BioMed Research International
Volume 2015 (2015), Article ID 865873, 6 pages
http://dx.doi.org/10.1155/2015/865873

Research Article

Attenuation of Upper Body Accelerations during Gait: Piloting an Innovative Assessment Tool for Parkinson’s Disease

Christopher Buckley,1,2 Brook Galna,³ Lynn Rochester,³ and Claudia Mazzà1,2,4

¹MRC-Arthritis Research UK Centre for Integrated Research into Musculoskeletal Ageing (CIMA), Pam Liversidge Building, University of Sheffield, Sheffield S1 3JD, UK
²Department of Mechanical Engineering, University of Sheffield, Sir Frederick Mappin Building, Sheffield S1 3JD, UK
³Institute of Neuroscience/Newcastle University Institute for Ageing, Newcastle University, Clinical Ageing Research Unit, Campus for Ageing and Vitality, Newcastle upon Tyne NE4 5PL, UK
⁴INSIGNEO Institute for in Silico Medicine, University of Sheffield, Pam Liversidge Building, Sheffield S1 3JD, UK

Received 21 November 2014; Accepted 21 January 2015

Academic Editor: Angelica Alonso

Copyright © 2015 Christopher Buckley et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The objective of the current investigation was to explore whether upper body accelerations obtained during gait provide sensitive measures of postural control in people with Parkinson’s disease (PD). Thirteen people with PD ( years) and nineteen age-matched controls ( years) walked continuously for two minutes while wearing three inertial sensors located on their lower back (L5), shoulder level (C7), and head. Magnitude (root mean square (RMS)), attenuation (attenuation coefficient), and smoothness (Harmonic ratios, HR) of the accelerations were calculated. People with PD demonstrated greater RMS, particularly in the mediolateral direction, but similar harmonic ratio of head accelerations compared to controls. In addition, they did not attenuate accelerations through the trunk and neck as well as control participants. Our findings indicate that measuring upper body movement provides unique information regarding postural control in PD and that poor attenuation of acceleration from the pelvis to the head contributes to impaired head control. This information is simple to measure and appears to be sensitive to PD and, consequently, is proposed to benefit researchers and clinicians.

1. Introduction

People with Parkinson’s disease (PD) walk with a gait pattern that is characterised by slowness (bradykinesia), muscle rigidity, and postural instability [1–3]. As the disease progresses, postural control deteriorates and predisposes people with PD to falls [4–6]. Current measures of postural control, based on the ability to maintain upright balance during quiet stance, poorly reflect real life situations when people with PD are at risk of falling. Consequently, researchers and clinicians are promoting the measurement of postural control during gait [7, 8].

The recent development of small and inexpensive wireless inertial sensors has helped facilitate routine measurement of postural control during gait in the clinic, laboratory, and the community. Emerging evidence suggests that measuring upper body acceleration during gait using inertial sensors can objectively quantify differences in gait patterns between those with and without PD [9, 10]. It has also been shown that upper body accelerations are sensitive to differences between PD fallers and nonfallers [11]. Specifically, these studies have revealed a deterioration of the smoothness of trunk accelerations in people with PD as measured by harmonic ratios, which was more pronounced in those with a history of falls.

Despite emerging evidence that maintaining head stability during gait is a key determinant of postural control [12–16], accelerations of the head have been neglected in these previous studies examining upper body acceleration in PD. One potential reason head stability is important is that the head contains the visual and vestibular systems, which are critical for navigation and preplanning of adaptive motor strategies [13]. Head stability may have added importance for people with PD because they rely heavily on vision to maintain their postural control [5]. Recent evidence suggests that vision during gait is affected in PD [17] and that the smoothness of trunk accelerations is also altered [9, 10]. However, it has not yet been established whether PD affects the stability of the head during gait. A key mechanism in maintaining head stability is the attenuation of accelerations through the trunk. People with PD often develop axial rigidity, which may impair their ability to attenuate the accelerations that are applied to the lower limbs during gait from impacting on head stability. The measurement of attenuation of accelerations through the upper body has previously been investigated as a strong postural control indicator for children, adults, and elderly individuals [18–21] but has not yet been examined in people with PD.

