹Department of Medical Microbiology and Parasitology, Faculty of Medicine and Health Sciences, Universiti Putra Malaysia, 43400 Serdang, Malaysia

²Department of Medical Microbiology and Immunology, Universiti Kebangsaan Malaysia Medical Centre, Jalan Yaakob Latif, Bandar Tun Razak, 56000 Kuala Lumpur, Malaysia

³Department of Biomedical Sciences, Faculty of Medicine and Health Sciences, Universiti Putra Malaysia, 43400 Serdang, Malaysia

Received 26 February 2013; Revised 26 April 2013; Accepted 27 April 2013

Academic Editor: Isabel Sá-Correia

Copyright © 2013 Poh Leng Weng et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Little is known on the genetic relatedness and potential dissemination of particular enterococcal clones in Malaysia. We studied the antibiotic susceptibility profiles of Enterococcus faecium and Enterococcus faecalis and subjected them to pulsed-field gel electrophoresis (PFGE) and multilocus sequence typing (MLST). E. faecium and E. faecalis displayed 27 and 30 pulsotypes, respectively, and 10 representative E. faecium and E. faecalis isolates (five each) yielded few different sequence types (STs): ST17 (2 isolates), ST78, ST203, and ST601 for E. faecium, and ST6, ST16, ST28, ST179, and ST399 for E. faecalis. Resistance to tazobactam-piperacillin and ampicillin amongst E. faecium isolates was highly observed as compared to E. faecalis isolates. All of the isolates were sensitive to vancomycin and teicoplanin. The presence of epidemic and nosocomial strains of selected E. faecium STs: 17, 78, and 203 and E. faecalis ST6 as well as high rates of resistance to multiple antibiotics amongst E. faecium isolates is of a particular concern.

1. Introduction

Enterococci are part of the normal intestinal microflora of most mammals and birds [1] and have emerged as important nosocomial and community pathogens in recent years [2]. Most enterococcal infections in hospitals are due to Enterococcus faecalis and Enterococcus faecium. Both species are commonly isolated from patients with bacteremia, surgical sites infections, urinary tract infections, and device-related infections [3, 4]. Enterococci create concerns to healthcare practitioners worldwide due to their increasing trend of antimicrobial resistance and great adaptability in hospital environments [5]. Like other nosocomial pathogens, the transmission of enterococci is often associated with the hands of health care workers.

The Center for Diseases Control and Prevention (CDC) has estimated that up to 4 million of hospitalized patients will succumb to hospital-acquired infection each year leading to increased hospital stay and costs [6]. In 2006 and 2007 alone, there were 2263 and 1647 cases of enterococcal infections, respectively, reported in several Malaysian hospitals (unpublished data). However, this data is insufficient to elucidate the current epidemiology of enterococcal infections locally. Hence, this study was designed to characterize the genetic relatedness of enterococcal strains from a tertiary teaching hospital by pulsed-field gel electrophoresis (PFGE) and multilocus sequence typing (MLST).

2. Materials and Methods

2.1. Bacterial Isolates

Non-repetitive clinical enterococcal isolates were collected from blood, pus, urine, vaginal and sterile body fluid from May 2009 and March 2010 from a tertiary teaching hospital. This hospital is one of the largest referral teaching hospitals in Malaysia with 38 wards and 819 beds. No reported cases of enterococcal outbreaks were reported during the study period.

2.2. Microbiological Identification of Vancomycin-Susceptible Enterococci

Enterococci were identified by using conventional biochemical tests [7], Remel RapID Strep Kit (Oxford, UK), and confirmed with species specific PCR previously described by Kariyama et al. [8]. The disk diffusion method was used for antibiotic susceptibility testing and screening for high-level gentamicin resistance, and the results were interpreted according to the Clinical and Laboratory Standards Institute guidelines [9]. Intermediate level of resistance by the disk diffusion method was considered resistant in this study. High-level gentamicin resistance (HLGR) phenotype was defined as resistant to the high content of gentamicin (120 μg/mL) by the disk diffusion method [9] and multidrug resistant strains were defined as strains that are resistant to one or more agents in three or more antimicrobial categories [10].

