BioMed Research International

Volume 2014 (2014), Article ID 517125, 9 pages

http://dx.doi.org/10.1155/2014/517125

Clinical Study

New Tools for Embryo Selection: Comprehensive Chromosome Screening by Array Comparative Genomic Hybridization

Lorena Rodrigo,1,2 Emilia Mateu,1,2 Amparo Mercader,² Ana Cristina Cobo,² Vanessa Peinado,¹ Miguel Milán,¹ Nasser Al-Asmar,³ Inmaculada Campos-Galindo,¹ Sandra García-Herrero,¹ Pere Mir,⁴ Carlos Simón,1,2,5,6 and Carmen Rubio1,2

¹IVIOMICS SPAIN, Parc Cientific Universitat de València, Calle Catedrático Agustín Escardino 9, 46980 Valencia, Spain

²Instituto Valenciano de Infertilidad (IVI), Instituto Universitario IVI/INCLIVA, Plaza de la Policía Local 3, 46015 Valencia, Spain

³IVIOMICS USA, 1200 NW 78th Avenue, Suite 103, Miami, FL 33126, USA

⁴IVIOMICS INDIA, 13 Olof Palme Marg, Vasant Vihar, New Delhi 11057, India

⁵Fundación IVI, 46980 Valencia, Spain

⁶Department of Obstetrics and Gynecology, Stanford University School of Medicine, Stanford, CA 94305, USA

Received 12 January 2014; Accepted 24 February 2014; Published 29 April 2014

Academic Editor: Irma Virant-Klun

Copyright © 2014 Lorena Rodrigo et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The objective of this study was to evaluate the usefulness of comprehensive chromosome screening (CCS) using array comparative genomic hybridization (aCGH). The study included 1420 CCS cycles for recurrent miscarriage (); repetitive implantation failure (); severe male factor (); previous trisomic pregnancy (); and advanced maternal age (). CCS was performed in cycles with fresh oocytes and embryos (); mixed cycles with fresh and vitrified oocytes (); mixed cycles with fresh and vitrified day-2 embryos (); and mixed cycles with fresh and vitrified day-3 embryos (). Day-3 embryo biopsy was performed and analyzed by aCGH followed by day-5 embryo transfer. Consistent implantation (range: 40.5–54.2%) and pregnancy rates per transfer (range: 46.0–62.9%) were obtained for all the indications and independently of the origin of the oocytes or embryos. However, a lower delivery rate per cycle was achieved in women aged over 40 years (18.1%) due to the higher percentage of aneuploid embryos (85.3%) and lower number of cycles with at least one euploid embryo available per transfer (40.3%). We concluded that aneuploidy is one of the major factors which affect embryo implantation.

1. Introduction

Aneuploidies are common in early human embryos [1, 2]. Trisomic and monosomic embryos account for at least 10% of human pregnancies and, for women nearing the end of their reproductive lifespan, the incidence may exceed 50% [3]. Further, aneuploidy rates are higher in oocytes and embryos from women with advanced maternal age (AMA) [4] which probably stems from meiotic recombination defects exacerbated by age [5]. Recent studies in humans and model organisms have shed new light on the complexity of meiotic defects, providing evidence that the age-related increase in errors in human females is not attributable to a single factor but to an interplay between the unique features of oogenesis and a host of other endogenous and exogenous factors [3]. Age-related defects result in higher aneuploidy rates in offspring and an increase in spontaneous abortions, thereby reducing ongoing implantation rates [6]. Aneuploidy may also be a contributing factor in other infertile populations; for example, despite other potential causes, an abnormal embryonic karyotype was found to be the most frequent cause of recurrent miscarriage (RM) [7]. In the same study, the percentage of cases with RM of truly unexplained origin was limited to 24.5%. While the diagnosis of repetitive implantation failure (RIF) remains a clinical challenge (its causes can be multiple, often with ill-defined embryonic and endometrial contributing factors), embryonic aneuploidy has been proposed as one of the leading embryonic causes [8]. In male factor (MF) infertility, an increase in sperm chromosomal abnormalities due to impairment of the meiotic process has been described [9, 10]. Additionally, a higher incidence of abnormal karyotypes has been described in the miscarriages of couples undergoing intracytoplasmic sperm injection (ICSI) because of MF infertility [11].

Despite a meta-analysis compiling nine randomized controlled clinical trials (RCTs) [12] indicating that there is no benefit to preimplantation genetic screening (PGS) by fluorescence in situ hybridization (FISH) for a limited number of chromosomes, some controversial opinions have surfaced regarding the convenience for embryo aneuploidy screening [13–19], including our own experience which differs from previously published studies. We conducted two prospective, randomized trials to evaluate the usefulness of PGS in AMA patients between 41 and 44 years of age and RIF patients aged less than 40 years of age. We observed a significant increase in the live birth rates in the PGS group compared to the blastocyst group in the AMA study (32.3% versus 15.5%; ) and a clear trend towards increased live birth rates in the RIF study (47.9% versus 27.9%). We therefore concluded that PGS with classic FISH is beneficial for these two indications if proper blastomere biopsy procedures and good laboratory conditions are applied [20].

