BioMed Research International
Volume 2015 (2015), Article ID 542105, 7 pages
http://dx.doi.org/10.1155/2015/542105

Research Article

Modulation of the Cardiomyocyte Contraction inside a Hydrostatic Pressure Bioreactor: In Vitro Verification of the Frank-Starling Law

Lorenzo Fassina,1,2 Giovanni Magenes,1,2 Roberto Gimmelli,³ and Fabio Naro⁴

¹Dipartimento di Ingegneria Industriale e dell’Informazione, Università di Pavia, Via Ferrata 1, 27100 Pavia, Italy
²Centro di Ingegneria Tissutale (CIT), Università di Pavia, 27100 Pavia, Italy
³Dipartimento di Medicina Sperimentale, Università “Sapienza”, 00161 Roma, Italy
⁴Dipartimento di Scienze Anatomiche, Istologiche, Medico-Legali e dell’Apparato Locomotore, Università “Sapienza”, 00161 Roma, Italy

Received 24 July 2014; Revised 18 October 2014; Accepted 27 October 2014

Academic Editor: Kibret Mequanint

Copyright © 2015 Lorenzo Fassina et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

We have studied beating mouse cardiac syncytia in vitro in order to assess the inotropic, ergotropic, and chronotropic effects of both increasing and decreasing hydrostatic pressures. In particular, we have performed an image processing analysis to evaluate the kinematics and the dynamics of those pressure-loaded beating syncytia starting from the video registration of their contraction movement. By this analysis, we have verified the Frank-Starling law of the heart in in vitro beating cardiac syncytia and we have obtained their geometrical-functional classification.

1. Introduction

Understanding how cells react to mechanical forces is crucial. For instance, when osteoblasts sense a fluid shear stress, stretch-gated ion channels open and specific intracellular mechanisms lead to an enhanced production of bone matrix [1–3]. On the other hand, both tension and compression modulate the expression of transcription factors essential for the homeostasis of bone, cartilage, and tooth tissues [4]. Compression has a role during embryogenesis, when the blastocoel fluid presses the inner cell mass and, as a consequence, activates the key transcription factors OCT4, SOX2, and NANOG that determine pluripotency in the epiblast [5–7]. Tension and compression may also change the transcription more rapidly when they are transmitted directly into the nucleus via the cytoskeleton linked to nuclear envelope proteins [8].

The preceding examples of structure/force/function relationships are well understandable in the frame of the “tensegrity” theory [9–13]: the functions of cells and tissues can be modulated not only by molecules, but also by biophysical stimuli. In particular, during the in vitro culture inside bioreactors, the biophysical forces may modify a specific cell status of force equilibrium, named “tensegrity,” inducing, via mechanotransduction, changes to the transcriptional profile. In general, the mechanical bioreactors elicit time varying forces acting perpendicularly or tangentially onto the cells and modulating the cell tensegrity via tensile, compressive, and shear deformations [14, 15].

In the present study, an instantaneous modulation of the cell function (without the involvement of transcriptional mechanisms) is well exemplified by the cardiomyocytes subjected to mechanical forces according to the Frank-Starling law of the heart [16].

In a previous work, to extend the possible use of beating cardiac syncytia cultured in vitro (e.g., in studies about human cardiac syncytium in physiological and pathological conditions, patient-tailored therapeutics, and syncytium models derived from induced pluripotent/embryonic stem cells with genetic mutations), we have developed a novel method based on image processing analysis to evaluate the kinematics and the dynamics of in vitro beating syncytia starting from the video registration of their contraction movement [17]: in particular, our method uses the displacement vector field and the velocity vector field of a beating patch to evaluate the syncytium not only from the chronotropic viewpoint, but also from the inotropic and ergotropic ones.

In the present work, the preceding calculus method allowed the study of the mechanical modulation of the contraction properties in in vitro beating cardiac syncytia as they were loaded with different hydrostatic pressures inside a bioreactor. In particular, the computed kinematic and dynamic parameters aimed at revealing the inotropic, ergotropic, and chronotropic effects of the applied hydrostatic pressures: we anticipate that the data analysis permitted the verification of the Frank-Starling law in in vitro beating cardiac syncytia and their geometrical-functional classification.

