BioMed Research International
Volume 2015 (2015), Article ID 629168, 7 pages
http://dx.doi.org/10.1155/2015/629168

Research Article

Osteogenic Matrix Cell Sheets Facilitate Osteogenesis in Irradiated Rat Bone

Yoshinobu Uchihara,¹ Manabu Akahane,² Takamasa Shimizu,¹ Tomoyuki Ueha,¹ Yusuke Morita,³ Shintaro Nakasaki,³ Tomohiko Kura,¹ Yasuaki Tohma,⁴ Akira Kido,¹ Kenji Kawate,⁵ and Yasuhito Tanaka¹

¹Department of Orthopedic Surgery, Nara Medical University, 840 Shijo-cho, Kashihara, Nara 634-8522, Japan
²Department of Public Health, Health Management and Policy, Nara Medical University School of Medicine, 840 Shijo-cho, Kashihara, Nara 634-8521, Japan
³Department of Biomedical Engineering, Doshisha University, 1-3 Tatara Miyakodani, Kyotanabe, Kyoto 610-0394, Japan
⁴Department of Orthopedic Surgery, Nara Medical Center, 2-789 Shichijo, Nara, Nara 630-8053, Japan
⁵Department of Arthroplasty and Regenerative Medicine, Nara Medical University, 840 Shijo-cho, Kashihara, Nara 634-8522, Japan

Received 4 December 2014; Revised 23 March 2015; Accepted 23 March 2015

Academic Editor: Aaron W. James

Copyright © 2015 Yoshinobu Uchihara et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Reconstruction of large bone defects after resection of malignant musculoskeletal tumors is a significant challenge in orthopedic surgery. Extracorporeal autogenous irradiated bone grafting is a treatment option for bone reconstruction. However, nonunion often occurs because the osteogenic capacity is lost by irradiation. In the present study, we established an autogenous irradiated bone graft model in the rat femur to assess whether osteogenic matrix cell sheets improve osteogenesis of the irradiated bone. Osteogenic matrix cell sheets were prepared from bone marrow-derived stromal cells and co-transplanted with irradiated bone. X-ray images at 4 weeks after transplantation showed bridging callus formation around the irradiated bone. Micro-computed tomography images at 12 weeks postoperatively showed abundant callus formation in the whole circumference of the irradiated bone. Histology showed bone union between the irradiated bone and host femur. Mechanical testing showed that the failure force at the irradiated bone site was significantly higher than in the control group. Our study indicates that osteogenic matrix cell sheet transplantation might be a powerful method to facilitate osteogenesis in irradiated bones, which may become a treatment option for reconstruction of bone defects after resection of malignant musculoskeletal tumors.

1. Introduction

Reconstruction of large bone defects after malignant musculoskeletal tumor resection is a significant challenge in orthopedic surgery. Several procedures have been attempted for reconstruction of such bone defects, including conventional autogenous bone grafting [1], vascularized bone transplantation [2], allogeneic bone grafting [3], and prosthetic replacement [4]. Although prosthetic replacement is one of the standard procedures for limb salvage operations, loosening, breakage, and wear particle formation of the prosthesis can cause clinical problems [4, 5]. Allografting is still uncommon in some Asian countries, especially in Japan, for socioreligious reasons.

Recently, intraoperative extracorporeal autogenous irradiated devitalized bone grafting has become a treatment option for reconstruction of bone defects after malignant musculoskeletal tumor resection [6, 7]. Surgeons can reconstruct the bone defect with the autogenous irradiated bone, resulting in an ideal shape and functional reconstruction because the bone maintains its original shape with tendons or ligamentous tissues attached to their original sites. Moreover, this method does not require harvesting bone from healthy sites, such as the pelvis, and is less problematic than allografts that might result in virus transmission and/or immunoreactions. However, there are some issues with this method. For example, the osteogenic capacity is completely lost by irradiation and nonunion or delayed union often occurs [5, 8]. Therefore, a novel method is required to facilitate osteogenesis for bone defect reconstruction by autogenous irradiated (devitalized) bone grafts.

We previously reported a cell transplantation method in which bone marrow-derived stromal cells (BMSCs) are cultured and lifted as a cell sheet structure. The cell sheet has an osteogenic potential and is therefore designated as an osteogenic matrix cell sheet [9, 10]. Osteogenic matrix cell sheets can be freely transplanted onto a scaffold at a nonunion site and enhance bone union with bridging bone formation around the nonunion site [11]. This finding indicates that the osteogenic matrix cell sheets may become an osteogenic cell source for autogenous irradiated devitalized bone grafts.

