BioMed Research International
Volume 2016 (2016), Article ID 5047948, 1 page
http://dx.doi.org/10.1155/2016/5047948

Corrigendum

Corrigendum to “Value of Fused ¹⁸F-Choline-PET/MRI to Evaluate Prostate Cancer Relapse in Patients Showing Biochemical Recurrence after EBRT: Preliminary Results”

Arnoldo Piccardo,¹ Francesco Paparo,² Riccardo Piccazzo,² Mehrdad Naseri,¹ Paolo Ricci,³ Andrea Marziano,² Lorenzo Bacigalupo,² Ennio Biscaldi,² Gian Andrea Rollandi,² Filippo Grillo-Ruggieri,³ and Mohsen Farsad⁴

¹Nuclear Medicine Department, E.O. Galliera Hospital, Mura delle Cappuccine 14, 16128 Genoa, Italy
²Radiology Department, E.O. Galliera Hospital, Mura delle Cappuccine 14, 16128 Genoa, Italy
³Radiotherapy Department, E.O. Galliera Hospital, Mura delle Cappuccine 14, 16128 Genoa, Italy
⁴Nuclear Medicine Department, Azienda Sanitaria dell’Alto Adige, Via Lorenz Böhler 5, 39100 Bolzano, Italy

Received 15 February 2016; Accepted 22 February 2016

Copyright © 2016 Arnoldo Piccardo et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the research article titled “Value of Fused ¹⁸F-Choline-PET/MRI to Evaluate Prostate Cancer Relapse in Patients Showing Biochemical Recurrence after EBRT: Preliminary Results” [1] the last name of the third author was wrong, because it was spelled with a “c” instead of double “c”. The correct last name is as shown above.

References

A. Piccardo, F. Paparo, R. Picazzo et al., “Value of fused ¹⁸F-Choline-PET/MRI to evaluate prostate cancer relapse in patients showing biochemical recurrence after EBRT: Preliminary results,” BioMed Research International, vol. 2014, Article ID 103718, 2014.