2.3. Molecular Typing of Vancomycin-Susceptible Enterococci

The plugs were lysed in lysis buffer supplemented with RNase (5 mg/mL) and lysozyme (1 mg/mL) which was incubated overnight, followed by fresh lysis buffer with proteinase K (0.5 mg/mL) at 50°C for 48 hours. Enterococcus DNA was digested with 20 U of SmaI restriction enzyme (Promega, USA) [11]. Electrophoresis was performed in 1% agarose (Seakem Gold, Lonza, USA) on CHEF DRII system (Bio-Rad Laboratories, USA) at 6 V/cm, with linear switching interval ramps from 3.5 s to 25 s for 12 hours at 14°C for the first block, and subsequently followed by 1 s to 5 s for 8 hours for the second block with 0.5X Tris-borate-EDTA [12]. Salmonella serotype Braenderup H9812 DNA marker was used for the standard molecular weight and size determinations [13].

The DNA banding patterns were analysed with the use of BioNumerics v. 6.10 software (Applied Maths, Saint-Martens-Latem, Belgium) using Dice coefficient of similarity with band tolerance of 1% and cluster analysis based on the unweighted pair group method with arithmetic averages (UPGMA).

MLST was performed for E. faecium according to Homan et al. [14] with primers of the seven housekeeping genes used which are shown in Table 1. Meanwhile, the MLST of E. faecalis was performed according to primers and procedures established by Ruiz-Garbajosa et al. [15]. Purified PCR products were then sequenced using commercial sequencing services (First Base Sdn Bhd., Malaysia). MLST sequences were then queried into the MLST databases, that is, (http://efaecium.mlst.net/) and (http://efaecalis.mlst.net/) to determine their sequence types. Unique sequences were submitted to the curator for the assignment of a new allelic profile and sequence type (ST).

Table 1: List of E. faecium primers used in the study.

Housekeeping genes
Primer sequences (5′-3′)

adk
Forward GAACCTCATTTTAATGGGG

Reverse TGATGTTGATAGCCAGACG

atpA
Forward CGG TTC ATA CGG AAT GGC ACA

Reverse AAG TTC ACG ATA AGC CAC GG

ddl
Forward GAG ACA TTG AAT ATG CCT TAT G

Reverse AAA AAG AAA TCG CAC CG

gyd
Forward CAA ACT GCT TAG CTC CAA GG C

Reverse CAT TTC GTT GTC ATA CCA AGC

gdh
Forward GGC GCA CTA AAA GAT ATG GT

Reverse CCA AGA TTG GGC AAC TTC GTC CCA

purK
Forward CAGATTGGCACATTGAAAG

Reverse TTCATTCACATATAGCCCG

pstS
Forward TTG AGC CAA GTC GAA GCT GGA

Reverse CGT GAT CAC GTT CTA CTT CC

Adk: adenylate kinase; atpA: ATP synthase, alpha subunit; ddl: D-alanine: D-alanine ligase; gyd: glyceraldehyde-3-phosphate dehydrogenase; gdh: glucose-6-phosphate dehydrogenase; purK: phosphoribosylaminoimidazole carboxylase ATPase subunit; pstS: phosphate ATP-binding cassette transporter.

3. Results

A total of nonrepetitive 59 VSE isolates were analysed of which 31 E. faecalis were isolated from pus (17), blood (11), and vaginal (2) and sterile body fluid (1) and 28 E. faecium isolates were isolated from pus (8), blood (14), and urine (6) samples.

The rate of resistance to tazobactam-piperacillin, ampicillin, penicillin and high-level gentamicin amongst E. faecium isolates was 96.4%, 92.9%, 89.3%, and 82.1%, respectively. Meanwhile, E. faecalis isolates exhibited 3.2%, 3.2%, 9.7%, and 38.7% resistance to ampicillin, tazobactam-piperacillin, penicillin and high-level gentamicin, respectively. E. faecium exhibited higher multidrug resistant strains as compared to E. faecalis (89.1% versus 3.2%). Interestingly, all enterococci isolates were susceptible to vancomycin and teicoplanin.