Despite our findings, there is still a clear need for a technique capable of comprehensive chromosome screening (CCS), which could also produce reliable and faithful results in a short period of time. The first approach was comparative genomic hybridization (CGH), and several studies were published using this technology [21–23]. However, in the last three years, embryo aneuploidy screening has evolved: it is more broadly applied in in vitro fertilization (IVF) programs and now includes other approaches that allow results to be obtained in a shorter period of time, such as oligoarrays, single nucleotide polymorphism arrays, quantitative PCR, and CGH bacterial artificial chromosome arrays (SNP, qPCR, and CGH BAC, resp.) [24–33]. In two recently published reviews, array-CGH (aCGH) was described as a robust and accessible diagnostic approach to assess 24-chromosome aneuploidy, and hence IVF programs are moving towards PGS using aCGH [34, 35].

Independent of the type of platform used, the technique selected for screening all 24 chromosomes should offer reliable and timely results and should only be applied in clinical programs after validation with an already well-established technique. In our program, we first validated the aCGH platform in single cells from embryos previously diagnosed as abnormal by FISH, obtaining similar error rates below three percent for both techniques [36]. Next, we confirmed that there were no differences in efficiency and accuracy when comparing day-3 and day-5 whole embryo array analysis [30]. This was further validated in another study using the same aCGH platform confirming the high efficiency of the platform: only 2.9% of embryos had no results, and the error rate when compared to FISH was 1.9% [37]. In the work presented here, we describe our current experience with the clinical application of CCS using aCGH for different clinical indications, considering oocyte and embryo vitrification as a coadjuvant technique to improve reproductive outcomes in IVF patients.

2. Materials and Methods

2.1. Patients

This retrospective study compiled 1420 cycles with a day-3 biopsy in which aCGH analysis was performed, from February 2010 to February 2013. Clinical indications for CCS were the following: RM (two or more miscarriages of unknown etiology); RIF (three or more previous IVF failures); MF (low sperm concentration or a significant increase in sperm chromosomal abnormalities); couples with a previous trisomic pregnancy (PTP); and AMA (40 years or older). The study included different cycle types: cycles in which all oocytes and embryos came from fresh cycles (); mixed cycles with fresh and vitrified oocytes (); mixed cycles with fresh and vitrified day-2 embryos (); and mixed cycles with fresh and vitrified day-3 embryos (). The goal of vitrification at different stages was to increase the number of embryos for the analysis within a single CCS cycle.

2.2. Embryo Biopsy and Culture Conditions

Patients underwent ovarian stimulation using standardized protocols. When at least two follicles reached 18 mm in diameter, recombinant human chorionic gonadotropin (hCG, Ovitrelle, 250 mg, Merck Serono, Geneva, Switzerland) was administered, and oocyte retrieval was scheduled 36 hours later. ICSI was performed in all cases [38]. Fertilization was assessed 17–20 hours after microinjection, and embryo cleavage was recorded every 24 hours. The CCS cycles were performed in different IVF centers using two main protocols. In most centers, embryos were grown in IVF/CCM medium (1/1) (Vitrolife, Göteborg, Sweden) until day 3 and were subsequently cultured in CCM medium with a monolayer of endometrial epithelial cells until day 5 [39]. In the remaining centers, global sequential culture system (LifeGlobal, Guilford, CT) was used with tri-gas incubators (7% O₂ and 5% CO₂).

Embryo biopsy was performed on day 3 and can be summarized as follows: embryos were placed on a droplet containing Ca²⁺/Mg²⁺-free medium (G-PGD, Vitrolife, Göteborg, Sweden/LifeGlobal, Guilford, CT), the zona pellucida was perforated using laser technology (OCTAX, Herborn, Germany), and one blastomere was withdrawn from each embryo. Only embryos with five or more nucleated blastomeres and less than 25% fragmentation were biopsied. Individual blastomeres were placed in 0.2 mL PCR tubes containing 2 μL PBS. For blastomere washing and handling, 1% polyvinylpyrrolidone (PVP) was used. Properly developed euploid embryos were transferred on day 5, and surplus euploid embryos were vitrified either on day 5 or on day 6.

2.3. Oocyte and Embryo Vitrification

The Cryotop method was used as previously described by Kuwayama et al. (2005) [40] and adapted for our laboratory [41]. In brief, oocytes/embryos were immersed in a solution containing 7.5% (v/v) ethylene glycol (EG) with 7.5% (v/v) dimethylsulfoxide (DMSO) in TCM199 medium with 20% (v/v) synthetic serum substitute (SSS) at room temperature for 15 minutes. Subsequently, oocytes/embryos were placed in a solution containing 15% EG with 15% DMSO and 0.5 mol/L sucrose. One minute later, they were placed on the Cryotop strip and immediately submerged in filtered liquid nitrogen (Brymill filter model 9409, Brymill Corporation, Ellington, CT, USA). For warming, the Cryotop was removed from the liquid nitrogen and instantly placed in 1.0 M sucrose in TCM199 with 20% SSS at 37°C. After 1 minute, oocytes/embryos were placed in 0.5 mol/L sucrose in TCM199 with 20% SSS at room temperature for 3 minutes. Finally, two consecutive washes (5 minutes and 1 minute) were performed with TCM199 with 20% SSS at room temperature before oocytes were incubated at 37°C for two hours preceding ICSI.