In the present study, we established bone defects in the femurs of rats, which were reconstructed using autogenous irradiated bone grafts together with transplantation of an osteogenic matrix cell sheet. The aim of the present study was to evaluate whether the osteogenic matrix cell sheet enhances bone union in such a model.

2. Materials and Methods

2.1. Animals

The experimental procedures were approved by the Animal Experimental Review Board of Nara Medical University. Fisher 344 rats were purchased from Japan SLC (Shizuoka, Japan). Seven- and 12-week-old male rats were used to prepare bone marrow cells and establish the autogenous bone graft model, respectively.

2.2. Preparation of Bone Marrow Cells

The method for BMSC preparation has been reported previously [9, 11]. Briefly, bone marrow cells were obtained by flushing out the femur shafts of 7-week-old male Fisher 344 rats with 10 mL culture medium. The cells were collected in two 75-cm² culture flasks (Corning, NY, USA) containing 15 mL minimal essential medium (Nacalai Tesque, Kyoto, Japan) with 15% fetal bovine serum (Gibco, Life Technologies, Carlsbad, CA, USA) and antibiotics (100 U/mL penicillin and 100 μg/mL streptomycin; Nacalai Tesque). The cells were cultured in an incubator at 37°C with 5% CO₂. At confluency, the primary cultured cells were trypsinized from the flasks using trypsin/EDTA (Nacalai Tesque).

2.3. Preparation of Osteogenic Matrix Cell Sheets

We have previously reported the method for osteogenic matrix cell sheet preparation [9]. Briefly, the trypsinized BMSCs were seeded at a density of 1 × 10⁴ cells/cm² in 10 cm dishes (100 × 20 mm; Corning) containing medium with 10 nM dexamethasone (Dex; Sigma, St. Louis, MO, USA) and ascorbic acid phosphate (Asap; L-ascorbic acid phosphate magnesium salt n-hydrate, 82 μg/mL; Wako Pure Chemical Industries, Kyoto, Japan) and cultured to confluency (approximately 12–14 days). The cells were rinsed twice with phosphate-buffered saline (Gibco, Life Technologies), and then the osteogenic matrix cell sheet was lifted by a scraper (Figure 1).

Figure 1: Macroscopic appearance of an osteogenic matrix cell sheet.

2.4. Preparation of Devitalized Bone Grafts

Femurs were obtained from 12-week-old male Fisher 344 rats. A column-shaped bone fragment of 10 mm in length was cut from the diaphysis of the femur using a bone micro-saw. It has been reported that tumor cells can be sufficiently devitalized by >50 Gy [5, 14]. Therefore, irradiation by a single exposure to 60 Gy (irradiation conditions: X-ray tube voltage, 125 kV; X-ray tube current, 20 mA; filter, 0.5 Al and 0.1 Cu) was performed to prepare the devitalized bone.

2.5. Transplantation of an Osteogenic Matrix Cell Sheet with an Autogenous Irradiated Bone Graft

An autogenous devitalized bone graft model was established in the femur of 12-week-old male Fisher 344 rats under anesthesia. Briefly, a lateral incision was made on the right hind limb and the vastus muscle was divided longitudinally to expose the right femur. The center of the femur shaft was cut and a 10 mm length of bone was removed to establish a bone defect. The bone defect was replaced with a previously prepared devitalized bone graft. The devitalized bone graft was fixed to the host femur using Kirschner wire (1.2 mm diameter), which was inserted into the intramedullary femur shaft from the distal femur condyle in a retrograde fashion. Subsequently, two osteogenic matrix cell sheets were wrapped around the grafted bone without suturing (sheet group). The transplanted osteogenic matrix cell sheets filled the gap between the grafted bone and host bone (Figure 2). The control group consisted of grafted bone without an osteogenic matrix cell sheet. Unprotected weight bearing was allowed immediately after the operation.

(a)

(b)

Figure 2: Osteogenic matrix cell sheet transplantation with an autogenous irradiated bone graft. Single and double arrows indicate grafted bone (irradiated bone) and the host femur, respectively. Asterisk indicates osteogenic matrix cell sheets. (a) Irradiated bone was fixed to the host femur using Kirschner wire. (b) Two osteogenic matrix cell sheets were wrapped around the grafted bone without suturing.

