BioMed Research International

Volume 2014 (2014), Article ID 897956, 15 pages

http://dx.doi.org/10.1155/2014/897956

Review Article

Assessment of Cardiac Sarcoidosis with Advanced Imaging Modalities

Makoto Orii, Toshio Imanishi, and Takashi Akasaka

Department of Cardiovascular Medicine, Wakayama Medical University, 811-1 Kimiidera, Wakayama 641-8510, Japan

Received 5 June 2014; Revised 6 August 2014; Accepted 11 August 2014; Published 28 August 2014

Academic Editor: Andor Glaudemans

Copyright © 2014 Makoto Orii et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Sarcoidosis is a chronic systemic disease of unknown etiology that is characterized by the presence of noncaseating epithelioid granulomas, usually in multiple organs. Several studies have shown that sarcoidosis might be the result of an exaggerated granulomatous reaction after exposure to unidentified antigens in genetically susceptible individuals. Cardiac involvement may occur and lead to an adverse outcome: the heart mechanics will be affected and that causes ventricular failure, and the cardiac electrical system will be disrupted and lead to third degree atrioventricular block, malignant ventricular tachycardia, and sudden cardiac death. Thus, early diagnosis and treatment of this potentially devastating disease is critically important. However, sensitive and accurate imaging modalities have not been established. Recent studies have demonstrated the promising potential of cardiac magnetic resonance imaging (MRI) and ¹⁸F-fluoro-2-deoxyglucose positron emission tomography (¹⁸F-FDG PET) in the diagnosis and assessment of cardiac sarcoidosis (CS). In this review, we discuss the epidemiology, etiology, histological findings, and clinical features of sarcoidosis. We also introduce advanced imaging including ¹⁸F-FDG PET and cardiac MRI as more reliable diagnostic modalities for CS.

1. Introduction

Sarcoidosis was first reported more than 120 years ago. It is a granulomatous inflammatory disease with an unclear etiology that affects multiple organs including the lungs, heart, skin, central nervous system, and eyes [1]. Although it is not commonly fatal, cardiac involvement may be responsible for more than two-thirds of deaths [2]. The clinical diagnosis of cardiac sarcoidosis (CS) is therefore critically important to the timely planning of therapeutic strategies.

Despite extensive research, the etiology of sarcoidosis has not been elucidated, although most evidence points to an aberrant immune response as the pathogenetic mechanism, which is driven by an unidentified antigen in genetically susceptible individuals. Although multiple candidate etiologic agents including microbial organisms and environmental agents have been identified, the results are inconclusive thus far.

Once the diagnosis of sarcoidosis is made, management may range from observation to long-term administration of steroids (often at high doses) or other immunosuppressive therapies, depending on disease severity and organ involvement [3]. Although immunosuppressive therapy may be required for CS, reliable biomarkers and effective imaging modalities have not been established for it. The diagnosis of CS is further hindered by the lack of any reliable and specific diagnostic test, as there are no imaging findings that allow for a definitive diagnosis of CS.

2. Epidemiology

Sarcoidosis is a systemic disease with a prevalence of about 4.7–64 in 100 000 and an incidence of 1.0–35.5 in 100 000 per year. The highest rates are reported in northern European and African-American individuals, particularly in women, and the lower rate is reported in Japan [4, 5]. Differences in prevalence and incidence are linked to age, sex, ethnic origin, and geographical location. The disease can occur in both sexes, with a female to male ratio of 1 : 1.46. Seventy percent of patients are aged 25–45 years, although a second incidence peak occurs in women older than 50 years in Europe and Japan [4, 5]. The clinical expression of sarcoidosis is affected by epidemiological and socioeconomic factors. Elderly-onset sarcoidosis is much more common in women and shows higher rates of change in general health and extrapulmonary manifestations [6]. Sarcoidosis is usually sporadic, but is familial in 3.6–9.6% of cases [7]. Siblings have a higher risk of sarcoidosis than do parents, suggesting a recessive made of inheritance with incomplete penetrance [7]. An 80-fold increase in risk in monozygotic twins lends support to the notion that genetic factors might account for two-thirds of disease susceptibility [8].

3. Etiology

The exact etiology of sarcoidosis remains unknown. Many studies suggest that genetic susceptibility and environmental factors contribute to disease development [9–11]. Immunologically, sarcoidosis is an exaggerated immune response to as yet unknown antigens. Data on the clinical heterogeneity of sarcoidosis strongly suggest that the pathogen-associated molecular patterns of microbial antigens can trigger or amplify inflammation. There is no evidence that sarcoidosis is an infectious disease; rather, it is likely to be an exaggerated immune response to the pathogen-associated molecular patterns of killed and partly degraded mycobacteria and propionibacteria. Other organic and inorganic substances might also trigger sarcoidosis [12]. Mycobacteria and propionibacteria persist in macrophage phagosomes because the high lipid contents in their membranes make them acid-fast, and many of their glycolipoproteins are not very soluble and resist degradation.

4. Histologic Findings in Sarcoidosis (Granuloma Formation)

The histologic hallmark of sarcoidosis, irrespective of organ involvement, is noncaseating epithelioid granulomas. Granulomas typically consist of a compact central area of macrophages that differentiate into epithelioid cells and then fuse to form multinucleated giant cells surrounded by lymphocytes (Figure 1) [3]. These cells become the primary sources for angiotensin-converting enzyme (ACE). Lymphocytes scattered within granulomas tend to be CD4+ T helper cells, while those around the periphery are CD8+ T cells and to a lesser extent B cells (Figure 1).

Figure 1: Recruitment of inflammatory cells and granuloma formation. Release of type 1 helper T (Th1) cytokines or chemokines promotes cellular accumulation and nidus formation, resulting in granuloma. Activated macrophages increase the expression of co-stimulatory molecules; released chemokines such as CXCL10 attract additional T cells with a CD4/Th1 phenotype.

There is generally minimal necrosis within sarcoid granulomas, unlike those associated with Mycobacterium tuberculosis infection [13]. Granulomas in sarcoidosis are thought to form around and isolate poorly degraded antigens as a means of preventing antigen dissemination and further tissue damage. Why sarcoidosis spontaneously resolves in some patients and progresses in others is still poorly understood. With respect to progressive disease, it has been postulated that the antigen persists, thereby inducing a chronic immune response [14, 15]. Importantly, the detection of granulomas alone is not specific enough to diagnose sarcoidosis, especially noncaseating granulomas that are rarely found by subendomyocardial biopsy in CS [16]. Sarcoidosis is conventionally diagnosed by the appropriate combination of clinical, physiologic, and multimodality imaging. Histological findings of granuloma mainly serve to support, not definitively confirm, the diagnosis of sarcoidosis and exclude other potential etiologies from the differential diagnosis.

5. Manifestations

The incidence of CS varies by ethnic group and depends on the type of study performed. Studies based on clinical findings in known sarcoid patients are likely given a prevalence of cardiac involvement in 5% to 10% of affected patients [17]. An excellent American autopsy series published in 1978 showed that 27% of 84 autopsied patients with a diagnosis of sarcoidosis had CS, two-thirds of whom had clinically significant cardiac disease [18]. Although myocardial fibrosis is nonspecific, it can sometimes be the only manifestation of CS. This series did not consider myocardial fibrosis as evidence of cardiac involvement, so it likely underestimated the true prevalence of CS. A recent American study investigated 62 outpatients with documented sarcoidosis and no documented CS. They asked about cardiac symptoms and performed noninvasive tests (simple electrocardiography [ECG], Holter monitoring, and transthoracic echocardiography). Any patient who reported symptoms or had an abnormal study was sent for advanced imaging including cardiac magnetic resonance imaging (MRI) or ¹⁸F-fluoro-2-deoxyglucose positron emission tomography (¹⁸F-FDG PET). The results showed that almost 40% of outpatients with documented sarcoid had CS. Of these, slightly more than half were asymptomatic [19]. CS is most common among older, female Japanese sarcoid patients, with a reported rate of cardiac involvement of almost 80% [20].

