BioMed Research International
Volume 2015 (2015), Article ID 780451, 8 pages
http://dx.doi.org/10.1155/2015/780451

Clinical Study

A Minimally Invasive Endoscopic Surgery for Infectious Spondylodiscitis of the Thoracic and Upper Lumbar Spine in Immunocompromised Patients

Hsin-Chuan Chen,¹ Teng-Le Huang,2,3,4 Yen-Jen Chen,5,6 Hsi-Kai Tsou,7,8 Wei-Ching Lin,6,9 Chih-Hung Hung,5,10 Chun-Hao Tsai,5,6 Horng-Chaung Hsu,5,6 and Hsien-Te Chen5,11

¹Department of Orthopedic Surgery, Show Chwan Memorial Hospital, No. 542, Section 1, Zhongshan Road, Changhua City, Changhua County 500, Taiwan
²Department of Orthopedics, Tainan Municipal An-Nan Hospital-China Medical University, No. 66, Section 2, Changhe Road, Annan District, Tainan City 709, Taiwan
³Department of Bioscience Technology, College of Science, Chung Yuan Christian University, No. 200 Chung Pei Road, Chung Li District, Taoyuan City 320, Taiwan
⁴Department of Sports Medicine, College of Health Care, China Medical University, No. 91, Hsueh-Shih Road, North District, Taichung 404, Taiwan
⁵Department of Orthopedic Surgery, China Medical University Hospital, No. 2 Yuhder Road, North District, Taichung 404, Taiwan
⁶School of Medicine, China Medical University, No. 91 Hsueh-Shih Road, North District, Taichung 404, Taiwan
⁷Functional Neurosurgery Division, Neurological Institute, Taichung Veterans General Hospital, 1650 Taiwan Boulevard Section 4, Taichung 407, Taiwan
⁸Department of Early Childhood Care and Education, Jen-Teh Junior College of Medicine, Nursing and Management, No. 79-9 Sha-Luen Hu, Xi-Zhou Li, Hou-Loung Town, Miaoli County 356, Taiwan
⁹Department of Radiology, China Medical University Hospital, No. 2 Yuhder Road, North District, Taichung 404, Taiwan
¹⁰China Medical University, No. 91 Hsueh-Shih Road, North District, Taichung 404, Taiwan
¹¹School of Chinese Medicine, College of Chinese Medicine, China Medical University, No. 91 Hsueh-Shih Road, North District, Taichung 404, Taiwan

Received 2 January 2015; Accepted 20 April 2015

Academic Editor: Yi Liu

Copyright © 2015 Hsin-Chuan Chen et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

This study evaluates the safety and effectiveness of computed tomography- (CT-) assisted endoscopic surgery in the treatment of infectious spondylodiscitis of the thoracic and upper lumbar spine in immunocompromised patients. From October 2006 to March 2014, a total of 41 patients with infectious spondylodiscitis underwent percutaneous endoscopic surgery under local anesthesia, and 13 lesions from 13 patients on the thoracic or upper lumbar spine were selected for evaluation. A CT-guided catheter was placed before percutaneous endoscopic surgery as a guide to avoid injury to visceral organs, major vessels, and the spinal cord. All 13 patients had quick pain relief after endoscopic surgery without complications. The bacterial culture rate was 77%. Inflammatory parameters returned to normal after adequate antibiotic treatment. Postoperative radiographs showed no significant kyphotic deformity when compared with preoperative films. As of the last follow-up visit, no recurrent infections were noted. Traditional transthoracic or diaphragmatic surgery with or without posterior instrumentation is associated with high rates of morbidity and mortality, especially in elderly patients, patients with multiple comorbidities, or immunocompromised patients. Percutaneous endoscopic surgery assisted by a CT-guided catheter provides a safe and effective alternative treatment for infectious spondylodiscitis of the thoracic and upper lumbar spine.