Genetic relationships between the enterococcal isolates from the study were examined using PFGE analysis with a homology cut-off value of 90%. As shown in Figures 1 and 2, the genetic relatedness of E. faecalis () and E. faecium () revealed 30 and 27 pulsotypes with a low level of homology between strains in both species. However, in E. faecium, two distinct clusters were observed. Cluster I and cluster II comprised pulsotype 1 to 10 and pulsotype 11 to 27, respectively. As for pulsotype 14, two identical E. faecium isolates were detected with similar antibiogram patterns in two different patients from two different wards at different periods of admission. In addition, pulsotype 3 was identically detected in two E. faecalis strains with similar antibiogram patterns isolated in two different patients. Further information revealed that these isolates were also different in terms of the period of isolation, the location of the ward, and the type of sample.

Figure 1: Dendrogram of genetic relatedness among E. faecalis strains (BioNumerics 6.10, Applied Maths, Saint-Martens-Latem, Belgium). Pulsotype refers to subtypes labelled as 1, 2, 3, and so forth. Date of collection refers to the date of the isolates that were collected and identified as E. faecalis. ST type refers to the assigned sequence type based on MLST. Ortho: Orthopedic ward; PICU: Pediatric Intensive Care Unit; O & G: Obstetrics & Gynecology ward; HDU: High Dependency Unit; CCU: Critical Care Unit; ICU: Intensive Care Unit; S: sensitive and R; resistant; Pen: penicillin, Amp; ampicillin; TZP: tazobactam-piperacillin; Gen: gentamicin (120 μg). No distinct clusters observed.

Figure 2: Dendrogram of genetic relatedness among E. faecium strains (BioNumerics 6.10, Applied Maths, Saint-Martens-Latem, Belgium). ICU: Intensive Care Unit; HDU: High Dependency Unit; BMT: Bone Marrow Transplant Unit; PICU: Pediatric Intensive Care Unit. Two distinct clusters were observed, cluster I (pulsotype 1–10) and cluster II (pulsotype 11–27).

MLST was performed for only five isolates of each species to determine the STs due to its high cost and labor intensive. The isolates were selected based on the antibiotic and PFGE profiles. ST types of E. faecalis were identified as follows: ST6, ST16, ST28, ST179, and ST399, whereas E. faecium isolates revealed ST17 (2 strains), ST78, ST203, and ST601.

4. Discussion

In general, E. faecium isolates exhibited high resistance rates to antibiotics compared to E. faecalis in our study. For instance, 92.9% of them were resistant to ampicillin. In contrast, resistance to ampicillin was only observed in 3.2% of E. faecalis isolates. Resistance to ampicillin is very common among E. faecium clinical isolates as reported by several studies [7, 16, 17]. For example, Miskeen and Deodhar [18] used the disc diffusion method and demonstrated 75.0% and 17.0% of 26 E. faecium and 128 E. faecalis isolates, respectively, and exhibited resistance to ampicillin. This is not surprising as the decreased affinity of penicillin-binding proteins or plasmid-mediated β-lactamases might be responsible for this resistance mechanism and E. faecium has a great ability to acquire resistant determinants [19].

Treatment for serious enterococcal infections requires the combination of an aminoglycoside with β-lactams drugs such as penicillin/ampicillin for a synergistic bactericidal effect. However, enterococci strains that show a high-level aminoglycoside resistance (HLAR) phenotype would no longer be susceptible to aminoglycosides and could not be used for the combination therapy [20]. Since most of the enterococcal infections utilizing gentamicin for their synergism [21], screening for a HLAR gentamicin is usually acceptable in most diagnostic laboratories. In our study, 82.1% E. faecium exhibited resistance to high-level gentamicin, whereas 38.7% of E. faecalis were resistant. Similar to our study, Kacmaz and Aksoy [22] demonstrated 88.0% (22/25) and 16.4% (34/207) of E. faecium and E. faecalis, respectively, and were resistant to high-level gentamicin. Few reports of the isolation of HLGR E. faecium have been documented in several other countries [23, 24]. The most worrying part is that this resistance determinant is transferable among bacteria via plasmids [25]. Surprisingly, no vancomycin and teicoplanin resistance was detected in our study. The prevalence of vancomycin-resistant enterococci (VRE) in Malaysia is very low, and only a few sporadic cases of vancomycin-resistant enterococci (VRE) isolates have been reported so far [26, 27].