CS can affect any part of the heart and its conduction system. The most frequently involved area is the ventricular septum (31.5%), followed by the inferior wall, anterior left ventricle, right ventricle, and lateral left ventricle [21]. Sarcoid granulomas and subsequent fibrosis may induce complete atrioventricular (AV) block, systolic and diastolic dysfunction, and ventricular tachycardia (VT) (Figure 2) [22–27]. Patients may present with syncope, heart failure, or sudden death. Because CS often occurs in the absence of apparent disease elsewhere, sarcoidosis should be considered in any nonischemic form of cardiomyopathy, particularly when rhythm disturbances are prominent.

Figure 2: Imaging and inflammation cascade. In this schematic representation of disease progression, the infection point is represented by inflammation, edema, and fibrosis. Granuloma formation (a), ¹⁸F-FDG PET of myocardial inflammation (b), cardiac magnetic resonance imaging of myocardial edema (c), and cardiac magnetic resonance imaging of myocardial fibrosis (d) are shown. ¹⁸F-FDG PET: ¹⁸F-fluorodeoxyglucose positron emission tomography.

A precise and early diagnosis would be needed to introduce effective anti-inflammatory therapy that could prevent an adverse outcome [19, 28]. However, the lack of gold standard in the diagnosis of CS remains a major problem.

6. Japanese Guidelines for the Diagnosis of CS

Clinical guidelines for the diagnosis of CS were first published by the Japanese Ministry of Health and Welfare (JMHW) in 1993 and they have been used most commonly in the diagnosis of CS and as the reference for comparison of various imaging techniques [29]. Electrophysiological studies should be used to evaluate patients with syncope or significant ECG abnormalities, but their sensitivity and ability to stratify patients by risk are poorly defined. A normal electrophysiological study at any one point does not predict future granulomatous infiltration and fibrosis in critical regions. This means that advanced imaging modalities such as cardiac MRI and ¹⁸F-FDG PET are needed to assess disease activity and management. In 2006, the Joint Committee of the Japan Society of Sarcoidosis and Other Granulomatous Disorders and the Japanese College of Cardiology published a revised version of the guidelines, in which delayed enhancement (DE) in cardiac MRI was added as a minor criterion for the clinical diagnosis as shown in the following list [30, 31].

Japanese Ministry of Health and Welfare Criteria for Cardiac Sarcoidosis

Major Criteria

(a)Advanced atrioventricular block.(b)Basal thinning of the interventricular septum.(c)Positive 67 gallium uptake in the heart.(d)Depressed ejection fraction of the left ventricle (50%).

Minor Criteria

(a)Abnormal ECG findings: ventricular arrhythmias (ventricular tachycardia, multifocal or frequent PVCs), CRBBB, axis deviation or abnormal Q-wave.(b)Abnormal echocardiography: regional abnormal wall motion or morphological abnormality (ventricular aneurysm, wall thickening).(c)Nuclear medicine: perfusion defect detected by 201 thallium or 99 m technetium myocardial scintigraphy.(d)Gadolinium-enhanced CMR imaging: delayed enhancement of myocardium.(e)Endomyocardial biopsy: interstitial fibrosis or monocyte infiltration over moderate grade. CMR: cardiac magnetic resonance, CRBBB: complete right bundle branch block, ECG: electrocardiogram, and PVC: premature ventricular contraction.(1)Two or more of the four major criteria are satisfied.(2)One in two of the major criteria and two or more of the five minor criteria are satisfied.

Abnormal cardiac accumulation on ¹⁸F-FDG PET was not added to the diagnostic criteria but was included in the additional statements. Several imaging studies have been published on utilizing ¹⁸F-FDG PET and cardiac MRI for the diagnosis of CS to date, but almost all of them were validated using JMHW’s original guidelines [32–40]. Two recent studies did, however, examine the diagnostic accuracy of ¹⁸F-FDG PET based on the revised guidelines (Table 1) [37, 40].

Table 1: Sensitivity and specificity of ¹⁸F-FDG PET in the diagnosis of CS.

Authors
Year
Subjects studied
JMHW guidelines
No. of patients ()
Fasting time (h)
Sensitivity (%)
Specificity (%)
Comments

Yamagishi et al. [38]
2003
With CS
1993
17
>5　
82
NA
First systemic research

Okumura et al. [34]
2004
With sarcoidosis
1993
22
>12
100
91
PET is more sensitive

than ⁶⁷Ga scintigraphy

Ishimaru et al. [35]
2005
With sarcoidosis
1993
32
>6
100
82
Pre-administered heparin

Ohira et al. [32]
2008
With suspected CS
1993
21
>12
88
39
Comparing 

¹⁸F-FDG PET and MRI

Langah et al. [36]
2009
With suspected CS
1993
76
>18
85
90
PET CT with prolonged fasting >18 h

Tahara et al. [37]
2010
With suspected CS
2006
24
>12
100
46→97
Analysis using the COV improved specificity

Manabe et al. [39]
2013
With suspected CS
1993
67
>6
96
62
18F-FDG uptake was related to ECG abnormalities

McArdle et al. [40]
2013
With suspected CS
2006
134
>12
100
83
With a high-fat, low-carbohydrate diet on the day before PET

Blankstein et al. [33]
2013
With suspected CS
1993
118
>3
71
45
With a high-fat, high protein, low-carbohydrate diet

CS: cardiac sarcoidosis, ¹⁸F-FDG PET: ¹⁸F-fluorodeoxyglucose positron emission tomography, JMHW: Japanese Ministry of Health and Welfare, COV: coefficient of variation.

7. Cardiac MRI

Cardiac MRI has emerged as the gold standard for the diagnosis of cardiac involvement in sarcoidosis. Early enhancement of sarcoid granulomas in T2-weighted images suggests the presence of inflammation and edema, whereas DE indicates fibrotic changes and scarring [41, 42]. Commonly, the two phases overlap. Smedema et al. evaluated the diagnostic role of cardiac MRI in 58 patients with suspected CS and reported that DE showed favorable sensitivity and specificity of 100% and 78%, respectively [42]. Kim et al. compared the prognostic value of DE in cardiac MRI with JMHW’s criteria in an asymptomatic cohort of 81 patients with biopsy-proven extra-cardiac sarcoidosis [43]. CS was detected in 26% of patients by DE on cardiac MRI, but only 12% fulfilled JMHW’s criteria. DE was associated with adverse events and cardiac death. These results were confirmed by a more recent study, in which 155 patients with extra-cardiac sarcoidosis underwent cardiac MRI and had a follow-up of approximately 2.6 years [41]. In addition to reliably, detecting the disease, DE may also be useful for assessing the response to steroid therapy [44, 45]. Unfortunately, however, the test is not effective for patients with non-MRI compatible pacemakers and defibrillators, or those with renal dysfunction.

8. ¹⁸F-FDG PET

¹⁸F-FDG PET is a noninvasive molecular imaging technique that is highly sensitive to metabolically active processes. ¹⁸F-FDG is taken up by living cells via cell membrane glucose transporters (GLUT) and is phosphorylated intracellularly by a hexokinase into ¹⁸F-FDG-6-phosphate (¹⁸F-FDG-6-P). ¹⁸F-FDG-6-P cannot be metabolized further along the glycolytic pathway and therefore accumulates within cells in direct proportion to their metabolic activity, a phenomenon known as metabolic trapping. In oncology, the uptake of ¹⁸F-FDG by tumor cells makes PET the gold-standard technique for investigating metastases [46, 47]. The use of this technique for imaging inflammation has also been proposed, partly because ¹⁸F-FDG has been noted at sites of inflammation during routine ¹⁸F-FDG PET imaging of cancer patients [48]. The identification of sites of inflammation is related to the glycolytic activity of cells involved in the inflammatory response. In inflammatory cells, especially neutrophils and monocytes/macrophages, cellular activation increases GLUT1 and GLUT3 in the cell membrane and hexokinase over the levels in resting cells [49, 50].

Under aerobic conditions, most myocardial energy consumption is derived from oxidation of free fatty acids (FFAs), followed by glucose and, to a smaller extent, amino acids. In the myocardium with a low concentration of glucose-6-phosphatase, ¹⁸F-FDG-6-P does not enter into further enzymatic pathway and accumulates intracellularly, proportional to the glycolytic rate of the cell.

