BioMed Research International

Volume 2014 (2014), Article ID 193516, 7 pages

http://dx.doi.org/10.1155/2014/193516

Research Article

Acinetobacter baumannii Infection in Prior ICU Bed Occupants Is an Independent Risk Factor for Subsequent Cases of Ventilator-Associated Pneumonia

Eirini Tsakiridou,¹ Demosthenes Makris,¹ Zoe Daniil,² Efstratios Manoulakas,¹ Vasiliki Chatzipantazi,³ Odysseas Vlachos,³ Grigorios Xidopoulos,³ Olympia Charalampidou,³ and Epaminondas Zakynthinos¹

¹Department of Critical Care Medicine, University Hospital of Larisa and School of Medicine, University of Thessaly, Biopolis, 41000 Larisa, Greece

²Department of Respiratory Medicine, University Hospital of Larisa and School of Medicine, University of Thessaly, Biopolis, 41000 Larisa, Greece

³Department of Critical Care Medicine, General Hospital of Serres, 62100 Serres, Greece

Received 27 February 2014; Revised 10 June 2014; Accepted 17 June 2014; Published 2 July 2014

Academic Editor: Manel Luján

Copyright © 2014 Eirini Tsakiridou et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Objective. We aimed to evaluate risk factors for ventilator-associated pneumonia (VAP) due to Acinetobacter baumannii (AbVAP) in critically ill patients. Methods. This was a prospective observational study conducted in an intensive care unit (ICU) of a district hospital (6 beds). Consecutive patients were eligible for enrolment if they required mechanical ventilation for 48 hours and hospitalization for 72 hours. Clinical, microbiological, and laboratory parameters were assessed as risk factors for AbVAP by univariate and multivariate analysis. Results. 193 patients were included in the study. Overall, VAP incidence was 23.8% and AbVAP, 11.4%. Previous hospitalization of another patient with Acinetobacter baumannii infection was the only independent risk factor for AbVAP (OR (95% CI) 12.016 (2.282–19.521) ). ICU stay versus , the incidence of other infections (OR (95% CI) 9.485 (1.640–10.466) (urinary tract infection, catheter related infection, and bacteremia), or sepsis (OR (95% CI) 10.400 (3.749–10.466) were significantly increased in patients with AbVAP compared to patients without VAP; no difference was found with respect to ICU mortality. Conclusion. ICU admission or the hospitalization of patients infected by Acinetobacter baumannii increases the risk of AbVAP by subsequent patients.

1. Introduction

Ventilator-associated pneumonia (VAP) may cause considerable morbidity [1, 2]. The risk of VAP is related to several host and treatment factors [3].

In recent years, Acinetobacter baumannii has become one of the predominant organisms responsible for VAP. Despite advances in prevention, outbreaks especially with multidrug-resistant strains of this organism have emerged as a major problem in the intensive care unit (ICU) [4]. Previous studies reported several risk factors for Acinetobacter baumannii VAP (AbVAP), such as elevated APACHE II score, previous antibiotic exposure to particular antibiotic agents, Glasgow coma score ≤ 9, head injury, ARDS, neurosurgery and large volume pulmonary aspiration [5–8]. In Greece, despite the fact that Acinetobacter baumannii infection is a major clinical problem, data regarding risk factors for AbVAP are limited [9, 10].

In the present prospective study, we therefore aimed to investigate potential risk factors for AbVAP and to study clinical outcomes of ICU patients with AbVAP in comparison with critically ill patients who did not present VAP or presented VAP caused by other pathogens.

2. Methods

This prospective observational study was conducted in a general ICU of a district hospital in Greece. During a 2-year period (2010−2012), all consecutive patients who were admitted to the ICU were screened for eligibility and entered the study if they met the following two criteria: (a) intubation for more than 48 hours and (b) hospitalization for more than 72 hours. The study was approved by the University of Thessaly (UT 08-02-10/568) and the International Centre of Services of Health Ministry (UT 01-06-10/2124).

3. Study Groups

Patients were classified as patients with AbVAP, patients with VAP due to other pathogens, and patients without VAP.

4. Outcomes

We primarily assessed risk factors for AbVAP. Secondarily, we compared ICU mortality, ICU stay, and the incidence of other infections between patients with AbVAP and patients in the other two study groups.

