BioMed Research International

Volume 2014 (2014), Article ID 246586, 1 page

http://dx.doi.org/10.1155/2014/246586

Erratum

Erratum to “A Survey of FDG- and Amyloid-PET Imaging in Dementia and GRADE Analysis”

Daniela Perani,¹ Orazio Schillaci,² Alessandro Padovani,³ Flavio Mariano Nobili,⁴ Leonardo Iaccarino,¹ Pasquale Anthony Della Rosa,⁵ Giovanni Frisoni,6,7 and Carlo Caltagirone⁸

¹Nuclear Medicine Department, Vita-Salute San Raffaele University, San Raffaele Hospital and Division of Neuroscience, San Raffaele Scientific Institute, Via Olgettina 60, 20132 Milan, Italy

²Nuclear Medicine Department, University of Rome “Tor Vergata” and IRCCS Neuromed, 86077 Pozzilli, Italy

³Department of Medical and Experimental Sciences, Unit of Neurology, Brescia University, 25123 Brescia, Italy

⁴Department of Neuroscience Ophthalmology and Genetics, University of Genoa, 16132 Genoa, Italy

⁵IBFM-CNR, Via Fratelli Cervi 93, Segrate, 20090 Milan, Italy

⁶IRCCS Centro San Giovanni di Dio Fatebenefratelli, 25125 Brescia, Italy

⁷Memory Clinic and LANVIE, Laboratory of Neuroimaging of Aging, University Hospitals and University of Geneva, 1225 Geneva, Switzerland

⁸University of Rome Tor Vergata and IRCCS S. Lucia, 00142 Rome, Italy

Received 12 May 2014; Accepted 22 May 2014; Published 11 June 2014

Copyright © 2014 Daniela Perani et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The authors’ names were incorrectly listed as Perani Daniela, Schillaci Orazio, Padovani Alessandro, Nobili Flavio Mariano, Iaccarino Leonardo, Della Rosa Pasquale Anthony, Frisoni Giovanni, and Caltagirone Carlo; this error is corrected here.

The addresses have been corrected.