BioMed Research International

Volume 2014 (2014), Article ID 459867, 8 pages

http://dx.doi.org/10.1155/2014/459867

Research Article

Increased Release Time of Antibiotics from Bone Allografts through a Novel Biodegradable Coating

István Hornyák,¹ Edit Madácsi,¹ Pálma Kalugyer,¹ Gabriella Vácz,¹ Dénes B. Horváthy,¹ Miklós Szendrői,² Weiping Han,³ and Zsombor Lacza1,2

¹Institute of Human Physiology and Clinical Experimental Research, Semmelweis University, Tűzoltó utca 37-47, Budapest 1094, Hungary

²Department of Orthopedics, Semmelweis University, Karolina út 27, Budapest 1113, Hungary

³Singapore Bioimaging Consortium, Agency for Science, Technology and Research, Fusionopolis Way, Singapore, 138632

Received 4 March 2014; Revised 14 May 2014; Accepted 19 May 2014; Published 19 June 2014

Academic Editor: Tibor Hortobagyi

Copyright © 2014 István Hornyák et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The use of bone allografts is contraindicated in septic revision surgery due to the high risk of graft reinfection. Antibiotic release from the graft may solve the problem and these combinations can theoretically be used for prevention or even therapy of infection. The present study investigated whether amoxicillin, ciprofloxacin, and vancomycin alone or in combination with chitosan or alginate are suitable for short-term or long-term bone coating. Human bone allografts were prepared from femoral head and lyophilized. Antibiotic coating was achieved by incubating the grafts in antibiotic solution and freeze-drying again. Two biopolymers chitosan and alginate were used for creating sustained-release implantable coatings and the drug release profile was characterized in vitro by spectrophotometry. Using lyophilization with or without chitosan only resulted in short-term release that lasted up to 48 hours. Alginate coating enabled a sustained release that lasted for 8 days with amoxicillin, 28 days with ciprofloxacin coating, and 50 days with vancomycin coating. Using only implantable biodegradable allograft and polymers, a sustained release of antibiotics was achieved with ciprofloxacin and vancomycin for several weeks. Since the calculated daily release of the antibiotic was lower than the recommended IV dose, the calcium alginate coated bone graft can support endoprosthesis revision surgery.

1. Introduction

Surgical treatment of musculoskeletal diseases relies increasingly on the long-term implantation of foreign materials such as bone substitutes, endoprosthesis, degradable scaffolds, and plastic components (e.g., polymethyl methacrylate or polyethylene). Since the immune system is not well adapted to fight bacterial infection associated with these foreign materials [1, 2], human allograft seems to be a logical choice as scaffold after suitable preparation [3, 4], although septic complications are becoming a growing concern for the orthopedic community [5, 6]. Infection after total hip replacement is still an unsolved issue; according to a clinical article, infection occurred in 1.7% after primary procedures and in 3.2% after revision procedures [7]. The quantification in another article had different results; in the United States the overall infection burden from 1990 to 2004 of hip arthroplasty was 0.88%; this value increases annually at a rate of close to 5% [8]. Based on another survey, from 145 patients with infection involving total joint arthroplasty subsequent infection occurred in 19% of the cases [9]. Due to the low metabolic rate of bone tissue and the low permeation of the formed bacterial biofilm [10], it is difficult to reach the required local concentration of antibiotics whether it is applied systemically or as a local formulation (e.g., block, sponge, implant, and bead) prepared during surgery [11–14]. In general practice, local treatment is typically applied to support systemic antibiotics and most frequently used drugs include amoxicillin, cephalexin, gentamycin, sulfamethoxazole, ciprofloxacin, and vancomycin applied in cement [15–17], beads [17], and impregnated bone [18–23]. In addition, off-label use of these antibiotics mixed by hand with the carrier bone substitute is often performed when the required antibiotic-carrier combination is not available off the shelf [24]. Whether the applied dose and the release kinetics of such mixtures are optimal or at least adequate for the intended purpose is unknown; however it is still the best way a surgeon can deal with these challenging situations.

The therapeutic goal of local antibiotic use in combination with endoprosthesis can be categorized into three distinct case types: (1) prevention of early infection in a primary prosthesis implantation procedure, (2) inhibiting of infection at aseptic prosthesis revisions where the probability of an already ongoing low-grade infection is high, and (3) treatment of massive infections at septic revisions [25, 26]. These cases pose differing challenges for the antibiotics summarized in Table 1.

Table 1: Technical requirements against a local antibiotic formulation in the 3 main categories of orthopedic use in endoprosthesis surgery.

