BioMed Research International
Volume 2014 (2014), Article ID 218569, 1 page
http://dx.doi.org/10.1155/2014/218569

Erratum

Erratum to “A De Novo Genome Assembly Algorithm for Repeats and Nonrepeats”

Shuaibin Lian,¹ Qingyan Li,¹ Zhiming Dai,1,2 Qian Xiang,¹ and Xianhua Dai¹

¹School of Information Science and Technology, Sun Yat-Sen University, Guangzhou High Education Mega City, No. 132 Waihuan East Road, Panyu, Guangzhou 510006, China
²SYSU-CMU Shunde International Joint Research Institute, Shunde 528300, China

Received 18 September 2014; Accepted 13 November 2014; Published 24 November 2014

Copyright © 2014 Shuaibin Lian et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

(iv) in Section  3.1 in the paper titled “A de novo genome assembly algorithm for repeats and nonrepeats ” is corrected as follows: The E-size is designed to answer the question: if you choose a location (a base) in the reference genome at random, what is the expected size of the contig or scaffold containing that location?