BioMed Research International
Volume 2015 (2015), Article ID 905648, 5 pages
http://dx.doi.org/10.1155/2015/905648

Research Article

Clinical Usefulness of Immunohistochemical Staining of p57kip2 for the Differential Diagnosis of Complete Mole

Shigeru Sasaki,¹ Yasushi Sasaki,² Toshiaki Kunimura,³ Akihiko Sekizawa,² Yoshihiro Kojima,⁴ and Koichi Iino¹

¹Department of Obstetrics and Gynecology, Iino Hospital, 4-3-2 Fuda, Chōfu, Tokyo 182-0024, Japan
²Department of Obstetrics and Gynecology, Showa University Northern Yokohama Hospital and Showa University School of Medicine, 35-1 Chigasaki Chuo, Tsuduki-Ku, Yokohama, Kanagawa 224-8503, Japan
³Department of Pathology, Showa University School of Medicine and Showa University Northern Yokohama Hospital, 35-1 Chigasaki Chuo, Tsuduki-Ku, Yokohama, Kanagawa 224-8503, Japan
⁴Maternity Clinic Kojima, 4-1-27 Asahi-Cho, Akishima, Tokyo 196-0025, Japan

Received 28 September 2014; Accepted 13 January 2015

Academic Editor: Shalini Rajaram

Copyright © 2015 Shigeru Sasaki et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Objective. Can polymer-based immunohistochemical staining of replace DNA analysis as an inexpensive means of differentiating complete mole from partial mole or hydropic abortion? Methods and Materials. Original paraffin-embedded tissue blocks from 14 equivocal cases were turned over to our laboratory and examined by immunohistochemical staining of . Results. Four of the 14 cases showed clearly negative nuclear staining in cytotrophoblasts and villous stromal cells: these results were fully concordant with the control staining. The remaining 10 cases showed apparently positive staining in cytotrophoblasts and villous stromal cells. Without DNA analysis we are able to clearly differentiate the 4 cases of complete mole among the 14 equivocal cases. During follow-up, secondary low-risk gestational trophoblastic neoplasia (GTN) developed in 1 of the 4 cases of complete mole: the GTN was treated by single-agent chemotherapy. No subsequent changes were observed during follow-up in the other cases. Conclusion. Polymer-based immunohistochemical staining of (paternally imprinted gene, expressed from maternal allele) is a very effective method that can be used to differentiate androgenetic complete mole from partial mole and hydropic abortion. We might be able to avoid the cost of DNA analysis.

1. Introduction

Today, widespread use of ultrasonography and measurement of serum human chorionic gonadotropin (hCG) can be used to detect blighted ovum in the very early stage of pregnancy. Typical classic hydatidiform mole is now rarely seen. However, we, including pathologists, often face equivocal cases of complete mole versus partial mole that are difficult to diagnose histologically. In such cases, pathologists always notify us that complete mole cannot be ruled out and that strict clinical follow-up should be necessary. Usually, we proceed to DNA polymorphism analysis to obtain an accurate diagnosis in such cases. This requires both the patient’s consent and extra expenditures.

We recently read the report that gene, which encodes the cyclin-dependent kinase inhibitor (CDKI) , was located on chromosome 11 p15.5 and that this gene is paternally imprinted but expressed from the maternal allele. In the androgenetic complete mole, this gene is underexpressed or not expressed at all as discussed by Saxena et al. [1].

Several reports [2–7] have been published on the efficacy of immunohistochemical staining of this gene product for differentiation of complete mole, although there have been some exceptions. For many years, we have performed this same examination confirmed by DNA analysis in our laboratory. However, we obtained several false-positive results by immunohistochemical staining of . We noticed that the false-positive immunoreaction was induced by endogenous biotin when we applied the standard streptavidin-biotin method that was used in the reported studies.

The polymer-based method is now gaining traction as an improved method in immunohistochemical staining method. With this method, a secondary antibody conjugated with a polymer is used. This polymer method has 10 to 100 times the sensitivity of the standard method, and there is almost no false staining of the target cells. Before starting this study, we used the polymer method in 10 cases each of androgenetic complete mole, partial mole, and biparental spontaneous abortion. These cases have been diagnosed by DNA analysis in our laboratory.

