BioMed Research International
Volume 2015 (2015), Article ID 818656, 8 pages
http://dx.doi.org/10.1155/2015/818656

Research Article

Rheology as a Tool to Predict the Release of Alpha-Lipoic Acid from Emulsions Used for the Prevention of Skin Aging

Vera Lucia Borges Isaac,¹ Bruna Galdorfini Chiari-Andréo,1,2 Joana Marques Marto,³ Jemima Daniela Dias Moraes,¹ Beatriz Alves Leone,¹ Marcos Antonio Corrêa,¹ and Helena Margarida Ribeiro³

¹Faculdade de Ciências Farmacêuticas, UNESP - Univ Estadual Paulista, LaCos, Rodovia Araraquara Jau, Km 1, CEP 14800-850 Araraquara, SP, Brazil
²Centro Universitário de Araraquara (UNIARA), Rua Carlos Gomes 1338, 14801-340 Araraquara, SP, Brazil
³Research Institute for Medicines and Pharmaceutical Sciences (iMed.UL), Faculty of Pharmacy, University of Lisbon, Avenida Prof. Gama Pinto, 1649-003 Lisbon, Portugal

Received 29 July 2015; Revised 26 October 2015; Accepted 3 November 2015

Academic Editor: Michael D. Coleman

Copyright © 2015 Vera Lucia Borges Isaac et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract

The availability of an active substance through the skin depends basically on two consecutive steps: the release of this substance from the vehicle and its subsequent permeation through the skin. Hence, studies on the specific properties of vehicles, such as their rheological behavior, are of great interest in the field of dermatological products. Recent studies have shown the influence of the rheological features of a vehicle on the release of drugs and active compounds from the formulation. In this context, the aim of this study was to evaluate the influence of the rheological features of two different emulsion formulations on the release of alpha-lipoic acid. Alpha-lipoic acid (ALA) was chosen for this study because of its antioxidant characteristics, which could be useful for the prevention of skin diseases and aging. The rheological and mechanical behavior and the in vitro release profile were assayed. The results showed that rheological features, such as viscosity, thixotropy, and compliance, strongly influenced the release of ALA from the emulsion and that the presence of a hydrophilic polymer in one of the emulsions was an important factor affecting the rheology and, therefore, the release of ALA.

1. Introduction

Many factors are involved in the percutaneous absorption process and a number of studies have been performed in the search for alternatives and ways of improving this process, including research about the use of permeation enhancers in topical formulations and the development of new drug delivery systems [1–7].

The release characteristics of a drug from a dermatological vehicle can be assessed by studying the in vitro release profile, which provides very useful data [8, 9]. Thus, during the development of dermatological products, it is adequate to employ in vitro release tests to select vehicles that can provide reasonable therapeutic activity.

An important barrier to the percutaneous absorption process is the protective layers of the stratum corneum whose composition results in many drugs being prevented from crossing this barrier and reaching their site of action [10–12].

However, to be effective, a topical formulation must be able to allow the release of the active compound(s) or drug, and this ingredient needs to have the ability of penetrating the skin at suitable concentrations to exert its biological activity [13, 14].

Active compounds incorporated in unsuitable vehicles may penetrate the skin little or not at all, so the vehicle is a limiting factor, influencing the pharmaceutical performance. Studies have shown that the rheological properties of vehicles can influence the release profile of drugs, being a crucial step for the penetration of the skin by the active substance [15–18]. Also, other physical-chemical characteristics have been studied aiming at elucidating the interferences of them in the process of drug release, such as the surface free energy [19].

This subject was investigated earlier by Barry (1983) [13] who criticized several scientific studies for not considering the correlation between the viscosity of a preparation and the rate of drug release because, according to the author, the rheological characteristics of a product often affect the release of active compounds.

Over the last decade, research has afforded increasing importance to alpha-lipoic acid (1,2-dithiolane-3-pentanoic acid) as a powerful antioxidant, effective in scavenging free radicals, including reactive oxygen species, such as superoxide ions, hydroxyl radicals, peroxyl radicals, and singlet oxygen [20]. Alpha-lipoic acid (ALA) is a sulfhydryl compound found naturally in virtually all plant and animal species and in both prokaryotic and eukaryotic cells [21]. In the human body, it is bonded to lysine residues and acts as a cofactor in various multienzyme complexes [22].