1. Introduction

In recent years, the incidence of infectious spondylodiscitis has increased due to vast improvements in medical care and prolonged life expectancies. The condition is associated with advanced age, intravenous drug use, immunocompromised status, and significant medical comorbidities [1]. Identifying the causative pathogen is the key to treatment. Computed tomography- (CT-) guided biopsy and drainage are the standard procedure for identifying causative pathogens. However, the pathogen-identification rate varies among studies [2–4]. Surgical intervention is indicated if neurological deficit, progressive deformity, failure to respond to conservative treatment, or the need to obtain specimens to identify causative pathogens is present. However, traditional anterior debridement and reconstruction with or without posterior instrumentation are associated with high rates of morbidity and mortality, especially in elderly immunocompromised patients and patients with multiple comorbidities. Percutaneous endoscopic discectomy, debridement, and drainage provide a minimally invasive surgical choice for the treatment of infectious spondylodiscitis [4–6]. This method provides adequate debridement and fast pain relief and has a relatively high pathogen-identification rate [4, 7, 8]. However, in the upper lumbar and thoracic spine, percutaneous endoscopy is associated with visceral organ damage, major vessel injury, and the spinal cord injury, which limits the use of this procedure in these areas [9].

A CT-guided catheter was placed before percutaneous endoscopic surgery as a guide to avoid injury to visceral organs, major vessels, and the spinal cord. We analyzed the clinical outcomes, inflammatory parameters, and radiographic findings for 13 lesions that occurred on thoracic or upper lumbar spine.

2. Materials and Methods

2.1. Patient Population

From October 2006 to March 2014, a total of 41 patients with infective spondylodiscitis underwent percutaneous endoscopic surgery with local anesthesia and 13 patients’ lesions on the thoracic or upper lumbar spine were selected for evaluation (Table 1). A CT-guided angiographic catheter was placed before percutaneous endoscopic surgery as a guide to avoid injury to visceral organs, major vessels, and the spinal cord. Of the 13 patients evaluated, 5 were men and 8 were women. Their mean age was 65.6 years (range, 49–84 years). The affected level ranged from T11-T12 to L1-L2 in 11 cases, T8-T9 in 1 case, and T9-T10 in the other case. All patients underwent plain film radiography and enhanced magnetic resonance imaging (MRI) of the involved spine, which revealed evidence of infectious spondylodiscitis (Figure 1). Most patients had high inflammatory markers (C-reactive protein (CRP) and erythrocyte sedimentation rate (ESR)) and complained of severe back pain. They also had a variety of comorbidities, including renal failure, heart failure, rheumatic arthritis, liver cirrhosis, polycystic liver posttransplantation, and diabetes (Table 1).

Table 1: Patient demographic data.

Patient number
Age
Gender
Level
Neurological deficit
Associated medical illness

1
71
F
L1-2
Frankle D
Uremia, CHF, RHD

2
60
M
T11-12
Frankle D
CAD, DM, CHF, asthma

3
67
F
T12
Nil
Uremia, DM

4
65
F
L1-2
Nil
HTN, RA

5
55
F
T11-12
Nil
DM, HTN

6
73
F
T12-L1
Mild sensory deficit
DM

7
71
F
T11-T12
Nil
DM, liver cirrhosis, burst fracture T11 vertebra

8
71
M
L1
Frankle D
None

9
84
F
T9-10
Frankle D
HTN, CHF, PSVT

10
63
M
T12-L1-2
Mild sensory deficit
Liver cirrhosis, asthma

11
52
M
L1-2
Nil
BPH

12
49
F
L1-2
Nil
Polycystic liver, kidney s/p liver transplantation

13
72
M
T8-9
Mild sensory deficit
DM

Average
65.6

Standard deviation
9.73

CHF: congestive heart failure, RHD: rheumatic heart disease, CAD: coronary artery disease, DM: diabetes mellitus, HTN: hypertension, RA: rheumatoid arthritis, PSVT: paroxysmal supraventricular tachycardia, and BPH: benign prostate hypertrophy.

(a)

(b)

(c)

Figure 1: MRI evidence of T8-T9 infectious spondylodiscitis in patient number 13 in (a) coronal, (b) sagittal, and (c) axial view. T1-weighted signal with gadolinium contrast of spine MRI showed increased signal at the T8 and T9 vertebral bodies and also ring enhancement of the destroyed T8-T9 intervertebral disc.