9. ¹⁸F-FDG PET in the Diagnosis of CS

Recent studies have demonstrated the promising potential of ¹⁸F-FDG PET in the diagnosis and assessment of CS [32–40, 51–53]. Accumulation of ¹⁸F-FDG is associated with an active inflammatory process in patients with CS [54, 55]. Gallium 67 (Ga-67) scintigraphy has long been used for the diagnosis of CS, but it is now being replaced by ¹⁸F-FDG PET, mainly because of its low diagnostic sensitivity, which does not exceed 36% owing to low image resolution [34, 35, 38]; ¹⁸F-FDG PET has a markedly higher sensitivity (71–100%) for diagnosing CS in comparison (Table 1). Advances continue to be made in PET/CT technology, and ¹⁸F-FDG PET offers less exposure to radiation, quantitative analysis capability, and greater sensitivity for diagnosing CS than other radioisotope imaging modalities such as thallium-201 or technetium-99 m perfusion single photon emission CT [34, 35, 38]. Langah et al. also reported favorable sensitivity (85%) and specificity (90%) of ¹⁸F-FDG/CT in patients with suspected CS [36] (Table 1), while a series of case reports have hinted at the promise value of ¹⁸F-FDG in detecting cardiac sarcoid lesions [56, 57]. For example, Smedema et al. reported that increased ¹⁸F-FDG uptake indicated active myocardial inflammation in the heart in a patient with biopsy-proven CS [56]. Similarly, Koiwa et al. demonstrated that ¹⁸F-FDG uptake in the heart corresponded well with the pathologically confirmed sarcoid lesions in an autopsy case [57]. Two studies of the diagnostic accuracy of ¹⁸F-FDG PET have been published and were based on the JMHW revised guidelines in 2006. Tahara et al. reported that they utilized visual and quantitative analysis using ¹⁸F-FDG PET images [37]. Mc Ardle et al. reported the sensitivity and specificity for diagnosing CS as 100% and 83%, respectively, and that CS patients with VT displayed higher cardiac uptake of ¹⁸F-FDG when compared with those with advanced AV block [51]. The specificity of ¹⁸F-FDG in the detection of CS varies and is relatively low (39–97%) compared with its sensitivity (Table 1). Possible explanations for this include nonspecific myocardial uptake of ¹⁸F-FDG in the normal heart [58, 59] and early-stage sarcoid lesions in the heart of patients who do not meet the diagnostic criteria for CS [60].

Cardiac assessment can be combined with whole-body imaging to determine the presence and activity of extra-cardiac sarcoidosis lesions (Figure 3).

Figure 3: ¹⁸F-FDG PET study in a subject with cardiac and extra-cardiac sarcoidosis. ¹⁸F-FDG uptake is focally increased in the basal septal wall, consistent with active CS, and is suppressed in other left ventricular walls (white arrows). Whole-body study shows multiple extra-cardiac foci of ¹⁸F-FDG uptake in chest, lymph nodes, and subcutaneous tissue consistent with active extensive systemic sarcoidosis. ¹⁸F-FDG PET: ¹⁸F-fluorodeoxyglucose positron emission tomography, MIP: maximum intensity projection.

10. Minimizing Physiological ¹⁸F-FDG Uptake in the Normal Myocardium

The identification of sites of inflammation is related to the glycolytic activity of the cells involved in the inflammatory response. It is important to determine whether ¹⁸F-FDG uptake in inflammatory lesions can be distinguished from physiological ¹⁸F-FDG uptake in the myocardium. Although a focal uptake pattern is most suggestive of CS (Figure 3), several studies have reported that fasting ¹⁸F-FDG uptake is inhomogeneous throughout the left ventricle in healthy subjects [61] and in oncologic patients [62], with regional maximal uptake in the infero-lateral and basal myocardium, probably because of local differences in substrate use [62]. This physiological ¹⁸F-FDG uptake by the normal myocardium is problematic because it could lead to blurring of the sarcoid lesions in the heart and/or false-positive results. Although there is currently no consensus on the best protocol for suppressing cardiac ¹⁸F-FDG uptake, a recently proposed protocol that combines prolonged fasting [63], dietary modifications [64, 65], and unfractionated heparin load before imaging [35] appears to be an attractive solution. In the fasting condition, normal myocardial cells use FFAs for up to 90% of their oxygen consumption [66, 67]. In contrast, when plasma glucose or insulin levels are increased after eating, glucose use may become dominant over FFA use. For clear visualization of CS lesions with a high signal-to-noise ratio, fasting imaging is preferable to postprandial imaging because background ¹⁸F-FDG uptake is more suppressed [68]. Williams and Kolodny have shown that a very high-fat, low-carbohydrate, protein-permitted diet suppresses myocardial ¹⁸F-FDG uptake more effectively than overnight or 4 h fasting in an oncologic cohort [65]. Comparing the effectiveness of myocardial ¹⁸F-FDG suppression with a low-carbohydrate, high-fat, and protein-permitted diet with prolonged fasting over 12 h in an oncologic cohort, Harisankar et al. found that dietary restriction better suppressed cardiac uptake than did prolonged fasting [64]. Unfractionated heparin increases plasma FFAs levels via activation of lipoprotein and hepatic lipases [69], which may cause a reduction of glucose consumption in the normal myocardium. In a Japanese CS study cohort after a fasting period of at least 6 h, 50 units of unfractionated heparin per kilogram of body weight were injected 15 min before application of ¹⁸F-FDG [35]. This resulted in robust suppression of cardiac ¹⁸F-FDG uptake. However, a more recent study comparing heparin with prolonged fasting of more than 17.5 h reported that cardiac uptake was inhibited to a greater degree by extended fasting [70].

If there is a more diffuse uptake, the suppression of myocardial physiologic uptake may have been insufficient and other pitfalls should be considered. These include insufficient myocardial uptake suppression leading to heterogeneous ¹⁸F-FDG uptake (maximum in the basal and lateral walls); other nonischemic cardiomyopathy or other inflammatory diseases of the heart leading to a substrate shift toward glucose, resulting in (heterogeneous) myocardial ¹⁸F-FDG uptake; and myocardial ischemia resulting in sustained regionally increased myocardial ¹⁸F-FDG uptake. Maurer et al. have shown that total cardiac uptake activity was suppressed in only 9% of an oncologic patient cohort despite adequate fasting [62]. Additionally, Israel et al. demonstrated that cardiac ¹⁸F-FDG uptake was significantly higher in male patients, patients younger than 30 years, patients who had fasted for less than 5 h, patients with heart failure, and patients receiving benzodiazepines [71].

11. Analysis of ¹⁸F-FDG PET Image

11.1. Semiquantitative Analysis

Focal myocardial ¹⁸F-FDG uptake has been considered a finding suggestive of active CS lesions. Ishimaru et al. visually classified ¹⁸F-FDG PET uptake into four patterns—“none,” “diffuse,” “focal,” and “focal on diffuse”—where the latter two patterns were considered to be indicative of CS [32, 35]. Similarly, Langah et al. defined the patterns of ¹⁸F-FDG uptake in the heart as “diffuse” or “focal” [36]. Alternatively, Yamagishi et al. divided the left ventricle into nine segments and defined a normal perfusion segment on cardiac ¹³N-NH3 images as the control region. They then compared ¹⁸F-FDG uptake between the segments with increased ¹⁸F-FDG uptake and the control segment [38]. ¹⁸F-FDG PET is often combined with a perfusion scan and ECG gating to rule out coronary artery disease or to identify resting perfusion defects suggestive of inflammation-induced tissue damage [51]. Normal perfusion and increased focal ¹⁸F-FDG uptake represent early CS, whereas abnormal perfusion and increased ¹⁸F-FDG uptake more likely represent advanced disease with tissue damage. Scarring, a potential outcome of end-stage disease, may result in abnormal perfusion without ¹⁸F-FDG uptake [34]. In regard to segmental analysis, Ohira et al. and Yamagishi et al. used 16-segment and 9-segment models of the left ventricle, respectively (Table 1).