The objective of the current investigation was to explore whether upper body accelerations obtained during gait provide sensitive proxy measures of postural control in people with Parkinson’s disease (PD). More specifically, the aims of this study were to assess the magnitude, attenuation, and smoothness of upper body accelerations in people with PD compared to age-matched controls. We tested the hypotheses that: people with PD would demonstrate impaired smoothness and attenuation of accelerations. To address these aims, accelerations of the head, trunk, and pelvis were assessed during gait in a cohort of people with PD and an age-matched control group.

2. Materials and Methods

2.1. Participants

A subsection of community dwelling older adults and people with PD were tested as part of the ongoing ICICLE-PD (Incidence of Cognitive Impairment in Cohorts with Longitudinal Evaluation—Parkinson’s Disease) Gait study [22, 23]. Participants were excluded if they had any neurological (other than PD), orthopaedic, or cardiothoracic conditions that may have markedly affected their walking or safety during the testing sessions. In addition, PD participants had to be diagnosed with idiopathic PD according to the UK Parkinson’s Disease Brain Bank criteria and were excluded if they presented with significant memory impairment (Mini Mental State Exam (MMSE) ≤ 24 [24]), dementia with Lewy bodies, drug induced parkinsonism, “vascular” parkinsonism, progressive supranuclear palsy, multiple system atrophy, corticobasal degeneration, or poor command of English. This study was conducted according to the Declaration of Helsinki and had ethical approval from the Newcastle and North Tyneside research ethics committee. All participants signed an informed consent form.

2.2. Experimental Protocol

All participants walked for two minutes at their preferred pace around a 25 m circuit, fully described in [27]. Spatiotemporal gait variables (walking speed, step time, step length, and step width) were measured using a 7 m long Gaitrite pressure activated electronic walkway (Platinum model Gaitrite, software version 4.5, CIR systems, United States of America). Upper body accelerations were measured using three OPAL inertial sensors sampling at 128 Hz (APDM Inc, Portland, OR, USA) located at 5th lumbar vertebra to represent the pelvis level (P), the 7th cervical vertebra to represent the shoulder level (S) and upon the back of the head (H). The Gaitrite and the OPAL system were synchronised and the data was collected using the same A/D converter.

2.3. Data Analysis

To ensure only steady-state, straight-line walking was analysed, only the portion of the acceleration data recorded while participants who were in contact with the Gaitrite walkway was used. As detailed in Mazzà et al. [20], prior to collecting the gait data, a calibration trial was captured using a sensor placed on the floor to create a global reference frame for the laboratory. Thereafter, the local reference frame of each sensor was reoriented for each time sample to the newly established global reference frame [19, 28]. Following, the acceleration data was further segmented based upon the foot contact and foot off values obtained from the Gaitrite walkway. Then, the mean value of the signal was removed and a low-pass fourth order Butterworth filter with a cut-off frequency of 10 Hz was applied [19]. Data for each stride was normalised to 100 data points using linear interpolation. All signals were processed using MATLAB (version 8.1.0).

2.4. Magnitude of Acceleration

The magnitude of accelerations was calculated using the root mean square (RMS) of the accelerations, measured by each sensor for each stride in the Anteroposterior (AP), Mediolateral (ML), and Vertical (V) directions.

2.5. Attenuation of Acceleration

The ability to attenuate accelerations through the upper body was quantified using the attenuation coefficient. The attenuation coefficient describes the ability to reduce accelerations from inferior to the superior anatomical locations and was calculated using the RMS values for each stride.

