BioMed Research International
Volume 2016 (2016), Article ID 3565916, 1 page
http://dx.doi.org/10.1155/2016/3565916

Corrigendum

Corrigendum to “Type 2C Phosphatase 1 of Artemisia annua L. Is a Negative Regulator of ABA Signaling”

Fangyuan Zhang, Xueqing Fu, Zongyou Lv, Qian Shen, Tingxian Yan, Weimin Jiang, Guofeng Wang, Xiaofen Sun, and Kexuan Tang

Plant Biotechnology Research Center, Fudan-SJTU-Nottingham Plant Biotechnology R&D Center, School of Agriculture and Biology, Shanghai Jiao Tong University, 800 Dongchuan Road, Shanghai 200240, China

Received 8 May 2016; Accepted 23 May 2016

Copyright © 2016 Fangyuan Zhang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Type 2C Phosphatase 1 of Artemisia annua L. Is a Negative Regulator of ABA Signaling” [1], the name of the sixth author was incorrectly written as Weiming Jiang while the correct name is Weimin Jiang. The correct authors’ list is shown above.

References

F. Zhang, X. Fu, Z. Lv et al., “Type 2C phosphatase 1 of Artemisia annua L. is a negative regulator of ABA signaling,” BioMed Research International, vol. 2014, Article ID 521794, 9 pages, 2014.