5. Clinical Evaluation

Baseline demographic and clinical data including age, sex, BMI, APACHE II score, and cause of admission were recorded. Data from patients’ medical history including previous antibiotic exposure, previous hospitalizations, corticosteroids exposure, or any Acinetobacter baumannii infection on admission were also recorded. The hospitalization in the ICU of another patient with documented Acinetobacter baumannii infection, during the 10 days preceding the VAP diagnosis or at any time for patients without VAP, and medical interventions associated previously with VAP, such as blood transfusion, corticosteroid treatment, and enteral or parenteral feeding, were recorded daily; these interventions required being present at least 48 hours before VAP diagnosis. All patients were evaluated daily until hospital discharge, for VAP or other types of infection and clinical pulmonary infection score (CPIS) was recorded [11]. The monthly bed occupancy rate was also calculated.

6. Sample Collection

Blood, urine, and tracheal aspirates with a sterile sputum trap for semiquantitative cultures were collected routinely at ICU admission, but also during the hospital stay whenever there were clinical and laboratory signs of infection [12].

7. Definitions

VAP was defined as a new persistent chest-radiographic infiltrate in conjunction with one of the following: a positive blood or pleural fluid culture or two of the following: fever (temperature > 38.3°C), leukocytosis (leukocyte count > 10⁴/mm³), and purulent tracheal aspirate [13]. In addition, a positive tracheal aspirate culture was required to confirm the diagnosis of VAP [11]. Blood stream infections, urinary tract infections, and intravenous catheter related infections were defined according to CDC/NHSN definition of healthcare-associated infections [14]. Sepsis was defined as previously suggested by international consensus guidelines [15]. Multidrug-resistant (MDR) bacteria included methicillin resistant Staphylococcus aureus, ceftazidime or imipenem resistant Pseudomonas aeruginosa, colistin sensitive Acinetobacter baumannii and Stenotrophomonas maltophilia, and Gram-negative bacilli producing extended spectrum beta lactamase [2]. The overall monthly bed occupancy rate was calculated by the formula cumulative inpatient days × 100/number of beds × days of month.

8. Statistics

Data are presented as frequency (%) for qualitative parameters or mean ± SD for quantitative variables. Comparisons between groups were performed by using -test/Mann-Whitney tests or chi-square/Fishers exact test as appropriate. Univariate analysis was performed to determine variables potentially associated with AbVAP, such as demographics, comorbidities, corticosteroids and blood transfusion in ICU, previous antibiotic and corticosteroid exposure, previous surgery, previous infection, enteral or parenteral feeding, and previous ICU hospitalization of another patient with Acinetobacter baumannii infection during the 10 days preceding the VAP diagnosis or at any time for patients without VAP. Variables which were significant at the 0.05 level were then included in multivariate logistic regression analysis. Model’s calibration was tested using the Hosmer-Lemeshow goodness-of-fit statistic. A high value (0.05) would indicate a good fit for the model. The overall accuracy (discrimination) of the model has been evaluated too. Data were analyzed by using SPSS version 17.

9. Results

One hundred ninety-three patients out of 247 admissions were eligible and entered the study; fifty-four patients were excluded because they were intubated for < 48 hours or hospitalized for < 72 hours (Figure 1). There were 46 patients with VAP; 22 of them (48%) with AbVAP and 24 (52%) with VAP due to other pathogens (Table 1), which were MDR in 42% of cases (OR (95% CI) 14; (2.649–73.980) ). There were no statistical differences between patients with AbVAP and patients with VAP due to other pathogens in terms of cause of admission or with respect to clinical characteristics. Similarly, no significant differences were found between patients with AbVAP and patients without VAP (Table 2).

Table 1: Microbiology of VAP.

VAP

Pseudomonas aeruginosa
5 (11%)

Klebsiella spp.
6 (13%)

Enterobacter spp.
3 (6.5%)

Proteus spp.
3 (6.5%)

Acinetobacter baumannii
22 (48%)

Stenotrophomonas maltophilia
1 (2%)

CNS
3 (7%)

MSSA
1 (2%)

Enterococcus faecium
2 (4%)

Data are presented as (%).