Medical purpose
Probability of infection
Antibiogram
Required length of local antibiotic treatment
Typical local antibiotic formulation
Reference

Primary implantation
Prevention of infection arising from contamination at surgery or early postoperation
0.5–2%
Not available
1-2 days or until the surgical site is open through drainage
Antibiotic bone cement, off-the-shelf
[27–30]

Aseptic revision
Prevention of infection arising from either contamination or a low-grade infection
n/a
Not available, or its reliability is low
1-2 days or until the surgical site is open through drainage. Longer if low-grade infection is suspected.
Antibiotic bone cement, bone substitutes, freehand use of local antibiotic powder or solution
[27, 31]

Septic revision
Eradication of bacterial infection
100%
Available
Several weeks
Antibiotic bone cement, freehand use of local antibiotic powder or solution. Bone substitutes are contraindicated.
[18, 27, 31, 32]

It is evident that even if one focuses only on antibiotic bone substitutes several formulations should be available in order to meet these diverging criteria [36]. One way of modifying the release kinetics of drugs in an implantable formulation is to couple the active agent with biodegradable polymers. Two well-known materials, which are frequently used to form biodegradable coatings, are chitosan (Chi) and sodium alginate (Na-Alg) [37, 38]. These biopolymers have been investigated over a wide scale including the preparation of fibers, nanoparticles, and even bone substitutes, thus posing a very low risk of toxicity [39–41]. Chitosan is typically prepared from shrimp-shell chitin with hydrolysis and is only soluble in acidic media. It forms excellent films and coatings and in case it is added to acidic forms of drugs it can slow down release and degradation [42]. Alginate derivatives such as alginic acid or sodium alginate are produced from seaweed species. The main feature of sodium alginate is that it is insoluble in acidic solutions and forms a biodegradable film that can be turned into water insoluble calcium alginate (Ca-Alg), which can act as a barrier for drug coatings. The general view of the surgical community is that local use of antibiotics without any carrier is only effective for the first few days postoperatively; however this view is not supported by reliable experimental data [14, 43]. Theoretically it can be hypothesized that fixation of the antibiotic with physicochemical means such as freeze-drying or embedding in polymer coatings may prolong the release of drugs [43]; however it is unknown if these procedures can meet the requirements detailed in Table 1.

The present study investigated if amoxicillin, ciprofloxacin, or vancomycin dried onto the surface of human bone allografts alone or in combination with Chi or Ca-Alg coating is suitable for preparing an antibiotic implant. We further studied the characteristics (drug release and drug load) of a short-term and a long-term release antibiotic coating in vitro.

2. Materials and Methods

All chemicals were purchased from Sigma except for vancomycin, which was purchased from Hangzhou APIChem Technology Co., Ltd., China. The HCl salt was used in case of vancomycin and ciprofloxacin; however amoxicillin was used in the trihydrate form. The bone blocks were generous gifts from the West-Hungarian Regional Tissue Bank. Freeze-dried femoral head blocks were cut to 0.05 ± 0.01 g cube-shaped pieces for the experiments.

Antibiotics were used in aqueous solutions with the initial concentrations of 0.1, 1, or 10 mg/mL for preliminary experiments. After evaluating these concentrations, we decided to use a 10 mg/mL starting solution for all further experiments in order to obtain data with low signal-to-noise ratio. The bone graft was placed in 1 mL of the antibiotic solution and the system was incubated at 25°C for 24 hours. Subsequently, the soaked graft was removed from the solution and freezed at −80°C followed by lyophilization for 24 hours using a Labconco Freezone 2.5′ freeze-dryer (soaked preparation). In order to maximize the drug content of the graft an alternative approach was also performed when the grafts were frozen while still being submerged in the antibiotic solution and the whole system was freeze-dried (saturated preparation).

Medium molecular weight Chi was used with a deacetylation grade of 75–85%, and the Chi solution prepared in our experimental set-up contained lactic acid (LA, 90%) with a ratio of 360 μL LA/40 mL 2% Chi. The chitosan-based preparations were prepared by using 1 mL aqueous 2% chitosan solution to dissolve the antibiotic. The bone samples were placed in this solution and incubated at room temperature for 24 hours and frozen and lyophilized afterwards in a similar manner as the saturated preparations.

Alginate-based preparations were created in another way since this polymer exhibits a basic pH and antibiotics typically precipitate in this solution. First, the bone grafts were coated by the saturated freeze-dried method as described above; then a film coating of alginate was created on top of the antibiotic layer. The Na-Alg film was prepared by adding 1 mL 4% Na-Alg solution on the antibiotic coated freeze-dried bone. Then the graft was dried in an oven at 40°C for 4 hours on teflon plates. The process was repeated with the dried coated graft turned upside down; thus the double layer Na-Alg film was formed. Sodium alginate was then converted into calcium alginate by CaCl₂. The Na-Alg coated bone grafts were placed in a 10% CaCl₂ solution for exactly 60 seconds, then washed with distilled water, and dried in an oven at 40°C. The methods for preparing the coatings are presented in Figure 1.

Figure 1: Antibiotic coating methods. As a first step, 50 mg bone allografts were incubated in a 10 mg/mL antibiotic solution for 24 hours. The Chi used for coating was 2 weight %; the alginate was 4 weight %. The final step in each method was lyophilization or drying in an oven resulting in a dry bone allograft which looks the same to the naked eye as a regular uncoated graft.