2.6. Evaluation of Bone Formation

X-ray images were taken under anesthesia at 4, 8, and 12 weeks postoperatively to evaluate bridging bone formation around the grafted devitalized bone. Rats were sacrificed and right hind limbs were harvested at 12 weeks postoperatively (Figure 3). After removal of the Kirschner wires, micro-computed tomography (CT) images were recorded using a Microfocus X-ray CT system. Quantitative 3D analysis was performed using a micro-CT system (SMX-160CTS; Shimadzu Corporation, Kyoto, Japan).

(a) Sheet

(b) Control

Figure 3: Microscopic appearance of the harvested femur at 12 weeks postoperatively. (a) Sheet group shows that smooth and rigid callus covers the grafted bone, resulting in bone union. (b) Control group shows that soft tissue covers the grafted bone, resulting in nonunion.

Two of the harvested femurs in each group were dissected from the surrounding muscle, fixed in 10% formalin, and embedded in methyl methacrylate resin. For histology, the femurs were cut longitudinally and subjected to von Kossa and Villanueva-Goldner staining. In von Kossa staining, calcified bone is represented as black. In Villanueva-Goldner staining, calcified bone is represented as green and an osteoid is represented as red.

Eight of the harvested femurs in each group were applied to mechanical testing (three-point bending test) using a universal testing machine equipped with a computer for data acquisition (EZ Graph; Shimadzu Corporation). As shown in Figure 4, a load was placed on the junction between the grafted bone and host femur. A crosshead speed of 10 mm/minute was applied until rupture. The maximum bending load at rupture was considered as the failure force.

Figure 4: Three-point bending test.

2.7. Statistical Analysis

Statistically significant differences in the mechanical test analyses were determined by the Mann-Whitney test. A value of was considered to be statistically significant.

3. Results

3.1. X-Ray Images

X-ray images taken at 4 weeks after transplantation showed obvious callus formation around the grafted bone in the sheet group. Callus formation had developed during the experimental period and bridging bone formation with the host bone was observed at 12 weeks postoperatively, resulting in bone union. In contrast, the control group showed no bridging callus formation around the grafted bone even at 12 weeks (Figure 5).

(a) Sheet

(b) Control

Figure 5: X-ray images of bone-grafted sites (femur) at 4, 8, and 12 weeks postoperatively. Arrows indicate bone-grafted sites. (a) Sheet group shows callus formation around the bone-grafted site, resulting in bone union at 12 weeks. (b) Control group shows nonunion.

3.2. CT Images

Micro-CT images recorded at 12 weeks postoperatively showed bridging bone formation around the grafted bone in the sheet group. In contrast, the control group exhibited no bridging bone formation around the grafted bone even at 12 weeks (Figure 6), which was similar to the X-ray images at 12 weeks.

(a) Sheet

(b) Control

Figure 6: Micro-CT images at 12 weeks postoperatively. Arrows indicate bone-grafted sites. (a) Sheet group shows bridging callus formation covering the grafted bone. (b) Control group does not show callus formation around the grafted bone.

3.3. Histological Staining

Representative histological sections of the harvested femur showed new bone formation around the grafted bone in the sheet group. In Villanueva-Goldner stained sections, grafted bone with empty lacunae and the host femur were united by the newly formed bone. Although there was no obvious remodeling at 12 weeks postoperatively, the grafted bone appeared to be stabilized by the newly formed bone in the gap between grafted and host bones as well as around the whole circumference of the graft. In contrast, no bone formation was observed around the grafted bone in the control group. Soft tissue interposition was observed between grafted and host bones, which was consistent with the nonunion findings (Figure 7).

Figure 7: Histology of the harvested femur at 12 weeks postoperatively. Single and double arrows indicate grafted bone (irradiated bone) and the host femur, respectively. Asterisks indicate newly formed bone. (a), (b), (c), and (d) Sheet group; (e), (f), (g), and (h) control group. (a) and (e) von Kossa staining; (b), (c), (f), and (g) Villanueva-Goldner staining. (a) New bone formation was observed around the grafted bone. (b) New bone formation was also observed around the grafted bone. (c) Higher-magnification image of the rectangular area in (b). Grafted bone and the host femur were united by newly formed bone (asterisks). (d) Diagram of (a) and (b). (e) No bone formation was observed around the grafted bone. (f) Bone formation was also not observed around the grafted bone. (g) Higher-magnification image of the rectangular area in (f). Fibrous tissue was observed between the grafted bone and host femur, indicating nonunion. (h) Diagram of (e) and (f).