2. Materials and Methods

2.1. Beating Mouse Cardiac Syncytia

Spontaneously beating cardiac syncytia were obtained from hearts of 1- to 2-day-old CD-1 mouse pups (Charles River Laboratories Italia, Calco, Italy), as previously described [18–20] with some modifications. Briefly, beating primary cultures of murine cardiomyocytes were prepared in vitro as follows: the hearts were quickly excised, the atria were cut off, and the ventricles were minced and digested by incubation with 100 μg/mL type II collagenase (Invitrogen, Carlsbad, CA) in ADS buffer (0.1 M HEPES, 0.1 M D-glucose, 0.5 M NaCl, 0.1 M KCl, 0.1 M NaH₂PO₄·H₂O, and 0.1 M MgSO₄) for 15 min at 37°C and then by incubation with 900 μg/mL pancreatin (Sigma-Aldrich, Milan, Italy) in ADS buffer for 15 min at 37°C. The resulting cell suspension was preplated for 2 h at 37°C to reduce the contribution of nonmyocardial cells. The unattached, cardiomyocyte-enriched cells remaining in suspension were collected, plated onto collagen-coated 35 mm Petri dishes, and covered by DMEM containing 10% horse serum, 5% fetal bovine serum, and 1× gentamicin (Roche Molecular Biochemicals, Indianapolis, IN). About 3 × 10⁵ cardiomyocytes were cultured in each Petri dish at 37°C and 5% CO₂ to form a spontaneously beating cardiac syncytium.

2.2. Pressure Bioreactor

On day 3 of culture, at a constant temperature of 37°C and 5% CO₂, each syncytium was observed via a movie capture system (ProgRes C5, Jenoptik, Germany) in four different conditions of relative hydrostatic pressure: at 0 (atmospheric pressure), 100, 200, and 300 mmHg inside a custom-machined polymethylmethacrylate pressure chamber (Figure 1).

Figure 1: Scheme of the transversal section of the pressure chamber with a seeded Petri dish inside. Each syncytium was observed via a movie capture system in four different conditions of relative hydrostatic pressure: at 0 (atmospheric pressure), 100, 200, and 300 mmHg inside a custom-machined polymethylmethacrylate pressure chamber.

The syncytium cultures were repeated 4 times for a total of 40 syncytia loaded by both increasing and decreasing pressures. In particular, for each syncytium, we have obtained a sequence of eight video files in AVI format, each video with a duration of 40 s: at 0, 100, 200, and 300 mmHg (after that there was a recovery of 0.5 h in incubator at 37°C and 5% CO₂) and then at 300, 200, 100, and 0 mmHg.

2.3. Registration of the Syncytium Movement via the Apposition of Software Markers

By the Video Spot Tracker (VST) program, which is used to track the motion of one or more spots in an AVI video file (http://cismm.cs.unc.edu/downloads/), in each video, we have systematically selected 30 spots or markers onto the first video frame, according to the same orthogonal grid. By starting the videos in VST, frame by frame, the program followed and registered the spatial-temporal coordinates , , and for each marker, as previously described [17]. The coordinates and are expressed in [pixel], whereas the coordinate is expressed in [s].

2.4. Kinematics and Dynamics of the Beating Syncytium

By an algorithm based on the Matlab programming language (The MathWorks, Inc., Natick, MA), frame by frame and for each marker, we have studied the kinematics and the dynamics of the beating cardiac syncytia, as previously described [17] (see the Appendix below for the mathematical details). In particular, in this work, we have evaluated the syncytium contraction in terms of contractility (maximum contraction velocity), contraction force, kinetic energy, and beat frequency.

2.5. Statistics

In order to compare the results between the different pressure conditions, one-way analysis of variance (ANOVA) with post hoc least significance difference (LSD) test was applied, electing a significance level of 0.05. The results are expressed as mean ± standard deviation.