11.2. Quantitative Analysis

The standardized uptake value (SUV) is commonly used as an index of tracer uptake in tumor imaging. The SUV can be obtained using the following equation. SUV = (decay-corrected radiotracer concentration, mCi/mL)/(mCi of tracer injected dose into the patient)(body weight). In CS, a high SUV in the ¹⁸F-FDG uptake site has been reported, consistent with visual determination of the site [34]. Okumura et al. divided the left ventricular cardiac muscle into 13 segments. Patients with CS showed a higher myocardial SUV than did healthy subjects. The diagnostic capability based on the above criterion had a sensitivity of 100% and specificity of 91% [34]. Tahara et al. reported that they utilized visual analysis using ¹⁸F-FDG PET images, and the sensitivity and specificity for diagnosing CS were 100% and 46%, respectively, but after the quantitative analysis utilizing the coefficient of variation of SUV for segmental ¹⁸F-FDG uptake, they achieved a specificity of 97% (Table 1) [37]. As for the use of SUV in the diagnosis of CS, problems that remain to be solved included unstandardized SUV calculation software and differences in measurement values depending on imaging equipment and imaging conditions.

12. Assessment of Disease Activity during Corticosteroid Treatment

The metabolic signal of inflammation is a marker of disease activity and can be used to guide the need for and response to corticosteroid therapies (Figure 4) [37, 38, 53, 72].

(a)

(b)

Figure 4: ¹⁸F-FDG PET before and after corticosteroid therapy. (a) ¹⁸F-FDG PET image (3D maximum intensity projection) before therapy. (b) After administration of 30 mg/day prednisone for 12 weeks, FDG uptake (arrow) has almost disappeared. ¹⁸F-FDG PET: ¹⁸F-fluoro-2-deoxyglucose positron emission tomography. SUV: standardized uptake value, COV: coefficient of variation.

Among the case reports in the literature, Takeda et al. reported a case of CS with third-degree AV block that had markedly increased ¹⁸F-FDG uptake in the basal interventricular septum. After corticosteroid therapy, myocardial ¹⁸F-FDG uptake disappeared and the complete AV block became a first-degree AV block [53]. Similarly, Tadamura et al. documented a case of reduced regional ¹⁸F-FDG uptake in the heart after corticosteroid therapy. In their case, myocardial ¹⁸F-FDG uptake decreased, as did the serum level of ACE, a biomarker that reflects the disease activity of sarcoidosis [72]. After steroid therapy, a small study in 17 biopsy-proven CS patients showed a significant decrease in ¹⁸F-FDG uptake, while perfusion defects remained stable [38]. Three patients showed improvement on ECG as well. Pandya et al. reported that the recurrence of symptomatic VT was predicted by increased ¹⁸F-FDG uptake during corticosteroid tapering [73]. In a recent prospective study of 28 patients with biopsy-proven sarcoidosis, ¹⁸F-FDG PET/CT influenced clinical management in 63% [63]. These reports suggest the practical role of ¹⁸F-FDG PET in monitoring the disease activity of CS during corticosteroid therapy; however, there are pitfalls in this. First, steroids often induce glucose intolerance along with gluconeogenesis and insulin resistance. Serum glucose and insulin levels elevated by steroid therapy could affect ¹⁸F-FDG uptake in target organs including the heart [74, 75]. This may preclude an accurate assessment of the effects of corticosteroid using ¹⁸F-FDG PET. Also, ¹⁸F-FDG PET has a limited ability in showing fibrous regions, although corticosteroid therapy may facilitate the transition from active inflammatory changes to the fibrotic stage. Fibrous lesions can be a focus of reentrant VT. Therefore, decreased ¹⁸F-FDG uptake in the heart should not necessarily be interpreted as a favorable finding.

13. Biomarkers of CS

There are several parameters that can be used to monitor the inflammation of sarcoidosis, including serum ACE, lysozyme, and soluble IL-2 receptor [76–78]. Although ACE is a clinically useful biochemical marker of systemic sarcoidosis, serum levels soon return to the normal range after corticosteroid therapy even when disease activity remains high [79]. ACE inhibitors are often used to treat heart failure in CS, and serum ACE levels are therefore likely to be influenced by this treatment.

14. Comparing ¹⁸F-FDG PET and Cardiac MRI

¹⁸F-FDG PET detects active CS lesions, whereas DE in cardiac MRI primarily detects more advanced fibrotic lesions [32, 35]. Commonly, the two phases overlap, so the mild to moderate correlation between DE in cardiac MRI and ¹⁸F-FDG PET is not surprising (Figure 5) [32, 80]. Several studies compared DE in cardiac MRI with ¹⁸F-FDG uptake in PET. In a report by Mehta et al., ¹⁸F-FDG showed positive findings in 86% of 22 patients with suspected CS, whereas DE in cardiac MRI showed them in only 36% of patients [19]. Ohira et al. similarly reported that ¹⁸F-FDG PET (87.5%) was more sensitive than DE in cardiac MRI (75%) [32]. In their study, however, the specificity of ¹⁸F-FDG PET (39%) was obviously lower than that of DE in cardiac MRI (88%). When DE in cardiac MRI and ¹⁸F-FDG PET were compared against JMHW’s criteria, DE in cardiac MRI had a higher specificity but a lower sensitivity [19, 32, 81].

Figure 5: Representative images of cardiac MRI and ¹⁸F-FDG PET in a CS patient with complete atrioventricular nodal block. Images of ¹⁸F-FDG PET and cardiac MRI in a 66-year-old woman with pathologically proven CS. (a), (b) Cardiac MRI shows areas of DE and increased T2-weighted signal in the anteroseptal wall of the left ventricle (white and red arrows). (c) ¹⁸F-FDG PET shows focal ¹⁸F-FDG uptake in the anteroseptal of the left ventricle and right ventricle (black arrow). When compared with the ¹⁸F-FDG PET image, the distribution of the positive finding on MRI notably differs. CS: cardiac sarcoidosis, DE: delayed enhancement, MRI: magnetic resonance imaging, T2-WI: T2-weighted image, ¹⁸F-FDG PET: ¹⁸F-fluorodeoxyglucose positron emission tomography.

Cardiac MRI has greater spatial and temporal resolution compared with ¹⁸F-FDG PET without radiation exposure. It also allows for anatomical and hemodynamic assessment of cardiac function. However, cardiac MRI is not feasible in patients with implantable devices in the heart, which are often used for CS.

The advantages of ¹⁸F-FDG PET include the biologic nature of the imaging signal, the potential for identifying cardiac and extra-cardiac sarcoidosis involvement (Figure 3) [40], and the feasibility of imaging in patients with implantable cardiac devices. Another advantage for therapy or risk stratification may be quantification. According to the European Association of Nuclear Medicine (EANM) and Society of Nuclear Medicine and Molecular Imaging guidelines for ¹⁸F-FDG in inflammation, SUV should be used with caution in this setting [48]. However, McArdle et al. found higher quantitative ¹⁸F-FDG uptake in CS patients with VT than in those with AV block and asymptomatic controls [40]. Similarly, Blankstein et al. concluded after examining a group of 125 patients that abnormal cardiac PET findings, but not JMHW criteria or the ejection fraction, are associated with a higher risk of death or VT [33].

The disadvantages of ¹⁸F-FDG PET include radiation exposure, false-positive result of cardiac uptake, and the inability to detect smaller regions of myocardial damage. Also, a potential source of error in patients with an implantable cardiac device may be hot-spot artifacts at the lead insertion site on attenuation-corrected images. Although some studies have suggested a significant overestimation of SUV [82], others have suggested that images in the presence of metallic leads can be interpreted without correction for metal artifacts [83]. Evaluation of images without attenuation may be used as an adjunct in cases of suspected lead insertion artifacts.