The chosen antibiotics (amoxicillin, ciprofloxacin, and vancomycin) have characteristic absorbances in the UV range in aqueous solutions, allowing the use of UV spectroscopy to assess the concentrations with a spectrophotometer. The absorbance-concentration diagrams were plotted using all antibiotics and the linear phase of this diagram was used to calculate the concentration from the absorbances according to the Lambert-Beer law (Table 2).

Table 2: UV measurement characteristics of the investigated antibiotics.

Characteristic absorbance (nm)
Linear absorbance-concentration interval

Amoxicillin
229
0.22–3.7

Ciprofloxacin
275
0.085–2.29

Vancomycin
280
0.06–2.00

We conducted preliminary experiments on the possible absorbance of the used polymers; neither Na-Alg nor Chi had detectable spectral peaks where the antibiotics were measured, specifically 229 nm and 275–280 nm, and neither had a significant baseline absorbance even in the maximum possible concentrations used in the present protocol (0.1% Na-Alginate or 0.25% chitosan). In contrast, Ca-Alginate was insoluble in water and the precipitate would have made the specific measurements impossible in case it had been present in the supernatant.

Measurements of release kinetics were performed by incubating each sample separately in 2 mL of water in a 24-well plate at room temperature. We did not work at 37°C to prevent evaporation and we did not use buffers to avoid changes in the solubility and adding possible UV absorbent molecules. Concentration measurements were performed at specified intervals by removing the supernatant for spectroscopy and replenishing with fresh solvent. The frequency of solution changes and the length of the experiments were determined by preliminary experiments and set in ways that optimal kinetic curves could be constructed from the data set. In the case of vancomycin and ciprofloxacin samples were taken on the 1st, 5th, 10th, 15th, 20th, 25th, and 28th day. Vancomycin was also measured on the 50th day. In a separate experiment with Ca-Alg coated amoxicillin grafts, the medium was placed back onto the graft after each measurement in order to evaluate the effect of drug accumulation in the medium. Statistics were carried out using GraphPad Prism 5.0 software. All data were expressed as means ± SEM () and were analyzed using Student’s -test, simple analysis of variance (ANOVA), or 2-way ANOVA with Bonferroni’s multiple comparison. Differences were considered significant when , , (Table 3).

Table 3: The daily released amount of amoxicillin measured with either replacing the solvent daily or replenishing the solvent. There were significant differences in the 1st and 2nd day with the different methods.

Released drug (mg/day)
Amoxicillin

solvent replenishment
Amoxicillin

cumulative release

Mean ± SEM
Mean ± SEM

Day 1**
0.260 ± 0.037
0.168 ± 0.030

Day 2***
0.202 ± 0.026
0.098 ± 0.005

Day 3
0.081 ± 0.015
0.085 ± 0.016

Day 4
0.049 ± 0.013
0.063 ± 0.009

Day 5
0.032 ± 0.012
0.042 ± 0.012

Day 6
0.007 ± 0.002
0.021 ± 0.015

Day 7
0.003
0.001 ± 0.001

Day 8
0.003
0.002

is the difference between the released drug on the first day with the two different methods, and *** is the difference between the released drug on the second day with the two different methods.

3. Results

After preliminary experiments (data not shown), all the three drugs were highly soluble in water and were suitable to be stored at room temperature without any decomposition. The original concentration of the antibiotic solutions used to incubate the bone grafts correlated with the amount of antibiotics on the bone surface as estimated by the total amount of drugs released. We decided to use a 10 mg/mL starting solution for all further experiments in order to obtain data with low signal-to-noise ratio.

Simple freeze-drying of antibiotics on the surface of bone grafts did not result in a sustained release of the compounds. Although minor differences were observed among the three antibiotics, each one is completely released within 48 hours (Figure 2). Maximizing the antibiotic loading with the saturated method did not improve the release kinetics only; the overall amount of antibiotics on the graft was higher (Figure 2(b)). Using a chitosan additive with the antibiotics did not significantly prolong the release of the drugs from the surface.

(a)

(b)

Figure 2: Drug release kinetic of amoxicillin, ciprofloxacin, or vancomycin coating, prepared by the soaked or the saturated method. These procedures are not expected to significantly increase release time, so over 90% of the drug is released within the first day.

With the use of a Ca-Alg film layer, it was possible to reach a long-term sustained-release antibiotic coating. Interestingly, the type of antibiotic significantly affected the rate of drug release from the same type of coating. For example, amoxicillin was completely released within 8 days and ciprofloxacin within 28 days while vancomycin exhibited the longest release time with 50 days (Figure 3). The amount of antibiotic released on the first day from Ca-Alg coated allograft was approximately the same as the amount from the antibiotic coated bones which did not contain Ca-Alg (Figure 2). The total quantity of dissolved antibiotics over the 8-, 28-, or 50-day period depending on the respective antibiotic was approximately the same as those without alginate coating. We therefore conclude that the amount of total antibiotic content did not increase; however, the release rate has changed as shown in Figure 3.