2.4. DNA Amplification and Array-Comparative Genomic Hybridization Protocol

To perform day-3 aCGH analysis, a single cell from each embryo was amplified using the Sureplex DNA amplification system (BlueGnome, Cambridge, UK). Amplification quality was ensured by gel electrophoresis (Lonza, Rockland, USA). Sample and control DNA were labelled with Cy3 and Cy5 fluorophores following the manufacturer’s instructions. Labelling mixes were combined and hybridized on 24sure arrays (V2 and V3, BlueGnome, Cambridge, UK) for 6–12 hours. Each probe is specific to a different chromosomal region and occupies a discrete spot on the slide. Chromosomal loss or gain is revealed by the color adopted by each spot after hybridization. The technique involves the competitive hybridization of differentially labeled test and reference DNA samples. Fluorescence intensity was detected using a laser scanner (Powerscanner, TECAN, Männedorf, Switzerland), and BlueFuse Multi software was used for data processing (BlueGnome, Cambridge, UK). The “24sure microarray product description (February 8, 2012, document version 2.3, and model number 408501-00)” describes 10 Mb effective resolution for 24sure using BlueFuse software, being this the minimum size specified by BlueGnome for segmental aneuploidies. The entire protocol can be completed in less than 24 hours and, therefore, embryo transfer and vitrification of surplus euploid embryos can be scheduled for day 5.

2.5. Statistics

The chi-square test and Fisher exact test were used for comparisons between study groups with respect to percentages. Welch -test was used to compare noncategorical variables. Bonferroni’s correction for multiple group comparisons was applied and was considered statistically significant. The implantation rate was defined as the percentage of embryos transferred resulting in an implanted gestational sac. The pregnancy rate per transfer was calculated as the percentage of clinical pregnancies with a fetal heart beat. The miscarriage rate was defined as the percentage of clinical pregnancies that were spontaneously miscarried before week 12 of pregnancy. The delivery rate per cycle was defined as the number of cycles with a live birth.

3. Results and Discussion

3.1. General Clinical Results

A total of 1420 CCS cycles were performed. The mean female age was 39.4 (SD 3.4). A total of 7210 embryos were analyzed and, in 7118 (98.7%) of them, amplification and further analysis were successful. A high percentage of aneuploid embryos were observed for all 24 chromosomes (77.6%), with 3.9% of them showing segmental aneuploidies defined as gains or losses of chromosome fragments with size larger than 10 Mb. A chaotic pattern was observed in 15.0% of the embryos. In 783 cycles, at least one euploid embryo was available for transfer, with a pregnancy rate of 53.4% per transfer and 29.4% per cycle. The miscarriage rate was 7.4%, and the delivery rate per cycle was 27.3%. The results from our CCS program using aCGH technology support our previous experience of the benefits of using FISH for a limited number of chromosomes. In fact, the average pregnancy rate per transfer for all indications was higher than in our previously published studies using FISH for similar indications, which produced pregnancy rates ranging between 30 and 40% [42–44]. Therefore, the incorporation of aCGH in our aneuploidy screening program has resulted in a clear increase in pregnancy and implantation rates, showing that aneuploidies for any of the 24 chromosomes can appear in preimplantation embryos and therefore can impair embryo viability and implantation.

3.2. Clinical Results according to the Origin of Oocytes and Embryos

Table 1 summarizes our results according to the origin of oocytes and embryos. Comparisons among the four groups showed a similar mean female age. The mean number of MII oocytes was 9.0 (SD 4.9) in the group of fresh oocytes; 10.1 (SD 4.7) in the vitrified oocytes group; 12.4 (SD 6.6) in the group of day-2 vitrified oocytes, and 12.8 (SD 6.9) in the day-3 vitrified embryo group. The informative and aneuploid embryos as well as their clinical outcomes were similar among groups, showing that vitrification had no detrimental clinical impact at any stage compared to fresh cycles. Statistical differences were only observed in the mean number of embryos analyzed (which was significantly higher for vitrified oocyte and vitrified day-2 embryo groups compared to fresh and day-3 vitrified cycle groups) and in the percentage of cycles reaching the embryo transfer stage, which was lower for vitrified oocytes compared to day-2 vitrified cycle groups.

Table 1: Clinical results of 1420 CCS cycles according to the origin of the oocytes and embryos.

Fresh cycles
Mixed vitrified oocytes
Mixed day-2 vitrified embryos
Mixed day-3 vitrified embryos

Number of cycles
774
320
235
91

Mean female age (SD)
39.4 (3.2)
39.7 (3.9)
38.9 (3.5)
38.3 (3.4)

Mean number of embryos analyzed (SD)
4.7 (2.9)b,c
5.0 (2.7)a,d,c
6.4 (3.4)a,b,d
4.4 (2.7)b,c

Number of informative embryos
3573
1565
1499
481

Total number of aneuploid embryos (%)
2757 (77.2)
1248 (79.7)
1151 (76.8)
371 (77.1)

Number of segmental aneuploidies (%)
151 (4.2)
51 (3.2)
56 (3.7)
20 (4.1)

Number of embryos with a chaotic pattern (%)
561 (15.7)
250 (16.0)
204 (13.6)
53 (11.0)