15. Future Directions

The goals for management of patients with CS are to preserve cardiac function and avoid fatal arrhythmia, thereby achieving better quality and longer survival. Advanced imaging such as cardiac MRI and ¹⁸F-FDG-PET may be useful for highly accurate early diagnosis, assessment of inflammatory activity, and therapeutic monitoring. Moreover, if optimal risk stratification of CS becomes available in the clinical setting, better prognosis is likely to be achieved in the future. However, a stepwise approach to diagnosing patients with cardiac involvement has not been established. Initial screening in extra-cardiac sarcoidosis usually includes a detailed medical history and physical exam, a surface ECG, and a transthoracic echocardiogram (Figure 6). Significant ECG abnormality such as new AV block or VT and echocardiographic abnormality such as decreased systolic/diastolic LV function should prompt further evaluation, usually with Holter monitoring and additional cardiac imaging [84]. Patients with initially negative screening tests should have repeat evaluations at follow-up visits to improve the sensitivity for detecting cardiac involvement [20]. In patients with initially positive screening tests, cardiac MRI should be performed because of its high specificity. Accordingly, ¹⁸F-FDG PET should be considered in patients with positive findings on cardiac MRI to assess inflammatory activity before initiating corticosteroid therapy. On the other hand, ¹⁸F-FDG PET-guided myocardial biopsy should be performed in patients with a contraindication to cardiac MRI (Figure 6).

Figure 6: Diagnostic algorithm for a patient with suspected for cardiac involvement in extra-cardiac sarcoidosis. ★Absence of coronary artery disease as determined by selective coronary angiography and the absence of a comorbidity that could explain heart failure. Patients with initially negative screening tests should have repeat evaluations at follow-up visits. Cardiac MRI is the most specific test and ¹⁸F-FDG PET is the most sensitive test available for cardiac sarcoidosis. ¹⁸F-FDG PET should be considered for patients with positive findings on cardiac MRI to assess inflammatory activity before initiating corticosteroid therapy. ¹⁸F-FDG PET-guided myocardial biopsy should be performed in patients with a contraindication to cardiac MRI.

In patients without a prior history of sarcoidosis, cardiac MRI should be considered if they have type II 2nd degree or complete AV block, sustained VT, or unexplained systolic or diastolic LV dysfunction. ¹⁸F-FDG PET should be performed in patients with positive findings on cardiac MRI or contraindication to cardiac MRI to detect both cardiac and extra-cardiac sarcoid lesions, and they should undergo ¹⁸F-FDG PET-guided biopsy (Figure 7). Clinical benefits and the cost effectiveness of these approaches should be evaluated simultaneously.

Figure 7: Diagnostic algorithm for a patient with suspected for cardiac sarcoidosis. ★Absence of coronary artery disease as determined by selective coronary angiography and the absence of a comorbidity that could explain heart failure. Cardiac MRI is the most specific test and ¹⁸F-FDG PET is the most sensitive test available for cardiac sarcoidosis. In patients without a prior history of sarcoidosis, cardiac MRI should be considered if they have type II 2nd degree or complete atrioventricular block, sustained ventricular tachycardia, or unexplained systolic or diastolic LV dysfunction. ¹⁸F-FDG PET should be performed in patients with positive findings on cardiac MRI or contraindication to cardiac MRI to detect both cardiac and extra-cardiac sarcoid lesions, and ¹⁸F-FDG PET-guided biopsy should be performed.

In the last decade, ¹⁸F-FDG PET has substantially enhanced the detection of CS. However, no noteworthy progress has been made in the treatment of CS, and the prognosis of patients with CS has not notably improved. This means that there are still some problems to be worked out in the use of ¹⁸F-FDG PET. First, standardized preparation protocols should be established to suppress physiological ¹⁸F-FDG uptake sufficiently in the normal myocardium. This will likely help detect early-stage sarcoid lesions with a favorable sensitivity and specificity. Several protocols have already been introduced, but more easily applicable and reliable preparations are needed. Recently, dual time-point ¹⁸F-FDG PET delayed imaging has been reported to be useful, not only for diagnosing malignancies [85], but also for assessing the activity of benign inflammatory disease [86]. In stimulated inflammatory cells, hexokinase, which mediates the phosphorylation of intracellular ¹⁸F-FDG and results in its retention within cells, is translocated to the endofacial surface of the glucose transporter and is activated [87, 88]. Therefore, activation of inflammatory cells causes a sustained increase in the accumulation of ¹⁸F-FDG over time. In a pulmonary sarcoidosis study, dual time-point ¹⁸F-FDG PET was useful over a 1-year observation period for detecting patients with persistent pulmonary disease [89]. However, there has been no data reported on dual time-point ¹⁸F-FDG PET delayed imaging in CS. Further studies needed to investigate how we can distinguish inflammatory lesions from physiological ¹⁸F-FDG uptake in the myocardium using this method. Second, a standardized methodology that enables quantitative and objective image analysis should be established. The Japanese Society of Nuclear Cardiology has published “Recommendations standardized for ¹⁸F-FDG PET imaging for CS” and stated that measurement of SUV in image interpretation may be useful for improving diagnostic capability and quantitative disease activity [90]. Furthermore, adopting a standardized segmentation and nomenclature system of the heart would allow comparison of ¹⁸F-FDG PET findings from different institutions [91]. In 2006, EANM launched EANM Research Ltd. (EARL) as an initiative to promote multicenter nuclear medicine and research. In January 2010, EANM published the FDG PET and PET/CT: EANM procedure guidelines for tumour PET imaging: version 1.0 [92] in which quantification of ¹⁸F-FDG PET is defined as quantification using SUV. The use of SUV in multicenter oncology PET studies requires an inter-institution calibration procedure to facilitate the exchangeability of SUVs between institutions. It is important that all participating institutions use a similar methodology To ensure the exchangeability of SUVs, a minimum set of quality-control procedures is recommended; for example, daily quality control, calibration/cross-calibration of PET or PET/CT camera with the institution’s own dose calibrator or against another dose calibrator, inter-institution cross-calibration, and determining “activity recovery coefficients.” Accurate, reproducible, and quantitative assessment using SUV could be obtained by standardizing the methodology. Further studies are needed to apply the methodology to CS. Third, long-term prospective clinical studies are needed to determine the value of imaging for therapy monitoring and risk stratification. Finally, the use of ¹⁸F-FDG PET combined with other imaging modalities is warranted. Hybrid PET/MRI systems have been recently introduced to medical imaging. In the imaging of CS, several case reports have demonstrated the potential of integrated PET/MRI [93, 94]. Cardiac MRI has been shown to provide good diagnostic performance in CS. However, T2-weighted images, which are particularly important for showing inflammatory activity in CS, are prone to artifacts and often do not yield a consistent image quality, especially in patients with arrhythmia and other motion artifacts [95]. In contrast, ¹⁸F-FDG PET is useful for assessing inflammatory myocardial disease activity for therapy response evaluation [95]. PET/MRI might emerge as an important modality for the diagnosis of CS and monitoring of its disease activity. Additionally, its lower radiation dose compared with PET/CT will be particularly valuable in the imaging of young patients with potentially curable disease [96].

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

The authors thank Kazuhiro Otani, Kouji Tsuchihashi, and Masaki Terada of Wakayama-Minami Radiology Clinic for their assistance.

References

“Statement on sarcoidosis. Joint Statement of the American Thoracic Society (ATS), the European Respiratory Society (ERS) and the World Association of Sarcoidosis and Other Granulomatous Disorders (WASOG) adopted by the ATS Board of Directors and by the ERS Executive Committee, February 1999,” American Journal of Respiratory and Critical Care Medicine, vol. 160, no. 2, pp. 736–755, 1999.

W. C. Roberts, H. A. McAllister Jr., and V. J. Ferrans, “Sarcoidosis of the heart: a clinicopathologic study of 35 necropsy patients (group I) and review of 78 previously described necropsy patients (group II),” The American Journal of Medicine, vol. 63, no. 1, pp. 86–108, 1977.

M. C. Iannuzzi, B. A. Rybicki, and A. S. Teirstein, “Sarcoidosis,” The New England Journal of Medicine, vol. 357, no. 21, pp. 2153–2108, 2007.

G. Hillerdal, E. Nou, K. Osterman, and B. Schmekel, “Sarcoidosis: epidemiology and prognosis: a 15-year European study,” American Review of Respiratory Disease, vol. 130, no. 1, pp. 29–32, 1984.

T. Morimoto, A. Azuma, S. Abe et al., “Epidemiology of sarcoidosis in Japan,” European Respiratory Journal, vol. 31, no. 2, pp. 372–379, 2008.