E. faecalis and E. faecium clinical isolates demonstrated a high level of diversity by PFGE typing during the study period. Similar findings from earlier studies demonstrated a high genetic diversity amongst these isolates originating from the same and/or different hospitals [28, 29]. For instance, D’Azevedo et al. [29] studied 455 clinical enterococcal isolates in five different hospitals and found the genetic diversity ranging from low (60.0%) to high similarity (95.0%). In our study, the PFGE patterns exhibited high heterogeneity amongst strains although the recovery of pulsotype 3 and 14 (Figures 1 and 2) in different patients from different wards with similar antibiogram profiles might probably show the possibility of cross-transmission of strains across wards within the hospital. PFGE has been considered as the “gold standard” for the study of hospital outbreaks because of its high degree of isolate differentiation [30]. However, MLST has emerged as an important tool to study the long-term epidemiology and the population structure and patterns of evolutionary descent [31].

MLST analysis of five selected E. faecalis strains revealed several STs such as ST6, ST16, ST28, ST179, and ST399 in our study. The presence of ST6 in this study, which is associated with clonal-complex 2 (CC2), deserves special attention as CC2 is commonly reported amongst nosocomial isolates and represents hospital-adapted complexes [32]. Moreover, CC2 is linked to vancomycin susceptibility with lower incidence of enterococcal surface protein (esp) gene carriage but exhibits high-level resistance to aminoglycosides [16]. ST6 in our study was sensitive to vancomycin but resistant to HLGR. ST 28 of CC87 has also been regarded as high-risk CCs similar to CC2 [15].

MLST analysis for E. faecium yielded ST17, ST78 and ST203 which are derived from CC17. CC17 is a major group of genetic lineage of E. faecium that has widely spread worldwide [3] and it is associated with hospital outbreaks [33, 34]. Two newly discovered STs were obtained at the time of database query that is, ST 399 (E. faecalis) and ST 601 (E. faecium). Nonetheless, the significance of these STs is yet uncertain.

Our study has several limitations. Because of the limited number of isolates, it is very difficult to draw firm conclusions particularly on the distribution of STs. However, resistance rates to important antibiotics as observed among E. faecium isolates cannot be ignored as horizontal transfer of resistance and virulence determinants is imminent among enterococci.

5. Conclusion

The high genetic variability amongst enterococci isolates in this study provides some information on the local dissemination and genetic relatedness, as well as the antibiotic patterns of our enterococcal isolates. Although little information can be deduced from the findings of their sequence types, constant monitoring and active surveillance of enterococcal infections should always be emphasized in this hospital.

Conflict of Interests

The authors declare that there is no conflict of interests.

Authors’ Contributions

P. L. Weng, R. A. Hamat, M. N. Shamsudin are involved in the study concepts and design. P. L. Weng performed the laboratory work, data collection, and data analysis with significant help from Y. K. Cheah in PFGE analysis. P. L. Weng drafted the paper. All authors critically revised and approved the paper.

Acknowledgments

The authors would like to express their thanks to J. Top for the technical assistance in MLST, Norafnizan Yusof and PPUKM for technical assistance, and Saliza Mohd Elias for the assistance in statistical analysis.

References

R. R. Facklam and L. M. Teixeira, “Enterococcus,” in Topley & Wilson's Microbiology and Microbial Infections, L. Lollier, A. Balows, and M. Sussman, Eds., pp. 669–682, Oxford University Press, New York, NY, USA, 9th edition, 1998.

D. R. Schaberg, D. H. Culver, and R. P. Gaynes, “Major trends in the microbial etiology of nosocomial infection,” American Journal of Medicine, vol. 91, no. 3B, pp. 72S–75S, 1991.

V. Shankar, A. S. Baghdayan, M. M. Huycke, G. Lindahl, and M. S. Gilmore, “Infection-derived Enterococcus faecalis strains are enriched in esp, a gene encoding a novel surface protein,” Infection and Immunity, vol. 67, no. 1, pp. 193–200, 1999.

I. G. Sava, E. Heikens, and J. Huebner, “Pathogenesis and immunity in enterococcal infections,” Clinical Microbiology and Infection, vol. 16, no. 6, pp. 533–540, 2010.