Number of embryos with >1 aneuploidy (%)
1191 (33.3)
578 (36.9)d
485 (32.3)
144 (29.9)b

Number of embryo transfers (%)
421 (54.4)
156 (48.7)c
147 (62.5)b
59 (64.8)

Mean transferred embryos (SD)
1.4 (0.5)
1.4 (0.5)
1.5 (0.5)
1.5 (0.5)

Number of pregnancies/transfer (%)
225 (53.4)
93 (59.6)
71 (48.3)
29 (49.1)

Number of pregnancies/cycle (%)
225 (29.1)
93 (29.1)
71 (30.2)
29 (31.9)

Implantation rate
48.1
51.9
40.0
43.7

Miscarriage rate
6.6 (15/225)
8.6 (8/93)
8.4 (6/71)
6.9 (2/29)

Delivery rate/cycle
27.1 (210)
26.6 (85)
27.7 (65)
29.7 (27)

versus fresh cycles; b versus mixed vitrified oocytes; c versus mixed day-2 vitrified embryos; d versus mixed day-3 vitrified embryos. Chi-square test, Fisher exact test, or Welch -test with Bonferroni’s correction.

A high proportion of cycles (62%) were performed in women who were aged 40 years or more. For this reason, in women with low ovarian response, the goal of vitrification was to accumulate a sufficient number of MII oocytes or embryos to be able to achieve embryo transfer and subsequent ongoing pregnancy. Oocyte vitrification from different stimulation cycles for oocyte accumulation has been successfully applied to low-responder patients in regular IVF cycles [45] and the introduction of vitrification in IVF programs opens new possibilities for embryo selection and CCS [46, 47]. Additionally, another recent publication showed that the process of oocyte vitrification does not increase embryonic aneuploidy and does not impact implantation [48]. An alternative for achieving an optimal number of embryos for biopsy is vitrification at the cleavage stage, which has also shown optimal performance in a long retrospective study [49]. However, a recent study of aCGH cycles showed that the cohort size was not significantly associated with the euploidy rate [50]. In this present study, the group of mixed vitrified oocytes showed the highest percentage of embryos with more than one aneuploidy (36.9%), which may be due to the older age of the women included in this group. Embryo vitrification at any of the other stages before the biopsy did not have an impact on the percentage and distribution of different types of chromosomal abnormalities. Similar aneuploidy rates were obtained in fresh cycles (77.2%) compared to mixed cycles with vitrified oocytes (79.7%), day-2 (76.8%), or day-3 (77.1%) cleavage-stage embryos; no differences were observed in pregnancy, implantation, or delivery rates. These data are comparable to those recently published regarding cycles with fresh and vitrified oocytes from our ovum donation program. Similar metabolomic profiles were also observed in embryos derived from fresh and vitrified oocytes, supporting the feasibility of accumulating oocytes or embryos for a single CCS cycle analysis [51].

3.3. Clinical Results according to the Comprehensive Chromosome Screening Indication

Table 2 shows the results for the different infertility indications studied. The mean number of embryos analyzed was significantly higher for the MF indication compared to the other indications, with a lower number of embryos analyzed for the AMA group (mean 4.6). The percentage of aneuploid embryos was similar for all indications below 40 years of age, with a significant increase in the AMA group (85.3%) compared to all the other groups (68.2% in RM, 67.7% in RIF, 71.5% in PTP, and 65.4% in MF). These results had an impact in the percentage of cycles with at least one euploid embryo for transfer, making it significantly lower for the AMA group (40.3%) compared to all the other indications (77.3% in RM, 79.2% in RIF, 78.8% in PTP, and 83.6% in MF). However, once embryo transfer was achieved, the chances of successful pregnancy and implantation were similar for all the mentioned indications, with a range between 46.0% and 62.9% for pregnancy rates per transfer and between 40.5% and 54.2% for implantation rates. However, the pregnancy rate per CCS cycle was significantly lower for the AMA group (19.3%) compared to the remaining indications (44.3%, 45.2%, 36.4%, and 52.1% for RM, RIF, PTP, and MF, resp.) due to the previously mentioned high transfer-cancellation rate. The delivery rate per cycle was also significantly lower for the AMA group (18.1%) compared to the other indications (38.4% in RM, 43.1% in RIF, 30.3% in PTP, and 50.9% in MF).

Table 2: Clinical results of 1420 CCS cycles according to the different indications.

RM <40 yrs
RIF <40 yrs
PTP <40 yrs
MF <40 yrs
AMA ≥40 yrs

Number of cycles
203
188
33
116
880

Mean female age (SD)
35.9 (2.7)
36.5 (2.5)
36.8 (2.4)
34.8 (3.2)
41.5 (2.1)

Mean number of embryos analyzed (SD)
5.5 (3.1)b,d,e
5.9 (3.0)a,d,e
5.7 (3.8)d,e
6.8 (3.7)a,b,c,e
4.6 (2.6)a,b,c,d

Number of informative embryos
1099
1064
186
797
3972

Total number of aneuploid embryos (%)
750 (68.2)e
720 (67.7)e
133 (71.5)e
521 (65.4)e
3403 (85.3)a,b,c,d