The attenuation coefficients were computed using the RMS values of the head (RMSH), shoulder (RMSS), and pelvis (RMSP) as follows [18–20]:

with representing the attenuation from the pelvis to the head, representing the attenuation from the pelvis to the shoulder, and representing the attenuation from the shoulder to the head. Each equation provides a percentage representing the amount of acceleration that is attenuated from the inferior sensors to the superiorly located sensor. A positive coefficient indicates reduced acceleration at the superiorly located sensor relative to the inferiorly located sensor. A negative coefficient value indicates a greater acceleration at the superiorly located sensor.

2.6. Smoothness of Accelerations

We quantified the smoothness of upper body accelerations using the harmonic ratio (HR). The HR accurately describes the step-to-step symmetry within a stride but for upper body gait analysis is also commonly referred to as a measure smoothness [29]. The HR was calculated via discrete Fourier transform for each of the acceleration components measured at the H, S, and P levels in the AP, ML, and V directions [30]. The fundamental frequency was set equal to the stride frequency.

For the AP and V Components, the HR Was Defined as:

For the ML Component, the HR Was Defined as:

Higher values of HR are associated with a higher similarity between the pattern of the upper body movements occurring during the right and left steps and are therefore favourable [9, 31]. Following calculation, the HR’s were normalised to each participant’s gait speed [9, 14].

2.7. Statistical Analysis

A series of two-tailed paired -tests were used to test the difference between groups for the magnitude, attenuation, and smoothness of accelerations. The level of significance was set at . Given the exploratory nature of this study, the value was not adjusted for multiple comparisons.

3. Results

The characteristics of the participants are reported in Table 1. All the participants with PD were tested within 18–54 months post diagnosis. No significant differences were found between the two groups in terms of anthropometric characteristics or spatiotemporal gait values.

Table 1: The mean (±SD) participant characteristics and spatial-temporal gait variables for the PD and control group.

PD ( = 13)
Control ( = 19)
(-test)

Age (years)
69.7 ± 11.1
70.2 ± 6.7
0.90

Height (m)
1.70 ± 0.10
1.72 ± 0.10
0.99

Mass (Kg)
77.9 ± 13.3
83.2 ± 14.2
0.30

BMI
26.1 ± 3.3
28.0 ± 4.5
0.20

MDS UPDRS III
35.6 ± 12.6
NA
NA

Hoehn and Yahr stage
HY II: 11; HY III: 2
NA
NA

Gait speed (m/s²)
1.22 ± 0.22
1.32 ± 0.15
0.14

Step time (s)
0.54 ± 0.21
0.54 ± 0.44
0.97

Step length (cm)
0.66 ± 0.12
0.71 ± 0.07
0.15

Step width (cm)
0.09 ± 0.03
0.09 ± 0.02
0.46

Significant difference at < 0.05.

BMI: body mass index.

MDS UPDRS III: Movement Disorders Society Revised Unified Parkinson’s Disease Rating Scale–Movement Subsection [25].

HY: Hoehn and Yahr stage [26].

3.1. Magnitude of Acceleration

Significantly higher ML head accelerations were observed in people with PD compared to controls ( m/s² versus  m/s², ) but not at the pelvis or the shoulder level. There were no other significant between-group differences although AP and V head accelerations tended to be greater in the PD group (Table 2).

Table 2: The mean (±SD) root mean square (RMS) for the PD and the control participants calculated at the head (H), shoulder (S), and the pelvis (P) levels.

Sensor location
Component
PD
Control
(t-test)

H
AP
1.02 ± 0.24
0.92 ± 0.20
0.22

ML
1.08 ± 0.29
0.86 ± 0.21
0.02*

V
2.15 ± 0.74
2.41 ± 0.47
0.26

S
AP
1.03 ± 0.18
0.96 ± 0.16
0.31

ML
1.05 ± 0.24
0.96 ± 0.17
0.25

V
2.04 ± 0.64
2.28 ± 0.46
0.24

P
AP
1.28 ± 0.38
1.47 ± 0.33
0.14

ML
1.17 ± 0.36
1.41 ± 0.42
0.11

V
2.16 ± 0.70
2.35 ± 0.47
0.37

Significant difference at < 0.05.