J. Top, R. Willems, and M. Bonten, “Emergence of CC17 Enterococcus faecium: from commensal to hospital-adapted pathogen,” FEMS Immunology and Medical Microbiology, vol. 52, no. 3, pp. 297–308, 2008.

C. D. Salgado, “The risk of developing a vancomycin-resistant Enterococcus bloodstream infection for colonized patients,” American Journal of Infection Control, vol. 36, no. 10, pp. S175.e5–S175.e8, 2008.

C. R. Mahon, D. C. Lehman, and G. Manuselis, Textbook of Diagnostic Microbiology, Saunders, St. Louis, Mo, USA, 2007.

R. Kariyama, R. Mitsuhata, J. W. Chow, D. B. Clewell, and H. Kumon, “Simple and reliable multiplex PCR assay for surveillance isolates of vancomycin-resistant enterococci,” Journal of Clinical Microbiology, vol. 38, no. 8, pp. 3092–3095, 2000.

Clinical and Laboratory Standards Institute (CLSI), Performance Standards for Antimicrobial Susceptibility Testing, Seventeenth Informational Supplement M100-S17, vol. 27, CLSI, Wayne, Pa, USA, 2007.

A. P. Magiorakos, A. Srinivasan, R. B. Carey et al., “Multidrug-resistant, extensively drug-resistant and pandrug-resistant bacteria: an international expert proposal for interim standard definitions for acquired resistance,” Clinical Microbiology and Infection, vol. 18, no. 3, pp. 268–281, 2012.

M. Talebi, F. Rahimi, M. Katouli, R. Möllby, and M. R. Pourshafie, “Epidemiological link between wastewater and human vancomycin-resistant Enterococcus faecium isolates,” Current Microbiology, vol. 56, no. 5, pp. 468–473, 2008.

M. A. Khan, M. van der wal, D. J. Farrell et al., “Analysis of VanA vancomycin-resistant Enterococcus faecium isolates from Saudi Arabian hospitals reveals the presence of clonal cluster 17 and two new Tn 1546 lineage types,” Journal of Antimicrobial Chemotherapy, vol. 62, no. 2, pp. 279–283, 2008.

S. B. Hunter, P. Vauterin, M. A. Lambert-Fair et al., “Establishment of a universal size standard strain for use with the pulsenet standardized pulsed-field gel electrophoresis protocols: converting the national databases to the new size standard,” Journal of Clinical Microbiology, vol. 43, no. 3, pp. 1045–1050, 2005.

W. L. Homan, D. Tribe, S. Poznanski et al., “Multilocus sequence typing scheme for Enterococcus faecium,” Journal of Clinical Microbiology, vol. 40, no. 6, pp. 1963–1971, 2002.

P. Ruiz-Garbajosa, M. J. M. Bonten, D. A. Robinson et al., “Multilocus sequence typing scheme for Enterococcus faecalis reveals hospital-adapted genetic complexes in a background of high rates of recombination,” Journal of Clinical Microbiology, vol. 44, no. 6, pp. 2220–2228, 2006.

R. Mato, F. Almeida, R. Pires, P. Rodrigues, T. Ferreira, and I. Santos-Sanches, “Assessment of high-level gentamicin and glycopeptide-resistant Enterococcus faecalis and E. faecium clonal structure in a Portuguese hospital over a 3-year period,” European Journal of Clinical Microbiology and Infectious Diseases, vol. 28, no. 7, pp. 855–859, 2009.

R. Jureen, J. Top, S. C. Mohn, S. Harthug, N. Langeland, and R. J. L. Willems, “Molecular characterization of ampicillin-resistant Enterococcus faecium isolates from hospitalized patients in Norway,” Journal of Clinical Microbiology, vol. 41, no. 6, pp. 2330–2336, 2003.

P. A. Miskeen and L. Deodhar, “Antimicrobial susceptibility pattern of Enterococcus species from urinary tract infections,” Journal of Association of Physicians of India, vol. 50, no. 3, pp. 378–381, 2002.

Y. Cetinkaya, P. Falk, and C. G. Mayhall, “Vancomycin-resistant enterococci,” Clinical Microbiology Reviews, vol. 13, no. 4, pp. 686–707, 2000.