3. Results

The software and calculus method previously described allowed the study of the mechanical modulation of the contraction properties in in vitro beating cardiac syncytia as they were loaded with different hydrostatic pressures. In particular, the computed kinematic and dynamic parameters aimed at revealing possible inotropic, ergotropic, and chronotropic effects of the applied hydrostatic pressures.

3.1. Geometrical-Functional Classification of the Beating Cardiac Syncytia

We observed particularly thick multilayers with “spheroidal” shape and “flat” multilayers (Figure 2), and we evaluated them in terms of contractility, contraction force, kinetic energy, and beat frequency.

(a)

(b)

(c)

(d)

Figure 2: Cellular layers in beating syncytia. We observed particularly thick multilayers with “spheroidal” shape ((a) and (b), with bars equal to 50 μm and to 1 mm, resp.) and “flat” multilayers ((c) and (d), with bars equal to 50 μm and to 1 mm, resp.).

The spheroidal syncytia showed minimum contractility, minimum contraction force, minimum kinetic energy, and maximum beat frequency at 200 mmHg, with in the comparison with the corresponding adjacent values at 100 and 300 mmHg (Figures 3, 4, and 6), except for the kinetic energy () (Figure 5).

Figure 3: Contractility: the spheroidal syncytia showed minimum contractility at 200 mmHg (with statistically significant differences in comparison with the adjacent values at 100 and 300 mmHg []); the flat syncytia were characterized by maximum contractility at 100 mmHg (with statistically significant difference in comparison with the value at 0 mmHg [] and without statistically significant difference in comparison with the value at 200 mmHg []). Except at 200 mmHg, the contractility of spheroidal syncytia was significantly higher than the contractility of flat syncytia ().

Figure 4: Contraction force: the spheroidal syncytia showed minimum contraction force at 200 mmHg (with statistically significant differences in comparison with the adjacent values at 100 and 300 mmHg []); the flat syncytia were characterized by maximum contraction force at 100 mmHg (with statistically significant differences in comparison with the adjacent values at 0 and 200 mmHg []). At all pressures, the contraction force of spheroidal syncytia was significantly higher than the contraction force of flat syncytia ().

Figure 5: Kinetic energy: the spheroidal syncytia showed minimum kinetic energy at 200 mmHg (without statistically significant differences in comparison with the adjacent values at 100 and 300 mmHg []); the flat syncytia were characterized by maximum kinetic energy at 100 mmHg (with statistically significant differences in comparison with the adjacent values at 0 and 200 mmHg []). At all pressures, the kinetic energy of spheroidal syncytia was significantly higher than the kinetic energy of flat syncytia ().

Figure 6: Beat frequency: the spheroidal syncytia showed maximum beat frequency at 200 mmHg (with statistically significant differences in comparison with the adjacent values at 100 and 300 mmHg []); the flat syncytia were characterized by minimum beat frequency at 100 mmHg (with statistically significant differences in comparison with the adjacent values at 0 and 200 mmHg []). At all pressures, the beat frequency of spheroidal syncytia was significantly lower than the beat frequency of flat syncytia ().

The flat syncytia were characterized by maximum contractility, maximum contraction force, maximum kinetic energy, and minimum beat frequency at 100 mmHg, with in the comparison with the corresponding adjacent values at 0 and 200 mmHg (Figures 4, 5, and 6), except for the contractility () (Figure 3).

At all pressures, the contractility, the contraction force, and the kinetic energy of spheroidal syncytia were significantly higher than those of flat syncytia () (Figures 3, 4, and 5), except for the contractility at 200 mmHg () (Figure 3). In addition, at all pressures, the beat frequency of spheroidal syncytia was significantly lower than the beat frequency of flat syncytia () (Figure 6).

4. Discussion

The mouse has become a cornerstone of the heart research because of the high potential in manipulating its genome and the consequent availability of models of cardiovascular diseases. Using in vitro beating primary cultures of murine cardiomyocytes, we have verified the Frank-Starling law of the heart according to the following terms.