Number of segmental aneuploidies (%)
61 (5.5)e
40 (3.7)c
19 (10.2)b,d,e
32 (4.0)c
126 (3.2)a,c

Number of embryos with a chaotic pattern (%)
180 (16.4)b
119 (11.2)a,e
24 (12.9)
125 (15.5)
620 (15.6)b

Number of embryos with >1 aneuploidy (%)
237 (21.6)e
250 (23.5)e
41 (22.0)e
158 (19.8)e
1711 (43.1)a,b,c,d

Number of embryo transfers (%)
157 (77.3)e
149 (79.2)e
26 (78.8)e
97 (83.6)e
354 (40.3)a,b,c,d

Mean transferred embryos (SD)
1.5 (0.5)
1.5 (0.6)
1.4 (0.5)
1.5 (0.5)
1.3 (0.5)

Number of pregnancies/transfer (%)
90 (57.3)
85 (57.0)
12 (46.0)
61 (62.9)
170 (48.0)

Number of pregnancies/cycle (%)
90 (44.3)e
85 (45.2)e
12 (36.4)
61 (52.1)e
170 (19.3)a,b,d

Implantation rate
47.9
50.9
40.5
54.2
42.4

Miscarriage rate
13.3
4.7
16.7
3.3
6.5

Delivery rate/cycle
38.4 (78)e
43.1 (81)e
30.3 (10)
50.9 (59)e
18.1 (159)a,b,d

RM: recurrent miscarriage; RIF: repetitive implantation failure; MF: severe male factor; PTP: previous trisomic pregnancy; AMA: advanced maternal age.

versus RM <40 yrs; b versus RIF <40 yrs; c versus PTP <40 yrs; d versus MF <40 yrs; e versus AMA ≥40 yrs. Chi-square test, Fisher exact test, or Welch -test with Bonferroni’s correction.

Despite the minimal effect of maternal age on implantation after the transfer of a euploid embryo, a negative effect on delivery rates has been described by other authors. A retrospective case-controlled study including CCS cycles with aCGH for PGS in AMA, RM, and RIF patients reported lower ongoing pregnancy rates per cycle in patients 35 years or older compared to patients less than 35 years. However, even in cycles in patients 38 years or older, the implantation, clinical pregnancy, and ongoing pregnancy rates significantly increased after CCS in these groups compared to their controls [52]. Another multicenter retrospective study described an increase in the incidence of aneuploid embryos, which correlated with increased maternal age, observing similar implantation and ongoing pregnancy rates per transfer after CCS in patients up to 42 years of age, after which these rates dramatically declined [53].

Interestingly, Table 2 shows a different distribution of chromosomal abnormality types according to the indication. The highest incidence of segmental aneuploidies was observed in couples with a previous chromosomally abnormal pregnancy (10.2%) and the lowest was in the AMA group (3.2%). The distribution of embryos showing a chaotic pattern was relatively homogenous among indications, with a slight decrease in RIF patients (11.2%) compared to RM (16.4%) and AMA (15.6%) patients. The most remarkable difference was observed for the percentage of embryos with aneuploidy for more than one chromosome, which was significantly higher in the AMA group (43.1%) compared to all other indications (range: 19.8%–23.5%). This percentage increases with maternal age, reaching values from 32.8% in 40 years to 65.8% in 46 years of age. Therefore, the overall incidence of aneuploidy ranges from 79.0% to 95.7% (Figure 1). This relationship between maternal age and the complexity of aneuploid errors has recently been described by Franasiak et al. (2013) [54] in a systematic report of 15169 CCS results, showing that 36% of embryos had more than one aneuploidy and that the proportion of more complex aneuploidy increases with age.

Figure 1: Aneuploidy rates according to maternal age in AMA group.

In RM couples, the transfer of euploid embryos after CCS results in a low miscarriage rate (13.3%). A multicenter study of 287 cycles in couples with idiopathic RM described 60% of the embryos as aneuploid but with a miscarriage rate of 6.9% after CCS, compared to the expected rate of 33.5% in RM control population and 23.7% in an infertile control population [28]. These results showed a clear benefit of 24-chromosome screening in couples with this etiology.

In RIF couples, previous RCTs using FISH for a limited number of chromosomes showed controversial results, with one study showing no clear benefit [55] and another showing an improvement in live birth rates compared to blastocyst transfer without previous FISH analysis [20]. Despite this, there is no RCT regarding CCS with aCGH for RIF patients, although the results described in our study support the application of aneuploidy screening for this group of patients.

In PTP couples, published data describe an increased risk of recurrent aneuploid conceptions, particularly in women under 37 years of age [56]. Previous studies on PGS with FISH analysis of a 9-chromosome panel showed high rates of abnormal embryos, ranging from 48.1% to 71.2% [57, 58], which is in agreement with the percentage of 71.5% observed in our study with 24-chromosome analysis.

Finally, we found the best clinical results after CCS in MF couples. Although, to our knowledge, there are no publications regarding CCS in MF infertile couples, this type of 24-chromosome CCS seems to be a very promising indication for this patient group, as also suggested by previous similar publications with PGS using FISH analysis [42, 59].

