BioMed Research International
Volume 2015 (2015), Article ID 214703, 3 pages
http://dx.doi.org/10.1155/2015/214703

Erratum

Erratum to “Localized and Sustained Delivery of Erythropoietin from PLGA Microspheres Promotes Functional Recovery and Nerve Regeneration in Peripheral Nerve Injury”

Wei Zhang,¹ Yuan Gao,¹ Yan Zhou,² Jianheng Liu,¹ Licheng Zhang,¹ Anhua Long,¹ Lihai Zhang,¹ and Peifu Tang¹

¹Department of Orthopedics, General Hospital of Chinese PLA, Beijing 100853, China
²Medical Department, Affiliated Hospital of Chinese PLA General Hospital, Beijing 100048, China

Received 25 May 2015; Accepted 4 June 2015

Copyright © 2015 Wei Zhang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the paper titled “Localized and Sustained Delivery of Erythropoietin from PLGA Microspheres Promotes Functional Recovery and Nerve Regeneration in Peripheral Nerve Injury” we have found that, in Figure 1(d), one panel is mistakenly a duplication of the adjacent panel. The upper two western blotting results are identical. According to our inspection of the original data sets, this is due to a mistake during the editorial process of the figures. We show here the amended Figure 1(d), with the correct image for the western blotting results of group EPO.

Due to the same reason, another mistake was made in the lower left panel of Figure 4. The label of the -axis, “Axon count (field),” should read “Axon count (per field).” And a typo was found in the beginning of the second line under Section 3.1 that “aws” should read “was.”

(a)

(b)

(c)

(d)

Figure 1

Figure 4