We confirmed completely negative immunohistochemical staining of by this polymer method in cytotrophoblasts and villous stromal cells of the complete moles. Further, there was no false negative staining in the 10 cases of partial moles or the 10 cases of abortion, respectively, in this preliminary study.

We report herein the results obtained by polymer-based immunohistochemical staining of in 14 equivocal cases.

2. Objective

Can polymer-based immunohistochemical staining of replace DNA analysis as an inexpensive means of differentiating complete mole from partial mole or hydropic abortion?

3. Materials and Methods

3.1. Materials

We investigated 14 cases considered equivocal after evacuation by local doctors. All were local cases referred to us in 2012. All cases were initially diagnosed by pathologists working at commercial clinical laboratories. This is because local doctors ask first for pathological examination by commercial clinical laboratories as a matter of routine management. After equivocal results were returned to these doctors, the specimens were sent to us for further evaluation. Original paraffin-embedded tissue blocks from these 14 cases were collected by our laboratory for this project. These sections were made for each case stained with hematoxylin-eosin and then reexamined independently by our three pathologists and reclassified as difficult equivocal cases. Under our pathologists’ review, 5 cases were considered as either hydropic abortion or partial mole, and 9 cases were considered partial or complete mole (Table 1). Informed consent was obtained from all patients, and the 14 cases were examined by polymer-based immunohistochemical staining of .

Table 1: Fourteen equivocal cases subjected to polymer-based p57kip2 immunohistochemistry for differentiation between complete and partial mole or hydropic abortion.

Case/patient
Age (yr)
G-P-A
Clinical Dx*
hCG mIU/mL 
before evacuation
Histopathologic 
Dx
p57kip2 
staining
Final Dx

1
40
1-0-1
7 weeks
6700
Hydropic/partial
+
Hydropic/partial

2**
30
3-3-0
7 weeks
4780
Partial/complete
−
Complete mole

3
40
2-2-0
7 weeks
49100
Partial/complete
+
Partial

4
27
3-2-1
8 weeks
83100
Partial/complete
+
Partial

5**†
48
4-2-2
6 weeks
6590
partial/complete
−
Complete mole

6**
30
3-1-2
7 weeks
28500
Partial/complete
−
Complete mole

7
27
1-1-0
8 weeks
91700
Hydropic/partial
+
Hydropic/partial

8
44
3-1-2
7 weeks
4670
Hydropic/partial
+
Hydropic/partial

9**
27
1-1-0
6 weeks
31200
Partial/complete
−
Complete mole

10
34
2-1-1
7 weeks
7800
Partial/complete
+
Partial

11
34
2-1-1
8 weeks
4400
Partial/complete
+
Partial

12
33
0-0-0
5 weeks
4600
Partial/complete
+
Partial

13
32
1-1-0
6 weeks
6800
Hydropic/partial
+
Hydropic/partial

14
36
3-2-1
6 weeks
5200
Hydropic/partial
+
Hydropic/partial

G-P-A, gravida/para/abortus; hCG, human chorionic gonadotropin; dilation and curettage; Dx, diagnosis.

*All diagnosed clinically as blighted ovum; **clearly differentiated as complete hydatidiform mole by polymer-based immunohistochemistry for p57kip2; †hCG elevated to 8740, persistent trophoblastic disease, treated by single-agent chemotherapy.

S. SASAKI 2012.

3.2. Methods

The polymer-based method of immunohistochemical staining is now well known to have 10 to 100 times the sensitivity of the standard streptavidin-biotin method. The immunohistochemical staining was carried out by heat-induced antigen retrieval followed by the polymer method. Duplicated 4 µm thick sections from the formalin-fixed, paraffin-embedded blocks were obtained in each case. Sections were deparaffinized in xylene and alcohol, washed, and rehydrated in distilled water.