H: head; S: shoulder level; P: pelvis.

AP: anterior/posterior; ML: medial/lateral; V: vertical.

3.2. Attenuation of Acceleration

People with PD did not attenuate AP or ML accelerations as well as controls (Figure 1). For , a significant difference existed between PD and the control participants in the ML direction (% versus %, ). For , a significant difference existed between PD and controls in the AP (% versus %, ), as well as the ML direction (% versus %, ). For , a significant difference existed between the PD and the control group in the ML direction (−% versus %, ).

Figure 1: Mean (±SD) values of the attenuation coefficients (, , and ) of the three acceleration components (AP = anterior/posterior, ML = medial/lateral; V = vertical), computed for the control and group with PD. .

3.3. Harmonic Ratio

The HRs normalised to gait speed showed no significant differences between the PD and control participants (Table 3).

Table 3: The mean (±SD) Harmonic ratios normalised to gait speed for the PD and the control participants calculated at the head (H), shoulder (S), and the pelvis (P) levels.

Sensor location
Component
PD
Control
(-test)

H
AP
0.71 ± 0.36
0.53 ± 0.23
0.11

ML
1.22 ± 0.56
1.02 ± 0.38
0.27

V
2.03 ± 0.57
2.18 ± 0.60
0.50

S
AP
0.70 ± 0.23
0.66 ± 0.22
0.64

ML
0.80 ± 0.50
0.80 ± 0.22
0.95

V
2.34 ± 0.77
2.51 ± 0.72
0.55

P
AP
1.22 ± 0.38
1.13 ± 0.48
0.61

ML
1.05 ± 0.69
0.80 ± 0.38
0.22

V
2.02 ± 0.60
2.17 ± 2.17
0.58

H: head; S: shoulder level; P: pelvis.

AP: anterior/posterior; ML: medial/lateral; V: vertical.

4. Discussion

Our current investigation provides evidence that upper body accelerations obtained during gait provide sensitive measures of postural control in people with Parkinson’s disease (PD). As hypothesised, the results of this study showed that people with PD walked with altered upper body accelerations compared to age-matched controls. In particular, people with PD walked with greater magnitude of ML head accelerations and demonstrated impaired attenuation of accelerations from the pelvis and neck to the head. In contrast to our hypothesis, smoothness of upper body accelerations as measured by the HR was not significantly affected in this sample of PD.

To our knowledge, this is the first study to show impaired head stability in people with PD using inertial sensors. A greater magnitude of ML head acceleration was found for the PD group. This was interpreted as a result of poor postural control for the PD participants and a failure to stabilise their head in space [18, 21]. High values for the head accelerations have been previously described as a reduced ability to stabilise the head in space. This is particularly crucial for people with PD because of their aforementioned increased dependence upon visual input for correcting postural control [5]: higher accelerations are likely disturbing their visual system, leading to an impaired ability to preplan effective motor strategies [13], causing an increased likelihood to fall. Although they might be a useful measure of postural control, RMS values of head accelerations are known to be dependent upon step length and gait speed [31]. Despite no significant differences being observed for these parameters between the PD and the control group in this sample, it is common that PD affects both gait speed and step length [1–3]. As a result, the magnitude of accelerations may lack sensitivity when used for discriminating PD patients, which in other studies have been shown to possess a decreased step length and gait speed, when compared to age-matched controls.

Alternatively, being computed as a ratio between accelerations measured during the same trial [18], the coefficients of attenuation do not suffer from being speed dependent. In the current investigation; the coefficients of attenuation provided insight into why the PD participants demonstrated greater accelerations at the head. Participants with PD were less able to attenuate accelerations through the trunk, as shown by impaired pelvis-shoulder attenuation coefficients, which were reduced on average by at least a half in the PD cohort, both in the AP and in the ML direction. It is not possible to fully explain why the people with PD did not attenuate accelerations well through the upper body; however, it may be associated with en bloc movement and axial rigidity. It has previously been stated that increased rigidity may cause underlying changes in the physiological and mechanical functioning of the axial muscles which results in en bloc movement, where the head, trunk and pelvis move together as one rigid unit [12, 32]. It might be assumed that the same mechanisms could be responsible for poor attenuation of accelerations through the spine in PD. However, more research is certainly needed to test this hypothesis and explain the mechanisms ruling altered head accelerations and poor attenuation in PD, as well as the implications of poor head stability on vision and postural control.