Figure 3: Release profile of amoxicillin, ciprofloxacin, or vancomycin with sustained release Ca-Alg film coating (). Although the coating method was the same in each case, the effective release term was different among the three drugs with amoxicillin lasting up to 8 days and ciprofloxacin up to 28 days while vancomycin reached 50 days.

In order to test whether the release kinetic is affected by the negative feedback of drug accumulation in the solution, we compared two sets of bone grafts either with release in fresh solvent or with cumulative release into the same medium. Ca-Alg coated amoxicillin was selected for this measurement since it showed a significant change for several days, while the other preparations had too slow or too fast kinetics for this type of measurement. We observed that above the dosage of 0.1 mg/day the release is slightly inhibited by the accumulation of the compound; however this was no issue at lower doses and did not affect the length of the active release period either (Table 3).

To summarize the long-term release experiment, altogether 0.64 ± 0.07 mg amoxicillin was eluted from the surface of 50 mg bone allograft with complete dissolution in 8 days. In case of ciprofloxacin, 1.08 ± 0.11 mg was the total eluted amount within 28 days. Vancomycin had the longest elution time for over 50 days during which 1.66 ± 0.31 mg antibiotic was released in total.

4. Discussion

The present study indicated that it is possible to produce antibiotic coating with physicochemical methods. With biopolymers we can modify the release kinetics of antibiotic impregnated bone grafts in order to reach either complete unloading in 48 hours or sustained release for up to 50 days.

A critical limitation in one-stage revision surgery is the extent of bone loss. Ideally, one would perform elaborate bone replacement techniques in order to build a suitable biological base for a new implant; however bone grafts are viewed as contraindicated in these procedures due to the high probability of infection. Impregnation of bone grafts with an antibiotic solution by hand mixing is generally applied in the OR as a preventive measure; however most surgeons would consider this technique inadequate for septic cases. This view is confirmed by data from the present study. Even though the antibiotics were incubated for a day and then freeze-dried onto the bone, the majority of the drug (90%) was released during the first day after placing the graft in water. This release kinetic may be suitable for fighting perioperative infection when the implant may be contaminated during surgery or from the patient’s skin through the surgical wound or drainage tubes, but this timeframe is inadequate to eradicate massive infections.

The amount of antibiotics in combination with a bone substitute is a challenge. In most cases the volume of the required bone graft is only determined during surgery and predetermining the required dose is only realistic with large margins. Moreover, the amount of antibiotic which is implanted into a patient is set by the amount of bone graft, as administering the drug follows the “dosing” of the graft. The highly variable spatial conformations add a further degree of freedom to the equation. One would assume that tightly impacted bone chips between a cortical layer and a metal implant have much lower surface for the body fluid to penetrate than a porous block placed into a well bleeding spongiotic area. Our current measurements showed that the negative feedback from the accumulation of the drug in a small volume just marginally affects the release kinetics. Therefore the spatial effect probably plays a limited role in this question. However, it should be noted that our experiment was performed in a laboratory setting and release kinetics with bodily fluids in the presence of metabolizing cells and bacteria will be different. Therefore, due to the uncertainties inherent in this applicable field, it is best to load bone grafts with only a low amount of antibiotics to prevent overdosing. As a comparison in the present study, we estimated the total daily doses potentially released from bone grafts with selected combinations. We applied the femoral head graft as a more or less standard “dose” of bone grafting material frequently applied in orthopedics. For these calculations we estimated the antibiotic elution from a femoral head based on the results from our experiments (Table 4.). In principle we multiplied the antibiotic content based on the femoral head and our bone chip weight ratio (45 g/0.05 g).

Table 4: Calculated antibiotic content of the coated bone compared to the daily doses in clinical practice.

24 hours from 0.05 g bone
28th day from 0.05 g bone
24 hours from 45 g bone
28th day from 45 g bone
Daily dose/reference (mg/day)

Amoxicillin (mg)
0.26

234

6000 [33]

% of daily dose
0.004

3.9

Ciprofloxacin (mg)
0.674
0.015
606.72
13.03
1500 [34]

% of daily dose
0.045
0.001
40.45
0.87

Vancomycin (mg)
0.485
0.05
436.87
44.68
1000 [35]

% of daily dose
0.049
0.005
43.687
4.468

Please note that these calculations are based on data gained in vitro, so these can only be considered as rough estimates. The calculations show that the implantation of one femoral head coated with any of the analyzed antibiotics can release a significant percentage of the daily IV dose during the first day but the dose goes below 10% in the long term. Therefore, in case of large antibiotic bone grafts implanted, it is recommended to set the systemic antibiotic dosing based on close monitoring of serum levels for a few days after surgery. Ciprofloxacin has to be monitored especially closely as it has the highest cytotoxic effect among the three drugs [44, 45]. A 10 mg/mL starting concentration of antibiotic was applied in our study and is also relevant according to the literature of local antibiotic drug release products regarding both amoxicillin [33, 46] and vancomycin [47]. We suggest that these calculations may have some relevance towards other antibiotic bone substitutes as well.