B. E. Murray, “Vancomycin-resistant enterococcal infections,” New England Journal of Medicine, vol. 342, no. 10, pp. 710–721, 1999.

E. Aslangul, L. Massias, A. Meulemans et al., “Acquired gentamicin resistance by permeability impairment in Enterococcus faecalis,” Antimicrobial Agents and Chemotherapy, vol. 50, no. 11, pp. 3615–3621, 2006.

B. Kacmaz and A. Aksoy, “Antimicrobial resistance of enterococci in Turkey,” International Journal of Antimicrobial Agents, vol. 25, no. 6, pp. 535–538, 2005.

D. Panesso, J. Reyes, S. Rincón et al., “Molecular epidemiology of vancomycin-resistant Enterococcus faecium: a prospective, multicenter study in South American hospitals,” Journal of Clinical Microbiology, vol. 48, no. 5, pp. 1562–1569, 2010.

H. Araoka, M. Kimura, and A. Yoneyama, “A surveillance of high-level gentamicin-resistant enterococcal bacteremia,” Journal of Infection and Chemotherapy, vol. 17, no. 3, pp. 433–434, 2011.

S. Watanabe, N. Kobayashi, D. Quiñones, S. Nagashima, N. Uehara, and N. Watanabe, “Genetic diversity of enterococci harboring the high-level gentamicin resistance gene aac(6′)-Ie-aph(2″)-Ia or aph(2″)-Ie in a Japanese hospital,” Microbial Drug Resistance, vol. 15, no. 3, pp. 185–194, 2009.

P. L. Weng, R. A. Hamat, Y. K. Kqueen, N. Zainol, M. N. Aziz, and M. N. Shamsudin, “Vancomycin-resistant Enterococcus faecium of multi-locus sequence type 18 in Malaysia,” Medical Journal of Malaysia, vol. 67, no. 6, pp. 639–640, 2012.

A. W. Zubaidah, A. Ariza, and S. Azmi, “Hospital-acquired vancomycin-resistant Enterococci: now appearing in Kuala Lumpur Hospital,” Medical Journal of Malaysia, vol. 61, no. 4, pp. 487–489, 2006.

S. Lloyd, M. Zervos, R. Mahayni, and T. Lundstrom, “Risk factors for enterococcal urinary tract infection and colonization in a rehabilitation facility,” American Journal of Infection Control, vol. 26, no. 1, pp. 35–39, 1998.

P. A. D'Azevedo, C. A. G. Dias, and L. M. Teixeira, “Genetic diversity and antimicrobial resistance of enterococcal isolates from southern region of Brazil,” Revista do Instituto de Medicina Tropical de Sao Paulo, vol. 48, no. 1, pp. 11–16, 2006.

I. Kuhn, L. G. Burman, S. Haeggman, K. Tullus, and B. E. Murray, “Biochemical fingerprinting compared with ribotyping and pulsed-field gel electrophoresis of DNA for epidemiological typing of enterococci,” Journal of Clinical Microbiology, vol. 33, no. 11, pp. 2812–2817, 1995.

E. J. Feil, B. C. Li, D. M. Aanensen, W. P. Hanage, and B. G. Spratt, “eBURST: inferring patterns of evolutionary descent among clusters of related bacterial genotypes from multilocus sequence typing data,” Journal of Bacteriology, vol. 186, no. 5, pp. 1518–1530, 2004.

J. F. Tomayko and B. E. Murray, “Analysis of Enterococcus faecalis isolates from intercontinental sources by multilocus enzyme electrophoresis and pulsed-field gel electrophoresis,” Journal of Clinical Microbiology, vol. 33, no. 11, pp. 2903–2907, 1995.

R. J. L. Willems, J. Top, M. van Santen et al., “Global spread of vancomycin-resistant Enterococcus faecium from distinct nosocomial genetic complex,” Emerging Infectious Diseases, vol. 11, no. 6, pp. 821–828, 2005.

G. Werner, T. M. Coque, A. M. Hammerum et al., “Emergence and spread of vancomycin resistance among enterococci in Europe,” Eurosurveillance, vol. 13, no. 47, pp. 1–11, 2008.