4. Conclusions

Our findings on day-3 embryo biopsies support the basis for CCS in patients in whom a high proportion of aneuploid embryos are suspected. New RCTs should be conducted in the near future to assess the feasibility of using different platforms for different clinical indications and to test for any potential increases in live birth rates resulting from more comprehensive aneuploidy screening before embryo transfer.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

The authors would like to thank all the clinicians and embryologists at the IVF units included in this study and particularly their colleagues Eva Marco and Asunción Martínez for the follow-up registry of all the CCS cycles described in this study.

References

J. C. Harper, E. Coonen, A. H. Handyside, R. M. L. Winston, A. H. N. Hopman, and J. D. A. Delhanty, “Mosaicism of autosomes and sex chromosomes in morphologically normal, monospermic preimplantation human embryos,” Prenatal Diagnosis, vol. 15, no. 1, pp. 41–49, 1995.

S. Munné and J. Cohen, “Chromosome abnormalities in human embryos,” Human Reproduction Update, vol. 4, no. 6, pp. 842–855, 1998.

S. I. Nagaoka, T. J. Hassold, and P. A. Hunt, “Human aneuploidy: mechanisms and new insights into an age-old problem,” Nature Reviews Genetics, vol. 13, no. 7, pp. 493–504, 2012.

T. Hassold, N. Chen, and J. Funkhouser, “A cytogenetic study of 1000 spontaneous abortions,” Annals of Human Genetics, vol. 44, no. 2, pp. 151–178, 1980.

N. E. Lamb, S. B. Freeman, A. Savage-Austin et al., “Susceptible chiasmate configurations of chromosome 21 predispose to non- disjunction in both maternal meiosis I and meiosis II,” Nature Genetics, vol. 14, no. 4, pp. 400–405, 1996.

A. Boué, J. Boué, and A. Gropp, “Cytogenetics of pregnancy wastage,” Advances in Human Genetics, vol. 14, pp. 1–57, 1985.

M. Sugiura-Ogasawara, Y. Ozaki, K. Katano, et al., “Abnormal embryonic karyotype is the most frequent cause of recurrent miscarriage,” Human Reproduction, vol. 27, no. 8, pp. 2297–2303, 2012.

E. J. Margalioth, A. Ben-Chetrit, M. Gal, and T. Eldar-Geva, “Investigation and treatment of repeated implantation failure following IVF-ET,” Human Reproduction, vol. 21, no. 12, pp. 3036–3043, 2006.

L. Rodrigo, V. Peinado, E. Mateu et al., “Impact of different patterns of sperm chromosomal abnormalities on the chromosomal constitution of preimplantation embryos,” Fertility and Sterility, vol. 94, no. 4, pp. 1380–1386, 2010.

C. Rubio, M. Gil-Salom, C. Simón et al., “Incidence of sperm chromosomal abnormalities in a risk population: relationship with sperm quality and ICSI outcome,” Human Reproduction, vol. 16, no. 10, pp. 2084–2092, 2001.

J. W. Kim, W. S. Lee, T. K. Yoon et al., “Chromosomal abnormalities in spontaneous abortion after assisted reproductive treatment,” BMC Medical Genetics, vol. 11, no. 1, article 153, 2010.

S. Mastenbroek, M. Twisk, F. van der Veen, and S. Repping, “Preimplantation genetic screening: a systematic review and meta-analysis of RCTs,” Human Reproduction, vol. 17, no. 4, Article ID dmr003, pp. 454–466, 2011.

J. Cohen and J. A. Grifo, “Multicentre trial of preimplantation genetic screening reported in the New England Journal of Medicine: an in-depth look at the findings,” Reproductive BioMedicine Online, vol. 15, no. 4, pp. 365–366, 2007.

B. C. J. M. Fauser, “Preimplantation genetic screening: the end of an affair?” Human Reproduction, vol. 23, no. 12, pp. 2622–2625, 2008.

M. A. Fritz, “Perspectives on the efficacy and indications for preimplantation genetic screening: where are we now?” Human Reproduction, vol. 23, no. 12, pp. 2617–2621, 2008.

E. R. Hernández, “What next for preimplantation genetic screening? beyond aneuploidy,” Human Reproduction, vol. 24, no. 7, pp. 1538–1541, 2009.

S. Mastenbroek, P. Scriven, M. Twisk, S. Viville, F. Van Der Veen, and S. Repping, “What next for preimplantation genetic screening? More randomized controlled trials needed?” Human Reproduction, vol. 23, no. 12, pp. 2626–2628, 2008.

J. L. Simpson, “What next for preimplantation genetic screening? Randomized clinical trial in assessing PGS: necessary but not sufficient,” Human Reproduction, vol. 23, no. 10, pp. 2179–2181, 2008.

C. Rubio, C. Giménez, E. Fernández, et al., “The importance of good practice in preimplantation genetic screening: critical viewpoints,” Human Reproduction, vol. 24, no. 8, pp. 2045–2047, 2009.

C. Rubio, J. Bellver, L. Rodrigo, et al., “Preimplantation genetic screening using fluorescence in situ hybridization in patients with repetitive implantation failure and advanced maternal age: two randomized trials,” Fertility and Sterility, vol. 99, no. 5, pp. 1400–1407, 2013.

