BioMed Research International

Volume 2014 (2014), Article ID 920492, 5 pages

http://dx.doi.org/10.1155/2014/920492

Review Article

The State of the Art of Robotic Pancreatectomy

Marco Del Chiaro and Ralf Segersvärd

Division of Surgery, Department of Clinical Science, Intervention and Technology (CLINTEC), Karolinska Institutet, Center for Digestive Diseases, Karolinska University Hospital, Huddinge, K53, 14186 Stockholm, Sweden

Received 17 March 2014; Revised 29 April 2014; Accepted 8 May 2014; Published 28 May 2014

Academic Editor: Juhani Sand

Copyright © 2014 Marco Del Chiaro and Ralf Segersvärd. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

During the last decades an increasing number of minimally invasive pancreatic resections have been reported in the literature. With the development of robotic surgery a new enthusiasm has not only increased the number of centers approaching minimally invasive pancreatic surgery in general but also enabled the use of this technique for major pancreatic procedures, in particular in minimally invasive pancreatoduodenectomy. The aim of this review was to define the state of the art of pancreatic robotic surgery. No prospective randomized trials have been performed comparing robotic, laparoscopic, and open pancreatic procedures. From the literature one may conclude that robotic pancreatectomies seem to be as feasible and safe as open procedures. The general idea that the overall perioperative costs of robotic surgery would be higher than traditional procedures is not supported. With the current lack of evidence of any oncologic advantages, the cosmetic benefits offered by robotic surgery are not enough to justify extensive use in cancer patients. In contrast, the safety of these procedure can justify the use of the robotic technique in patient with benign/low grade malignant tumors of the pancreas.

1. Introduction

At the Karolinska Institutet, Hans-Christian Jacobeaus made the first laparoscopic procedure in humans in 1910. The Swedish surgeon used a cystoscope for a diagnostic laparoscopy in 17 patients with ascites [1]. The use of diagnostic laparoscopy for the staging of pancreatic cancer was introduced some months later by Bernheim at Johns Hopkins University [2]. However, only in the late 80s diagnostic laparoscopy for staging of pancreatic cancer was used on a more regular basis [3, 4]. In 1992, Shimi et al. published a series of patients undergoing laparoscopic cholecystojejunostomy for treatment of jaundice [5]. At the beginning of the 90s, the development of higher quality laparoscopic instruments, imaging monitors, and improved surgical techniques enabled not only palliative procedures for unresectable pancreatic cancer to be performed but also the first series of pancreatic resections. In 1994, Gagner and Pomp described the first laparoscopic pancreatoduodenectomy [6]. Even if large series of laparoscopic pancreatoduodenectomies, including complex operation associated with vascular resection, have been published today with comparable results to open procedures [7, 8], the safety of laparoscopic pancreatic procedure is mostly limited to distal pancreatic resections and enucleations [9]. The major problems for the spreading of laparoscopic pancreatoduodenectomy are the dissection of retroperitoneal margin, the complicated reconstruction phase (further complicated by laparoscopic instruments), the length of operating time, and the lack of scientifically proved advantages compared to the conventional open technique. With the development of robotic surgery, however, a new enthusiasm in minimally invasive pancreatic surgery and in particular in minimally invasive pancreatoduodenectomy has grown. The aim of this review is to offer an up to date summary of the state of the art of robotic pancreatic surgery.

2. Methods

Search of MEDLINE and PubMed databases was performed using the keywords “robotic pancreatectomy” and “robotic pancreatic surgery” from 1990 to 2013. Additional articles were identified using a manual search. Series with less than 5 procedures performed were excluded by the analysis and reported eventually to describe particular aspects or techniques. An analysis of the result of major robotic pancreatic procedure was performed.