2.2. Surgical Procedures

The CT-guided biopsy and catheter placement were performed by an experienced radiologist on the day of or the day before the scheduled percutaneous endoscopic surgery (Figure 2). The patient was positioned prone, and local anesthesia with 2% lidocaine was injected into the area of needle insertion. A 6-in-long number 11G-wide multiple side hole bone puncture needle was inserted into the lesion site with CT guidance. A J guidewire was then inserted via the bone biopsy needle. Finally, a number 5 Fr C1 angiographic catheter (Cook, Bloomington, USA) was inserted along the J guidewire and left in the infective area after guidewire removal. The specimen obtained during the procedure was sent for bacterial, tuberculosis (TB), and fungal cultures and pathologic analysis.

(a)

(b)

(c)

Figure 2: CT-guided catheterization in T8-T9 intervertebral disc: (a) anteroposterior, (b) lateral projection of the catheter during the procedure, and (c) axial illustration of the catheter in the intervertebral disc with CT-guided procedure.

Percutaneous endoscopic surgery was then performed after placement of the CT-guided angiographic catheter. The patient was positioned prone on a spine-operating table with the abdomen hanging free. The patient was under intravenous pain control but was kept awake during the endoscopic surgery so that he or she could respond well when the dura or nerve roots were irritated. Local anesthesia was also performed with 2% lidocaine around the area of endoscopic insertion. A percutaneous endoscopic guidewire was inserted directly through the CT-guided number 5 Fr C1 angiographic catheter and advanced slowly with the assistance of fluoroscopy to ensure that the wire was targeting the infective area without penetrating the angiographic catheter wall and injuring any related structures. After the guidewire was set in the infected area, the number 5 Fr C1 angiographic catheter was then removed. A dilator was inserted along the endoscopic guidewire, and the position was again checked under fluoroscopy. The infected disc and vertebra were harvested for bacterial, fungal, and TB cultures by using endoscopic microrongeurs and microscissors before starting irrigation. After adequate tissue sampling for culture, radical debridement, sequestrectomy, and irrigation could be performed with the aid of direct endoscope vision and fluoroscopy. The Surgitron, a high-voltage bipolar probe (Ellman Innovations, New York, USA), was used for thermocoagulation of infected tissue and bleeders. All the operating instruments and endoscopic systems were supplied by Richard and Wolf (Knittlingen, Germany). The high-resolution endoscope has a diameter of 8 mm with a 4.1 mm intraendoscopic working channel. The angle of vision is 25°. The working sheath has an 8.0 mm outer diameter and a beveled opening, both of which enable the creation of visual and working fields in an area without a clear, anatomically preformed cavity. More than 4 L normal saline with 1 g cefazolin in each liter was used for pressured irrigation and drainage of infected materials and pus. A 1/4 in drainage tube was left in the infected area at the end of surgery for further drainage of infective materials, pus, and exudates (Figure 3).

(a)

(b)

(c)

Figure 3: (a) Intraoperative fluoroscopic image demonstrated the working sheath and endoscope within the intervertebral disc space, (b) immediate postoperative AP view demonstrated a 1/4 inch drainage tube in the intervertebral space, and (c) postoperative 3-month AP view revealed partially united T8-T9 vertebral body.

2.3. Postoperative Care

The 1/4 in drainage tube was left in place for at least 7 days until the daily drainage amount was less than 5 mL. Effective antibiotics were administered intravenously for patients with known causative pathogens before surgery. For patients with unknown pathogens, empirical antibiotics were administered immediately after surgery. These were switched to specific antibiotics after identification of the causative pathogen was made from intraoperative tissue or pus culture. Intravenous antibiotics were used for 4 to 6 weeks according to follow-up inflammatory markers. The patients were then switched to oral antibiotics and discontinued when the inflammatory markers were within a normal range. The patient remained in bed for 2 weeks after surgery. A rigid thoracolumbar spinal orthosis was then used for ambulation. The orthosis was used until radiographs showed evidence of bone union or prominent syndesmophyte formation along the anterior lateral aspect of the infected level.

2.4. Clinical Evaluation

Preoperative clinical symptoms and signs were recorded. Pain was evaluated with a visual analogue scale (VAS; 0–10) before and after surgery at 1 month, 3 months, and 6 months. The ESR and CRP levels were checked before surgery and every week after surgery. Spine plain radiography was performed immediately after surgery and at 1 month, 3 months, 6 months, and 1 year after surgery. Any evidence of spinal kyphotic deformity due to infectious spondylodiscitis was recorded.