The release of the antibiotics was comparable or even faster when we used chitosan than in the absence of a polymer coating. Although Chi is a well-known vehicle for drugs, and it was already applied in combination with vancomycin, mostly with microencapsulation by spray drying [48–50], we did not find it effective in our experiments. This can be explained with our freeze-dried formulation and the solubility of chitosan. This polymer is only soluble in acidic media and the three chosen drugs were also acids or acidic salts. We speculate that the acidic drugs enhanced the solubility of Chi, since most antibiotics are also acids, and the use of chitosan as a delivery vehicle for sustained release is not suitable.

Ca-Alg was used as a layer by layer film coating, and in most cases alginate is used in loaded beads [51] or microspheres [52] or composites [53]. Since all the three drugs we used precipitated in the Na-Alg solution, we decided to use it as a coating to separate the drugs from water. The long-term release was successful when we produced a water insoluble Ca-Alg film coating. Due to the uneven surface of the bone structure, the thickness of the alginate film cannot be proven to be uniform on the surface of the bone. According to our current results this did not affect the elution characteristics. Although the coating exhibited little difference for amoxicillin, both ciprofloxacin and vancomycin proved to be suitable for sustained release bone graft formulations. The drug delivery period of at least 28 days should be sufficient for the long-term antibacterial effect required for the eradication of implant-related infections [54]. Loading biomaterials with antibiotic is nowadays a standard medical procedure for the local treatment or prevention of bacterial infection. However, there are concerns related to biofilm formation, developing resistance especially if the local antibiotic cement is the first line treatment [55]. One possible solution is that different antibiotics should be added locally than in the preventive phase or two or more antibiotics should be combined in local treatment [56]. Bacterial biofilm formation on bone cement has also been studied; adhesion to the bone cement is an important factor [57]. However, there is no evidence that an alginate coating on bone allograft would be suitable for biofilm formation. On the other hand, prevention of bacterial resistance can be solved with the use of combined drug coating later on in the in vitro experiments. Besides, we also have to keep in mind that both the allograft and the alginate coating are biodegradable, which can pose an obstruction for biofilm formation. According to our measurements, the MIC value of vancomycin was 0.2 μg/mL for Enterococcus faecalis (data not shown) and the MIC value of 2 μg/mL vancomycin is sufficient against vancomycin susceptible MRSA [58–60]. Taking into account that using our coating and vancomycin as the antibiotic we managed to keep the released vancomycin concentration above 5 μg per mL at the 50th day, the in vitro results show that this drug coated biomaterial is capable of keeping the antibiotic above the required dose for a prolonged time.

5. Conclusion

We conclude that sustained release antibiotic bone graft coating can be achieved by using an insoluble Ca-Alg coating on bone allografts impregnated with antibiotics. This preparation allows the sustained release of either vancomycin or ciprofloxacin at therapeutic levels for at least 28 days, making this composition suitable for septic revision surgery. A short-term release coating without the protective alginate layer is also possible, especially with amoxicillin, a broad-spectrum antibiotic regularly used for the prevention of infection [33, 46].

Conflict of Interests

The authors state that there is no conflict of interests regarding the results shown in the present study. The institute received financial funding from Lacerta Technologies to achieve the development.

Acknowledgments

This study was supported by the Hungarian-Singaporean joint research grant TET-SIN-CELLTHER. The authors are thankful to Lacerta Technologies for sponsoring the research.

References

V. Krenn, J. P. Kretzer, P. Thomas, et al., “Update on endoprosthesis pathology: particle algorithm for particle identification in the SLIM,” Seminars in Arthroplasty, vol. 24, no. 4, pp. 265–275, 2013.

P. K. Jaiswal, G. Blunn, R. Pollock, J. A. Skinner, S. R. Cannon, and T. W. R. Briggs, “Bone remodeling around the tibial component of distal femoral expandable endoprosthesis,” Journal of Arthroplasty, vol. 24, no. 3, pp. 421–426, 2009.

C. J. D. Bergmann, J. C. E. Odekerken, T. J. M. Welting, et al., “Calcium phosphate based three-dimensional cold plotted bone scaffolds for critical size bone defects,” BioMed Research International, vol. 2014, Article ID 852610, 10 pages, 2014.

J. Rauh, et al., “Comparative biomechanical and microstructural analysis of native versus peracetic acid-ethanol treated cancellous bone graft,” BioMed Research International, vol. 2014, Article ID 784702, 11 pages, 2014.

V. Antoci Jr., C. S. Adams, J. Parvizi, P. Ducheyne, I. M. Shapiro, and N. J. Hickok, “Covalently attached vancomycin provides a nanoscale antibacterial surface,” Clinical Orthopaedics and Related Research, no. 461, pp. 81–87, 2007.