3. Results

3.1. Pancreatoduodenectomy (PD)

With the advent of the robotic era, some of the limitations of laparoscopy are overcome. The robot offers advantages in terms of 3D vision, dexterity, and ergonomy [10]. Giulianotti and coworkers described the first robotic PD in 2003 [11]. In this experience the authors showed the feasibility of this procedure with robotic approach with an acceptable morbidity rate (37.5%), but with a very high mortality rate (12.5%). Today several larger series have been reported in the scientific literature [12–23]. Even though one series contains more than 100 patients [12], the number of procedures per center is still quite small, half of them with less than 10 patients (Table 1). The perioperative results of robotic PD are similar to the open procedures described in the literature. The morbidity and mortality rates range from 60% to 0 and from 4% to 0, respectively. The operative time seems to be longer compared to the open procedure and the mean postoperative stay comparable (Table 1). However to date, no prospective randomized trial has been performed comparing the open with the laparoscopic or robotic procedure. Currently, only 4 nonrandomized studies compared the outcome of open and robotic PD [15, 17, 18, 20]. The operation time was significantly shorter in the open procedure in three and robotic in one of these studies. Furthermore, the mean length of stay (LOS) was shorter in the robotic compared to the open group in three of the studies. No statistical significant differences were found in morbidity and mortality comparing the two groups of procedures. Only one paper in the literature compares the mean costs of robotic versus open PD procedures showing excess of  6200 with the robotic approach [16]. Robotic PD has been performed for both benign and malignant diseases. As shown in Table 2, the rate of R1 resections for malignant diseases ranges from 0 to 27%; these data most probably reflect different definitions of pathological margin assessment. However, the median number of lymph nodes retrieved in some series is not adequate according to current guidelines to treat pancreatic malignancies [23] (Table 2).

Table 1: Perioperative results of robotic pancreatoduodenectomy.

Author
Year
Number of patients
Morbidity (%)
Mortality (%)
Mean OT (min)
Mean POS (days)

Zureikat et al. [12]
2013
132
63
3.8
527
10

Giulianotti et al. [13]
2010
60
NR
3.3
421
22

Zeh et al. [14]
2012
50
56
NR
568
10

Buchs et al. [15]
2011
44
36
4.5
444
13

Boggi et al. [16]
2013
34
56
2.9
517
23

Chalikonda et al. [17]
2012
30
30
3.3
476
9.8

Lai et al. [18]
2012
20
50
0
491
14

Chan et al. [19]
2011
8
NR
0
NR
NR

Zhou et al. [20]
2011
8
75
0
718
28

Kendrick and Cusati [21]
2010
8
NR
NR
NR
NR

de Vasconcellos Macedo et al. [22]
2011
5
60
0
640
26

Narula et al. [23]
2010
5
0
0
420
9.6

Table 2: Pathology of resected specimens after robotic pancreatoduodenectomy.

Author
Year
Number of patients
Malignant diseases (%)
Mean lymph nodes harvested
R1 (%)

Zureikat et al. [12]
2013
132
80
NR
NR

Giulianotti et al. [13]
2010
60
75
18
11

Zeh et al. [14]
2012
50
74
18
11

Boggi et al. [16]
2013
34
63
32
0

Chalikonda et al. [17]
2012
30
47
13
0

Lai et al. [18]
2012
20
75
10
27

Zhou et al. [20]
2011
8
100
NR
0

de Vasconcellos Macedo et al. [22]
2011
5
40
NR
NR

Narula et al. [23]
2010
5
20
16
0

3.2. Distal Pancreatectomy (DP)

Minimally invasive DPs are today extensively performed around the world for the treatment of pancreatic tumors and some authors even consider this technique “standard of care” [9]. Today, in most cases the traditional laparoscopic technique is preferred to the robotic approach. The reason is that distal pancreatectomies are less complicated procedures compared to PD without a technically demanding reconstructive phase. In the last decade, however, the number of reports of robotic DP has increased. The results of these studies confirm the safety and feasibility of robotic DP [12, 13, 24–28]. No mortality has been reported in the published series. The morbidity ranges from 9 to 72% and length of stay from 4 to 7 days (Table 3). There are no prospective randomized studies comparing the open, laparoscopic, and robotic DP. A retrospective study comparing the robotic to the traditional laparoscopic technique showed that the robotic technique was associated with a significant increase of spleen preservation rate, operative time, and costs [25]. Another study, retrospectively comparing the results of open, laparoscopic, and robotic DP, confirmed that robotic DP was associated with an increased operative time and spleen preservation rate but significant reduction in LOS compared to both laparoscopic and open DP. Interestingly, the costs of the robotic DP, even if no statistical significant differences were found, seemed to be associated with certain cost reduction [28]. Only three studies have reported on robotic DP for malignancy but data regarding R1-rate or number of lymph nodes retrieved are scarcely reported [12, 13, 24–28] (Table 4).