In the spheroidal syncytia, where a better 3D distribution of pressure loads was possible in comparison to flat syncytia, an increasing pressure theoretically caused a shortening of the sarcomeres with consequent decreased inotropy, decreased ergotropy, and increased chronotropy (in the 0 ÷ 200 mmHg pressure range, Figures 3, 4, 5, and 6); on the other hand, in the flat syncytia, where the increasing pressure loads uniformly spread onto a 2D surface, the sarcomeres were theoretically stretched with consequent increased inotropy, increased ergotropy, and decreased chronotropy (in the 0 ÷ 100 mmHg pressure range, Figures 3, 4, 5, and 6).

The preceding trends were then inverted for pressures higher than 100 mmHg and 200 mmHg in flat and spheroidal syncytia, respectively. We hypothesize the presence of overstretched sarcomeres in the flat and thin syncytia already at low pressures (>100 mmHg) with consequent impairment of the contractile function. On the other hand, in the spheroidal and thick syncytia, where a better 3D distribution of pressure loads was possible in comparison to the flat and thin syncytia, we hypothesize increasingly packed myofibrils, that is, increasingly cross-linked actin and myosin filaments only at high pressures (>200 mmHg) with consequent amelioration of the contractile function.

In addition, in comparison to the flat and thin syncytia, the spheroidal and thick syncytia showed, at each pressure, higher inotropy, higher ergotropy, and lower chronotropy (Figures 3, 4, 5, and 6): this result was consistent with the general relationship between the contractile parameters and the heart size in mammalians, where the chronotropy decreases due to increasing heart size, whereas the inotropy and the ergotropy increase together with the heart size [21].

5. Conclusions

In conclusion, the employed calculus method (based on image processing analysis [17]) permitted a systematic study of in vitro beating syncytia, which were previously described in terms of cardiac markers and functional gap junctions [22]. As a consequence, it could be used in in vitro studies of beating cardiac patches, as alternative to Langendorff’s heart in biochemical, pharmacological, and physiology studies, and, especially, when Langendorff’s technique is inapplicable (e.g., in studies about human cardiac syncytium in physiological and pathological conditions, patient-tailored therapeutics, and syncytium models derived from induced pluripotent/embryonic stem cells with genetic mutations).

Furthermore, the method could help, in heart tissue engineering and bioartificial heart researches, to “engineer the heart piece by piece” [23]. In particular, our method could be useful in (i) the identification of a suitable cell source, preferably adult-derived autologous stem cells, (ii) the development of biomaterials, and (iii) the design of novel bioreactors and microperfusion systems.

Appendix

Being both contraction and relaxation active phases of the syncytium movement, in order to estimate a possible ergotropic effect of the pressure, we have defined as the mean kinetic energy of a beating syncytium in a discrete video:

where is the velocity of the marker in the frame , is the total number of video frames, is the total number of markers (), is the constant related to the tissue mass, and is the constant derived from the linear relation between the units meter and pixel in a bitmap AVI video at a given magnification.

According to (A.1), for each syncytium, in order to compare the pressure effects, there was no need to know the mass of the beating tissue or the constant, because that mass and that constant were the same in the four different conditions of relative hydrostatic pressure and the spot markers were juxtaposed in the same grid positions. In addition, there was no need to know the video metrics or the constant, because the metrics and constant and the video magnification were the same at all pressures. As a consequence, we have defined as the normalized mean kinetic energy of a beating syncytium in a discrete video:

Besides, for each marker , in order to calculate as the total number of beats, we have identified and counted the peak displacements. Given the duration of the video ( s), we have defined as the mean beat frequency:

According to Sonnenblick et al. [24, 25], the isotonic contraction of the papillary tissue is well described by the force-velocity curves, where, at a given load, the maximum contraction velocity is an indicator of contractility.