CNS: coagulase negative Staphylococci and MSSA: methicillin sensitive Staphylococcus aureus.

*The results are referred to monomicrobial infections.

Table 2: Baseline characteristics of the study patients.

Non-VAP

AbVAP

VAP due to

other pathogens

Sex (male)
86 (59%)
12 (55%)
16 (67%)

Age (years)
66 17
65 15
66 10

APACHE II score
24 8
25 7
23 5

BMI
29 8
29 4
28 5

Comorbidities

Hypertension
83 (57%)
10 (46%)
9 (38%)

Hyperlipidemia
35 (24%)
3 (14%)
6 (25%)

Cardiac disease
76 (52%)
7 (31.8%)
7 (29%)

Stroke
18 (12%)
3 (14%)
2 (8%)

Chronic kidney disease
13 (9%)
1 (5%)
3 (13%)

Cancer
11 (8%)
1 (5%)
2 (8%)

COPD
31 (21%)
4 (18%)
2 (8.3%)

Others
41 (28%)
5 (23%)
0%

Cause of admission

Cardiac disorders
29 (20%)
1 (5%)
4 (17%)

Neurologic disorders
23 (16%)
4 (18%)
6 (25%)

Respiratory failure
57 (39%)
9 (41%)
7 (29%)

Sepsis
4 (3%)
2 (9%)
2 (8%)

Trauma
14 (10%)
2 (9%)
3 (13%)

Surgical
19 (13%)
2 (9%)
2 (8%)

ARDS
10 (7%)
0%
3 (13%)

Head trauma
4 (3%)
2 (9%)
0%

Others
5 (4%)
2 (9%)
0%

Data are presented as (%) or mean (SD). Differences between the analyzed groups of the study were evaluated by -test or test as appropriate.

VAP: ventilator-associated pneumonia, AbVAP: VAP due to Acinetobacter baumannii, BMI: body mass index, and COPD: chronic obstructive pulmonary disease.

No significant differences were observed between the 3 groups of the study.

Figure 1: Flow chart of the study.

10. VAP due to Acinetobacter baumannii

In the majority of AbVAP cases, the cause of admission was respiratory failure (41%) or neurologic disorders (18%). The mean time for AbVAP diagnosis was days (Table 3). AbVAP compared to VAP due to other pathogens was more prevalent during the autumn and winter () and more specifically during November and December () (Figure 2). There was no significant difference between the occupancy rate during this period (mean rate of 59%) in the ICU and the rates observed during other months of the two-year study period (which ranged between 66% and 77%, ) (Figure 3).

Table 3: Risk factors for VAP due to Acinetobacter baumannii.

Non-VAP

AbVAP

VAP due to other pathogens

Enteral feeding
79 (54%)*
17 (77%)
19 (79%)

Parenteral feeding
135 (92%)
20 (91%)
21 (88%)

Blood transfusion in ICU
31 (21%)*
9 (41%)
12 (50%)

Corticosteroids in ICU
42 (29%)
7 (32%)
8 (32%)

BSI in ICU
26 (18%)
7 (32%)
6 (25%)

Infection on admission
53 (36%)
11 (50%)
10 (42%)

Blood transfusion on admission
8 (5%)
1 (5%)
0%

Previous surgery
19 (13%)
2 (9%)
2 (8%)

Preceding intake of antibiotics
57 (39%)
12 (55%)
9 (38%)

Preceding corticosteroid treatment
7 (5%)
0%
1 (4%)

Previous hospitalization
60 (41%)
10 (46%)
9 (38%)

Previous patient with Ab infection
48 (33%)*
17 (77%)
14 (58%)

ICU stay (prior VAP)
12 9
12 11
15 10

Data are presented as (%) or mean (±SD).

VAP: ventilator-associated pneumonia, ICU: intensive care unit, BSI: bloodstream infections, and Ab: Acinetobacter baumannii.

Previous patients with Ab infection were considered those who were hospitalized in ICU during 10 days preceding the VAP diagnosis or at any time for patients without VAP.

value between AbVAP and non-VAP patients.

No significant differences were observed between AbVAP patients and patients with VAP by other agents.

Figure 2: Distribution of VAP cases per two-month period.

Figure 3: Occupancy of the ICU per two-month period.