3. Results

All patients had prominent back pain (VAS = 9.23) before surgery, and all reported quick pain relief (VAS = 2.31) after endoscopic surgery and antibiotic treatment (Table 4). The causative pathogens were identified in 10 patients (77% culture rate) postoperatively (Table 2), and effective antibiotics were administered according to the sensitivity test of isolated pathogens. The blood culture result of patient 7 was methicillin-sensitive Staphylococcus aureus infection, but the results of the endoscopic specimen were negative. Oxacillin was used for infection control according to the sensitivity test report of blood culture. The other 2 patients had no known culture results, and empirical antibiotics were maintained until the inflammatory parameters returned to normal ranges. In patient 9, anti-TB medication was maintained for 9 months according to TB treatment protocol. The ESR and CRP levels of all patients decreased significantly after endoscopic surgery and 3 months of intravenous and oral antibiotic treatment. No patient had relapse of spinal infection at the treated level during the follow-up period (Table 3).

Table 2: Surgical procedures.

Patient
Level
Procedures
Bacteria culture

L1-L2
CT-guided catheter + PEDD
Delftia acidovorans

T11-T12
CT-guided catheter + PEDD
No growth

3
T12
CT-guided catheter + PEDD
No growth

4
L1-L2
CT-guided catheter + PEDD
Escherichia coli (ESBL)

5
T11-T12
CT-guided catheter + PEDD
Staphylococcus aureus

6
T12-L1
CT-guided catheter + PEDD
Staphylococcus aureus (MRSA)

7
T11-T12
CT-guided catheter + PEDD
No growth

L1
CT-guided catheter + PEDD
Streptococcus anginosus

9
T9-10
CT-guided catheter + PEDD
Mycobacteria tuberculosis complex

10
T12-L1-2
CT-guided catheter + PEDD
Klebsiella pneumoniae

11
L1-L2
CT-guided catheter + PEDD
Staphylococcus aureus

12
L1-L2
CT-guided catheter + PEDD
Candida albicans, Ecoli

13
T8-9
CT-guided catheter + PEDD
Klebsiella pneumoniae

PEDD: percutaneous endoscopic discectomy drainage.

Dying of other medical problems during next few years.

Table 3: ESR and CRP levels before and after surgery.

Patient number
ESR (mm/1 hr)
CRP (mg/dL)

Preop
Postop 1 m
Postop 3 m
Last F/U
Preop
Postop 1 m
Postop 3 m

1
51
67
20
37
6.62
0.38
2.84

2
76
18
21
13
22.16
0.15
0.18

3
115
86
78
72
32.11
2.70
0.60

4
79
41
9
8
4.96
0.45
0.03

5
108
71
25
21
6.33
0.31
0.08

6
123
115
64
36
23.72
1.24
0.55

7
112
93
86
84
1.44
0.18
0.29

8
75
42
14
7
18.19
2.80
0.95

9
53
28
18
28
6.61
1.94
0.75

10
125
85
37
30
0.19
0.07
0.06

11
92
16
2
2
7.45
0.23
0.12

12
108
74
50
9
4.84
0.70
0.11

13
104
12
11
11
16.53
0.25
0.35

Average
93.02
57.53
33.46
27.53
11.63
0.88
0.53

Standard deviation
25.00
33.44
27.51
25.26
9.85
0.98
0.75

Table 4: Back pain level before and after surgery.

Patient number
Visual analog scale (0–10)
Complication

Preop
Postop 1 m
Postop 3 m

1
10
5
2
Nil

2
9
4
2
Nil

3
10
5
3
Nil

4
10
4
1
Nil

5
10
5
4
Nil

6
10
5
3
Nil

7
10
4
3
Nil

8
9
5
1
Nil

9
9
4
3
Nil

10
10
5
4
Nil

11
8
1
1
Nil

12
8
3
2
Nil

13
7
3
1
Nil

Average
9.23
4.08
2.31

Standard deviation
1.01
1.19
1.11

No surgery-related complications were noted during the follow-up period (average, 42.46 months; range, 8–70 months). No recurrence of infection developed in these patients, and no open spinal surgery was needed. Deformity of the spine was evaluated from plain film radiographs obtained before and after surgery and at the last follow-up. The kyphotic angle was measured as the angle between the upper end plate of the first vertebral body above the involved level and the lower end plate of the first vertebral body below the involved level. Only 1 patient had a kyphotic change greater than 10°. The other 12 patients had no significant changes in spinal deformity (Table 5; Figure 4).