Interestingly, the findings regarding attenuation coefficients were strongest in the ML direction. Similar results were found even when analysing healthy elderly subjects [21]. The fact that instability was predominantly found in the ML direction, suggests that when utilising a coefficient of attenuation, the ML direction is potentially most informative of an impaired walking stability. Consequently, assessments in the ML direction may be best for proxy measures of postural control in PD.

In contrast with our hypothesis and previous studies [9], the smoothness of upper body accelerations (harmonic ratios) was not significantly affected in our sample of PD participants. The discrepancy with previous studies is unlikely due to methodological differences, as the studies were similar in design. It is possible, however, that we were statistically underpowered to detect group difference, as suggested by a 25% reduction of AP HRs and 16% reduction of ML HRs at the head in the PD group that did not reach statistical significance (). Further research is required to determine the effectiveness of harmonic ratios as a sensitive measure to PD at different stages of their disease progression, as well as its ability to predict future falls.

Clinicians require objective measures to assess postural control during locomotion in people with PD to supplement standard clinical assessments and conventional rating scales which are not sensitive to subtle postural control disturbance [31, 33, 34]. Our findings indicate that it is feasible to measure the magnitude, attenuation, and smoothness of upper body accelerations in people with PD using body worn sensors. The rapid technological development of inertial sensors may afford a quick, clinically appropriate, and cost effective method to measure postural control in the clinic and community settings [5]. Specifically, the attenuation coefficient is a promising measure that is sensitive to PD; however, larger longitudinal studies are needed to assess its ability to monitor disease progression, determine intervention efficacy, and inform clinical management [5, 34, 35].

5. Conclusion

The current investigation suggests that assessing upper body acceleration offers additional and unique information about postural control during gait in people with PD. In particular, the magnitude of ML head accelerations and attenuation of upper body acceleration appear sensitive to PD and consequently hold promise as useful proxy measures that can be utilised in clinical and community settings.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

The authors would like to thank the MRC-Arthritis research UK Centre for Integrated Research into Musculoskeletal Ageing (CIMA) for their part in funding the project and for allowing for the collaboration with the contributing members from the Clinical Ageing Research Unit (CARU). The authors would also like to acknowledge all participants for their time and interest into the project. ICICLE-GAIT is supported by the National Institute for Health Research (NIHR) Newcastle Biomedical Research Unit based at Newcastle upon Tyne Hospitals NHS Foundation Trust and Newcastle University. The research was also supported by NIHR Newcastle CRF Infrastructure funding. The views expressed are those of the authors and not necessarily those of the NHS, the NIHR, or the Department of Health.

References

J. Barth, J. Klucken, P. Kugler et al., “Biometric and mobile gait analysis for early diagnosis and therapy monitoring in Parkinson's disease,” in Proceedings of the 33rd Annual International Conference of the IEEE Engineering in Medicine and Biology Society (EMBS '11), pp. 868–871, September 2011.

R. E. A. van Emmerik, R. C. Wagenaar, A. Winogrodzka, and E. C. Wolters, “Identification of axial rigidity during locomotion in parkinson disease,” Archives of Physical Medicine and Rehabilitation, vol. 80, no. 2, pp. 186–191, 1999.

M. H. M. Cole, P. A. P. Silburn, J. M. Wood, C. J. Worringham, and G. K. Kerr, “Falls in Parkinson's disease: kinematic evidence for impaired head and trunk control,” Movement Disorders, vol. 25, no. 14, pp. 2369–2378, 2010.

