BioMed Research International

Volume 2014 (2014), Article ID 639310, 4 pages

http://dx.doi.org/10.1155/2014/639310

Research Article

Comparison between Conventional and Real-Time PCR Assays for Diagnosis of Visceral Leishmaniasis

Mariana R. Pereira, Fabiana Rocha-Silva, Cidiane Graciele-Melo, Camila R. Lafuente, Telcia Magalhães, and Rachel B. Caligiorne

Núcleo de Pós-Graduação e Pesquisa Hospital Santa Casa de Belo Horizonte, Rua Domingos Vieira 590, 30150240 Belo Horizonte, MG, Brazil

Received 23 July 2013; Revised 20 November 2013; Accepted 27 December 2013; Published 6 February 2014

Academic Editor: Sumeeta Khurana

Copyright © 2014 Mariana R. Pereira et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The diagnosis of visceral leishmaniasis (VL) is a challenging issue and several studies worldwide have evaluated the different tools to reach a diagnostic solution. The polymerase chain reaction (PCR) has proven to be effective in detecting the genome of Leishmania species in different biological samples. In this study, we compared the conventional PCR and real-time PCR using the Sybr Green system and their application in molecular diagnosis of visceral leishmaniasis in peripheral blood as a biological sample. The genus-specific conserved region of kinetoplast DNA (kDNA) was the target of amplification. We studied 30 samples from patients with suspect of visceral leishmaniasis who were treated by the Medical Clinic of Santa Casa de Belo Horizonte Hospital, Brazil. Among the samples studied, 19 had a confirmed diagnosis for VL by serology and/or by clinical findings. Among these 19 samples, 63% () presented positive results for serology and 79% () positive results in both PCR methodologies. This fact suggests that the PCR technique can assist in the diagnosis of visceral leishmaniasis in patients who do not have detectable antibodies by serology but can present the genome of the parasite circulating in whole blood. Also, it was possible to observe that there was conformity between the results of the techniques of cPCR and qPCR using the Sybr Green system in 100% of samples analyzed. These data suggest that both PCR techniques were equally effective for detection of the genome of the parasite in the patient’s blood.

1. Introduction

Visceral leishmaniasis (VL) and cutaneous leishmaniasis (CL) are defined as a zoonosis caused by parasites of the genus Leishmania sp. This disease is caused by Leishmania donovani in Asia and Africa and by  Leishmania infantum/chagasi in the Mediterranean, China, North Africa, and Latin America [1–4]. The different forms of leishmaniasis occur endemically in 90 countries spread over five continents: Africa, Asia, Europe, North, and South America [3–5]. It is estimated that about 12 million people worldwide are infected with some form of leishmaniasis [6].

The diagnosis of visceral leishmaniasis is based on clinical, epidemiological, and laboratory approaches [7–9]. Several authors consider the detection of parasite DNA in biological samples as alternative for leishmaniasis diagnosis [10–13]. The standardization of molecular biology such as amplification of species-specific genomic regions by the polymerase chain reaction (PCR) is of great importance, since that will support the diagnosis of the disease and the identification of Leishmania species, in cases that the serological and parasitological tests do not elucidate the diagnosis. This technique has the advantage of replicating the genome of the agent from the minimum quantity of circulating DNA in biological samples [6, 14, 15].

Because of its abundance, specificity, and repetitive nature, the kinetoplast DNA (kDNA) has often been target of detection of Leishmania species [16]. According to some studies, the use of kDNA target amplification has shown high specificity and effectiveness [17]. El-Beshbishy et al. (2013) [18] compared the PCR amplification using as targets primers that anneal in the regions of ribosomal DNA (rDNA) of the parasite and also that anneal in the kDNA. The results of this study demonstrate that kDNA-PCR had a sensitivity of 90.7%, whereas for the rDNA-PCR, the sensitivity was 70.1%.

A major concern for public health services with leishmaniasis is the necessity for rapid and accurate diagnosis of this disease with low cost. The aim of this study was to evaluate the application of conventional PCR and real-time PCR using the kDNA as target of amplification, in the diagnosis of visceral leishmaniasis, an affordable cost to the patient treated by the public health system.

2. Methodology

2.1. Biological Samples

Thirty blood samples were collected from patients with suspect of visceral leishmaniasis, treated at the Santa Casa de Belo Horizonte Hospital, Brazil, from September, 2012, to April, 2013. The project was approved by the Ethics Committee (CEP) of the Santa Casa de Belo Horizonte Hospital, with the protocol number 021/2010.