Nevertheless, there is often little or no free ALA in tissues [23], so a topical antioxidant formulation containing this natural antioxidant could be used to protect the skin against the effects of ultraviolet rays, such as photoaging and skin cancer [24].

To investigate the influence of the rheological behavior of two different emulsions on the release of active substances from them, alpha-lipoic acid (ALA) was employed as a model compound in this study.

In light of the above statements, the aim of this study was to correlate the rheological behavior and the release profile of two different emulsions containing ALA (see Supplementary Material available online at http://dx.doi.org/10.1155/2015/818656).

2. Materials and Methods

2.1. Preparation of Emulsions

Two O/W emulsions (A and B) (Table 1) were prepared. The oily phase (Phase A) and the aqueous phase (Phase B) were heated to °C separately. The aqueous phase was poured into the oily phase with continuous stirring until cooling.

Table 1: Qualitative and quantitative (%w/w) composition of emulsions A and B.

Component (INCI name)
A
B

Phase A

    Behenyl alcohol, Polyglyceryl-10
   Pentastearate, Sodium stearoyl lactylate
4.00
—

    Caprylic/capric triglyceride
2.00
—

    Octyl stearate
1.00
—

    Dibutyl adipate
4.00
—

    Ceteareth-20
—
3.00

    Cetearyl alcohol
—
3.00

    Cetyl palmitate
—
3.00

    Isopropyl myristate
—
4.00

    PEG-75 lanolin
—
2.00

    Dimethicone copolyol
—
1.00

Phase B

    BHT
0.10
0.10

    Carbomer
2.00
—

    EDTA
0.10
0.10

    Methylparaben
0.18
0.18

    Propylparaben
0.02
0.02

    Metabisulfite
0.15
0.15

    Triethanolamine
pH 6.00
pH 6.00

    Water
80.45
77.45

Phase C

    Propylene glycol
4.00
4.00

    Alpha-lipoic acid
2.00
2.00

The ALA, at 2%, was dispersed separately in the propylene glycol (Phase C) used in each formulation. This solution was then poured into the fresh emulsion while still hot and mixed well to achieve a completely homogeneous emulsion.

2.2. Structure Analysis of Emulsions

2.2.1. Droplet Size Analysis of Emulsions

The size distribution of the emulsions was measured by light scattering using a Malvern Mastersizer 2000 (Malvern Instruments, Worcestershire, UK) coupled with a Hydro S accessory. For a correct turbidity, about 0.5 g of each formulation (A and B), corresponding to an obscuration between 10% and 20%, was added in the sample chamber containing 120 to 150 mL of water using a stirrer at 700 rpm. Data was expressed in terms of relative distribution of volume of particles and given as diameter values corresponding to percentiles of 10%, 50%, and 90% (mean ± SD; ). The span value is a statistical parameter useful for characterizing the wideness of the particle size distribution (see the following equation):

2.2.2. Microscopy Analysis

A computerized image analysis device was used for the microscopic observations, connected to an Olympus BX51 microscope in bright field (Olympus, Japan). Samples were examined after preparation and storage at room temperature.

2.3. Study of Rheological Behavior

The rheological tests were performed with a Haake RS-1 Rheometer, using the cone-plate sensor (C35/2°Ti). In the first test, flow curves were generated by ramping the shear rate from 0 to 100 s⁻¹ in 120 seconds (ascent curve) and then from 100 to 0 s⁻¹ in 120 seconds (descent curve) and recording the shear stress throughout.

Next, the stress sweep test was conducted at a frequency of 1 Hz, with a range of shear stress from 0 to 50 Pa, and the frequency sweep test was performed over a frequency range from 0.01 to 10 Hz, at a shear stress of 1 Pa for emulsion A and 0.5 Pa for emulsion B. The creep and recovery test was carried out with a shear stress of 1 Pa for emulsion A and 0.5 Pa for emulsion B, allowing 300 seconds for creep and 300 seconds for relaxation.

All tests were performed on samples of about 1 g, at °C. All experiments were performed in triplicate.

2.4. Surface Tension

Surface tension measurements of the emulsions using a Krüss Tensiometer K12 (Germany) at 25°C were performed. The Wilhelmy plate technique was applied in the Wilhelmy Constant Run programme mode. A platinum plate was partially immersed into the surface layer of an aqueous phase and the monitored surface tension decreased with time, while the plate remained into position. The analysis ceased when the surface tension value was stabilized. Prior to each analysis, the surface tension of bidistilled water (Strom) was measured as control.