L. Varron, V. Cottin, A. Schott, C. Broussolle, and P. Sève, “Late-onset sarcoidosis: a comparative study,” Medicine, vol. 91, no. 3, pp. 137–143, 2012.

B. A. Rybicki, M. C. Iannuzzi, M. M. Frederick et al., “Familial aggregation of sarcoidosis: a Case-Control Etiologic Study of Sarcoidosis (ACCESS),” American Journal of Respiratory and Critical Care Medicine, vol. 164, no. 11, pp. 2085–2091, 2001.

A. Sverrild, V. Backer, K. O. Kyvik et al., “Heredity in sarcoidosis: a registry-based twin study,” Thorax, vol. 63, no. 10, pp. 894–896, 2008.

R. P. Baughman, E. E. Lower, and R. M. Du Bois, “Sarcoidosis,” The Lancet, vol. 361, no. 9363, pp. 1111–1118, 2003.

L. S. Newman, C. S. Rose, E. A. Bresnitz et al., “A case control etiologic study of sarcoidosis: environmental and occupational risk factors,” The American Journal of Respiratory and Critical Care Medicine, vol. 170, no. 12, pp. 1324–1330, 2004.

J. Müller-Quernheim, M. Schürmann, S. Hofmann et al., “Genetics of Sarcoidosis,” Clinics in Chest Medicine, vol. 29, no. 3, pp. 391–414, 2008.

E. S. Chen and D. R. Moller, “Etiology of Sarcoidosis,” Clinics in Chest Medicine, vol. 29, no. 3, pp. 365–377, 2008.

Y. Rosen, “Pathology of sarcoidosis,” Seminars in Respiratory and Critical Care Medicine, vol. 28, no. 1, pp. 36–52, 2007.

G. Zissel, A. Prasse, and J. Müller-Quernheim, “Immunologic response of sarcoidosis,” Seminars in Respiratory and Critical Care Medicine, vol. 31, no. 4, pp. 390–403, 2010.

E. S. Chen, Z. Song, M. H. Willett et al., “Serum amyloid a regulates granulomatous inflammation in sarcoidosis through toll-like receptor-2,” American Journal of Respiratory and Critical Care Medicine, vol. 181, no. 4, pp. 360–373, 2010.

A. Uemura, S. Morimoto, S. Hiramitsu, Y. Kato, T. Ito, and H. Hishida, “Histologic diagnostic rate of cardiac sarcoidosis: evaluation of endomyocardial biopsies,” American Heart Journal, vol. 138, no. 2 I, pp. 299–302, 1999.

L. S. Newman, C. S. Rose, and L. A. Maier, “Sarcoidosis,” The New England Journal of Medicine, vol. 336, no. 17, pp. 1224–1234, 1997.

K. J. Silverman, G. M. Hutchins, and B. H. Bulkley, “Cardiac sarcoid: a clinicopathologic study of 84 unselected patients with systemic sarcoidosis,” Circulation, vol. 58, no. 6, pp. 1204–1211, 1978.

D. Mehta, S. A. Lubitz, Z. Frankel et al., “Cardiac involvement in patients with sarcoidosis: diagnostic and prognostic value of outpatient testing,” Chest, vol. 133, no. 6, pp. 1426–1435, 2008.

C. Chapelon-Abric, D. de Zuttere, P. Duhaut et al., “Cardiac sarcoidosis: a retrospective study of 41 cases,” Medicine, vol. 83, no. 6, pp. 315–334, 2004.

F. Tavora, N. Cresswell, L. Li, M. Ripple, C. Solomon, and A. Burke, “Comparison of necropsy findings in patients with sarcoidosis dying suddenly from cardiac sarcoidosis versus dying suddenly from other causes,” The American Journal of Cardiology, vol. 104, no. 4, pp. 571–577, 2009.

K. Banba, K. F. Kusano, K. Nakamura et al., “Relationship between arrhythmogenesis and disease activity in cardiac sarcoidosis,” Heart Rhythm, vol. 4, no. 10, pp. 1292–1299, 2007.

R. Kandolin, J. Lehtonen, and M. Kupari, “Cardiac sarcoidosis and giant cell myocarditis as causes of atrioventricular block in young and middle-aged adults,” Circulation: Arrhythmia and Electrophysiology, vol. 4, no. 3, pp. 303–309, 2011.

G. Youssef, R. S. B. Beanlands, D. H. Birnie, and P. B. Nery, “Cardiac sarcoidosis: applications of imaging in diagnosis and directing treatment,” Heart, vol. 97, no. 24, pp. 2078–2087, 2011.

H. Furushima, M. Chinushi, H. Sugiura, H. Kasai, T. Washizuka, and Y. Aizawa, “Ventricular tachyarrhythmia associated with cardiac sarcoidosis: its mechanisms an outcome,” Clinical Cardiology, vol. 27, no. 4, pp. 217–222, 2004.

M. Sekiguchi, Y. Numao, M. Imai, T. Furuie, and R. Mikami, “Clinical and histopathological profile of sarcoidosis of the heart and acute idiopathic myocarditis: concepts through a study employing endomyocardial biopsy. I. Sarcoidosis,” Japanese Circulation Journal, vol. 44, no. 4, pp. 249–263, 1980.

Y. Yazaki, M. Isobe, M. Hiroe et al., “Prognostic determinants of long-term survival in Japanese patients with cardiac sarcoidosis treated with prednisone,” The American Journal of Cardiology, vol. 88, no. 9, pp. 1006–1010, 2001.

V. Sekhri, S. Sanal, L. J. DeLorenzo, W. S. Aronow, and G. P. Maguire, “Cardiac sarcoidosis: a comprehensive review,” Archives of Medical Science, vol. 7, no. 4, pp. 546–554, 2011.

H. Hiraga, K. Iwai, and M. Hiroe, Guidelines for Diagnosis of Cardiac Sarcoidosis, Study Report on Diffuse Pulmonary Diseases, pp. 23-24, The Japanese Ministry of Health and Welfare, Tokyo, Japan, 1993, (Japanese).

“Diagnostic standard and guidelines for sarcoidosis,” Japanese Journal of Sarcoidosis Granulomatous Disorders, vol. 27, pp. 89–102, 2007 (Japanese).

K. Soejima and H. Yada, “The work-up and management of patients with apparent or subclinical cardiac sarcoidosis: with emphasis on the associated heart rhythm abnormalities,” Journal of Cardiovascular Electrophysiology, vol. 20, no. 5, pp. 578–583, 2009.

H. Ohira, I. Tsujino, S. Ishimaru et al., “Myocardial imaging with 18F-fluoro-2-deoxyglucose positron emission tomography and magnetic resonance imaging in sarcoidosis,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 35, no. 5, pp. 933–941, 2008.

R. Blankstein, M. Osborne, M. Naya et al., “Cardiac positron emission tomography enhances prognostic assessments of patients with suspected cardiac sarcoidosis,” Journal of the American College of Cardiology, vol. 63, no. 4, pp. 329–336, 2013.

W. Okumura, T. Iwasaki, T. Toyama et al., “Usefulness of fasting18F-FDG PET in identification of cardiac sarcoidosis,” Journal of Nuclear Medicine, vol. 45, no. 12, pp. 1989–1998, 2004.

S. Ishimaru, I. Tsujino, T. Takei et al., “Focal uptake on 18F-fluoro-2-deoxyglucose positron emission tomography images indicates cardiac involvement of sarcoidosis,” European Heart Journal, vol. 26, no. 15, pp. 1538–1543, 2005.

R. Langah, K. Spicer, M. Gebregziabher, and L. Gordon, “Effectiveness of prolonged fasting 18f-FDG PET-CT in the detection of cardiac sarcoidosis,” Journal of Nuclear Cardiology, vol. 16, no. 5, pp. 801–810, 2009.

N. Tahara, A. Tahara, Y. Nitta et al., “Heterogeneous myocardial FDG uptake and the disease activity in cardiac sarcoidosis,” JACC Cardiovascular Imaging, vol. 3, no. 12, pp. 1219–1228, 2010.

