BioMed Research International
Volume 2016 (2016), Article ID 4152173, 1 page
http://dx.doi.org/10.1155/2016/4152173

Corrigendum

Corrigendum to “Effects of Sevoflurane and Propofol on Organ Blood Flow in Left Ventricular Assist Devices in Pigs”

Paloma Morillas-Sendín,¹ Emilio Delgado-Baeza,² María Jesús Delgado-Martos,² Mónica Barranco,¹ Juan Francisco Del Cañizo,² Manuel Ruíz,³ and Begoña Quintana-Villamandos1,4

¹Department of Anesthesiology and Intensive Care, Gregorio Marañón University General Hospital, 28007 Madrid, Spain
²Department of Experimental Medicine and Surgery, Gregorio Marañón University General Hospital, 28007 Madrid, Spain
³Department of Cardiac Surgery, Gregorio Marañón University General Hospital, 28007 Madrid, Spain
⁴Department of Pharmacology, Faculty of Medicine, Complutense University, 28040 Madrid, Spain

Received 30 May 2016; Accepted 7 June 2016

Copyright © 2016 Paloma Morillas-Sendín et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Effects of Sevoflurane and Propofol on Organ Blood Flow in Left Ventricular Assist Devices in Pigs” [1], there was an error in “Acknowledgments,” which should be corrected as follows.

This work was supported by FIS (PI08/1480, PI13/01261) and Fondos Feder.

References

P. Morillas-Sendín, E. Delgado-Baeza, M. J. Delgado-Martos et al., “Effects of sevoflurane and propofol on organ blood flow in left ventricular assist devices in pigs,” BioMed Research International, vol. 2015, Article ID 898373, 9 pages, 2015.