2.5. In Vitro Release Assay

To assess the release profile of the formulations, Franz-type diffusion cells, with a release area of 1.77 cm², were used. The receptor solution was sodium phosphate buffer (pH 7.4) containing 1% of polysorbate 80, which was maintained at °C and stirred at 300 rpm throughout the experimental period. The diffusion cell was assembled with hydrophilic synthetic membranes of cellulose acetate, of pore size 0.45 μm (Sigma-Aldrich, USA), separating the two compartments. Approximately 270 mg of emulsion A or B, containing 2% alpha-lipoic acid, was spread evenly over the membrane. A base emulsion of each, without ALA, was used as the blank. Samples were collected from the receptor solution after 2, 4, and 8 hours and analyzed by UV spectrophotometry at 334 nm.

An analytical curve was constructed with a certified reference solution of 2 mg/mL of alpha-lipoic acid in the receptor medium. This stock solution was diluted in the same medium to obtain solutions at concentrations of 1.4, 1.2, 1.0, 0.8, 0.6, 0.4, and 0.2 mg/mL, which were analysed in the UV spectrophotometer (Hitachi U-2001) at 334 nm.

Release data were fitted to zero-order, first-order, and Higuchi kinetic models.

2.6. Statistical Analysis

All analysis was performed at least in triplicate; average values and standard deviations were calculated. ANOVA and Tukey’s test were used to differentiate release data. Differences were considered to be significant when .

3. Results and Discussion

3.1. Structure Analysis of Emulsions

3.1.1. Droplet Size Analysis of Emulsions

The presence of carbomer ingredient influences the droplet size distribution. Both emulsions present a bimodal population (Figure 1). Nevertheless, the droplet size (90% of the droplets) immediately after preparation is different for both emulsions ( μm and  μm for emulsions A and B, resp.) (Table 2). Emulsion B seems to present a higher droplet size dispersion which was translated by a higher standard deviation. For bimodal dispersions of droplets it is important to know the composition of the two populations. If the volume fractions of particles are the same, the viscosity of the bimodal dispersion can be lower than that of the monomodal system even when a decrease in the particle size occurs. However, according to Pal (1996) [25], the particle-size effect on rheological measurements is particularly important for emulsions with particles smaller than 1 μm, which is the case of emulsion A (Figure 1). Nonetheless, in general, the reduction in droplet size results in an increase in the viscosity and storage modulus of the emulsions, which suggested an enhancement in emulsion stability.

Table 2: Droplet size distribution of emulsions A and B storage at room temperature, (, mean ± SD).

Emulsion
Span

A
2.40 ± 0.09
3.36 ± 0.71
15.28 ± 0.80
40.07 ± 2.76

B
2.91 ± 0.28
14.31 ± 1.12
45.08 ± 3.00
145.48 ± 16.76

Figure 1: Droplet size distribution of emulsions A and B storage at room temperature.

3.1.2. Microscopy Analysis

The light microscopy images revealed that the size of the droplets and the microstructure of the systems depended on the emulsifiers and emollients used.

In emulsion A, several small inner drops of oil were observed in the water phase. The droplets presented a smaller and nonhomogeneous size (Figure 2). In emulsion B, greater inner oil droplets with a nonhomogeneous size were seen.

(a)

(b)

Figure 2: Photomicrographs of emulsions A (a) and B (b) (scale bar = 50 μm).

Concerning the carbomer-based formulation, the results showed a significant influence on the microstructure of the emulsions and the microscopy analysis is in accordance with droplet size distribution. Figure 2 proved that ingredients such as polymers can modify the microstructure of the emulsion by, probably, raising the viscosity of the continuous phase or by causing adhesion between droplets without coalescence.

3.2. Study of the Rheological Profile

Rheology could be used as a tool to assess parameters that help in the evaluation of release of active compounds from vehicles.

In a review study, Barry (1983) [13] cited several scientific studies, criticizing their neglect of the correlation between the viscosity of a preparation and its release because, according to the author, the rheological characteristics of a product can affect the release of the active ingredient. Despite the importance of determining the rheological properties of a semisolid, such as a gel, studies rarely correlated parameters such as viscosity with release data [13]. In that study, the author correlated plastic viscosity with the diffusion of active ingredients from agar gel and found that the viscosity was inversely proportional to the rate of release. In another study by Marriott (1996) [26], the rate of absorption of active agents through the skin was inversely proportional to the viscosity of the vehicle.

