BioMed Research International
Volume 2014 (2014), Article ID 639475, 2 pages
http://dx.doi.org/10.1155/2014/639475

Editorial

Advances in Molecular Pathway-Directed Cancer Systems Imaging and Therapy

David J. Yang,¹ Lan Pham,¹ Mei-Hsiu Liao,² Fan-Lin Kong,¹ Hiroji Uemura,³ and Yen-Yu Ian Shih⁴

¹University of Texas MD Anderson Cancer Center, Houston, TX 77030, USA
²Radiopharmaceuticals Production and Marketing Center, Institute of Nuclear Energy Research, Atomic Energy Council, Taoyuan 32546, Taiwan
³Yokohama City University Graduate School of Medicine, Yokohama 236-0004, Japan
⁴Small Animal MRI, Biomedical Research Imaging Center, University of North Carolina at Chapel Hill, Chapel Hill, NC 27599, USA

Received 7 September 2014; Accepted 7 September 2014; Published 21 December 2014

Copyright © 2014 David J. Yang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Molecular nuclear imaging agents enable the comprehensive characterization of therapeutic intervention and can be used in patient selection, pharmacokinetic, dosage-finding, and proof-of-concept studies. The effort in image-guided cell therapy and theranostic approaches in parallel with instrumentation development would be more comprehensive in the outcome assessment of patient response to treatment. To extend the threshold of being able to provide personalized therapy for patients, the integration of imaging findings to genomic and proteomic systems profiling is essential to validate targeted pathways.

The Food and Drug Administration (FDA) permits radiopharmaceuticals produced under well-controlled conditions in central commercial facilities to be distributed to local clinics where they are administered. In addition, radiopharmaceutical production process must adhere to Current Good Manufacturing Practice (CGMP) compliance to ensure the quality of drug product that meets acceptance criteria. The CGMP compliance covers manufacturing process and facility, quality guidelines, and personnel training. Y.-T. Chi et al. reported the design of CGMP production for ¹⁸F- and ⁶⁸Ga-radiopharmaceuticals. The Pharmaceutical Inspection Convention and Pharmaceutical Inspection Cooperation Scheme (jointly referred to as PIC/S) are two international instruments between countries and pharmaceutical inspection authorities, which provide together an active and constructive cooperation in the field of Good Manufacturing Practice (GMP). PIC/S’ mission is to lead the international development, implementation, and maintenance of harmonized CGMP standards and quality systems of inspectorates in the field of medicinal products. They reviewed FDA and PIC/S guidelines for the synthesis of radiopharmaceuticals. Two examples, ⁶⁸Gallium-[1,4,7,10-tetraazacyclododecane-N,N′,N′′,N′′′-tetraacetic acid]-D-Phe¹,Tyr³-octreotate (⁶⁸Ga-DOTATATE) and ¹⁸F-fluorodeoxyglucose (¹⁸F-FDG), were manufactured under CGMP process. They have reviewed acceptance criteria for these clinic useful radiopharmaceuticals.

Radiopharmaceutical chemistry requires intricate handling of radioactive materials, fast reaction times, ease of synthesis, and reproducible results. In the preclinical setting, radiopharmaceuticals are typically synthesized manually. Such applications use in vitro and small animal models to validate the agent and require low levels of radioactivity. The use of manual synthesis for clinical imaging, however, is challenging for multiple reasons: (1) clinical agents must meet strict sterility and pyrogenicity requirements which are validated from batch to batch; (2) batch-to-batch reproducibility is required to demonstrate suitable radiochemical yield, radiochemical purity, and other quality control analyses; (3) synthesis time must be fast when dealing with radionuclides with a short half-life; (4) clinical studies require multiple patient doses and would expose radiochemists to much higher levels of radioactivity; and (5) production cost and availability of the technology may limit the viability of the agent in routine clinical practice. I.-H. Shih et al. reported the manufacturing of a cGMP grade of [¹⁸F]fluoropropoxytryptophan (¹⁸F-FTP) to assess tryptophan transporters. PET imaging studies were performed with ¹⁸F-FTP and ¹⁸F-FDG in prostate and small cell lung tumor-bearing animal models. They have reported that ¹⁸F-FTP could be synthesized with high radiochemical yield. They conclude that ¹⁸F-FTP may provide potential applications in differential diagnosis and prediction of early treatment response for carcinoids.

Molecular imaging science has been focused on imaging guidance in the areas of targeting epigenetic abnormalities and disease microenvironment in overcoming resistance in diseases. Multimodality imaging using noncytotoxic triple fusion (TF) reporter genes is an important application for cell-based tracking, drug screening, and therapy. Y.-J. Hsieh et al. reported the rational design of a triple reporter gene for multimodality molecular imaging. They reported that an optimized triple fusion reporter constructed with DsRedm-fl-ttksr39 was developed and validated for more effective and sensitive in vivo animal imaging using fluorescence, bioluminescence, and PET imaging modalities. Their findings may facilitate different fields of biomedical research and applications.

The use of image-guided technologies to select patient for personalized therapy and to monitor therapeutic outcomes is the focus of this special issue. S. H.-H. Yeh et al. reported the evaluation of inhibitory effect of recreational drugs on dopaminergic terminal neuron by ¹⁸F-FDOPA and whole-body autoradiography. They used ¹⁸F-FDOPA PET imaging and autoradiographic techniques toassess the impact of recreational drugs such as ketamine, cocaine, and methamphetamine on dopamine neurons in peripheral organs. They have demonstrated that both dynamic ¹⁸F-FDOPA PET and autoradiography were useful crossing-validating tools to evaluate the alteration of dopaminergic neurons in peripheral tissues. D. Smith et al. reported the application of patched targeting peptides for imaging and treatment of hedgehog positive breast tumors. Hedgehog (Hh) signaling is involved in breast cancer growth and metastasis and high tumor Sonic Hedgehog (SHh) expression is correlated with poor prognosis in invasive ductal carcinoma. Peptides which bind the PTCH receptor have recently been reported to have a growth inhibitory effect in tumors with activated Hh signaling. These peptides may be used as molecular imaging probes to monitor changes in Hh expression after chemotherapy. Their studies showed that peptides which bind the SHh docking site in PTCH-1 correlate with PTCH-1 expression and can be used to image PTCH-1 in vivo. They conclude that radiolabeled peptides may enable examining the activity of the Hh signaling pathway and evaluating response to anticancer therapies.

In summary, this special issue covers advances in molecular imaging in drug manufacturing under CGMP environment, preclinical drug discovery, image-guided drug response, and target validation using PET/SPECT hybrid with CT.

David J. Yang
Lan Pham
Mei-Hsiu Liao
Fan-Lin Kong
Hiroji Uemura
Yen-Yu Ian Shih