Among the thirty cases analyzed in our study, 12 were diagnosed with VL confirmed by clinical findings and the indirect fluorescence antibody test (IFAT). Seven cases were clinically suspected for VL, devoid of serological positive tests. In these cases, the patients received treatment for the disease and showed good clinical improvement. The remaining cases () had a differential diagnosis for VL, with other diseases such as atrophic gastritis and anemia of various etiologies.

2.2. DNA Extraction from Whole Blood

The DNA was extracted using the Invitrogen kit (USA). After being extracted and purified, the DNA was assayed by spectrophotometry using Nanovue Plus (GE Healthcare Life Sciences, Sweden). Despite the concentration of the DNA purified, all samples were diluted 10 times in sterile ultrapure water, before being used in the PCR reactions.

2.3. Conventional PCR (cPCR)

The DNA extracted from whole blood was subjected to PCR assay using primers directed to the conserved region of Leishmania genus minicircle kDNA (mkDNA): the sense primer 150-GGGKAGGGGCGTTCTSCGAA and anti-sense primer 152-SSSWCTATWTTACACCAACCCC [19, 20].

The negative and positive controls were included in all PCR assay performed. The DNA extracted from promastigotes of a sample-reference Leishmania (Leishmania) infantum MHOM/BR/2002/LPC-RPV was used as positive control. Tubes containing only sterile ultrapure water instead of the DNA samples were used as negative control in the PCR assays.

For all PCR assays were used specific primers for the constitutive β-globin gene, as a quality control of the reaction. For each PCR reaction, were used the following reagents: 2 mM MgCl₂, 200 μM dNTPs, 0.6 μM of each primer (Sigma, USA), 1 UI Taq DNA polymerase and specific buffer (Invitrogen, USA), and 20 ng DNA template. The program was used as follows: step one: 10 minutes 94°C; step two: 30 seconds 60°C; step three: 30 seconds 72°C; step four: 30 seconds 94°C; go to step two for 42 times; and, finally, 10 minutes 72°C. The final product of amplification was analyzed on a 7% polyacrylamide gel and stained with 0.2% silver nitrate.

2.4. PCR Real Time (qPCR)

For the standardization of real-time PCR was employed the Sybr Green system (Ludwig, Brazil). For comparison between the two techniques, the same pair of primers described for cPCR was applied. The universal cycling conditions were used for amplification (95°C for 10 minutes followed by 40 cycles of 95°C for 15 seconds and 60°C for 1 minute) and performed quantitative analysis of the presence or absence of the pathogen, based on the presence of amplification. In this work was performed dissociation curve on all boards’ amplification.

All samples were analyzed in duplicate. For all PCR reactions were used specific primers for the constitutive β -globin gene, as a quality control of the reaction. The negative and positive controls were included in all PCR reactions performed. The DNA extracted from promastigotes of a sample-reference Leishmania (Leishmania) infantum MHOM/BR/2002/LPC-RPV was used as positive control. Tubes containing only sterile ultrapure water instead of the DNA samples were used as negative control in the PCR reactions.

3. Results and Discussion

For purposes of comparative analysis of diagnostic techniques, we considered the 19 samples of patients who had a confirmed diagnosis by serology and/or by clinical findings. Thus, among these 19 samples, 63% () presented positive results for indirect fluorescence antibody test (IFAT) and 79% () positive results in both PCR methodologies. The remaining samples () which presented a differential diagnosis for VL showed PCR negative results, allowing the expected finding.

The leishmaniasis is highly related to the immunosuppressive diseases such as AIDS, leukemia, among others [3–5]. In many cases the PCR may aid in the diagnosis of VL in which the patient has no detectable amounts of antibodies by serological techniques but can present the genome of the parasite circulating in whole blood. Therefore, molecular biology has been presented as an important tool in the detection of infectious and parasitic diseases, in immunosuppressed patients.

According to the results obtained, there was conformity between the results of the techniques of cPCR and qPCR using the Sybr Green system in 100% of samples analyzed. These data suggest that both PCR techniques were equally effective for detection of the genome of the parasite in the patient’s blood, requiring critical adjustments in accordance with the conditions intralaboratory, so that the efficiency and sensitivity are maintained. It is important to report that the DNA purified from the blood samples presented amplification when it was tested in full concentration or, sometimes, when it was 10 times diluted in sterile ultrapure water (data not show). Thus, this study suggests that all DNA of the blood samples should be tested in full concentrations and 10 times diluted in sterile ultrapure water, despite DNA quantity. These data support some publications that demonstrate the need for detailed standardization for improving performance of PCR in biological samples [16, 21–23].