Flow curves, stress and frequency sweeps, and creep and recovery assays were carried out to understand the rheological behavior of the emulsions.

The flow curves (Figure 3) showed that the emulsions were non-Newtonian fluids, which means that their viscosity varies as the shear rate varies. This characteristic, the nonlinear relation between the shear stress and the shear rate, is typical of non-Newtonian behavior [27].

Figure 3: Flow curves of emulsions A and B.

The emulsions were also characterized as thixotropic, exhibiting a decrease in viscosity with increasing shear that is not completely recovered when the shear rate is ceased. It can be clearly seen that the hysteresis area of emulsion B is much larger than that of emulsion A (Table 3). This could influence the release rate of ALA [16], owing to the time necessary for the emulsion to recover its viscosity and initial structure when the shear rate that is imposed on it falls. Thus, active substances incorporated in more thixotropic systems have more time to be released faster in the period of low viscosity caused by the spreading of the emulsion over the skin by the consumer.

Table 3: Hysteresis areas of emulsions A and B (mean ± SD, ).

Emulsion
Hysteresis area (Pa/s)

A
256.60 ± 10.74

B
863.96 ± 40.20

Different letters mean statistically different values.

As it is possible to see also in Figure 3, emulsion A needs a higher shear stress to flow than emulsion B, showing that emulsion A is more structured than emulsion B, since it needs more shear stress per unit of area to be disrupted and flow.

The flow curve data were fitted to the Herschel-Bulkley rheological model. This model was chosen because it is a general power-law equation for non-Newtonian fluids [28] and includes a value for the yield stress, observed in the cosmetic emulsion studied. According to Schramm (2006) [27], rheological curve fitting allows confidence intervals to be set around the standard regression coefficients instead of comparing the standard curves with a specific flow, and thus it can be decided whether the material tested is within or outside the specifications of the model in question.

The Herschel-Bulkley model furnished the rheological parameters of yield stress (), behavior index (), consistency index (), and the correlation coefficient () for the model fitting. The correlation coefficient, which measures the proportion of total variation of the mean explained by the regression, was above 0.99 for all fitted curves, demonstrating that the model was highly appropriate.

The shear stress sweep precedes the frequency sweep and creep and recovery tests, making it possible to determine the values of shear stress, within a linear range, at which the sample does not suffer deformation (Figure 4), also called the linear viscoelastic region [29]. In the range from 0 to 5 Pa, sample A was not disrupted, while for sample B this was true in the range from 0 to 1.0 Pa. Thus, the values of remained linear within this region of linear viscoelasticity, which can therefore indicate the suitable shear stress to be used in frequency sweep and creep and recovery tests.

Figure 4: Shear stress sweeps of emulsions A and B.

Emulsion B exhibited higher and values than emulsion A, but when subjected to increasing shear stress, B was disrupted (both moduli fell) earlier than emulsion A. This reflects how much the systems are structured, since the higher linear viscoelastic region is the higher microstructural stability of the sample is [30].

The frequency sweep curves of emulsion A (Figure 5) showed that in the range tested (1–10 Hz) there was practically no variation in the elastic and viscous moduli. Furthermore, viscoelastic behavior was seen over the whole range, since (elastic modulus) was higher than (viscous modulus). The same relation is observed for emulsion B, but and values for emulsion B are higher than for emulsion A.

Figure 5: Frequency sweeps of emulsions A and B.

When a viscoelastic material has a storage (or elastic) modulus higher than the viscous (or loss) modulus, the shear energy is temporarily stored during the test and can be retrieved later as usually occurs in O/W emulsion systems. Emulsion systems with this feature usually exhibit high stability.

When the emulsions were submitted to the predetermined shear stress (1 Pa for emulsion A and 0.5 Pa for emulsion B) for 300 seconds, in the creep and recovery test, samples A and B both suffered deformation, shown by the compliance value (), but emulsion B was much more susceptible to this force (Figure 6). In the recovery part of this assay, when the shear stress was removed and the samples could recover their former structure, the elastic part of the deformation, more evident in emulsion A, was reversed (Figure 7). This response is quite common in polymer systems. In emulsion B, the recovery was almost negligible compared to emulsion A.