Table 3: Perioperative results of robotic distal pancreatectomy.

Author
Year
Number of patients
Morbidity (%)
Mortality (%)
Mean OT (min)
Mean POS (days)

Zureikat et al. [12]
2013
83
72
0
256
6

Giulianotti et al. [13]
2010
46
NR
NR
NR
NR

Suman et al. [24]
2013
40
40
0
203
5

Daouadi et al. [25]
2013
30
66
0
293
6

Hwang et al. [26]
2013
22
9.1
0
398
7

Kang et al. [27]
2011
20
10
0
348
7

Waters et al. [28]
2010
17
18
0
298
4

Table 4: Pathology of resected specimens after robotic distal pancreatectomy.

Author
Year
Number of patients
Malignant diseases (%)
Mean lymph nodes harvested
R1 (%)

Zureikat et al. [12]
2013
83
72
NR
NR

Giulianotti et al. [13]
2010
46
NR
NR
NR

Suman et al. [24]
2013
40
32
NR
NR

Daouadi et al. [25]
2013
30
43
19
0

Hwang et al. [26]
2013
22
0
NR
0

Kang et al. [27]
2011
20
0
NR
NR

Waters et al. [28]
2010
17
0
5
0

3.3. Robotic Pancreatectomies Associated with Vascular Resection

Three reports of small series of patients undergoing pancreatectomy associated with vascular resection for cancer have been found in the literature. In the first paper [29], 5 patients were included. The mean operative time was 392 minutes and the mean intraoperative blood loss 200 mL. One patient developed postoperative complications (20%). In two cases in which a portal vein reconstruction was required, the mean time of superior-mesenteric/portal vein clamping was 22 minutes. The 6-month survival rate was 80%. In the second paper [16] three cases are described, but no details on the perioperative results and outcome are reported. In the 3rd paper [12] four Appleby operations were reported without perioperative mortality, but with 100% morbidity. The mean operative time was 204 minutes.

3.4. Others Robotic Pancreatic Procedures

Many case reports, or small series, of robotic pancreatectomy, are reported in the last year’s literature. Enucleation of pancreatic tumors seems to be a safe and effective procedure. Zureikat et al. [12] reported 10 cases performed with no perioperative mortality and 50% morbidity. Few cases of central pancreatectomy, probably also for the rare indication for this procedure [30], are reported in the literature. In a recent series of 13 patients robotically treated [12], there was no perioperative mortality, but 100% morbidity. In another retrospective study [31] including five patients treated robotically and 10 patients treated with open central pancreatectomy, no differences were found regarding overall complication rate and perioperative mortality, but the intraoperative blood loss was significantly lower in the robotic group. In contrast the operative time was longer in the robotic group compared to the open procedure. No significant difference was found in the length of hospital stay. A few small series of total pancreatectomies are also reported [12, 32]. In the Zureikat experience [12], 5 patients were analyzed with no postoperative mortality and with 100% of complication rate. In the Giulianotti series [32], there was no perioperative mortality and 2 patients of 5 (40%) developed postoperative complications. In this study the mean operative time was 456 minutes and the mean length of hospital stay was 7 days. Robotic total pancreatectomies associated with autoislet transplantations have also been described for the treatment of chronic pancreatitis [33, 34].

3.5. Overall Evaluation of Results of Robotic Pancreatic Surgery

From the analysis of the current literature, robotic pancreatectomies seem to be feasible and as safe as open procedures. In a recent meta-analysis, Zhang et al. [35] showed a statistical significant advantage of robotic surgery compared to open procedures in terms of overall complication rate, reoperation rate, positive resection margin rate, mean hospital stay, and mean intraoperative blood loss. No differences were found in incidence of postoperative pancreatic fistula, postoperative mortality, and operation time. More complicated is the comparison between robotic and laparoscopic procedures for the lack of comparative data.