F. B. Horak and M. Mancini, “Objective biomarkers of balance and gait for Parkinson's disease using body-worn sensors,” Movement Disorders, vol. 28, no. 11, pp. 1544–1551, 2013.

M. Mancini, F. B. Horak, C. Zampieri, P. Carlson-Kuhta, J. G. Nutt, and L. Chiari, “Trunk accelerometry reveals postural instability in untreated Parkinson's disease,” Parkinsonism and Related Disorders, vol. 17, no. 7, pp. 557–562, 2011.

M. D. Latt, S. R. Lord, J. G. L. Morris, and V. S. C. Fung, “Clinical and physiological assessments for elucidating falls risk in Parkinson's disease,” Movement Disorders, vol. 24, no. 9, pp. 1280–1289, 2009.

A. L. Adkin, B. R. Bloem, and J. H. J. Allum, “Trunk sway measurements during stance and gait tasks in Parkinson's disease,” Gait and Posture, vol. 22, no. 3, pp. 240–249, 2005.

H. J. Yack and R. C. Berger, “Dynamic stability in the elderly: identifying a possible measure,” Journal of Gerontology, vol. 48, no. 5, pp. M225–M230, 1993.

K. A. Lowry, A. L. Smiley-Oyen, A. J. Carrel, and J. P. Kerr, “Walking stability using harmonic ratios in Parkinson's disease,” Movement Disorders, vol. 24, no. 2, pp. 261–267, 2009.

K. A. Lowry, A. J. Carrel, J. M. McIlrath, and A. L. Smiley-Oyen, “Use of harmonic ratios to examine the effect of cueing strategies on gait stability in persons with Parkinson’s disease,” Archives of Physical Medicine and Rehabilitation, vol. 91, no. 4, pp. 632–638, 2010.

M. M. D. Latt, H. H. B. Menz, V. S. Fung, and S. R. Lord, “Acceleration patterns of the head and pelvis during gait in older people with Parkinson's disease: a comparison of fallers and nonfallers,” Journals of Gerontology A: Biological Sciences and Medical Sciences, vol. 64, no. 6, pp. 700–706, 2009.

S. Mesure, J. P. Azulay, J. Pouget, and B. Amblard, “Strategies of segmental stabilization during gait in Parkinson's disease,” Experimental Brain Research, vol. 129, no. 4, pp. 573–581, 1999.

T. Pozzo, A. Berthoz, and L. Lefort, “Head stabilization during various locomotor tasks in humans. I. Normal subjects,” Experimental Brain Research, vol. 82, no. 1, pp. 97–106, 1990.

H. B. Menz, S. R. Lord, and R. C. Fitzpatrick, “Acceleration patterns of the head and pelvis when walking on level and irregular surfaces,” Gait and Posture, vol. 18, no. 1, pp. 35–46, 2003.

J. J. Kavanagh, S. Morrison, and R. S. Barrett, “Coordination of head and trunk accelerations during walking,” European Journal of Applied Physiology, vol. 94, no. 4, pp. 468–475, 2005.

J. J. Kavanagh and H. B. Menz, “Accelerometry: a technique for quantifying movement patterns during walking,” Gait and Posture, vol. 28, no. 1, pp. 1–15, 2008.

B. Galna, S. Lord, D. Daud, N. Archibald, D. Burn, and L. Rochester, “Visual sampling during walking in people with Parkinson's disease and the influence of environment and dual-task,” Brain Research, vol. 1473, pp. 35–43, 2012.

C. Mazzà, M. Iosa, F. Pecoraro, and A. Cappozzo, “Control of the upper body accelerations in young and elderly women during level walking,” Journal of NeuroEngineering and Rehabilitation, vol. 5, article 30, 2008.

C. Mazzà, M. Iosa, P. Picerno, and A. Cappozzo, “Gender differences in the control of the upper body accelerations during level walking,” Gait and Posture, vol. 29, no. 2, pp. 300–303, 2009.