Figure 6: Creep and recovery of emulsions A and B (shear stress of 1 Pa for emulsion A and 0.5 Pa for emulsion B).

Figure 7: Creep and recovery of emulsion A (augmented scale).

According to the rheological behavior data, comparing emulsions A and B, the first required a higher shear stress to be deformed than the second and when the forces acting on the emulsion ceased emulsion A recovered its structure faster. This could help predict the release profile of the two emulsions, with reference to the shear and time required by the emulsions to allow the release of ALA when applied to the skin. During spreading, emulsion B will “open” its structure more readily, allowing the ALA to be released more efficiently than emulsion A, apart from taking more time to recover its initial structure, providing more time for ALA diffusion. To verify this expectation, the release assay was performed.

3.3. Surface Tension

Surfactants are frequently used to stabilize an emulsion, decreasing the surface tension of multiphasic systems. Additionally, the measurement of surface tension could be a tool to understand the flow and the transport of the drugs across the skin [31].

The surface tensions of emulsions are shown in Table 4. The surface tension values for emulsion B are lower than those for emulsion A. In a recent study, Azarbayjani et al. (2010) [32] demonstrated that lower values for interfacial tension promoted the drug permeation and a similar result was obtained in this study (Table 5). Thus, both emulsions could improve the wetting properties and skin permeability. However, concerning emulsion A, this one exhibits higher surface tension than emulsion B, probably due to the fact that polymers are frequently added to increase the stability of an emulsion by thickening the external phase, increasing the viscosity of the external phase which plays a minor role for the stabilizing action. Thus, addition of a carbomer to the emulsion increases the interfacial tension of the multiphasic systems decreasing the wettability of active substance on the skin surface and a lower permeability of the drug, which is in accordance with in vitro release assay described below. Another factor that probably interferes in this parameter is the surfactants used, which was different in the two emulsions assessed.

Table 4: Surface tension of emulsions A and B (mean ± SD, ).

Emulsion
Surface tension (mN/m)

Water
70.76 ± 0.03

A
47.71 ± 0.86

B
36.43 ± 1.27

Table 5: ALA released from emulsions A and B in various periods of time (mean ± SD, ).

Time (h)
Amount of ALA (g/mL)
Amount of ALA per area (g/cm²)
% released

A
2
0 ± 0
0
0

4
292.42 ± 0.04
1156.46
37.90

8
366.13 ± 0.01
1447.97
47.46

B
2
343.35 ± 0.01
1357.88
44.50

4
386.67 ± 0.01
1529.20
50.12

8
537.27 ± 0.01
2124.79
69.64

Standard deviation (); SD <5% in all results.

Different letters means statistically different values.

3.4. In Vitro Release Assay

ALA in formulation A had a different release profile from that in formulation B (Table 5), possibly reflecting the great difference in rheological properties that were revealed during the rheological tests.

When the data were fitted to the zero-order, first-order, and Higuchi kinetic models by linear regression (Table 6), the regression coefficients () were calculated (Table 7).

Table 6: Linear regression equations obtained in determining the reaction order of in vitro release of alpha-lipoic acid from formulations A and B.

Kinetic model
Emulsion A
Emulsion B

Zero-order

First-order

Higuchi model

Table 7: Values of calculated to determine the best kinetic model for in vitro release of alpha-lipoic acid from formulations A and B.

Kinetic model
Emulsion A
Emulsion B

Zero-order
0.75
0.98

First-order
0.62
0.99

Higuchi model
0.89
0.95

For emulsion A, the results showed a release profile closest to the Higuchi model. Since this is best suited to controlled release systems, this indicates that the active substance release was controlled by diffusion. The Higuchi model describes the diffusion of substances from matrix systems, where the amount of substance released is proportional to the square root of time [33, 34].

For emulsion B, the most appropriate mathematical model was of zero order or first order, since the two models showed values close to 1. The zero-order model describes a system where the dissolution occurs at a constant rate, being independent of active substance concentration [35]. The first-order kinetic model is related to formulations of conventional and immediate release [36], with the amount released depending on the time of release and on the amount of active substance remaining in the formulation, so that the rate of release of the active substance falls [37]. The release of ALA from emulsion B was apparently immediate, since in the first 2 hours of assay 44.5% of the initial ALA was released, and the rate of release fell with time (Table 8). Although emulsion B released a larger amount of ALA than emulsion A, the rate of release from emulsion B was smaller than that from emulsion A. This occurred because of the reduction in the rate of release as the amount of ALA in the formulation decreased. According to this result, the first-order kinetic model is more suitable for emulsion B than the zero-order model.