Enteral feeding in ICU (OR (95% CI) 2.927; (1.026–8.351) ), blood transfusion in ICU (OR (95% CI) 2.591; (1.014–6.617) ), and previous hospitalization of another patient with Acinetobacter baumannii infection (OR (95% CI) 7.013; (2.442–20.140) ) were significantly associated with the presence of AbVAP (Table 3). Multivariate analysis showed that previous hospitalization of another patient with Acinetobacter baumannii infection (OR (95% CI) 6.674; (2.282–19.521) ) was the only independent risk factor for AbVAP (Table 4). When characteristics of patients with AbVAP were compared to those of patients with VAP due to other pathogens, no independent risk factor for AbVAP was identified.

Table 4: Multivariate analysis of risk factors for VAP due to Acinetobacter baumannii.

OR
95% CI
Wald statistic

Enteral feeding
2.759
0.919–8.281
3.275
0.07

Another patient with Ab infection
6.674
2.282–19.521
12.016
0.001

Blood transfusion in ICU
2.106
0.766–5.792
2.083
0.149

The Hosmer-Lemeshow statistic (calibration) was not significant: chi-square = 2.466, df = 7, = 0.782. Overall accuracy (discrimination) was 87%.

BSI: bloodstream infections, ICU: intensive care unit, and Ab: Acinetobacter baumannii.

11. VAP Outcome due to Acinetobacter baumannii

Patients with AbVAP presented significantly increased incidence of other types of infection (urinary tract infection, intravenous catheter related infection, and bacteremia) (OR (95% CI) 4.143; (1.640–10.466) ), due to MDR bacteria (OR (95% CI) 9.485; (3.269–25.517) ), sepsis (OR (95% CI) 10.400; (3.749–28.853) ), and prolonged ICU stay ( days versus ) compared to patients without VAP (Table 5). Patients with VAP due to other MDR pathogens had significantly prolonged ICU stay compared to patients with AbVAP ( days versus ).

Table 5: Clinical outcome measures in patients with VAP due to Acinetobacter baumannii.

Non-VAP

AbVAP

VAP due to other pathogens

Other infections
38 (26%)*
13 (59%)
17 (71%)

Urinary tract infection
12 (8%)*
7 (32%)
6 (25%)

Intravenous catheter infection
15 (10%)*
6 (27%)
9 (38%)

Bacteremia in ICU
28 (19%)*
13 (59%)
14 (58%)

Other infections due to MDR
10 (7%)*
9 (41%)
7 (29%)

Sepsis
30 (20%)*
16 (73%)
19 (79%)

ICU stay (days)
12 9*
25 17
34 23

ICU mortality
87 (59%)
15 (68%)
15 (62%)

Data are presented as (%) or mean (±SD).

VAP: ventilator-associated pneumonia, ICU: intensive care unit, and MDR: multidrug-resistant bacteria.

Other infections included bacteremia, urinary tract infection, and infection of intravenous catheter.

value between AbVAP and non-VAP patients.

ICU mortality was not significantly increased in patients with AbVAP compared to patients without VAP. Urinary tract infection (OR (95% CI) 1.875; (1.168–3.01) ), previous antibiotic exposure (OR (95% CI) 16.5; (1.487–183.07) ), older age ( years versus ), and Apache II score ( versus ) were risk factors for ICU mortality in patients with AbVAP. However, multivariate analysis did not identify any independent risk factor for death in patients with AbVAP. In addition, sepsis was the only independent risk factor for death in patients without VAP (OR (95% CI) 7.242; (2.016–26.019) ). No independent risk factor for ICU mortality in patients with VAP due to other pathogens was found.

12. Discussion

The main finding of this study is the association between the hospitalization of patients with Acinetobacter baumannii infection and the increased risk of AbVAP by subsequent patients. In addition, the present study showed that patients with AbVAP presented increased length of ICU stay, increased incidence of other ICU infections, and sepsis, compared to patients without VAP, but similar clinical outcome measures to those of patients with VAP by other bacteria.