The use of the kDNA as amplification target has demonstrated favorable results, demonstrated by many studies [15, 18–20, 24–26]. However, the great genetic diversity among species of Leishmania genus hampers the development of a diagnostic method that can encompass all forms of leishmaniasis and detect overall species agent of the disease [27]. Thus, at present, there is no standardization described for probes that anneal in genomes of each species of Leishmania, which makes it impossible to have a standardized system by TaqMan qPCR for detecting large-scale species of the Leishmania genus [16, 21]. Facing that, the technique of qPCR by means of the Sybr Green system, using the target kDNA provides the diagnosis of leishmaniasis enable to detect all species of the genus in the same time.

Some authors have already demonstrated the right application of qPCR for the diagnosis of leishmaniasis, using the Sybr Green system [16, 28, 29]. It is noteworthy that the Syber Green system has a lower cost, since the use of probes or multiple probes for accomplishing all different species of the genus implies a high cost of the test and therefore will be less feasible to be applied to the system of public health.

In our experiments we observed that the results of cPCR and qPCR using the Sybr Green system were similar, demonstrating that both techniques have the same effectiveness to assist in the leishmaniasis diagnosis, when using peripheral blood as a biological sample. Therefore, the choice of method should be evaluated in accordance with the reality of service and technical resources available, as already shown in previous studies [15, 29].

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This work was supported by the National Council for Research and Development (Conselho Nacional de Desenvolvimento Científico e Tecnológico, CNPq) and Research Foundation of the State of Minas Gerais (Fundação de Amparo à Pesquisa do Estado de Minas Gerais, FAPEMIG), Brazil.

References

M. I. S. Duarte and C. E. P. Corbertt, Patologia das Principais Doenças Tropicais No Brasil: Leishmaniose Visceral, Patologia, Guanabara Koogan, Rio de Janeiro, Brazil, 5th edition, 1994, edited by L. Bogliolo.

G. Grimaldi Jr. and R. B. Tesh, “Leishmaniases of the new world: current concepts and implications for future research,” Clinical Microbiology Reviews, vol. 6, no. 3, pp. 230–250, 1993.

P. Desjeux, “The increase in risk factors for Leishmaniasis worldwide,” Transactions of the Royal Society of Tropical Medicine and Hygiene, vol. 95, no. 3, pp. 239–243, 2001.

P. Desjeux, “Leishmaniosis,” Nature Reviews Microbiology, vol. 2, no. 9, p. 692, 2004.

A. Rabello, M. Orsini, and J. Disch, “Leishmania/HIV co-infection in Brazil: an appraisal,” Annals of Tropical Medicine and Parasitology, vol. 97, no. 1, pp. 17–28, 2003.

C. O. Bracho, L. P. de Quintana, S. M. Arenas, and M. R. Parra, “Polymerase chain reaction with two molecular targets in mucosal Leishmaniasis' diagnosis: a validation study,” Memorias do Instituto Oswaldo Cruz, vol. 102, no. 5, pp. 549–554, 2007.

S. A. Ejazi and N. Ali, “Developments in diagnosis and treatment of visceral Leishmaniasis during the last decade and future prospects,” Expert Review of Anti-infective Therapy, vol. 11, no. 1, pp. 79–98, 2013.

A. C. Lopes, Tratado de Clínica Médica, Ed Rocca, São Paulo, Brazil, 2005.

L. Parada, “Kinetoplastids and their networks of interlocked DNA,” Nature Education, vol. 3, no. 9, p. 63, 2010.

S. Sundar, S. G. Reed, V. P. Singh, P. C. K. Kumar, and H. W. Murray, “Rapid accurate field diagnosis of Indian visceral Leishmaniasis,” The Lancet, vol. 351, no. 9102, pp. 563–565, 1998.

N. Singh, M. D. Curran, A. K. Rastogil, D. Middleton, and S. Sundar, “Diagnostic PCR with Leishmania donovani specificity using sequences from the variable region of kinetoplast minicircle DNA,” Tropical Medicine and International Health, vol. 4, no. 6, pp. 448–453, 1999.

X.-S. Hu, W.-T. Yang, H.-G. Lu et al., “Sequencing a specific kinetoplast DNA fragment of Leishmania donovani for polymerase chain reaction amplification in diagnosis of Leishmaniasis in bone marrow and blood samples,” Journal of Parasitology, vol. 86, no. 4, pp. 822–826, 2000.

R. Fisa, C. Riera, E. Ribeira, M. Gállego, and M. Portús, “A nested polymerase chain reaction for diagnosis and follow-up of human visceral Leishmaniasis,” Transactions of the Royal Society of Tropical Medicine and Hygiene, vol. 96, pp. 191–194, 2002.