Table 8: Rate constant () for release of alpha-lipoic acid from the formulations tested.

Emulsion
Rate constant () (g/mL/h)

A
61.02

B
32.32

The results obtained for emulsion A are consistent with the literature, since the presence of polymers in formulations slows and controls the release of the active substance. In a review paper by Lopes et al. (2005) [38], it was reported that the presence of water-soluble polymers, and especially hydroxypropyl methylcellulose (HPMC), slows the release of active substances from the vehicle. In a study by Monteiro et al. (2007) [34] it was proved that formulations containing, respectively, 30, 50, and 64 mg of HPMC released 88.82%, 75.43%, and 49.16% of the quercetin after 8 h of experiment, demonstrating that an increased proportion of HPMC delayed the release of quercetin.

From the above results, it is suggested that the rheological profile and the other physical-chemical characteristics of the two emulsions may have interfered significantly in the release of ALA by the vehicle, being possible to summarize that decreasing the viscosity, increasing the hysteresis area, increasing the droplet size, and decreasing the surface tension probably will be more effective in the release of the active substance from the vehicle. However, it should be done carefully, since many of these parameters also influence the system’s stability.

A similar result was reported by Bruschi et al. (2007) [39] for formulations containing carbomer 934P with propolis extract. The authors observed that increasing the polymer concentration resulted in an increase in viscosity of the static system, which hindered with the release of the active substance. The same was observed here since emulsion A, containing carbomer dispersion, showed a release profile that is quite different from emulsion B, which lacks the polymer in its formulation.

The choice of a suitable system, the incorporation of an active substance, is of fundamental importance for the stability and availability of the active substance at the application site and, therefore, for its effectiveness. The vehicle has an influence on release, permeation, and retention of the active substance, taking a dominant role in dermatological therapy [35].

4. Conclusion

In conclusion, the release assay confirmed the prediction of release profile suggested by the rheological data, showing the influence of the rheological features on the release of active substances from the vehicles.

Thus, recalling that the permeation of an active substance through the skin depends basically on two consecutive steps, the release of this substance from the vehicle and its subsequent penetration through the skin, it is important to think about the first of these steps when developing a formulation for dermatological use. Therefore, it is crucial to consider carefully the ingredients of the vehicle and their effects on the rheological properties of it, since viscosity, thixotropy, compliance, and other rheological characteristics can exert a direct influence on the release of the active substance and hence on its action on the skin.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

The authors acknowledge the financial support of Capes (Coordination for the Improvement of Higher Education Personnel), CNPq (Brazilian Council for Scientific and Technological Development), PADC-FCF-UNESP, and FINEP (Project and Study Financing Agency). The authors are grateful to Timothy J. C. Roberts, native English speaker, for the review of the paper.

References

R. Carneiro, A. Salgado, S. Raposo et al., “Topical emulsions containing ceramides: effects on the skin barrier function and anti-inflammatory properties,” European Journal of Lipid Science and Technology, vol. 113, no. 8, pp. 961–966, 2011.

N. Hassan, A. Ahad, M. Ali, and J. Ali, “Chemical permeation enhancers for transbuccal drug delivery,” Expert Opinion on Drug Delivery, vol. 7, no. 1, pp. 97–112, 2010.

M. R. F. M. Martins and F. Veiga, “Promotores de permeação para a liberação transdérmica de fármacos: uma nova aplicação para as ciclodextrinas,” Revista Brasileira de Ciências Farmacêuticas, vol. 38, no. 1, pp. 33–54, 2002.

J. Marto, D. Baltazar, A. Duarte et al., “Topical gels of etofenamate: in vitro and in vivo evaluation,” Pharmaceutical Development and Technology, vol. 20, no. 6, pp. 710–715, 2015.

L. Montenegro, A. M. Panico, A. Ventimiglia, and F. P. Bonina, “In vitro retinoic acid release and skin permeation from different liposome formulations,” International Journal of Pharmaceutics, vol. 133, no. 1-2, pp. 89–96, 1996.