L. Wilton, L. Voullaire, P. Sargeant, R. Williamson, and J. McBain, “Preimplantation aneuploidy screening using comparative genomic hybridization or fluorescence in situ hybridization of embryos from patients with recurrent implantation failure,” Fertility and Sterility, vol. 80, no. 4, pp. 860–868, 2003.

E. Fragouli, D. Wells, K. M. Whalley, J. A. Mills, M. J. W. Faed, and J. D. A. Delhanty, “Increased susceptibility to maternal aneuploidy demonstrated by comparative genomic hybridization analysis of human MII oocytes and first polar bodies,” Cytogenetic and Genome Research, vol. 114, no. 1, pp. 30–38, 2006.

W. B. Schoolcraft, E. Fragouli, J. Stevens, S. Munne, M. G. Katz-Jaffe, and D. Wells, “Clinical application of comprehensive chromosomal screening at the blastocyst stage,” Fertility and Sterility, vol. 94, no. 5, pp. 1700–1706, 2010.

A. Hellani, K. Abu-Amero, J. Azouri, and S. El-Akoum, “Successful pregnancies after application of array-comparative genomic hybridization in PGS-aneuploidy screening,” Reproductive BioMedicine Online, vol. 17, no. 6, pp. 841–847, 2008.

D. S. Johnson, G. Gemelos, J. Baner et al., “Preclinical validation of a microarray Method for full molecular karyotyping of blastomeres in a 24-h protocol,” Human Reproduction, vol. 25, no. 4, pp. 1066–1075, 2010.

N. R. Treff, B. Levy, J. Su, L. E. Northrop, X. Tao, and R. T. Scott Jr., “SNP microarray-based 24 chromosome aneuploidy screening is significantly more consistent than FISH,” Molecular Human Reproduction, vol. 16, no. 8, pp. 583–589, 2010.

E. J. Forman, X. Tao, K. M. Ferry, D. Taylor, N. R. Treff, and R. T. Scott, “Single embryo transfer with comprehensive chromosome screening Results in improved ongoing pregnancy rates and decreased miscarriage rates,” Human Reproduction, vol. 27, no. 4, pp. 1217–1222, 2012.

B. Hodes-Wertz, J. Grifo, S. Ghadir, et al., “Idiopathic recurrent miscarriage is caused mostly by aneuploid embryos,” Fertility and Sterility, vol. 98, no. 3, pp. 675–680, 2012.

Z. Yang, J. Liu, G. S. Collins, et al., “Selection of single blastocysts for fresh transfer via standard morphology assessment alone and with array CGH for good prognosis IVF patients: results from a randomized pilot study,” Molecular Cytogenetics, vol. 5, no. 1, pp. 24–29, 2012.

P. Mir, L. Rodrigo, E. Mateu, et al., “Accuracy rates in biopsies performed on day-3 and day-5 embryos using CGHarray technology for PGS,” in 11th International Conference on Preimplantation Genetic Diagnosis, Bregenz, Austria, 2012.

A. Capalbo, S. Bono, L. Spizzichino, et al., “Sequential comprehensive chromosome analysis on polar bodies, blastomeres and trophoblast: insights into female meiotic errors and chromosomal segregation in the preimplantation window of embryo development,” Human Reproduction, vol. 28, no. 2, pp. 509–518, 2013.

D. Christopikou, E. Tsorva, K. Economou, et al., “Polar body analysis by array comparative genomic hybridization accurately predicts aneuploidies of maternal meiotic origin in cleavage stage embryos of women of advanced maternal age,” Human Reproduction, vol. 28, no. 5, pp. 1426–1434, 2013.

J. R. Scott RT, K. M. Upham, E. J. Forman, et al., “Blastocyst biopsy with comprehensive chromosome screening and fresh embryo transfer significantly increases in vitro fertilization implantation and delivery rates: a randomized controlled trial,” Fertility and Sterility, vol. 100, no. 3, pp. 697–703, 2013.

J. L. Simpson, “Preimplantation genetic diagnosis to improve pregnancy outcomes in subfertility,” Best Practice & Research Clinical Obstetrics & Gynaecology, vol. 26, no. 6, pp. 805–815, 2012.

A. H. Handyside, “24-chromosome copy number analysis: a comparison of available technologies,” Fertility and Sterility, vol. 100, no. 3, pp. 595–602, 2013.

P. Mir, L. Rodrigo, A. Mercader, et al., “False positive rate of an arrayCGH platform for single-cell preimplantation genetic screening and subsequent clinical aplication on day-3,” Journal of Assisted Reproduction and Genetics, vol. 30, no. 1, pp. 143–149, 2013.

C. Gutiérrez-Mateo, P. Colls, J. Sánchez-García et al., “Validation of microarray comparative genomic hybridization for comprehensive chromosome analysis of embryos,” Fertility and Sterility, vol. 95, no. 3, pp. 953–958, 2011.

C. Rubio, A. Mercader, P. Alamá et al., “Prospective cohort study in high responder oocyte donors using two hormonal stimulation protocols: impact on embryo aneuploidy and development,” Human Reproduction, vol. 25, no. 9, pp. 2290–2297, 2010.

A. Mercader, D. Valbuena, and C. Simón, “Human embryo culture,” Methods in Enzymology, vol. 420, pp. 3–18, 2006.

M. Kuwayama, G. Vajta, S. Ieda, and O. Kato, “Comparison of open and closed methods for vitrification of human embryos and the elimination of potential contamination,” Reproductive BioMedicine Online, vol. 11, no. 5, pp. 608–614, 2005.

