BioMed Research International
Volume 2015 (2015), Article ID 941923, 1 page
http://dx.doi.org/10.1155/2015/941923

Corrigendum

Corrigendum to “Peak Vertical Ground Reaction Force during Two-Leg Landing: A Systematic Review and Mathematical Modeling”

Wenxin Niu,1,2,3 Tienan Feng,⁴ Chenghua Jiang,⁴ and Ming Zhang²

¹Tongji Hospital, Tongji University School of Medicine, Shanghai 200455, China
²Interdisciplinary Division of Biomedical Engineering, The Hong Kong Polytechnic University, Hong Kong
³Shanghai Key Laboratory of Orthopaedic Implants, Shanghai 200011, China
⁴Department of Disaster and Emergency Medicine, Eastern Hospital, Tongji University School of Medicine, Shanghai 200120, China

Received 18 April 2015; Accepted 4 May 2015

Copyright © 2015 Wenxin Niu et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the paper titled “Peak Vertical Ground Reaction Force during Two-Leg Landing: A Systematic Review and Mathematical Modeling,” there were two citation errors:

(1)Page 6: reference should be as follows: D. P. Fransz, A. Huurnink, I. Kingma, E. A. Verhagen, and J. H. van Dieën, “A systematic review and meta-analysis of dynamic tests and related force plate parameters used to evaluate neuromusculoskeletal function in foot and ankle pathology,” Clinical Biomechanics, vol. 28, no. 6, pp. 591–601, 2013.(2)Page 7: reference should be removed here.