D. Nandini, N. Chauhan, A. Chandra, and K. Pathak, “Effect of permeation enhancers on the release and permeation kinetics of oxytetracycline hydrochloride organogel formulations,” Journal of Young Pharmacists, vol. 1, no. 4, pp. 285–289, 2009.

C. Sinico, M. Manconi, M. Peppi, F. Lai, D. Valenti, and A. M. Fadda, “Liposomes as carriers for dermal delivery of tretinoin: in vitro evaluation of drug permeation and vesicle-skin interaction,” Journal of Controlled Release, vol. 103, no. 1, pp. 123–136, 2005.

B. S. Snorradóttir, P. I. Gudnason, F. Thorsteinsson, and M. Másson, “Experimental design for optimizing drug release from silicone elastomer matrix and investigation of transdermal drug delivery,” European Journal of Pharmaceutical Sciences, vol. 42, no. 5, pp. 559–567, 2011.

E. Yenilmez, E. Başaran, and Y. Yazan, “Release characteristics of vitamin E incorporated chitosan microspheres and in vitro-in vivo evaluation for topical application,” Carbohydrate Polymers, vol. 84, no. 2, pp. 807–811, 2011.

B. W. Barry, “Breaching the skin’s barrier to drugs,” Nature Biotechnology, vol. 22, no. 2, pp. 165–167, 2004.

S. Grayson and P. M. Elias, “Isolation and lipid biochemical characterization of stratum corneum membrane complexes: Implications for the cutaneous permeability barrier,” Journal of Investigative Dermatology, vol. 78, no. 2, pp. 128–135, 1982.

A. C. Williams and B. W. Barry, “Penetration enhancers,” Advanced Drug Delivery Reviews, vol. 56, pp. 603–661, 2004.

B. W. Barry, Dermatological Formulations, Marcel Dekker, New York, NY, USA, 1983.

J. A. Silva, D. P. De Santana, D. G. C. Bedor, V. F. C. Borba, A. A. Lira, and E. S. Egito, “Estudo de liberação e permeação in vitro do diclofenaco de dietilamônio em microemulsão gel-like,” Química Nova, vol. 32, no. 6, pp. 1389–1393, 2009.

F. E. Antunes, L. Gentile, C. O. Rossi, L. Tavano, and G. A. Ranieri, “Gels of Pluronic F127 and nonionic surfactants from rheological characterization to controlled drug permeation,” Colloids and Surfaces B: Biointerfaces, vol. 87, no. 1, pp. 42–48, 2011.

C. H. Lee, V. Moturi, and Y. Lee, “Thixotropic property in pharmaceutical formulations,” Journal of Controlled Release, vol. 136, no. 2, pp. 88–98, 2009.

K. Welin-Berger, J. A. M. Neelissen, and B. Bergenståhl, “The effect of rheological behaviour of a topical anaesthetic formulation on the release and permeation rates of the active compound,” European Journal of Pharmaceutical Sciences, vol. 13, no. 3, pp. 309–318, 2001.

M. M. Talukdar, I. Vinckier, P. Moldenaers, and R. Kinget, “Rheological characterization of xanthan gum and hydroxypropylmethyl cellulose with respect to controlled-release drug delivery,” Journal of Pharmaceutical Sciences, vol. 85, no. 5, pp. 537–540, 1996.

J. Saurí, J. M. Suñé-Negre, J. Díaz-Marcos et al., “Relationships between surface free energy, surface texture parameters and controlled drug release in hydrophilic matrices,” International Journal of Pharmaceutics, vol. 478, no. 1, pp. 328–340, 2015.

L. Packer, E. H. Witt, and H. J. Tritschler, “Alpha-lipoic acid as a biological antioxidant,” Free Radical Biology and Medicine, vol. 19, no. 2, pp. 227–250, 1995.

J. Teichert, T. Tuemmers, H. Achenbach et al., “Pharmacokinetics of alpha-lipoic acid in subjects with severe kidney damage and end-stage renal disease,” Journal of Clinical Pharmacology, vol. 45, no. 3, pp. 313–328, 2005.

G. P. Biewenga, G. R. M. M. Haenen, and A. Bast, “The pharmacology of the antioxidant lipoic acid,” General Pharmacology, vol. 29, no. 3, pp. 315–331, 1997.