A. Cobo, J. Bellver, J. Domingo et al., “New options in assisted reproduction technology: the Cryotop method of oocyte vitrification,” Reproductive BioMedicine Online, vol. 17, no. 1, pp. 68–72, 2008.

C. Rubio, L. Rodrigo, I. Pérez-Cano et al., “FISH screening of aneuploidies in preimplantation embryos to improve IVF outcome,” Reproductive BioMedicine Online, vol. 11, no. 4, pp. 497–506, 2005.

C. Rubio, P. Buendía, L. Rodrigo, et al., “Prognostic factors for preimplantation genetic screening in repeated pregnancy loss,” Reproductive BioMedicine Online, vol. 18, no. 5, pp. 687–693, 2009.

M. Milán, A. C. Cobo, L. Rodrigo et al., “Redefining advanced maternal age as an indication for preimplantation genetic screening,” Reproductive BioMedicine Online, vol. 21, no. 5, pp. 649–657, 2010.

A. Cobo, N. Garrido, J. Crespo, R. José, and A. Pellicer, “Accumulation of oocytes: a new strategy for managing low-responder patients,” Reproductive BioMedicine Online, vol. 24, no. 4, pp. 424–432, 2012.

A. Cobo and C. Diaz, “Clinical application of oocyte vitrification: a systematic review and meta-analysis of randomized controlled trials,” Fertility and Sterility, vol. 96, no. 2, pp. 277–285, 2011.

L. Rienzi, A. Cobo, A. Paffoni, et al., “Consistent and predictable delivery rates after oocyte vitrification: an observational longitudinal cohort multicentric study,” Human Reproduction, vol. 27, no. 6, pp. 1606–1612, 2012.

E. J. Forman, X. Li, K. M. Ferry, et al., “Oocyte vitrification does not increase the risk of embryonic aneuploidy or diminish the implantation potential of blastocysts created after intracytoplasmic sperm injection: a novel, paired randomized controlled trial using DNA fingerprinting,” Fertility and Sterility, vol. 98, no. 3, pp. 644–649, 2012.

A. Cobo, M. J. de Los Santos, D. Castellò, et al., “Outcomes of vitrified early cleavage-stage and blastocyst-stage embryos in a cryopreservation program: evaluation of 3,150 warming cycles,” Fertility and Sterility, vol. 98, no. 5, pp. 1138–1146, 2012.

B. Ata, B. Kaplan, H. Danzer et al., “Array CGH analysis shows that aneuploidy is not related to the number of embryos generated,” Reproductive BioMedicine Online, vol. 24, no. 6, pp. 614–620, 2012.

F. Dominguez, D. Castellò, and J. Remohí, “Effect of vitrification on human oocytes: a metabolic profiling study,” Fertility and Sterility, vol. 99, no. 2, pp. 565–572, 2013.

M. D. Keltz, M. Vega, I. Sirota, et al., “Preimplantation Genetic Screening (PGS) with Comparative Genomic Hybridization (CGH) following day 3 single cell blastomere biopsy markedly improves IVF outcomes while lowering multiple pregnancies and miscarriages,” Journal of Assisted Reproduction and Genetics, vol. 30, no. 10, pp. 1333–1339, 2013.

G. L. Harton, S. Munné, M. Surrey, et al., “Diminished effect of maternal age on implantation after preimplantation genetic diagnosis with array comparative genomic hybridization,” Fertility and Sterility, vol. 100, no. 6, pp. 1695–1703, 2013.

J. M. Franasiak, E. J. Forman, K. H. Hong, et al., “The nature of aneuploidy with increasing age of the female partner: a review of 15,169 consecutive trophectoderm biopsies evaluated with comprehensive chromosomal screening,” Fertility and Sterility, 2013.

C. Blockeel, V. Schutyser, A. De Vos et al., “Prospectively randomized controlled trial of PGS in IVF/ICSI patients with poor implantation,” Reproductive BioMedicine Online, vol. 17, no. 6, pp. 848–854, 2008.

E. de Souza, J. Halliday, A. Chan, C. Bower, and J. K. Morris, “Recurrence risks for trisomies 13, 18, and 21,” American Journal of Medical Genetics A, vol. 149, no. 12, pp. 2716–2722, 2009.

S. Munné, M. Sandalinas, C. Magli, L. Gianaroli, J. Cohen, and D. Warburton, “Increased rate of aneuploid embryos in young women with previous aneuploid conceptions,” Prenatal Diagnosis, vol. 24, no. 8, pp. 638–643, 2004.

N. Al-Asmar, V. Peinado, M. Vera et al., “Chromosomal abnormalities in embryos from couples with a previous aneuploid miscarriage,” Fertility and Sterility, vol. 98, no. 1, pp. 145–150, 2012.

M. C. Magli, L. Gianaroli, A. P. Ferraretti, S. Gordts, V. Fredericks, and A. Crippa, “Paternal contribution to aneuploidy in preimplantation embryos,” Reproductive BioMedicine Online, vol. 18, no. 4, pp. 536–542, 2009.