In the present study, we evaluated several risk factors for increased frequency of AbVAP. AbVAP was found to be associated with the previous hospitalization of another patient with Acinetobacter baumannii infection. Prior room occupant with Acinetobacter baumannii has been also previously suggested as independent risk factor for ICU-aquired Acinetobacter baumannii from only one existing study [16]. This finding indicates that hospital personnel, admitted patients, and medical equipment are important reservoirs of the organism [17]. The fact that medical equipment and more specifically ventilators can be contaminated by Acinetobacter baumannii has been reported in another recent study [18]. These data underline the necessity of strict microbiological surveillance and infection control strategies for the primary prevention of the transmission of this organism in the ICU. These strategies could include rigorous cleaning and disinfecting of hands and ICU environment and implementation of an antibiotic control and therapeutic strategy according to specific guidelines, adapted to the local settings [19, 20].

Previous studies have also reported that the risk of AbVAP in intubated patients with nosocomial pneumonia was higher in patients with head trauma, neurosurgery, ARDS, large volume aspiration, and prior antibiotic use [5–8]. In the present investigation, there were not many neurosurgical patients and the number of ARDS patients was also small. Hence, we found no association between the above-mentioned factors and AbVAP. Enteral feeding was indeed associated with AbVAP in our study, but the association was not significant in multivariate analysis. However, in the present study, we found that AbVAP was more frequent in certain time periods. AbVAP incidence was increased during the humid winter months (Figure 2). This may be different to what one might have expected because previous studies reported that the incidence is higher during humid warmer months [21, 22]. Nevertheless, humidity is higher in winter months, especially during November and December, compared to other seasons in Greece; the relative humidity of the study region shows a progressive decrease during the first semester of the year, ranging between 74.4% and 53.1%, and a progressive increase during the second semester of the year, reaching a maximum level of 78.4% during November and December [23]. Therefore, seasonality in the occurrence of Acinetobacter baumannii infection in relation to the humidity of the geographic region could be possible.

An increased prevalence of multidrug-resistant pathogens or a higher level of occupancy/complexity with increased workload for staff during specific periods could also affect AbVAP frequency [24, 25]. However, bed occupancy rates in our department—which is an indirect index of workload—was not associated with AbVAP frequency in our study. On the other hand, our data regarding colonization rates during the whole 2-year study are limited and a possible association cannot be ascertained. A longitudinal study, which could answer adequately this question, is underway.

It should be also pointed out that VAP depends also on host-related immune factors and on the grade of virulence of each pathogen. Unfortunately, little is known about the pathogenesis and the host-pathogen interactions of Acinetobacter baumannii [26, 27] and our study has not depicted any risk factor that could provide further insight in these interactions.

In the present investigation, patients with AbVAP presented significantly increased frequency of other types of MDR infections and sepsis and had prolonged ICU stay compared to patients without VAP, while no differences were found with respect to the ICU mortality. Previous studies have pointed out that Acinetobacter baumannii infection may increase the length of ICU stay, but the relationship between Acinetobacter baumannii infection frequency and ICU mortality is not constant, since in many studies mortality was not significantly increased in patients with Acinetobacter baumannii infection compared to controls [28].

In this study, no significant differences were found in terms of length of ICU stay, mortality, other types of infection, or sepsis frequency between patients with AbVAP and patients with VAP due to other microbial agents. This is in agreement with previous studies that reported similar prognosis between patients with AbVAP and patients with VAP due to other microorganisms [8, 29]. Hence, our data do not support that VAP due to Acinetobacter baumannii carries a worse prognosis than other causes of VAP. Notably, patients with VAP due to other MDR bacteria presented significantly increased length of stay in the ICU compared to patients with AbVAP in our study. These findings might indicate that there are several variables involved in the clinical course of critically ill patients, such as appropriate empirical treatment and the interaction between host defense mechanisms and the pathogen. In our study, the rates of initial appropriate empirical treatment were different between AbVAP and VAP due to other MDR bacteria (68% versus 30%; ). On the other hand, MDR bacteria, such as Pseudomonas aeruginosa or Klebsiella species, are more virulent or inherently difficult to be eradicated even with effective therapy, especially in patients with impaired host defenses or due to treatment differences [30, 31].