V. Antoci Jr., S. B. King, B. Jose et al., “Vancomycin covalently bonded to titanium alloy prevents bacterial colonization,” Journal of Orthopaedic Research, vol. 25, no. 7, pp. 858–866, 2007.

A. D. Hanssen and J. A. Rand, “Evaluation and treatment of infection at the site of a total hip or knee arthroplasty,” Instructional course lectures, vol. 48, pp. 111–122, 1999.

S. M. Kurtz, E. Lau, J. Schmier, K. L. Ong, K. Zhao, and J. Parvizi, “Infection Burden for Hip and Knee Arthroplasty in the United States,” Journal of Arthroplasty, vol. 23, no. 7, pp. 984–991, 2008.

C. P. Luessenhop, L. D. Higgins, B. D. Brause, and C. S. Ranawat, “Multiple prosthetic infections after total joint arthroplasty: Risk factor analysis,” Journal of Arthroplasty, vol. 11, no. 7, pp. 862–868, 1996.

P. S. Stewart, “A review of experimental measurements of effective diffusive permeabilities and effective diffusion coefficients in biofilms,” Biotechnology and Bioengineering, vol. 59, no. 3, pp. 261–272, 1998.

J. W. Costerton, P. S. Stewart, and E. P. Greenberg, “Bacterial biofilms: a common cause of persistent infections,” Science, vol. 284, no. 5418, pp. 1318–1322, 1999.

P. Stoodley, K. Sauer, D. G. Davies, and J. W. Costerton, “Biofilms as complex differentiated communities,” Annual Review of Microbiology, vol. 56, pp. 187–209, 2002.

C. Ketonis, S. Barr, C. S. Adams, I. M. Shapiro, J. Parvizi, and N. J. Hickok, “Vancomycin bonded to bone grafts prevents bacterial colonization,” Antimicrobial Agents and Chemotherapy, vol. 55, no. 2, pp. 487–494, 2011.

S. K. Nandi, P. Mukherjee, S. Roy, B. Kundu, D. K. De, and D. Basu, “Local antibiotic delivery systems for the treatment of osteomyelitis—a review,” Materials Science and Engineering C, vol. 29, no. 8, pp. 2478–2485, 2009.

H. W. Buchholz, R. A. Elson, and K. Heinert, “Antibiotic-loaded acrylic cement: current concepts,” Clinical Orthopaedics and Related Research, vol. 190, pp. 96–108, 1984.

S. B. Trippel, “Antibiotic-impregnated cement in total joint arthroplasty,” Journal of Bone and Joint Surgery A, vol. 68, no. 8, pp. 1297–1302, 1986.

D. A. Wininger and R. J. Fass, “Antibiotic-impregnated cement and beads for orthopedic infections,” Antimicrobial Agents and Chemotherapy, vol. 40, no. 12, pp. 2675–2679, 1996.

H. Winkler, “Rationale for one stage exchange of infected hip replacement using uncemented implants and antibiotic impregnated bone graft,” International Journal of Medical Sciences, vol. 6, no. 5, pp. 247–252, 2009.

J. Barckman, J. Baas, M. Sorensen, J. Lange, J. E. Bechtold, and K. Soballe, “Does tobramycin impregnation of allograft bone affect implant fixation?—An experimental study in 12 dogs,” Journal of Biomedical Materials Research B Applied Biomaterials, vol. 102, no. 1, pp. 173–180, 2014.

P. Melicherčík, D. Jahoda, O. Nyč et al., “Bone grafts as vancomycin carriers in local therapy of resistant infections,” Folia Microbiologica, vol. 57, no. 5, pp. 459–462, 2012.

M. A. Buttaro, A. J. Guala, F. Comba, F. Suarez, and F. Piccaluga, “Incidence of deep infection in aseptic revision THA using vancomycin-impregnated impacted bone allograft,” HIP International, vol. 20, no. 4, pp. 535–541, 2010.

C. Ketonis, S. Barr, I. M. Shapiro, J. Parvizi, C. S. Adams, and N. J. Hickok, “Antibacterial activity of bone allografts: comparison of a new vancomycin-tethered allograft with allograft loaded with adsorbed vancomycin,” Bone, vol. 48, no. 3, pp. 631–638, 2011.

C. Ketonis, S. Barr, C. S. Adams, N. J. Hickok, and J. Parvizi, “Bacterial colonization of bone allografts: establishment and effects of antibiotics,” Clinical Orthopaedics and Related Research, vol. 468, no. 8, pp. 2113–2121, 2010.

N. M. C. Mathijssen, G. Hannink, P. Pilot, B. W. Schreurs, R. M. Bloem, and P. Buma, “Impregnation of bone chips with alendronate and cefazolin, combined with demineralized bone matrix: A bone chamber study in goats,” BMC Musculoskeletal Disorders, vol. 13, article 44, 2012.