After endogenous peroxidase activity was quenched with 3% hydrogen peroxidase solution, antigen retrieval was performed. The sections were immersed in 0.01 M citrate buffer (pH 7.0) with 0.1% Tween-20, kept for 40 minutes at 98°C. The sections were allowed to cool for 20 minutes spontaneously. Next, sections were immersed in 1 mM EDTA (pH 9.0), for 40 minutes at 98°C, and again allowed to cool. Next the sections were immersed again in 1 mg/mL protease XXIV (Sigma-Aldrich. St. Louis, MO, USA) in PBS for 60 minutes at room temperature and then washed in water and PBS. To block nonspecific reactions, these sections were immersed with 5% gout serum for 20 minutes at room temperature. Mouse monoclonal antibody for human protein, the primary antibody, was applied to samples for overnight incubation at 4°C (Novocastra Liquid Mouse Monoclonal Antibody for human p57 protein (Product code: NCL-L-p57: Leica Biosystems Newcastle Ltd, Newcastle, UK)). Peroxidase-labeled secondary antibody for anti-mouse immunoglobulin conjugated with amino acid polymer (Nichirei Co, Ltd., Tokyo, Japan) was applied for 60 minutes at room temperature. Sections were then washed three times for 5 minutes each with PBS. The sections were incubated with diaminobenzidine as a chromogen for 10 minutes, then washed in water, and nuclear-counterstained with hematoxylin. Staining patterns on the tissue sections were examined microscopically and compared to those of control sections. The control sections were prepared from the DNA-established androgenetic complete moles, partial moles (triploidy), and abortions of biparental origin and prepared in the same manner as the cases’ sections.

Reactivity was judged positive only when distinct nuclear staining of cytotrophoblasts and villous stromal cells was identified. There was no faint nuclear staining observed by polymer-based method through this experiment. Control study showed clearly negative staining of complete moles and positive in partial moles and abortions in cytotrophoblasts and villous stromal cells, respectively. Decidual stromal cells were positive for in all cases and provided a reliable internal control (Figure 1). Syncytiotrophoblasts in complete moles, partial moles, and abortions always stained negatively (Figure 1).

(a)

(b)

(c)

Figure 1: Those figures are the control staining in hydropic abortion (left), partial mole (middle), and complete mole (right). Upper panels show hematoxylin-eosin staining, and middle and lower panels show immunohistochemical staining for by the polymer-based method of control hydropic abortion (left), partial mole (middle), and complete mole (right). Magnification are 100x and 400x by microscope, respectively. In cytotrophoblasts and villous stromal cells, strong positive immunoreactive staining for is seen in the hydropic abortion (left) and partial mole (middle): staining is absent in the complete mole (right). The genetic origins of the control partial and complete mole were established by DNA polymorphism analysis in our laboratory.

4. Results

Duplicate immunohistochemical staining by the polymer method was done for each of the 14 equivocal cases, and the staining patterns were compared with those of the control cases confirmed genetically in our laboratory. Four cases (Cases 2, 5, 6, and 9 indicated by asterisks in Table 1) showed a clearly negative immunoreaction for . The others stained positively.

Thus, we were able to differentiate these 4 cases as complete moles among the 9 equivocal cases of partial or complete mole. Cases 3, 4, 10, 11, and 12 in Table 1 were considered partial moles.

This staining did not differentiate partial moles from hydropic abortions.

The other cases (Cases 1, 7, 8, 13, and 14 in Table 1) remained equivocal cases of partial mole, or hydropic abortion.

These 4 cases of complete moles as well as the other cases were followed to 24 weeks by weekly serum hCG measurement. Of the 4 cases of complete mole, one (Case 5 in Table 1) developed into a secondary low risk gestational trophoblastic neoplasia (GTN) and was treated with single-agent chemotherapy.

No subsequent changes were observed during follow-up in the other cases.

5. Discussion

As a preliminary study, we performed standard streptavidin-biotin immunohistochemical staining of in our DNA-established complete mole and hydropic abortion cases to know how effective the reported method is for differentiation of complete moles from hydropic abortion [5, 6]. In several established moles, however, we observed false positive staining. In reading the previous papers carefully, we learned that the investigators also encountered a small percentage of false positive staining.

With the standard streptavidin-biotin method, endogenous biotin has a positive effect on the staining pattern. So, we then used 3% hydrogen peroxidase solution to quench the endogenous biotin activity. This was 10 times the concentration reported by Jun et al. [6], but we still encountered false positive staining in several established complete moles. Subsequently, we learned that the polymer method of immunohistochemical staining, in which a secondary antibody conjugated with a polymer is used, is much more sensitive (10 to 100 times) than the standard streptavidin-biotin method.