We acknowledge that there are some points that have to be taken into consideration when interpreting the results of the present study. First, we did not assess all potential risk factors that have been previously reported to be associated with VAP due to certain agents, such as colonization rates—as it was pointed out previously—or the type of previous antibiotic exposure or risk factors that could have an impact on the outcome of VAP. Thus, the possibility of missing other possible risk factors for increased VAP frequency due to Acinetobacter baumannii or for increased mortality cannot be excluded. Second, this is one center study, which might represent the microbiological flora of the ICU of a general district hospital, and one should be cautious in generalizing our results.

In conclusion, our study suggests that the hospitalization of patients with Acinetobacter baumannii infection in the ICU may increase the risk of VAP due to this bacterium by subsequent patients. Moreover, we found that AbVAP incidence might be increased during the months, when humidity is increased. AbVAP patients presented increased length of ICU stay and increased incidence of other ICU infections and sepsis compared to patients who did not present VAP. In this respect, more efforts should be addressed to infection control measures in order to prevent the transmission of this organism between ICU patients.

Conflict of Interests

The authors declare no conflict of interests.

References

J. Chastre and J. Fagon, “Ventilator-associated pneumonia,” American Journal of Respiratory and Critical Care Medicine, vol. 165, no. 7, pp. 867–903, 2002.

D. R. Park, “The microbiology of ventilator-associated pneumonia,” Respiratory Care, vol. 50, no. 6, pp. 742–763, 2005.

D. E. Craven, “Preventing ventilator-associated pneumonia in adults: sowing seeds of change,” Chest, vol. 130, no. 1, pp. 251–260, 2006.

J. Chastre, “Infections due to Acinetobacter baumannii in the ICU,” Seminars in Respiratory and Critical Care Medicine, vol. 24, no. 1, pp. 69–77, 2003.

P. Zhou and E. Chen, “A prospective study on the risk factors of Acinetobacter banmannii bacteremia infection in incubated patients with nosocomial pneumonia,” Zhonghua Liu Xing Bing Xue Za Zhi, vol. 25, no. 7, pp. 617–619, 2004.

J. Baraibar, H. Correa, D. Mariscal, M. Gallego, J. Vallés, and J. Rello, “Risk factors for infection by Acinetobacter baumannii in intubated patients with nosocomial pneumonia,” Chest, vol. 112, no. 4, pp. 1050–1054, 1997.

F. G. Rios, C. M. Luna, B. Maskin et al., “Ventilator-associated pneumonia due to colistin susceptible-only microorganisms,” European Respiratory Journal, vol. 30, no. 2, pp. 307–313, 2007.

J. Garnacho-Montero, C. Ortiz-Leyba, E. Fernández-Hinojosa et al., “Acinetobacter baumannii ventilator-associated pneumonia: epidemiological and clinical findings,” Intensive Care Medicine, vol. 31, no. 5, pp. 649–655, 2005.

S. Miyakis, A. Pefanis, and A. Tsakris, “The challenges of antimicrobial drug resistance in Greece,” Clinical Infectious Diseases, vol. 53, no. 2, pp. 177–184, 2011.

E. Apostolopoulou, V. Raftopoulos, P. Zarkadas, A. Toska, D. Veldekis, and K. Tsilidis, “Risk factors and attributable mortality of carbapenem-resistant Acinetobacter baumannii infections,” Health Science Journal, vol. 8, no. 1, pp. 126–136, 2014.

J. Pugin, “Clinical signs and scores for the diagnosis of ventilator-associated pneumonia,” Minerva Anestesiologica, vol. 68, no. 4, pp. 261–265, 2002.

American Thoracic Society and Infectious Diseases Society of America, “Guidelines for the Management of adults with hospital-acquired, ventilator-associated, and healthcare-associated pneumonia,” American Journal of Respiratory Critical Care Medicine, vol. 171, no. 4, pp. 388–416, 2005.

M. H. Kollef, “What is ventilator-associated pneumonia and why is it important?” Respiratory Care, vol. 50, no. 6, pp. 714–721, 2005.

T. C. Horan, M. Andrus, and M. A. Dudeck, “CDC/NHSN surveillance definition of health care-associated infection and criteria for specific types of infections in the acute care setting,” American Journal of Infection Control, vol. 36, no. 5, pp. 309–332, 2008.

M. M. Levy, M. P. Fink, J. C. Marshall et al., “2001 SCCM/ESICM/ACCP/ATS/SIS international sepsis definitions conference,” Intensive Care Medicine, vol. 29, no. 4, pp. 530–538, 2003.

