BioMed Research International
Volume 2016 (2016), Article ID 7261027, 6 pages
http://dx.doi.org/10.1155/2016/7261027

Clinical Study

Miniopen Transforaminal Lumbar Interbody Fusion with Unilateral Fixation: A Comparison between Ipsilateral and Contralateral Reherniation

Zheng Li, Fubing Liu, Shuhao Liu, Zixian Chen, Chun Jiang, Zhenzhou Feng, and Xiaoxing Jiang

Department of Orthopaedics, Zhongshan Hospital of Fudan University, 180 Fenglin Road, Shanghai, China

Received 8 June 2016; Revised 30 September 2016; Accepted 11 October 2016

Academic Editor: Hiroaki Nakamura

Copyright © 2016 Zheng Li et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The aim of this study was to evaluate the risk factors between ipsilateral and contralateral reherniation and to compare the effectiveness of miniopen transforaminal lumbar interbody fusion (TLIF) with unilateral fixation for each group. From November 2007 to December 2014, clinical and radiographic data of each group (ipsilateral or contralateral reherniation) were collected and compared. Functional assessment (Visual Analog Scale (VAS) score and Japanese Orthopaedic Association (JOA)) and radiographic evaluation (fusion status, disc height, lumbar lordosis (LL), and functional spine unit (FSU) angle) were applied to compare surgical effect for each group preoperatively and at final followup. MacNab questionnaire was applied to further evaluate the satisfactory rate after the discectomy and fusion. No difference except pain-free interval was found between ipsilateral and contralateral groups. There was a significant difference in operative time between two groups. No differences were found in clinical and radiographic data for assessment of surgical effect between two groups. The satisfactory rate was decreasing in both groups with time passing after discectomy. Difference in pain-free interval may be a distinction for ipsilateral and contralateral reherniation. Miniopen TLIF with unilateral pedicle screw fixation can be a recommendable way for single level reherniation regardless of ipsilateral or contralateral reherniation.

1. Introduction

Recurrent lumbar disc herniation (rLDH) refers to disc herniation occurring at the ipsilateral or contralateral side of previous operation level and causes clinical symptoms after more than six months of “painless” period from primary surgery [1–3]. Many risk factors have been reported to be associated with rLDH, including age, gender, traumatic history, and disc degeneration [1, 4]; however, most risk factors are focused on ipsilateral reherniation, and only a few articles pay attention to the contralateral reherniation. Evidences show that different pathogenic mechanism may exist in those two kinds of reherniation [5, 6].

Recurrent lumbar herniation has become a common reason for revision surgery, and the optimal surgical treatment for rLDH is still controversial. Some authors propose that repeat discectomy is the treatment of choice, which could achieve satisfactory clinical outcome comparable to the primary procedure, and some spine surgeons believe that fusion is a reasonable choice as repeated discectomy requires more removal of disc materials, which would potentially affect the segmental stability; besides, the presence of scar tissue may increase the risk of nerve injury or dural tear [5, 7, 8]. Several articles have reported that TLIF with bilateral fixation is a recommendable choice for rLDH with satisfied surgical effect [8, 9]. Sonmez and Xue analyzed patients who underwent unilateral percutaneous instrumentation plus TLIF for rLDH and compared them with bilaterally instrumented group. Both groups had a significant decrease in VAS and JOA scores after surgery, while unilateral instrumented group had some advantages in operation time, blood loss, and economic cost [10, 11]. Up to now, no articles have been concerned with the difference which may exist between ipsilateral and contralateral reherniation after fusion. The aim of this study is to evaluate the risk factors between ipsilateral and contralateral reherniation and to compare the effectiveness of miniopen transforaminal lumbar interbody fusion (TLIF) with unilateral fixation for ipsilateral reherniation with those for contralateral ones.

2. Materials and Methods

2.1. Patient Group

From November 2007 to December 2014, 38 patients who were treated with unilateral pedicle screw instrumented TLIF were included in this study; among them, 31 patients with ipsilateral reherniation were set as group I and 7 patients with contralateral reherniation were set as group II. The inclusion criteria were (1) recurrent disc herniation nonresponse to conservative treatment of more than 3 months; (2) over 6 months of pain-free period after primary discectomy; (3) ipsilateral or contralateral disc herniation observed on imaging at the same level as the primary discectomy. Patients with pathological vertebral fracture, severe osteoporosis of the spine, active infection, or spinal metastasis were excluded. All patients developed back/leg pain, leg numbness, or intermittent claudication after an initial pain-free interval, which was averaged 63.3 months (range 6–228 months) following discectomy. All cases were single level recurrent herniation with imaging confirmed (Figure 1).