3.4. Mechanical Testing

In the three-point bending test, the median failure forces at the site of the junction between the grafted bone and host femur were 101.2 N (41.7–233.5) and 14.2 N (0−70.3) in the sheet and control groups, respectively.

The failure force in the sheet group was significantly higher than that in the control group () (Figure 8).

Figure 8: Results of mechanical testing (three-point bending test). Failure force in the sheet group was significantly higher than that in the control group ().

4. Discussion

The present study clearly demonstrated that osteogenic matrix cell sheets can facilitate the osteogenesis of autogenous irradiated devitalized bone grafts. By combining the devitalized bone graft with an osteogenic matrix cell sheet, bone union was achieved at 12 weeks postoperatively. Although remodeling of the bone graft was not observed until 12 weeks, we observed bridging bone formation over the grafted bone between both ends of the autogenous bone, resulting in stability between the grafted bone and host bones. Mechanical testing revealed significantly higher strength in the sheet group, indicating that transplantation of devitalized bone grafts with osteogenic matrix cell sheets can be useful for bone reconstruction after musculoskeletal tumor resection.

In clinical cases of bone defects after musculoskeletal tumor resection, intraoperative extracorporeal autogenous irradiated bone grafting is one of the bone reconstruction methods. The method consists of a wide en bloc resection of the tumor, curettage of the tumor, extracorporeal irradiation with 50 Gy, and reintroduction of the irradiated bone into the host with fixation devices. The problem with this reconstruction method is that the osteogenic capacity is lost by irradiation and nonunion or delayed union often occurs [5, 8]. Therefore, an extended treatment strategy is required for intraoperative extracorporeal autogenous irradiated bone grafting. The present study indicates that transplantation of an osteogenic matrix cell sheet may be a strategy to solve this problem.

BMSCs have a self-renewal potential and can differentiate into osteoblasts, adipocytes, chondrocytes, neurons, and myogenic cells [12, 13, 15]. Differentiation into the osteoblastic lineage is induced by in vitro culture in osteoinductive medium containing Dex, Asap, and β-glycerophosphate [16–18]. BMSCs have been widely applied to a variety of scaffolds as a cell source for tissue regeneration including bone and cartilage reconstruction [16, 19, 20]. However, a scaffold that has no biological activity may function as a barrier for bone regeneration [9]. Recently, we reported that BMSCs can be transplanted as a cell sheet (osteogenic matrix cell sheet) with an osteogenic potential [9–11]. Our cell sheet transplantation method does not require specialized equipment to create the cell sheet, because the BMSCs are simply cultured in osteoinductive medium and lifted as a cell sheet using a scraper. Osteogenic matrix cell sheets remain at the transplantation site and fill the gap between the grafted bone and host bone (as shown in Figure 2), even when they are freely transplanted onto a scaffold at a fracture site. In our previous study, we analyzed the origin of de novo formed bone in the transplantation model of osteogenic matrix cell sheets using the sex-determining region Y (Sry) gene as a marker of donor cells. Sry was detected in the de novo formed bone, indicating that the cells in the transplanted osteogenic matrix cell sheet without a scaffold could survive at the fracture site and differentiate into osteogenic lineage cells in vivo [11].

We used irradiated devitalized bone as a graft in the present study. Therefore, the outcome of the graft and host bones might easily be nonunion because of the interposition of soft tissue in the junctions between them. However, we observed bridging bone formation over the grafted bone between both ends of the host bones as well as de novo formed bone in the junction. This union may be achieved by the fact that the osteogenic matrix cell sheets are pulpy and able to enter the gaps, that is, bone fracture sites, nonunion sites, and bone-grafted sites. Cell sheet transplantation prevented interposition of soft tissue into the gaps between the graft and host bones. Subsequently, bone tissue was formed in the gap as well as around the whole circumference of the graft. Therefore, the present study indicates that transplantation of an osteogenic matrix cell sheet provides an osteoinductive matrix as well as osteogenic cells, resulting in facilitation of osteogenesis.