D. P. Neves, Parasitologia Humana, Editora Atheneu, São Paulo, Brazil, 10th edition, 2002.

T. S. M. de Assis, R. B. Caligiorne, G. A. S. Romero, and A. L. Rabello, “Comparison between serum and peripheral blood as sources of Leishmania k-DNA for the diagnosis of visceral Leishmaniasis,” Transactions of the Royal Society of Tropical Medicine and Hygiene, vol. 103, no. 12, pp. 1269–1272, 2009.

J. L. Weirather, S. M. B. Jeronimo, S. Gautam et al., “Serial quantitative PCR assay for detection, species discrimination, and quantification of Leishmania spp. in human samples,” Journal of Clinical Microbiology, vol. 49, no. 11, pp. 3892–3904, 2011.

D. M. de Oliveira, M. V. C. Lonardoni, U. Theodoro, and T. G. V. Silveira, “Comparison of different primes for PCR-based diagnosis of cutaneous Leishmaniasis,” Brazilian Journal of Infectious Diseases, vol. 15, no. 3, pp. 204–210, 2011.

H. A. El-Beshbishy, K. H. Al-Ali, and A. A. El-Badry, “Molecular characterization of cutaneous Leishmaniasis in Al-Madinah Al-Munawarah province, Western Saudi Arabia,” International Journal of Infectious Diseases, vol. 5, pp. e334–e338, 2013.

W. Degrave, O. Fernandes, D. Campbell, M. Bozza, and U. Lopes, “Use of molecular probes and PCR for detection and typing of Leishmania—a mini-review,” Memorias do Instituto Oswaldo Cruz, vol. 89, no. 3, pp. 463–469, 1994.

J. Disch, F. C. Maciel, M. C. de Oliveira, M. Orsini, and A. Rabello, “Detection of circulating Leishmania chagasi DNA for the non-invasive diagnosis of human infection,” Transactions of the Royal Society of Tropical Medicine and Hygiene, vol. 97, no. 4, pp. 391–395, 2003.

M. Depaiva-Cavalcanti, F. Dantas-Torres, D. Cunha Gonçalves et al., “Quantitative real time PCR assays for the detection of Leishmania (Viannia) braziliensis in animals and humans,” Molecular and Cellular Probes, vol. 27, no. 3-4, pp. 122–128, 2013.

G. Johnson, T. Nolan, and S. A. Bustin, “Real-time quantitative PCR, pathogen detection and MIQE,” in PCR Detection of Microbial Pathogens, M. Wilks, Ed., vol. 943 of Methods in Molecular Biology, pp. 1–16, Springer Science+Business Media, LLC, 2nd edition, 2013.

A. Mohammadiha, M. Mohebali, A. Haghighi et al., “Comparison of real-time PCR and conventional PCR with two DNA targets for detection of Leishmania (Leishmania) infantum infection in human and dog blood samples,” Experimental Parasitology, vol. 133, no. 1, pp. 89–94, 2013.

J. Disch, R. B. Caligiorne, F. Maciel et al., “Single-step duplex kDNA-PCR for detection of Leishmania donovani complex in human peripheral blood samples,” Diagnostic Microbiology and Infectious Disease, vol. 56, no. 4, pp. 395–400, 2006.

Z. M. P. Luz, A. R. da Silva, F. D. O. Silva, R. B. Caligiorne, E. Oliveira, and A. Rabello, “Lesion aspirate culture for the diagnosis and isolation of Leishmania spp. from patients with cutaneous Leishmaniasis,” Memorias do Instituto Oswaldo Cruz, vol. 104, no. 1, pp. 62–66, 2009.

I. Cruz, A. Millet, E. Carrillo et al., “An approach for interlaboratory comparison of conventional and real-time PCR assays for diagnosis of human leishmaniasis,” Experimental Parasitology, vol. 134, no. 3, pp. 281–289, 2013.

M. C. Boité, I. L. Maurício, M. A. Miles, and E. Cupolillo, “New insights on taxonomy, phylogeny and population genetics of Leishmania (Viannia) parasites based on multilocus sequence analysis,” PLOS Neglected Tropical Diseases, vol. 6, no. 11, Article ID e1888, 2012.

D. Pita-Pereira, R. Lins, M. P. Oliveira et al., “SYBR Green-based Real-Time PCR targeting kinetoplast DNA can be used to discriminate between the main etiologic agents of Brazilian cutaneous and visceral Leishmaniases,” Parasites and Vectors, vol. 5, no. 1, article 15, 2012.

S. Khademvatan, N. Neisi, S. Maraghi, and J. Saki, “Diagnosis and identification of Leishmania spp. from giemsa-stained slides, by real-time PCR and melting curve analysis in south-west of Iran,” Annals of Tropical Medicine and Parasitology, vol. 105, no. 8, pp. 559–565, 2011.