C. Mazzà, M. Zok, and A. Cappozzo, “Head stabilization in children of both genders during level walking,” Gait and Posture, vol. 31, no. 4, pp. 429–432, 2010.

T. Doi, T. Asai, S. Hirata, and H. Ando, “Dual-task costs for whole trunk movement during gait,” Gait and Posture, vol. 33, no. 4, pp. 712–714, 2011.

S. Lord, B. Galna, J. Verghese, S. Coleman, D. Burn, and L. Rochester, “Independent domains of gait in older adults and associated motor and nonmotor attributes: validation of a factor analysis approach,” Journals of Gerontology, Series A: Biological Sciences and Medical Sciences, vol. 68, no. 7, pp. 820–827, 2013.

L. Rochester, B. Galna, S. Lord, and D. Burn, “The nature of dual-task interference during gait in incident Parkinson's disease,” Neuroscience, vol. 265, pp. 83–94, 2014.

M. F. Folstein, S. E. Folstein, and P. R. McHugh, “‘Mini-mental state’. A practical method for grading the cognitive state of patients for the clinician,” Journal of Psychiatric Research, vol. 12, no. 3, pp. 189–198, 1975.

C. G. Goetz, S. Fahn, P. Martinez-Martin et al., “Movement disorder society-sponsored revision of the unified Parkinson's disease rating scale (MDS-UPDRS): process, format, and clinimetric testing plan,” Movement Disorders, vol. 22, no. 1, pp. 41–47, 2007.

C. Goetz, W. Poewe, O. Rascol et al., “Movement disorder society task force report on the Hoehn an Yahr stageing scale: status and recommendations,” Movement Disorders, vol. 19, pp. 1020–1028, 2004.

B. Galna, S. Lord, and L. Rochester, “Is gait variability reliable in older adults and Parkinson's disease? Towards an optimal testing protocol,” Gait & Posture, vol. 37, no. 4, pp. 580–585, 2013.

A. Godwin, M. Agnew, and J. Stevenson, “Accuracy of inertial motion sensors in static, quasistatic, and complex dynamic motion,” Journal of Biomechanical Engineering, vol. 131, no. 11, Article ID 114501, 2009.

J. L. Bellanca, K. A. Lowry, J. M. VanSwearingen, J. S. Brach, and M. S. Redfern, “Harmonic ratios: a quantification of step to step symmetry,” Journal of Biomechanics, vol. 46, no. 4, pp. 828–831, 2013.

F. Pecoraro, C. Mazzà, A. Cappozzo, E. E. Thomas, and A. Macaluso, “Reliability of the intrinsic and extrinsic patterns of level walking in older women,” Gait and Posture, vol. 26, no. 3, pp. 386–392, 2007.

M. D. Latt, H. B. Menz, V. S. Fung, and S. R. Lord, “Walking speed, cadence and step length are selected to optimize the stability of head and pelvis accelerations,” Experimental Brain Research, vol. 184, no. 2, pp. 201–209, 2008.

J. Spildooren, S. Vercruysse, E. Heremans et al., “Head-pelvis coupling is increased during turning in patients with Parkinson's disease and freezing of gait,” Movement Disorders, vol. 28, no. 5, pp. 619–625, 2013.

P. Vieregge, H. Stolze, C. Klein, and I. Heberlein, “Gait quantitation in Parkinson's disease—locomotor disability and correlation to clinical rating scales,” Journal of Neural Transmission, vol. 104, no. 2-3, pp. 237–248, 1997.

M. Mancini, L. King, A. Salarian, L. Holmstrom, J. Mcnames, and F. B. Horak, “Mobility lab to assess balance and gait with synchronized body-worn sensors,” Journal of Bioengineering & Biomedical Science, supplement 1, article 007, 2012.

M. Iosa, A. Fusco, G. Morone et al., “Assessment of upper-body dynamic stability during walking in patients with subacute stroke,” Journal of Rehabilitation Research and Development, vol. 49, no. 3, pp. 439–450, 2012.