Moreover, the osteogenic matrix cell sheet produces angiogenic factors, such as vascular endothelial growth factor A (VEGF-A), thereby promoting vessel sprouting from the existing vasculature and blood flow around the devitalized bone. Osteogenic matrix cell sheet transplantation can be applied to not only bone fractures but also nonunion and necrotic bone sites. Therefore, we believe that cell sheet transplantation can contribute to bone reconstruction in cases involving not only nonunion but also irradiated bone grafts.

The present study has some limitations. First, we used an irradiated bone model for our analyses. Clinically, intraoperative extracorporeal bone devitalized with liquid nitrogen is also used for reconstruction of bone defects after resection of malignant musculoskeletal tumors, because devitalization by liquid nitrogen can preserve the cartilage matrix and sufficient biomechanical strength [21–23]. Here, we chose irradiation that causes denaturation of proteins. Nevertheless, our transplantation method united irradiated bones to the host bones, indicating a high osteogenic activity. Second, the follow-up duration of 12 weeks was relatively short in the present study. Histological sections of the harvested femur showed little remodeling in the irradiated bone. Without remodeling, grafted bone and the junctions may be weak and subsequently fracture. However, in clinical cases, an intramedullary nail or plate can provide stability and prevent fractures at the site of the grafted bone and the junctions between the grafted bones and host bones until completion of union and remodeling. In a long-term followup, remodeling might occur during the healing process of the fracture. Further study is needed to address these points. Third, we did not evaluate vascularization around the irradiated bone. Revascularization is an important factor for new bone formation around irradiated devitalized bone. Angiogenic factors such as VEGF-A in the osteogenic matrix cell sheet may promote revascularization and vascular flow. Finally, we need to extend our study by performing experiments with larger bone defects and different species.

5. Conclusions

Our study clearly indicates that osteogenic matrix cell sheet transplantation facilitates osteogenesis in irradiated devitalized bone grafts. Therefore, transplantation of autogenous irradiated bone grafts with osteogenic matrix cell sheets may become a treatment option for reconstruction of bone defects after resection of malignant musculoskeletal tumors.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

The authors thank F. Kunda and M. Matsumura (Nara Medical University) for their technical assistance. This study was supported by a Grant-in-Aid for Young Scientists (KAKENHI).

References

R. Schuh, J. Panotopoulos, S. E. Puchner et al., “Vascularised or non-vascularised autologous fibular grafting for the reconstruction of a diaphyseal bone defect after resection of a musculoskeletal tumour,” The Bone & Joint Journal, vol. 96, no. 9, pp. 1258–1263, 2014.

R. W.-W. Hsu, M. B. Wood, F. H. Sim, and E. Y. S. Chao, “Free vascularised fibular grafting for reconstruction after tumour resection,” The Journal of Bone & Joint Surgery—British Volume, vol. 79, no. 1, pp. 36–42, 1997.

F. J. Hornicek Jr., W. Mnaymneh, R. D. Lackman, G. U. Exner, and T. I. Malinin, “Limb salvage with osteoarticular allografts after resection of proximal tibia bone tumors,” Clinical Orthopaedics and Related Research, no. 352, pp. 179–186, 1998.

A. Kawai, G. F. Muschler, J. M. Lane, J. C. Otis, and J. H. Healey, “Prosthetic knee replacement after resection of a malignant tumor of the distal part of the femur. Medium to long-term results,” The Journal of Bone and Joint Surgery—American Volume, vol. 80, no. 5, pp. 636–647, 1998.

N. Araki, A. Myoui, S. Kuratsu et al., “Intraoperative extracorporeal autogenous irradiated bone grafts in tumor surgery,” Clinical Orthopaedics and Related Research, no. 368, pp. 196–206, 1999.

H. Wafa, R. J. Grimer, L. Jeys, A. T. Abudu, S. R. Carter, and R. M. Tillman, “The use of extracorporeally irradiated autografts in pelvic reconstruction following tumour resection,” The Bone & Joint Journal, vol. 96, no. 10, pp. 1404–1410, 2014.

A. W. Davidson, A. Hong, S. W. McCarthy, and P. D. Stalley, “En-bloc resection, extracorporeal irradiation, and re-implantation in limb salvage for bony malignancies,” The Journal of Bone & Joint Surgery—British Volume, vol. 87, no. 6, pp. 851–857, 2005.

S. Z. Kotb and M. F. Mostafa, “Recycling of extracorporeally irradiated autograft for malignant bone tumors: long-term follow-up,” Annals of Plastic Surgery, vol. 71, no. 5, pp. 493–499, 2013.