As a consequence, in order to study a possible inotropic effect of the pressure under a kinematic point of view, for each marker during its beats, we have identified the peak velocities and we have evaluated the mean syncytium contractility as their mean. is expressed in [pixel/s].

In order to study a possible inotropic effect of the pressure under a dynamic point of view, we have evaluated the syncytium contraction force by the Hamiltonian mechanics. The so-called Hamiltonian function is the sum of the kinetic and potential energy. Assuming that, during the whole video observation, there was a plentiful source of available glucose from the culture medium and that the subsequent ATP production and distribution were isotropic, , the ATP-related potential energy for the contraction movement, could be supposed to be constant in time and in space. As a consequence, the Hamilton differential equations to describe the syncytium movement were:

where and are the orthogonal components of the contraction force and is the kinetic energy function of the beating syncytium.

From (A.4), we have obtained:

where is the beating tissue mass and and are the orthogonal components of the velocity vector .

Combining (A.5), we have obtained:

According to (A.6), in order to study a possible inotropic effect of the pressure under a dynamic point of view, we have defined as the normalized mean contraction force of a beating syncytium in a discrete video:

According to Cauchy’s theory of continuum mechanics, introducing the and reference axes of the undeformed tissue configuration, we could rewrite (A.6) as follows:

In (A.8), under the hypothesis of small displacements, the symmetric part of the displacement gradient is the deformation tensor, whereas the nonsymmetric one describes the rigid movement.

In our experimental setup, (A.8) was then suitable for studying the contraction force both in terms of pure deformation (symmetric part of the displacement gradient) and in terms of roto-translation (nonsymmetric part of the displacement gradient).

Ethical Approval

All procedures involving mice were completed in accordance with the policy of the Italian National Institute of Health (Protocol no. 118/99-A) and with the ethical guidelines for animal care of the European Community Council (Directive no. 86/609/ECC). CD-1 mice were obtained from the Charles River Laboratories Italia (Calco, Italy) and were housed under 12 h light/dark cycles, at constant temperature, and with food and water ad libitum. The mice were sacrificed by CO₂ asphyxiation.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This work was supported by the following research projects: FIRB Grant 2010 and INAIL Grant 2010 to Fabio Naro.

References

F. M. Pavalko, S. M. Norvell, D. B. Burr, C. H. Turner, R. L. Duncan, and J. P. Bidwell, “A model for mechanotransduction in bone cells: the load-bearing mechanosomes,” Journal of Cellular Biochemistry, vol. 88, no. 1, pp. 104–112, 2003.

L. Fassina, L. Visai, L. Asti et al., “Calcified matrix production by SAOS-2 cells inside a polyurethane porous scaffold, using a perfusion bioreactor,” Tissue Engineering, vol. 11, no. 5-6, pp. 685–700, 2005.

S. R. L. Young, R. Gerard-O'Riley, J.-B. Kim, and F. M. Pavalko, “Focal adhesion kinase is important for fluid shear stress-induced mechanotransduction in osteoblasts,” Journal of Bone and Mineral Research, vol. 24, no. 3, pp. 411–424, 2009.

A. Mammoto, T. Mammoto, and D. E. Ingber, “Mechanosensitive mechanisms in transcriptional regulation,” Journal of Cell Science, vol. 125, part 13, pp. 3061–3073, 2012.

M. A. Wozniak and C. S. Chen, “Mechanotransduction in development: a growing role for contractility,” Nature Reviews Molecular Cell Biology, vol. 10, no. 1, pp. 34–43, 2009.

J. Rossant and P. P. Tam, “Blastocyst lineage formation, early embryonic asymmetries and axis patterning in the mouse,” Development, vol. 136, no. 5, pp. 701–713, 2009.

E. Farge, “Mechanotransduction in development,” Current Topics in Developmental Biology, vol. 95, pp. 243–265, 2011.

D.-H. Kim, S. B. Khatau, Y. Feng et al., “Actin cap associated focal adhesions and their distinct role in cellular mechanosensing,” Scientific Reports, vol. 2, article 555, 2012.

