BioMed Research International
Volume 2016 (2016), Article ID 4729643, 1 page
http://dx.doi.org/10.1155/2016/4729643

Retraction

Retracted: Downregulation of MDR1 Gene by Cepharanthine Hydrochloride Is Related to the Activation of c-Jun/JNK in K562/ADR Cells

BioMed Research International

Received 25 August 2016; Accepted 25 August 2016

Copyright © 2016 BioMed Research International. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

BioMed Research International has retracted the article titled “Downregulation of MDR1 Gene by Cepharanthine Hydrochloride Is Related to the Activation of c-Jun/JNK in K562/ADR Cells.” [1]. β-Actin loading controls in the Western Blots were duplicated. The authors provided corrected figures but could not provide the original uncropped blots or laboratory books.

References

L. Han, Y. Wang, X. Guo et al., “Downregulation of MDR1 gene by cepharanthine hydrochloride is related to the activation of c-Jun/JNK in K562/ADR cells,” BioMed Research International, vol. 2014, Article ID 164391, 6 pages, 2014.