R. Hermann, G. Niebch, H. O. Borbe et al., “Enantioselective pharmacokinetics and bioavailability of different racemic α-lipoic acid formulations in healthy volunteers,” European Journal of Pharmaceutical Sciences, vol. 4, no. 3, pp. 167–174, 1996.

M. Podda, T. M. Zollner, M. Grundmann-Kollmann, J. J. Thiele, L. Packer, and R. Kaufmann, “Activity of alpha-lipoic acid in the protection against oxidative stress in skin,” in Oxidants and Antioxidants in Cutaneous Biology, J. Thiele and P. Elsner, Eds., vol. 29 of Current Problems in Dermatology, pp. 43–51, Karger Publishers, Basel, Switzerland, 2001.

R. Pal, “Effect of droplet size on the rheology of emulsions,” AIChE Journal, vol. 42, no. 11, pp. 3181–3190, 1996.

C. Marriott, “Rheology and the flow of fluids,” in Pharmaceutics: The Science of Dosage Form Design, M. E. Aulton, Ed., Churchill Livingstone, 1996.

G. Schramm, Reologia e Reometria: Fundamentos Teóricos e Práticos, Artiliber, São Paulo, Brazil, 2006.

J. F. Steffe, Rheological Methods in Food Process Engineering, Freeman Press, East Lansing, Mich, USA, 2nd edition, 1996.

P. B. Pisal, S. S. Patil, and V. B. Pokharkar, “Rheological investigation and its correlation with permeability coefficient of drug loaded carbopol gel: influence of absorption enhancers,” Drug Development and Industrial Pharmacy, vol. 39, no. 4, pp. 593–599, 2013.

V. S. Rudraraju and C. M. Wyandt, “Rheology of Microcrystalline Cellulose and Sodiumcarboxymethyl Cellulose hydrogels using a controlled stress rheometer: part II,” International Journal of Pharmaceutics, vol. 292, no. 1-2, pp. 63–73, 2005.

“Application of surface activity in therapeutics,” in Surface Activity in Drug Action, C. Srivastava and A. N. Nagappa, Eds., vol. 21, chapter 8, pp. 233–293, 2005.

A. F. Azarbayjani, H. Lin, C. W. Yap, Y. W. Chan, and S. Y. Chan, “Surface tension and wettability in transdermal delivery: a study on the in-vitro permeation of haloperidol with cyclodextrin across human epidermis,” Journal of Pharmacy and Pharmacology, vol. 62, no. 6, pp. 770–778, 2010.

T. Higuchi, “Mechanism of sustained-action medication. Theoretical analysis of rate of release of solid drugs dispersed in solid matrices,” Journal of pharmaceutical sciences, vol. 52, no. 12, pp. 1145–1149, 1963.

M. L. Monteiro, A. E. Souza, E. A. S. Gianotto et al., “Comprimidos matriciais preparados com hidroxipropilmetilcelulose e pectina contendo quercetina para liberação cólon-específica,” Latin American Journal of Pharmacy, vol. 26, no. 2, pp. 179–184, 2007.

A. T. Florence and D. Attwood, Princípios físico químicos em farmácia, Edusp-Fapesp, São Paulo, Brazil, 2003.

E. C. Cid, Cinética de dissolución de medicamentos, Organización de los Estados Americanos, Washington, DC, USA, 1981.

K. Scheshowitsch, A. Pereira, A. Cruz, M. A. S. Silva, and H. Stulzer, “Avaliação da qualidade e perfil de dissolução de cápsulas manipuladas de piroxicam,” Latin American Journal of Pharmacy, vol. 26, no. 5, pp. 645–651, 2007.

C. M. Lopes, J. M. S. Lobo, and P. Costa, “Formas farmacêuticas de liberação modificada: polímeros hidrofílicos,” Revista Brasileira de Ciências Farmacêuticas, vol. 41, no. 2, pp. 143–154, 2005.

M. L. Bruschi, D. S. Jones, H. Panzeri, M. P. D. Gremião, O. De Freitas, and E. H. G. Lara, “Semisolid systems containing propolis for the treatment of periodontal disease: in vitro release kinetics, syringeability, rheological, textural, and mucoadhesive properties,” Journal of Pharmaceutical Sciences, vol. 96, no. 8, pp. 2074–2089, 2007.