M. Akahane, A. Nakamura, H. Ohgushi, H. Shigematsu, Y. Dohi, and Y. Takakura, “Osteogenic matrix sheet-cell transplantation using osteoblastic cell sheet resulted in bone formation without scaffold at an ectopic site,” Journal of Tissue Engineering and Regenerative Medicine, vol. 2, no. 4, pp. 196–201, 2008.

M. Akahane, H. Shigematsu, M. Tadokoro et al., “Scaffold-free cell sheet injection results in bone formation,” Journal of Tissue Engineering and Regenerative Medicine, vol. 4, no. 5, pp. 404–411, 2010.

A. Nakamura, M. Akahane, H. Shigematsu et al., “Cell sheet transplantation of cultured mesenchymal stem cells enhances bone formation in a rat nonunion model,” Bone, vol. 46, no. 2, pp. 418–424, 2010.

J. E. Dennis and A. I. Caplan, “Porous ceramic vehicles for rat-marrow-derived (Rattus norvegicus) osteogenic cell delivery: effects of pre-treatment with fibronectin or laminin.,” The Journal of oral implantology, vol. 19, no. 2, pp. 106–136, 1993.

D. Woodbury, E. J. Schwarz, D. J. Prockop, and I. B. Black, “Adult rat and human bone marrow stromal cells differentiate into neurons,” Journal of Neuroscience Research, vol. 61, no. 4, pp. 364–370, 2000.

Y. Tohma, H. Ohgushi, T. Morishita et al., “Bone marrow-derived mesenchymal cells can rescue osteogenic capacity of devitalized autologous bone,” Journal of Tissue Engineering and Regenerative Medicine, vol. 2, no. 1, pp. 61–68, 2008.

K. Hanada, J. E. Dennis, and A. I. Caplan, “Stimulatory effects of basic fibroblast growth factor and bone morphogenetic protein-2 on osteogenic differentiation of rat bone marrow-derived mesenchymal stem cells,” Journal of Bone and Mineral Research, vol. 12, no. 10, pp. 1606–1614, 1997.

M. Akahane, H. Ohgushi, S. Kuriyama, T. Akahane, and Y. Takakura, “Hydroxyapatite ceramics as a carrier of gene-transduced bone marrow cells,” Journal of Orthopaedic Science, vol. 7, no. 6, pp. 677–682, 2002.

C. Maniatopoulos, J. Sodek, and A. H. Melcher, “Bone formation in vitro by stromal cells obtained from bone marrow of young adult rats,” Cell and Tissue Research, vol. 254, no. 2, pp. 317–330, 1988.

H. Ohgushi, S. Tamai, Y. Dohi, T. Katuda, S. Tabata, and Y. Suwa, “In vitro bone formation by rat marrow cell culture,” Journal of Biomedical Materials Research, vol. 32, no. 3, pp. 333–340, 1996.

D. W. Hutmacher, “Scaffold design and fabrication technologies for engineering tissues—state of the art and future perspectives,” Journal of Biomaterials Science, Polymer Edition, vol. 12, no. 1, pp. 107–124, 2001.

M. Akahane, H. Ohgushi, T. Yoshikawa et al., “Osteogenic phenotype expression of allogeneic rat marrow cells in porous hydroxyapatite ceramics,” Journal of Bone and Mineral Research, vol. 14, no. 4, pp. 561–568, 1999.

H. Tsuchiya, S. L. Wan, K. Sakayama, N. Yamamoto, H. Nishida, and K. Tomita, “Reconstruction using an autograft containing tumour treated by liquid nitrogen,” The Journal of Bone & Joint Surgery—British Volume, vol. 87, no. 2, pp. 218–225, 2005.

K. Igarashi, N. Yamamoto, T. Shirai et al., “The long-term outcome following the use of frozen autograft treated with liquid nitrogen in the management of bone and soft-tissue sarcomas,” The Bone & Joint Journal, vol. 96, no. 4, pp. 555–561, 2014.

P. Paholpak, W. Sirichativapee, T. Wisanuyotin, W. Kosuwon, and P. Jeeravipoolvarn, “Clinical results of primary malignant musculoskeletal tumor treated by wide resection and recycling autograft reconstruction using liquid nitrogen,” Asia-Pacific Journal of Clinical Oncology, 2014.