4. Discussion

During the last decade there has been an increasing interest in minimally invasive pancreatic surgery. The use of traditional laparoscopy, mostly limited to DPs and enucleations [9], has increasingly been described in large series of PD in the last years [7]. The introduction of the robot increased the interest in many centers for minimally invasive pancreatic surgery, even in performing more complicated operations. The improved 3-dimensional imaging, the enhanced dexterity, the better visualization and increased magnification, and the improved ergonomics associated with robotic surgery [10] are some of the most important reasons for the development of robotic pancreatic surgery. The robot offers also the possibility of performing a minimally invasive operation in a way much more similar to traditional open surgery compared to the laparoscopic approach. This difference facilitates the work of the surgeon and can reduce the intraoperative stress [36]. Even if no prospective randomized trials are available comparing results of robotic, open, and laparoscopic pancreatic surgery, data from literature show that robotic pancreatectomies can be performed as safe as the open procedures in experienced centers. However, in all these analyses there is an important bias: the retrospective nature of the studies. The advantages of robotic surgery, compared to the open one, seem to be the traditional ones of minimally invasive surgery, that is, decreased intraoperative blood loss and shorter hospital stay. How much these advantages impact the perioperative costs is very difficult to analyze because there are contradictory results in different retrospective comparative studies. Anyway, the general idea that robotic surgery is more expensive than traditional one is not supported by the literature. Even more complicated is the comparison of robotic and laparoscopic pancreatic surgery. Considering the experience reported in performing PD with the two methods, we can say that robotic technique is more suitable to approach major pancreatectomies. In contrast in DPs, it is difficult to identify advantages. The only reasonable explanation for the use of robot in these procedures can be the easier performing of spleen preserving distal resection and the shorter learning curve to approach these operations. The learning curve aspect is also a topic that should be more investigated [37], even considering the institutional impact on reducing costs. The real problem coming out from this literature analysis is that no long term results of these procedures are available. No data comparing survival in cancer patients are available. For this reason, without a strong evidence of oncologic advantages of robotic surgery and with similar short term results, the cosmetic advantages offered by this technique seem to be not enough to justify an extensive use of it without reasonable cost/effectiveness for cancer patients. In contrast, the safety of these procedures can justify the use of the robotic technique in young patients with benign/low grade malignant tumors of the pancreas that can mostly benefit from a cosmetic operation.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publishing of this paper.

References

H. C. Jacobaeus, “Ueber die Möglichkeit die Zystoskopie die Untersuchung seroser Holungen anzuwenden,” Münchener Medizinische Wochenschrift, vol. 57, pp. 2090–2092, 1910.

B. M. Bernheim, “Organoscopy: cystoscopy of the abdominal cavity,” Annals of Surgery, vol. 53, no. 6, pp. 764–767, 1911.

A. Cuschieri, “Laparoscopy for pancreatic cancer: does it benefit the patient?” European Journal of Surgical Oncology, vol. 14, no. 1, pp. 41–4, 1988.

A. Pietrabissa, D. Caramella, G. Di Candio et al., “Laparoscopy and laparoscopic ultrasonography for staging pancreatic cancer: critical appraisal,” World Journal of Surgery, vol. 23, no. 10, pp. 998–1003, 1999.

S. Shimi, S. Banting, and A. Cuschieri, “Laparoscopy in the management of pancreatic cancer: endoscopic cholecystojejunostomy for advanced disease,” British Journal of Surgery, vol. 79, no. 4, pp. 317–319, 1992.

M. Gagner and A. Pomp, “Laparoscopic pylorus-preserving pancreatoduodenectomy,” Surgical Endoscopy, vol. 8, no. 5, pp. 408–410, 1994.