The polymer method is easy and more sensitive, and it is not affected by endogenous biotin.

The secondary antibody conjugated with a polymer can be easily obtained commercially.

The polymer-based method is now described in textbooks as an improved method.

We applied the polymer method to our DNA analysis-established androgenetic complete moles and confirmed that the polymer methods do not produce false-positive or false-negative staining.

We found the method to be a reliable tool that can be used to differentiate complete mole in equivocal cases without the need for DNA analysis of each specimen.

However, there is 1 report of a definitive androgenetic complete mole that stained positively for [3].

Of course, we must be vigilant, and we must realize that immunoreaction is not always absolute.

DNA analysis should be done, whenever a case remains questionable. However, there is no doubt that the polymer method is sensitive and effective.

We believe this method to be a very useful tool for differentiation of complete mole, when the results of other tests are equivocal. We would like to recommend that the polymer method of immunohistochemistry be applied first as a routine examination in any equivocal cases, especially for doctors who work in developing countries, where DNA analysis is far too expensive or even unfeasible. We may be able to avoid the cost of DNA analysis.

Kihara et al. published the first report of perfect concordance between negative immunoreactivity and molar tissue of androgenetic origin [8]. They used a polymer system produced by DakoCytomation (Glostrup, Denmark). Our study independently supports their findings.

6. Conclusion

Polymer-based immunohistochemical staining of (paternally imprinted gene, expressed from maternal allele) is a very effective method that can be used to differentiate androgenetic complete mole from partial mole and hydropic abortion. We might be able to avoid the cost of DNA analysis.

Ethical Approval

The authors obtained permission to conduct this study from the ethics committee of Iino Hospital, and they obtained informed consent from all 14 study patients.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This paper was presented at the XVII World Congress on Gestational Trophoblastic Diseases held in Chicago, IL, USA, September 19–23, 2013. The authors express their thanks to Dr. Takashi Kimuro (Chiba University, Kato Hospital at Kisarazu) for his help with the preparation of this paper.

References

A. Saxena, D. Frank, P. Panichkul, I. B. Van den Veyver, B. Tycko, and H. Thaker, “The product of the imprinted gene IPL marks human villous cytotrophoblast and is lost in complete hydatidiform mole,” Placenta, vol. 24, no. 8-9, pp. 835–842, 2003.

M. Chilosi, E. Piazzola, M. Lestani et al., “Differential expression of p57(kip2), a maternally imprinted cdk inhibitor, in normal human placenta and gestational trophoblastic disease,” Laboratory Investigation, vol. 78, no. 3, pp. 269–276, 1998.

D. H. Castrillon, D. Sun, S. Weremowicz, R. A. Fisher, C. P. Crum, and D. R. Genest, “Discrimination of complete hydatidiform mole from its mimics by immunohistochemistry of the paternally imprinted gene product p57KIP2,” American Journal of Surgical Pathology, vol. 25, no. 10, pp. 1225–1230, 2001.

R. A. Fisher, M. D. Hodges, H. C. Rees et al., “The maternally transcribed gene p57KIP2 (CDNK1C) is abnormally expressed in both androgenetic and biparental complete hydatidiform moles,” Human Molecular Genetics, vol. 11, no. 26, pp. 3267–3272, 2002.

M. Fukunaga, “Immunohistochemical characterization of expression in early hydatidiform moles,” Human Pathology, vol. 33, no. 12, pp. 1188–1192, 2002.

S.-Y. Jun, J. Y. Ro, and K.-R. Kim, “ is useful in the classification and differential diagnosis of complete and partial hydatidiform moles,” Histopathology, vol. 43, no. 1, pp. 17–25, 2003.

H. Crisp, J. L. Burton, R. Stewart, and M. Wells, “Refining the diagnosis of hydatidiform mole: image ploidy analysis and p57KIP2 immunohistochemistry,” Histopathology, vol. 43, no. 4, pp. 363–373, 2003.

M. Kihara, H. Matsui, K. Seki, Y. Nagai, N. Wake, and S. Sekiya, “Genetic origin and imprinting in hydatidiform moles. Comparison between DNA polymorphism analysis and immunoreactivity of p57kip2,” The Journal of Reproductive Medicine, vol. 50, no. 5, pp. 307–312, 2005.