S. Nseir, C. Blazejewski, R. Lubret, F. Wallet, R. Courcol, and A. Durocher, “Risk of acquiring multidrug-resistant Gram-negative bacilli from prior room occupants in the intensive care unit,” Clinical Microbiology and Infection, vol. 17, no. 8, pp. 1201–1208, 2011.

E. L. Larson, “Persistent carriage of gram-negative bacteria on hands,” American Journal of Infection Control, vol. 9, no. 4, pp. 112–119, 1981.

S. M. El-Ageery, M. A. Abo-Shadi, A. A. Alghaithy, M. A. Ahmad, N. H. Alsharif, and S. A. Alharbi, “Epidemiological investigation of nosocomial infection with multidrug-resistant Acinetobacter baumannii,” European review for medical and pharmacological sciences, vol. 16, no. 13, pp. 1834–1839, 2012.

L. L. Maragakis and T. M. Perl, “Acinetobacter baumannii: epidemiology, antimicrobial resistance, and treatment options,” Clinical Infectious Diseases, vol. 46, no. 8, pp. 1254–1263, 2008.

D. Gruson, G. Hilbert, F. Vargas et al., “Rotation and restricted use of antibiotics in a medical intensive care unit: impact on the incidence of ventilator-associated pneumonia caused by antibiotic-resistant gram-negative bacteria,” American Journal of Respiratory and Critical Care Medicine, vol. 162, no. 3, part 1, pp. 837–843, 2000.

Y. W. Chu, C. M. Leung, E. T. Houang et al., “Skin carriage of Acinetobacters in Hong Kong,” Journal of Clinical Microbiology, vol. 37, no. 9, pp. 2962–2967, 1999.

N. M. Anstey, B. J. Currie, and K. M. Withnall, “Community-acquired Acinetobacter pneumonia in the Northern Territory of Australia,” Clinical Infectious Diseases, vol. 14, no. 1, pp. 83–91, 1992.

Hellenic National Meteorological Service, http://www.hnms.gr/hnms/english/climatology/climatology_region_diagrams_html?dr_city=Serres

I. Martin-Loeches, M. Deja, D. Koulenti et al., “Potentially resistant microorganisms in intubated patients with hospital-acquired pneumonia: the interaction of ecology, shock and risk factors,” Intensive Care Medicine, vol. 39, no. 4, pp. 672–681, 2013.

K. Kaier, N. T. Mutters, and U. Frank, “Bed occupancy rates and hospital-acquired infections—should beds be kept empty?” Clinical Microbiology and Infection, vol. 18, no. 10, pp. 941–945, 2012.

A. Y. Peleg, H. Seifert, and D. L. Paterson, “Acinetobacter baumannii: emergence of a successful pathogen,” Clinical Microbiology Reviews, vol. 21, no. 3, pp. 538–582, 2008.

J. C. Lee, H. Koerten, P. van den Broek et al., “Adherence of Acinetobacter baumannii strains to human bronchial epithelial cells,” Research in Microbiology, vol. 157, no. 4, pp. 360–366, 2006.

M. E. Falagas, I. A. Bliziotis, and I. I. Siempos, “Attributable mortality of Acinetobacter baumannii infections in critically ill patients: A systematic review of matched cohort and case-control studies,” Critical Care, vol. 10, no. 2, article R48, 2006.

M. Di Bonito, S. Gaiazzo, M. Iannazzone, et al., “Prognostic differences between VAP from Acinetobacter baumanii and VAP from other microorganisms,” Translational Medicine @ UniSa, vol. 30, no. 3, pp. 15–21, 2012.

K. Mantzarlis, D. Makris, E. Manoulakas, M. Karvouniaris, and E. Zakynthinos, “Risk factors for the first episode of Klebsiella pneumoniae resistant to carbapenems infection in critically ill patients: a prospective study,” BioMed Research International, vol. 2013, Article ID 850547, 8 pages, 2013.

D. R. Silver, I. L. Cohen, and P. F. Weinberg, “Recurrent Pseudomonas aeruginosa pneumonia in an intensive care unit,” Chest, vol. 101, no. 1, pp. 194–198, 1992.