Table 5: Changes in kyphosis angle (°).

Patient number
Level
Preoperative
Postoperative
Last F/U

1
L1-2
−6°
−2°
−1°

2
T11-12
10°
8°
10°

3
T12
16°
19°
19°

4
L1-2
2°
−2°
−1°

5
T11-12
6°
4°
1°

6
T12-L1
13°
13°
24°

7
T11-12
11°
14°
12°

8
L1
12°
5°
4°

9
T9-10
0°
3°
3°

10
T12-L1-2
−13°
−12°
−12°

11
L1-2
7°
8°
12°

12
L1-2
17°
16°
16°

13
T8-9
12°
14°
15°

Average

8.69
6.77
7.85

Standard deviation

6.68
8.72
9.91

Kyphosis angle was obtained by measuring the sagittal angles with the Cobb method.

(a)

(b)

Figure 4: The plain films 6 months after operation. (a) AP view and (b) lateral view revealed prominent syndesmophyte formation at anterior and lateral aspects of infective area without significant kyphotic deformity.

4. Discussion

Infectious spondylodiscitis is an increasingly prevalent disease, especially in elderly or immunocompromised patients or those with medical comorbidities. Conservative treatment consisting of antibiotic administration and bed rest is the standard choice in cases of mild infection. CT-guided biopsy is a less invasive procedure used to obtain specimens for pathogen identification. Drainage function also contributes to infection control. However, the rate of pathogen identification varies widely, from 36% to 91% [2–4, 10–12], and the rate of successful infection control is also unsatisfactory. When conservative treatment fails, the treatment approach shifts to open surgery. However, traditional anterior debridement and reconstruction with or without posterior instrumentation are a major operation with a high rate of postoperative complications, especially in immunocompromised patients with many comorbid diseases or in the elderly.

Percutaneous endoscopic discectomy was first applied for lumbar disc herniation in the 1980s and now is a well-established surgical procedure. This procedure has also been used to treat infectious spondylodiscitis in recent years and has proved to be as effective as open surgery for infection control [4, 6, 8, 13]. However, percutaneous endoscopic surgery for infectious spondylodiscitis has been limited to cases with lower lumbar spine infection for reasons of operative safety [7]. Percutaneous endoscopic surgery carries risks of injury to the surrounding visceral organs, the spinal cord, and major vessels of the thoracic and upper lumbar spine when used to treat lesions above the L2 level. In this study, a combination of a CT-guided angiographic catheter and percutaneous endoscopic surgery was found to be effective and safe for the treatment of infectious spondylodiscitis of the upper lumbar and thoracic spine. CT provides real-time images that can be used to insert the guidewire and catheter, which helps prevent injury to the spinal cord, major vessels, or visceral organs. Once the endoscope is inserted safely along the CT-guided catheter, percutaneous endoscopic surgery can be performed safely to carry out radical debridement or obtain a sufficient specimen culture, and a large-diameter drainage tube can be left in the infected level. Infection was well controlled with antibiotics in all patients, regardless of the culture results. No complications occurred during the operation or follow-up period. Moreover, no open surgery was needed in these patients, whereas anterior debridement and fusion surgery was previously performed in 19% to 25% of patients [4, 6].

In view of the risks of general anesthesia and traditional major surgery for infectious spondylodiscitis of the thoracic and upper lumbar spine, minimally invasive endoscopic surgery represents a good alternative treatment for immunocompromised patients. Percutaneous endoscopic surgery assisted by a CT-guided catheter is a safe and effective operation using local anesthesia and a small incision wound (<1 cm).