D. E. Ingber, “Tensegrity I. Cell structure and hierarchical systems biology,” Journal of Cell Science, vol. 116, part 7, pp. 1157–1173, 2003.

D. E. Ingber, “Tensegrity II. How structural networks influence cellular information processing networks,” Journal of Cell Science, vol. 116, part 8, pp. 1397–1408, 2003.

D. E. Ingber, “Cellular mechanotransduction: putting all the pieces together again,” FASEB Journal, vol. 20, no. 7, pp. 811–827, 2006.

D. E. Ingber, “Mechanical control of tissue morphogenesis during embryological development,” International Journal of Developmental Biology, vol. 50, no. 2-3, pp. 255–266, 2006.

T. Mammoto and D. E. Ingber, “Mechanical control of tissue and organ development,” Development, vol. 137, no. 9, pp. 1407–1420, 2010.

J. Hansmann, F. Groeber, A. Kahlig, C. Kleinhans, and H. Walles, “Bioreactors in tissue engineering—principles, applications and commercial constraints,” Biotechnology Journal, vol. 8, no. 3, pp. 298–307, 2013.

S. V. Murphy and A. Atala, “Organ engineering—combining stem cells, biomaterials, and bioreactors to produce bioengineered organs for transplantation,” BioEssays, vol. 35, no. 3, pp. 163–172, 2013.

E. H. Starling and M. B. Visscher, “The regulation of the energy output of the heart,” The Journal of Physiology, vol. 62, no. 3, pp. 243–261, 1927.

L. Fassina, A. di Grazia, F. Naro, L. Monaco, M. G. C. de Angelis, and G. Magenes, “Video evaluation of the kinematics and dynamics of the beating cardiac syncytium: an alternative to the langendorff method,” International Journal of Artificial Organs, vol. 34, no. 7, pp. 546–558, 2011.

E. Devic, Y. Xiang, D. Gould, and B. Kobilka, “β-Adrenergic receptor subtype-specific signaling in cardiac myocytes from β1 and β2 adrenoceptor knockout mice,” Molecular Pharmacology, vol. 60, no. 3, pp. 577–583, 2001.

Y. Xiang, V. O. Rybin, S. F. Steinberg, and B. Kobilka, “Caveolar localization dictates physiologic signaling of β ₂-adrenoceptors in neonatal cardiac myocytes,” Journal of Biological Chemistry, vol. 277, no. 37, pp. 34280–34286, 2002.

Y. Xiang, F. Naro, M. Zoudilova, S.-L. C. Jin, M. Conti, and B. Kobilka, “Phosphodiesterase 4D is required for β2 adrenoceptor subtype-specific signaling in cardiac myocytes,” Proceedings of the National Academy of Sciences of the United States of America, vol. 102, no. 3, pp. 909–914, 2005.

K. Schmidt-Nielsen, Animal Physiology: Adaptation and Environment, Cambridge University Press, Cambridge, UK, 1997.

L. Formigli, F. Francini, S. Nistri et al., “Skeletal myoblasts overexpressing relaxin improve differentiation and communication of primary murine cardiomyocyte cell cultures,” Journal of Molecular and Cellular Cardiology, vol. 47, no. 2, pp. 335–345, 2009.

L. Hecker and R. K. Birla, “Engineering the heart piece by piece: state of the art in cardiac tissue engineering,” Regenerative Medicine, vol. 2, no. 2, pp. 125–144, 2007.

E. H. Sonnenblick, J. F. Williams Jr., G. Glick, D. T. Mason, and E. Braunwald, “Studies on digitalis. XV. Effects of cardiac glycosides on myocardial force-velocity relations in the nonfailing human heart,” Circulation, vol. 34, no. 3, pp. 532–539, 1966.

J. W. Covell, J. Ross Jr., E. H. Sonnenblick, and E. Braunwald, “Comparison of the force-velocity relation and the ventricular function curve as measures of the contractile state of the intact heart,” Circulation Research, vol. 19, no. 2, pp. 364–372, 1966.