M. L. Kendrick and D. Cusati, “Total laparoscopic pancreaticoduodenectomy feasibility and outcome in an early experience,” Archives of Surgery, vol. 145, no. 1, pp. 19–23, 2010.

M. L. Kendrick and G. M. Sclabas, “Major venous resection during total laparoscopic pancreaticoduodenectomy,” HPB, vol. 13, no. 7, pp. 454–458, 2011.

C. D. Briggs, C. D. Mann, G. R. B. Irving et al., “Systematic review of minimally invasive pancreatic resection,” Journal of Gastrointestinal Surgery, vol. 13, no. 6, pp. 1129–1137, 2009.

S. Zenoni, J. P. Arnoletti, and S. de la Fuente, “Minimally invasive approach for patients requiring pancreatoduodenectomy,” JAMA Surgery, vol. 148, no. 12, pp. 1154–1157, 2013.

P. C. Giulianotti, A. Coratti, M. Angelini et al., “Robotics in general surgery: personal experience in a large community hospital,” Archives of Surgery, vol. 138, no. 7, pp. 777–784, 2003.

A. H. Zureikat, A. J. Moser, B. A. Boone, D. L. Bartlett, M. Zenati, and H. J. Zeh III, “250 robotic pancreatic resections: safety and feasibility,” Annals of Surgery, vol. 258, no. 4, pp. 554–562, 2013.

P. C. Giulianotti, F. Sbrana, F. M. Bianco et al., “Robot-assisted laparoscopic pancreatic surgery: single-surgeon experience,” Surgical Endoscopy and Other Interventional Techniques, vol. 24, no. 7, pp. 1646–1657, 2010.

H. J. Zeh, A. H. Zureikat, A. Secrest, M. Dauoudi, D. Bartlett, and A. J. Moser, “Outcomes after robot-assisted pancreaticoduodenectomy for periampullary lesions,” Annals of Surgical Oncology, vol. 19, no. 3, pp. 864–870, 2012.

N. C. Buchs, P. Addeo, F. M. Bianco, S. Ayloo, E. Benedetti, and P. C. Giulianotti, “Robotic versus open pancreaticoduodenectomy: a comparative study at a single institution,” World Journal of Surgery, vol. 35, no. 12, pp. 2739–2746, 2011.

U. Boggi, S. Signori, N. de Lio, et al., “Feasibility of robotic pancreatoduodenectomy,” British Journal of Surgery, vol. 100, no. 7, pp. 917–925, 2013.

S. Chalikonda, J. R. Aguilar-Saavedra, and R. M. Walsh, “Laparoscopic robotic-assisted pancreaticoduodenectomy: a case-matched comparison with open resection,” Surgical Endoscopy and Other Interventional Techniques, vol. 26, no. 9, pp. 2397–2402, 2012.

E. C. H. Lai, G. P. C. Yang, and C. N. Tang, “Robot-assisted laparoscopic pancreaticoduodenectomy versus open pancreaticoduodenectomy—a comparative study,” International Journal of Surgery, vol. 10, no. 9, pp. 475–479, 2012.

O. C. Y. Chan, C. N. Tang, E. C. H. Lai, G. P. C. Yang, and M. K. W. Li, “Robotic hepatobiliary and pancreatic surgery: a cohort study,” Journal of Hepato-Biliary-Pancreatic Sciences, vol. 18, no. 4, pp. 471–480, 2011.

N. X. Zhou, J. Z. Chen, Q. Liu et al., “Outcomes of pancreatoduodenectomy with robotic surgery versus open surgery,” International Journal of Medical Robotics and Computer Assisted Surgery, vol. 7, no. 2, pp. 131–137, 2011.

M. L. Kendrick and D. Cusati, “Total laparoscopic pancreaticoduodenectomy feasibility and outcome in an early experience,” Archives of Surgery, vol. 145, no. 1, pp. 19–23, 2010.

A. L. de Vasconcellos Macedo, V. Schraibman, S. Okazaki et al., “Treatment of intraductal papillary mucinous neoplasms, neuroendocrine and periampullary pancreatic tumors using robotic surgery: a safe and feasible technique,” Journal of Robotic Surgery, vol. 5, no. 1, pp. 35–41, 2011.