5. Conclusion

Percutaneous endoscopic discectomy, debridement, irrigation, and drainage with the assistance of a CT-guided catheter are a safe and effective alternative treatment for infectious spondylodiscitis of the thoracic and upper lumbar spine. It prevents many complications normally associated with percutaneous endoscopic surgery in the thoracic and upper lumbar area. Endoscopic surgery not only has a high rate of the causative-pathogen identification but also provides good infection control and pain relief, even if causative pathogen cannot be identified. The safe and minimally invasive nature of this procedure broadens the application of operative treatment for infectious spondylodiscitis, even in the thoracic and upper lumbar level, and prevents progressive deformity when prolonged antibiotic treatment is used. We have more confidence when treating patients in poor health, immunocompromised or elderly patients, and can now provide a more promising and safe treatment strategy. Motor weakness of the lower limbs may be the only contraindication for this procedure.

Conflict of Interests

The authors declare no conflict of interests regarding the publication of this paper.

References

J. S. Fischgrund, OKU 9: Orthopaedic Knowledge Update, American Academy of Orthopaedic Surgeons, Rosemont, Ill, USA, 2008.

S.-C. Yang, T.-S. Fu, L.-H. Chen, W.-J. Chen, and Y.-K. Tu, “Identifying pathogens of spondylodiscitis: percutaneous endoscopy or CT-guided biopsy,” Clinical Orthopaedics and Related Research, vol. 466, no. 12, pp. 3086–3092, 2008.

F. S. Chew and M. J. Kline, “Diagnostic yield of CT-guided percutaneous aspiration procedures in suspected spontaneous infectious diskitis,” Radiology, vol. 218, no. 1, pp. 211–214, 2001.

T.-S. Fu, L.-H. Chen, and W.-J. Chen, “Minimally invasive percutaneous endoscopic discectomy and drainage for infectious spondylodiscitis,” Biomedical Journal, vol. 36, no. 4, pp. 168–174, 2013.

M. Ito, K. Abumi, Y. Kotani, K. Kadoya, and A. Minami, “Clinical outcome of posterolateral endoscopic surgery for pyogenic spondylodiscitis: results of 15 patients with serious comorbid conditions,” Spine, vol. 32, no. 2, pp. 200–206, 2007.

S.-C. Yang, T.-S. Fu, H.-S. Chen, Y.-H. Kao, S.-W. Yu, and Y.-K. Tu, “Minimally invasive endoscopic treatment for lumbar infectious spondylitis: a retrospective study in a tertiary referral center,” BMC Musculoskeletal Disorders, vol. 15, no. 1, article 105, 2014.

S.-C. Yang, T.-S. Fu, L.-H. Chen, C.-C. Niu, P.-L. Lai, and W.-J. Chen, “Percutaneous endoscopic discectomy and drainage for infectious spondylitis,” International Orthopaedics, vol. 31, no. 3, pp. 367–373, 2007.

G. Bavinzski, A. Schoeggl, S. Trattnig et al., “Microsurgical management of postoperative disc space infection,” Neurosurgical Review, vol. 26, no. 2, pp. 102–107, 2003.

J. C. Chiu, N. Javidan, and J. Thacker, “Posteriorlateral endoscopic thoracic microdecompressive discectomy,” The Internet Journal of Minimally Invasive Spinal Technology, vol. 2, no. 3, 2008.

L. M. Parker, P. C. McAfee, I. L. Fedder, J. C. Weis, and W. P. Geis, “Minimally invasive surgical techniques to treat spine infections,” Orthopedic Clinics of North America, vol. 27, no. 1, pp. 183–199, 1996.

J. J. Rankine, D. A. Barron, P. Robinson, P. A. Millner, and R. A. Dickson, “Therapeutic impact of percutaneous spinal biopsy in spinal infection,” Postgraduate Medical Journal, vol. 80, no. 948, pp. 607–609, 2004.

G. Staatz, G. B. Adam, P. Keulers, D. Vorwerk, and R. W. Günther, “Spondylodiskitic abscesses: CT-guided percutaneous catheter drainage,” Radiology, vol. 208, no. 2, pp. 363–367, 1998.

A. G. Hadjipavlou, J. T. Mader, J. T. Necessary, and A. J. Muffoletto, “Hematogenous pyogenic spinal infections and their surgical management,” Spine, vol. 25, no. 13, pp. 1668–1679, 2000.