H. Yamagishi, N. Shirai, M. Takagi et al., “Identification of cardiac sarcoidosis with 13N-NH 3/18F-FDG PET,” Journal of Nuclear Medicine, vol. 44, no. 7, pp. 1030–1036, 2003.

O. Manabe, H. Ohira, K. Yoshinaga et al., “Elevated 18F-fluorodeoxyglucose uptake in the interventricular septum is associated with atrioventricular block in patients with suspected cardiac involvement sarcoidosis,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 40, no. 10, pp. 1558–1566, 2013.

B. A. McArdle, D. H. Birnie, R. Klein, et al., “Is there an association between clinical presentation and the location and extent of myocardial involvement of cardiac sarcoidosis as assessed by 18F-fluorodoexyglucose positron emission tomography?” Circulation: Cardiovascular Imaging, vol. 6, no. 5, pp. 617–626, 2013.

S. Greulich, C. C. Deluigi, S. Gloekler et al., “CMR imaging predicts death and other adverse events in suspected cardiac sarcoidosis,” JACC: Cardiovascular Imaging, vol. 6, no. 4, pp. 501–511, 2013.

J. Smedema, G. Snoep, M. P. G. van Kroonenburgh et al., “Evaluation of the accuracy of gadolinium-enhanced cardiovascular magnetic resonance in the diagnosis of cardiac sarcoidosis,” Journal of the American College of Cardiology, vol. 45, no. 10, pp. 1683–1690, 2005.

R. J. Kim, M. R. Patel, P. J. Cawley et al., “Detection of myocardial damage in patients with sarcoidosis,” Circulation, vol. 120, no. 20, pp. 1969–1977, 2009.

O. Vignaux, R. Dhote, D. Duboc et al., “Clinical significance of myocardial magnetic resonance abnormalities in patients with sarcoidosis: a 1-year follow-up study,” Chest, vol. 122, no. 6, pp. 1895–1901, 2002.

T. Shimada, K. Shimada, T. Sakane et al., “Diagnosis of cardiac sarcoidosis and evaluation of the effects of steroid therapy by gadolinium-DTPA-enhanced magnetic resonance imaging.,” The American Journal of Medicine, vol. 110, no. 7, pp. 520–527, 2001.

B. E. Hillner, B. A. Siegel, D. Liu et al., “Impact of positron emission tomography/computed tomography and positron emission tomography (PET) alone on expected management of patients with cancer: initial results from the National Oncologic PET Registry,” Journal of Clinical Oncology, vol. 26, no. 13, pp. 2155–2161, 2008.

L. K. Shankar, J. M. Hoffman, S. Bacharach et al., “Consensus recommendations for the use of 18F-FDG PET as an indicator of therapeutic response in patients in National Cancer Institute Trials,” Journal of Nuclear Medicine, vol. 47, no. 6, pp. 1059–1066, 2006.

F. Jamar, J. Buscombe, A. Chiti et al., “EANM/SNMMI guideline for 18F-FDG use in inflammation and infection,” Journal of Nuclear Medicine, vol. 54, no. 4, pp. 647–658, 2013.

S. Yamada, K. Kubota, R. Kubota, T. Ido, and N. Tamahashi, “High accumulation of fluorine-18-fluorodeoxyglucose in turpentine-induced inflammatory tissue,” Journal of Nuclear Medicine, vol. 36, no. 7, pp. 1301–1306, 1995.

T. Mochizuki, E. Tsukamoto, Y. Kuge et al., “FDG uptake and glucose transporter subtype expressions in experimental tumor and inflammation models,” Journal of Nuclear Medicine, vol. 42, no. 10, pp. 1551–1555, 2001.

B. A. Mc Ardle, E. Leung, H. Ohira et al., “The role of F18-fluorodeoxyglucose positron emission tomography in guiding diagnosis and management in patients with known or suspected cardiac sarcoidosis,” Journal of Nuclear Cardiology, vol. 20, no. 2, pp. 297–306, 2013.

G. Youssef, E. Leung, I. Mylonas et al., “The use of ¹⁸F-FDG PET in the diagnosis of cardiac sarcoidosis: a systematic review and metaanalysis including the Ontario experience,” Journal of Nuclear Medicine, vol. 53, no. 2, pp. 241–248, 2012.

N. Takeda, I. Yokoyama, Y. Hiroi et al., “Positron emission tomography predicted recovery of complete A-V nodal dysfunction in a patient with cardiac sarcoidosis,” Circulation, vol. 105, no. 9, pp. 1144–1145, 2002.

L. H. Brudin, S. O. Valind, C. G. Rhodes et al., “Fluorine-18 deoxyglucose uptake in sarcoidosis measured with positron emission tomography,” European Journal of Nuclear Medicine, vol. 21, no. 4, pp. 297–305, 1994.

P. J. Lewis, A. Salama, A. Alavi, C. A. Buchpiguel, A. Loessner, and S. M. Larson, “Uptake of fluorine-18-fluorodeoxyglucose in sarcoidosis,” Journal of Nuclear Medicine, vol. 35, no. 10, pp. 1647–1649, 1994.

J. P. Smedema, V. Reenaers, and R. Geukens, “Images in cardiology. Cardiac sarcoidosis in a 60 year old woman.,” Heart, vol. 92, article 688, 2006.

H. Koiwa, I. Tsujino, H. Ohira, K. Yoshinaga, N. Otsuka, and M. Nishimura, “Imaging of cardiac sarcoid lesions using fasting cardiac 18F-fluorodeoxyglucose positron emission tomography: an autopsy case,” Circulation, vol. 122, no. 5, pp. 535–536, 2010.

M. L. Bartlett, S. L. Bacharach, L. M. Voipio-Pulkki, and V. Dilsizian, “Artifactual inhomogeneities in myocardial PET and SPECT scans in normal subjects,” Journal of Nuclear Medicine, vol. 36, no. 2, pp. 188–195, 1995.

R. J. Gropler, B. A. Siegel, K. J. Lee et al., “Nonuniformity in myocardial accumulation of fluorine-18-fluorodeoxyglucose in normal fasted humans,” Journal of Nuclear Medicine, vol. 31, no. 11, pp. 1749–1756, 1990.

M. Orii, K. Hirata, T. Tanimoto et al., “Early abnormality detected by speckle-tracking echocardiography in a patient with suspected cardiac sarcoidosis,” Journal of Echocardiography, vol. 11, no. 2, pp. 69–71, 2013.

P. Iozzo, P. Chareonthaitawee, M. D. Terlizzi, D. J. Betteridge, E. Ferrannini, and P. G. Camici, “Regional myocardial blood flow and glucose utilization during fasting and physiological hyperinsulinemia in humans,” The American Journal of Physiology: Endocrinology and Metabolism, vol. 282, no. 5, pp. E1163–E1171, 2002.

A. H. Maurer, M. Burshteyn, L. P. Adler, J. P. Gaughan, and R. M. Steiner, “Variable cardiac 18FDG patterns seen in oncologic positron emission tomography computed tomography importance for differentiating normal physiology from cardiac and paracardiac disease,” Journal of Thoracic Imaging, vol. 27, no. 4, pp. 263–268, 2012.

V. Ambrosini, M. Zompatori, L. Fasano et al., “18F-FDG PET/CT for the assessment of disease extension and activity in patients with sarcoidosis: results of a preliminary prospective study,” Clinical Nuclear Medicine, vol. 38, no. 4, pp. e171–e177, 2013.

C. N. B. Harisankar, B. R. Mittal, K. L. Agrawal, M. L. Abrar, and A. Bhattacharya, “Utility of high fat and low carbohydrate diet in suppressing myocardial FDG uptake,” Journal of Nuclear Cardiology, vol. 18, no. 5, pp. 926–936, 2011.

G. Williams and G. M. Kolodny, “Suppression of myocardial 18F-FDG uptake by preparing patients with a high-fat, low-carbohydrate diet,” The American Journal of Roentgenology, vol. 190, no. 2, pp. W151–w156, 2008.

J. A. Wisneski, E. W. Gertz, R. A. Neese, and M. Mayr, “Myocardial metabolism of free fatty acids. Studies with 14C-labeled substrates in humans,” The Journal of Clinical Investigation, vol. 79, no. 2, pp. 359–366, 1987.