V. K. Narula, D. J. Mikami, and W. S. Melvin, “Robotic and laparoscopic pancreaticoduodenectomy: a hybrid approach,” Pancreas, vol. 39, no. 2, pp. 160–164, 2010.

P. Suman, J. Rutledge, and A. Yiengpruksawan, “Robotic spleen preserving distal pancreatectomy,” Journal of the Society of Laparoendoscopic Surgeons, vol. 17, no. 4, pp. 627–635, 2013.

M. Daouadi, A. H. Zureikat, M. S. Zenati et al., “Robot-assisted minimally invasive distal pancreatectomy is superior to the laparoscopic technique,” Annals of Surgery, vol. 257, no. 1, pp. 128–132, 2013.

H. K. Hwang, C. M. Kang, Y. E. Chung, K. A. Kim, S. H. Choi, and W. J. Lee, “Robot-assisted spleen preserving distal pancreatectomy: a single surgeon's experience and proposal of clinical application,” Surgical Endoscopy, vol. 27, no. 3, pp. 774–781, 2013.

C. M. Kang, D. H. Kim, W. J. Lee, and H. S. Chi, “Conventional laparoscopic and robot-assisted spleen-preserving pancreatectomy: does da Vinci have clinical advantages?” Surgical Endoscopy and Other Interventional Techniques, vol. 25, no. 6, pp. 2004–2009, 2011.

J. A. Waters, D. F. Canal, E. A. Wiebke et al., “Robotic distal pancreatectomy: cost effective?” Surgery, vol. 148, no. 4, pp. 814–823, 2010.

P. C. Giulianotti, P. Addeo, N. C. Buchs, S. M. Ayloo, and F. M. Bianco, “Robotic extended pancreatectomy with vascular resection for locally advanced pancreatic tumors,” Pancreas, vol. 40, no. 8, pp. 1264–1270, 2011.

M. del Chiaro, “Are there really indications for central pancreatectomy?” JAMA Surgery, 2014.

C. M. Kang, D. H. Kim, W. J. Lee, and H. S. Chi, “Initial experiences using robot-assisted central pancreatectomy with pancreaticogastrostomy: a potential way to advanced laparoscopic pancreatectomy,” Surgical Endoscopy and Other Interventional Techniques, vol. 25, no. 4, pp. 1101–1106, 2011.

P. C. Giulianotti, P. Addeo, N. C. Buchs, F. M. Bianco, and S. M. Ayloo, “Early experience with robotic total pancreatectomy,” Pancreas, vol. 40, no. 2, pp. 311–313, 2011.

C. A. Galvani, H. Rodriguez Rilo, J. Samamé, M. Porubsky, A. Rana, and R. W. Gruessner, “Fully robotic-assisted technique for total pancreatectomy with an autologous islet transplant in chronic pancreatitis patients: results of a first series,” Journal of the American College of Surgeons, vol. 218, no. 3, pp. e73–e78, 2014.

P. C. Giulianotti, J. Kuechle, P. Salehi et al., “Robotic-assisted laparoscopic distal pancreatectomy of a redo case combined with autologous islet transplantation for chronic pancreatitis,” Pancreas, vol. 38, no. 1, pp. 105–107, 2009.

J. Zhang, W. M. Wu, L. You, and Y. P. Zhao, “Robotic versus open pancreatectomy: a systematic review and meta-analysis,” Annals of Surgical Oncology, vol. 20, no. 6, pp. 1774–1780, 2013.

T. Bocci, C. Moretto, S. Tognazzi et al., “How does a surgeon's brain buzz? An EEG coherence study on the interaction between humans and robot,” Behavioral and Brain Functions, vol. 9, article 14, 2013.

R. Pilka, R. Marek, P. Dzvinčuk, M. Kudela, and D. Neubert, “Learning curve" robotic radical hysterectomy compared to standardized laparoscopy assisted radical vaginal and open radical hysterectomy,” Ceská Gynekologie, vol. 78, no. 1, pp. 20–27, 2013.