T. Gehrke and D. Kendoff, “Peri-prosthetic hip infections: in favour of one-stage,” HIP International, vol. 22, supplement 8, pp. S40–S45, 2012.

T. O. Klatte, R. Meinicke, P. O'Loughlin, J. M. Rueger, T. Gehrke, and D. Kendoff, “Incidence of bacterial contamination in primary THA and combined hardware removal. Analysis of preoperative aspiration and intraoperative biopsies,” Journal of Arthroplasty, vol. 28, no. 9, pp. 1677–1680, 2013.

J. Wilson, A. Charlett, G. Leong, C. McDougall, and G. Duckworth, “Rates of surgical site infection after hip replacement as a hospital performance indicator: analysis of data from the english mandatory surveillance system,” Infection Control and Hospital Epidemiology, vol. 29, no. 3, pp. 219–226, 2008.

W. Zimmerli, A. Trampuz, and P. E. Ochsner, “Current concepts: prosthetic-joint infections,” The New England Journal of Medicine, vol. 351, no. 16, pp. 1645–1654, 2004.

A. W. Blom, A. H. Taylor, G. Pattison, S. Whitehouse, and G. C. Bannister, “Infection after total hip arthroplasty,” Journal of Bone and Joint Surgery B, vol. 85, no. 7, pp. 956–959, 2003.

C. B. Phillips, J. A. Barrett, E. Losina et al., “Incidence rates of dislocation, pulmonary embolism, and deep infection during the first six months after elective total hip replacement,” Journal of Bone and Joint Surgery A, vol. 85, no. 1, pp. 20–26, 2003.

K. L. Ong, S. M. Kurtz, E. Lau, K. J. Bozic, D. J. Berry, and J. Parvizi, “Prosthetic joint infection risk after total hip arthroplasty in the medicare population,” Journal of Arthroplasty, vol. 24, supplement 6, pp. 105–109, 2009.

W. O. Jackson and T. P. Schmalzried, “Limited role of direct exchange arthroplasty in the treatment of infected total hip replacements,” Clinical Orthopaedics and Related Research, no. 381, pp. 101–105, 2000.

E. Forestier, C. Sordet, J. Cohen-Solal et al., “Bone and joint infection due to Streptococcus pneumoniae in two immunocompetent adults,” Joint Bone Spine, vol. 73, no. 3, pp. 325–328, 2006.

W. Zimmerli, A. F. Widmer, M. Blatter, R. Frei, and P. E. Ochsner, “Role of rifampin for treatment of orthopedic implant-related staphylococcal infections: a randomized controlled trial,” Journal of the American Medical Association, vol. 279, no. 19, pp. 1537–1541, 1998.

M. E. Roy, M. P. Peppers , L. A. Whiteside, and R. M. Lazear, “Vancomycin concentration in synovial fluid: direct injection into the knee vs. intravenous infusion,” The Journal of Arthroplasty, vol. 29, no. 3, pp. 564–568, 20014.

M. Zilberman and J. J. Elsner, “Antibiotic-eluting medical devices for various applications,” Journal of Controlled Release, vol. 130, no. 3, pp. 202–215, 2008.

N. Akter, R. A. Khan, S. Salmieri, N. Sharmin, D. Dussault, and M. Lacroix, “Fabrication and mechanical characterization of biodegradable and synthetic polymeric films: Effect of gamma radiation,” Radiation Physics and Chemistry, vol. 81, no. 8, pp. 995–998, 2012.

B. Buranapanitkit, K. Oungbho, and N. Ingviya, “The efficacy of hydroxyapatite composite impregnated with amphotericin B,” Clinical Orthopaedics and Related Research, no. 437, pp. 236–241, 2005.

G. Zhou, Y. Lu, H. Zhang et al., “A novel pulsed drug-delivery system: polyelectrolyte layer-by-layer coating of chitosan-alginate microgels,” International Journal of Nanomedicine, vol. 8, pp. 877–887, 2013.

V. Sanna, A. M. Roggio, S. Siliani et al., “Development of novel cationic chitosan-and anionic alginate-coated poly(D,L-lactide-co-glycolide) nanoparticles for controlled release and light protection of resveratrol,” International Journal of Nanomedicine, vol. 7, pp. 5501–5516, 2012.

Z. Qian, M. Dai, X. Zheng et al., “Chitosan-alginate sponge: preparation and application in curcumin delivery for dermal wound healing in rat,” Journal of Biomedicine and Biotechnology, vol. 2009, Article ID 595126, 8 pages, 2009.

Z. Lacza and I. Hornyak, Pharmaceutical Composition Comprising S-nitrosoglutathione and polisaccharide WO, 2009/050527 A1. 2009(WO, 2009/050527 A1)

K. Kanellakopoulou and E. J. Giamarellos-Bourboulis, “Carrier systems for the local delivery of antibiotics in bone infections,” Drugs, vol. 59, no. 6, pp. 1223–1232, 2000.