K. Yoshinaga and N. Tamaki, “Imaging myocardial metabolism,” Current Opinion in Biotechnology, vol. 18, no. 1, pp. 52–59, 2007.

Y. Choi, R. C. Brunken, R. A. Hawkins et al., “Factors affecting myocardial 2-[F-18]fluoro-2-deoxy-D-glucose uptake in positron emission tomography studies of normal humans,” European Journal of Nuclear Medicine, vol. 20, no. 4, pp. 308–318, 1993.

E. Persson, “Lipoprotein lipase, hepatic lipase and plasma lipolytic activity. Effects of heparin and a low molecular weight heparin fragment (Fragmin),” Acta Medica Scandinavica, vol. 724, pp. 1–56, 1988.

M. Morooka, M. Moroi, K. Ito, and R. Minamimoto, “Heparin vs. long fasting method: which inhibits the FDG myocardial physiological uptake more strongly?” Journal of Nuclear Medicine, vol. 54, supplement, p. 406P, 2013.

O. Israel, M. Weiler-Sagie, S. Rispler et al., “PET/CT quantitation of the effect of patient-related factors on cardiac 18F-FDG uptake,” Journal of Nuclear Medicine, vol. 48, no. 2, pp. 234–239, 2007.

E. Tadamura, M. Yamamuro, S. Kubo et al., “Multimodality imaging of cardiac sarcoidosis before and after steroid therapy,” Circulation, vol. 113, no. 20, pp. e771–e773, 2006.

C. Pandya, R. C. Brunken, P. Tchou, P. Schoenhagen, and D. A. Culver, “Detecting cardiac involvement in sarcoidosis: a call for prospective studies of newer imaging techniques,” European Respiratory Journal, vol. 29, no. 2, pp. 418–422, 2007.

A. Alavi, N. Gupta, J. Alberini et al., “Positron emission tomography imaging in nonmalignant thoracic disorders,” Seminars in Nuclear Medicine, vol. 32, no. 4, pp. 293–321, 2002.

J. M. Chang, H. J. Lee, J. M. Goo, J. J. Lee, J. Chung, and J. Im, “False positive and false negative FDG-PET scans in various thoracic diseases,” Korean Journal of Radiology, vol. 7, no. 1, pp. 57–69, 2006.

J. Lieberman, “Elevation of serum angiotension converting enzyme (ACE) level in sarcoidosis,” The American Journal of Medicine, vol. 59, no. 3, pp. 365–372, 1975.

O. Selroos and C. Gronhagen-Riska, “Angiotensin converting enzyme, III: changes in serum level as an indicator of disease activity in untreated sarcoidosis,” Scandinavian Journal of Respiratory Diseases, vol. 60, no. 6, pp. 328–336, 1979.

S. Rothkrantz-Kos, M. P. van Dieijen-Visser, P. G. H. Mulder, and M. Drent, “Potential usefulness of inflammatory markers to monitor respiratory functional impairment in sarcoidosis,” Clinical Chemistry, vol. 49, no. 9, pp. 1510–1517, 2003.

M. W. Ziegenhagen, M. E. Rothe, M. Schlaak, and J. Müller-Quernheim, “Bronchoalveolar and serological parameters reflecting the severity of sarcoidosis,” European Respiratory Journal, vol. 21, no. 3, pp. 407–413, 2003.

M. Soussan, P. Brillet, H. Nunes et al., “Clinical value of a high-fat and low-carbohydrate diet before FDG-PET/CT for evaluation of patients with suspected cardiac sarcoidosis,” Journal of Nuclear Cardiology, vol. 20, no. 1, pp. 120–127, 2013.

N. Y. Hamzeh, F. S. Wamboldt, and H. D. Weinberger, “Management of cardiac sarcoidosis in the United States: a Delphi study,” Chest, vol. 141, no. 1, pp. 154–162, 2012.

F. P. DiFilippo and R. C. Brunken, “Do implanted pacemaker leads and ICD leads cause metal-related artifact in cardiac PET/CT?” Journal of Nuclear Medicine, vol. 46, no. 3, pp. 436–443, 2005.

P. Ghafarian, S. M. R. Aghamiri, M. R. Ay et al., “Is metal artefact reduction mandatory in cardiac PET/CT imaging in the presence of pacemaker and implantable cardioverter defibrillator leads?” European Journal of Nuclear Medicine and Molecular Imaging, vol. 38, no. 2, pp. 252–262, 2011.

J. Smedema, G. Snoep, M. P. G. Van Kroonenburgh et al., “Cardiac involvement in patients with pulmonary sarcoidosis assessed at two university medical centers in the Netherlands,” Chest, vol. 128, no. 1, pp. 30–35, 2005.

A. Mavi, M. Urhan, J. Q. Yu et al., “Dual time point 18F-FDG PET imaging detects breast cancer with high sensitivity and correlates well with histologic subtypes,” Journal of Nuclear Medicine, vol. 47, no. 9, pp. 1440–1446, 2006.

I. Kim, J. S. Lee, S. Kim et al., “Double-phase 18F-FDG PET-CT for determination of pulmonary tuberculoma activity,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 35, no. 4, pp. 808–814, 2008.

J. Huang, A. L. Kindzelskii, and H. R. Petty, “Hexokinase translocation during neutrophil activation, chemotaxis, and phagocytosis: Disruption by cytochalasin D, dexamethasone, and indomethacin,” Cellular Immunology, vol. 218, no. 1-2, pp. 95–106, 2002.

K. C. Pedley, G. E. Jones, M. Magnani, R. J. Rist, and R. J. Naftalin, “Direct observation of hexokinase translocation in stimulated macrophages,” Biochemical Journal, vol. 291, no. 2, pp. 515–522, 1993.

Y. Umeda, Y. Demura, M. Morikawa et al., “Prognostic value of dual-time-point18F-fluorodeoxyglucose positron emission tomography in patients with pulmonary sarcoidosis,” Respirology, vol. 16, no. 4, pp. 713–720, 2011.

Y. Ishida, K. Yoshinaga, M. Miyagawa et al., “Recommendations for ¹⁸F-fluorodeoxyglucose positron emission tomography imaging for cardiac sarcoidosis: Japanese Society of Nuclear Cardiology Recommendations,” Annals of Nuclear Medicine, vol. 28, no. 4, pp. 393–403, 2014.

M. D. Cerqueira, N. J. Weissman, V. Dilsizian et al., “Standardized myocardial segmentation and nomenclature for tomographic imaging of the heart: a statement for healthcare professionals from the Cardiac Imaging Committee of the Council on Clinical Cardiology of the American Heart Association,” Circulation, vol. 105, pp. 539–542, 2002.

R. Boellaard, M. J. O'Doherty, W. A. Weber et al., “FDG PET and PET/CT: EANM procedure guidelines for tumour PET imaging: version 1.0,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 37, no. 1, pp. 181–200, 2010.

S. Schneider, A. Batrice, C. Rischpler, M. Eiber, T. Ibrahim, and S. G. Nekolla, “Utility of multimodal cardiac imaging with PET/MRI in cardiac sarcoidosis : implications for diagnosis, monitoring and treatment,” European Heart Journal, vol. 35, no. 5, p. 312, 2014.

J. A. White, M. Rajchl, J. Butler, R. T. Thompson, F. S. Prato, and G. Wisenberg, “Active cardiac sarcoidosis first clinical experience of simultaneous positron emission tomography-magnetic resonance imaging for the diagnosis of cardiac disease,” Circulation, vol. 127, no. 22, pp. e639–e641, 2013.

D. P. Sobic-Saranovic, I. T. Grozdic, J. Videnovic-Ivanov et al., “Responsiveness of FDG PET/CT to treatment of patients with active chronic sarcoidosis,” Clinical Nuclear Medicine, vol. 38, no. 7, pp. 516–521, 2013.

F. Nensa, K. Beiderwellen, P. Heusch, and A. Wetter, “Clinical applications of PET/MR: current status and future perspectives,” Diagnostic and Interventional Radiology, 2014.