BioMed Research International
Volume 2015 (2015), Article ID 318739, 1 page
http://dx.doi.org/10.1155/2015/318739

Erratum

Erratum to “Radial Quantitative Ultrasound and Dual Energy X-Ray Absorptiometry: Intermethod Agreement for Bone Status Assessment in Children”

Kar Hau Chong,¹ Bee Koon Poh,¹ Nor Aini Jamil,¹ Nor Azmi Kamaruddin,² and Paul Deurenberg³

¹Physical Activity and Energy Metabolism Research Group, Faculty of Health Sciences, Universiti Kebangsaan Malaysia, Jalan Raja Muda Abdul Aziz, 50300 Kuala Lumpur, Malaysia
²Department of Medicine, Faculty of Medicine, Universiti Kebangsaan Malaysia, Jalan Yaacob Latif, Bandar Tun Razak, 56000 Cheras, Kuala Lumpur, Malaysia
³Telaga Harbour Marina, Lot 1, 07000 Langkawi, Malaysia

Received 27 May 2015; Accepted 2 June 2015

Copyright © 2015 Kar Hau Chong et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In our paper entitled “Radial Quantitative Ultrasound and Dual Energy X-Ray Absorptiometry: Intermethod Agreement for Bone Status Assessment in Children,” there was an error in the title of -axis in Figure 1. The title was written as “Difference in -score (radial QUS minus DXA)”; however, it should be written as “Mean of -scores of radial QUS and DXA.” We have now provided new corrected Figure 1.

Figure 1: Bland-Altman plot for assessing the agreement between radial quantitative ultrasound (QUS) and dual energy X-ray absorptiometry (DXA).

These corrections do not change any conclusion or findings of the paper.