A. Gürbay, C. Garrel, M. Osman, et al., “Cytotoxicity in ciprofloxacin-treated human fibroblast cells and protection by vitamin E,” Human & Experimental Toxicology, vol. 21, no. 12, pp. 635–641, 2002.

F. Hincal, A. Gurbay, and A. Favier, “Biphasic response of ciprofloxacin in human fibroblast cell cultures,” Nonlinearity in Biology Toxicology and Medicine, vol. 1, no. 4, pp. 481–492, 2003.

Q. Xu and J. T. Czernuszka, “Controlled release of amoxicillin from hydroxyapatite-coated poly(lactic-co-glycolic acid) microspheres,” Journal of Controlled Release, vol. 127, no. 2, pp. 146–153, 2008.

S. Leprêtre, F. Chai, J. C. Hornez et al., “Prolonged local antibiotics delivery from hydroxyapatite functionalised with cyclodextrin polymers,” Biomaterials, vol. 30, no. 30, pp. 6086–6093, 2009.

E. Cevher, Z. Orhan, L. Mülazimoǧlu et al., “Characterization of biodegradable chitosan microspheres containing vancomycin and treatment of experimental osteomyelitis caused by methicillin-resistant Staphylococcus aureus with prepared microspheres,” International Journal of Pharmaceutics, vol. 317, no. 2, pp. 127–135, 2006.

S. P. Chakraborty, S. K. Sahu, P. Pramanik, and S. Roy, “In vitro antimicrobial activity of nanoconjugated vancomycin against drug resistant Staphylococcus aureus,” International Journal of Pharmaceutics, vol. 436, no. 1-2, pp. 659–676, 2012.

B. N. Estevinho, F. Rocha, L. Santos, and A. Alves, “Microencapsulation with chitosan by spray drying for industry applications—a review,” Trends in Food Science and Technology, vol. 31, no. 2, pp. 138–155, 2013.

S. W. N. Ueng, L. J. Yuan, N. Lee, S. S. Lin, E. C. Chan, and J. H. Weng, “In vivo study of biodegradable alginate antibiotic beads in rabbits,” Journal of Orthopaedic Research, vol. 22, no. 3, pp. 592–599, 2004.

A. Joshi, S. Solanki, R. Chaudhari, D. Bahadur, M. Aslam, and R. Srivastava, “Multifunctional alginate microspheres for biosensing, drug delivery and magnetic resonance imaging,” Acta Biomaterialia, vol. 7, no. 11, pp. 3955–3963, 2011.

P. C. Balaure, E. Andronescu, A. M. Grumezescu et al., “Fabrication, characterization and in vitro profile based interaction with eukaryotic and prokaryotic cells of alginate-chitosan-silica biocomposite,” International Journal of Pharmaceutics, vol. 441, no. 1-2, pp. 555–561, 2013.

B. N. Kim, E. S. Kim, and M. D. Oh, “Oral antibiotic treatment of staphylococcal bone and joint infections in adults,” Journal of Antimicrobial Chemotherapy, vol. 69, no. 2, pp. 309–322, 2014.

D. Campoccia, L. Montanaro, P. Speziale, and C. R. Arciola, “Antibiotic-loaded biomaterials and the risks for the spread of antibiotic resistance following their prophylactic and therapeutic clinical use,” Biomaterials, vol. 31, no. 25, pp. 6363–6377, 2010.

B. Thornes, P. Murray, and D. Bouchier-Hayes, “Development of resistant strains of Staphylococcus epidermidis on gentamicin-loaded bone cement in vivo,” Journal of Bone and Joint Surgery B, vol. 84, no. 5, pp. 758–760, 2002.

E. Bertazzoni Minelli, T. Della Bora, and A. Benini, “Different microbial biofilm formation on polymethylmethacrylate (PMMA) bone cement loaded with gentamicin and vancomycin,” Anaerobe, vol. 17, no. 6, pp. 380–383, 2011.

B. P. Howden, J. K. Davies, P. D. R. Johnson, T. P. Stinear, and M. L. Grayson, “Reduced vancomycin susceptibility in Staphylococcus aureus, including vancomycin-intermediate and heterogeneous vancomycin-intermediate strains: resistance mechanisms, laboratory detection, and clinical implications,” Clinical Microbiology Reviews, vol. 23, no. 1, pp. 99–139, 2010.

F. C. Tenover and R. C. Moellering Jr., “The rationale for revising the Clinical and Laboratory Standards Institute vancomycin minimal inhibitory concentration interpretive criteria for Staphylococcus aureus,” Clinical Infectious Diseases, vol. 44, no. 9, pp. 1208–1215, 2007.

K. A. Elkhodairy, S. A. Afifi, and A. S. Zakaria, “A promising approach to provide appropriate colon target drug delivery systems of vancomycin HCL: pharmaceutical and microbiological studies,” BioMed Research International, vol. 2014, Article ID 182197, 14 pages, 2014.