(a)

(b)

(c)

(d)

Figure 1: T2 sagittal (a) and axial (b) MRI show contralateral reherniation; T2 sagittal (c) and axial (d) MRI show ipsilateral reherniation. The arrow reflecting the laminectomy defect due to previous surgery.

2.2. Risk Factors Evaluation

The patients were divided into ipsilateral or contralateral group based on the orientation of the reherniation. Demographic and clinical data including age, gender, pain-free interval, LDH types, and traumatic history were compared between two groups. Radiographic factors including disc height (DH), lumbar lordosis (LL), and functional spine unit (FSU) angle were compared; two experienced spine surgeons who were blind to the clinical data took the measurement of radiographic value. DH, LL, and FSU angle were measured as the figure showed (Figure 2).

Figure 2: Preoperative and 3-day postoperative anterior-posterior X-ray images showing unilateral pedicle screw instrumented TLIF on L4-5 level. The angle of lumbar lordosis was measured between the superior endplate of L1 and S1. The functional spine unit was measured between the superior endplate and inferior endplate of fusion segment. The mean disc height was defined as the arithmetic mean between anterior and posterior disc height.

2.3. Surgical Procedure

All operations were conducted by the same surgeon in a single center. After successful general anesthesia, the patient was placed in a prone position, and the surgical level was confirmed with the help of a C-arm machine. A paramedian longitudinal incision about 4 cm long was made on the reherniation side. Paraspinal muscle was split and retracted to expose the articular process, transverse process, and lamina. According to the surface location and anatomic marker, two pedicle screws were placed, and then the inferior and superior articular processes, part of lamina, and ligamentum flavum were removed, to decompress the nerve root, A complete discectomy and end-plate preparation were performed; thereafter, a suitable cage filled with autologous bone, which came from the resected bones, was placed obliquely across the disc space, and then connecting rod was installed, followed by the fluoroscopy confirmation. After washing the wound with saline, a drainage tube was placed, and the incision was sutured by layers.

2.4. Surgical Outcome Evaluation

Perioperative parameters of both groups including incision length, intraoperative blood loss, drainage volume, operative time, hospital stay, and postoperative complications were obtained from hospital records and compared. Visual Analog Scale (VAS) score and Japanese Orthopaedic Association (JOA) were applied to assess the pain and functional outcome for each group preoperatively and at final followup. The patients were examined with X-ray films at 2, 6, and 12 months and annually thereafter after surgery. Three-dimensional CT (3DCT) scan was performed at 6 months and yearly to assess the fusion status accurately. Solid fusion was defined as bone bridging the disk space without lucency according to the 3DCT with sagittal and coronal reconstruction [12]. MacNab questionnaire was applied to further evaluate the satisfactory rate after the discectomy and fusion for each group.

2.5. Data Analysis

Statistical analysis was performed with SPSS 20.0 (SPSS, Inc., Chicago, IL, USA). The data of ipsilateral and contralateral groups were compared by two independent sample t-test and Fisher’s exact test. A value < 0.05 was considered to be significant.

3. Results

The 38 patients were followed up for a mean duration of 52.2 months, ranging from 12 to 93 months. Risk factors evaluation was shown in Table 1; there was no statistical significance for the two groups in age, gender, and traumatic history. Pain-free interval had significant difference between two groups and contralateral group has longer time of pain-free interval compared to that of ipsilateral group. Protruded and extruded type were more common in ipsilateral reherniation while extruded type except one protruded patient makes up the majority of contralateral reherniation group before the first surgery. Both groups have no sequestered patient. After the discectomy, the ratio of those types has no significant statistic difference (Table 2).

Table 1: Risk factors data analysis.

Parameters
Group

Ipsilateral (31)
Contralateral (7)

Age (years)

0.258

Gender (male/female)
19 : 12
3 : 4
0.425

Pain-free interval (months)

0.048

Fused segment

    L4-L5
20
2
0.108

    L5-S1
11
5

Data presented as mean ± SD. < 0.05 was considered to be significant.

Table 2: Types of lumbar disc herniation distribution of two groups before and after discectomy.

Parameters
Groups

LDH types
Ipsilateral (31)
Contralateral (7)

Before discectomy
Protruded-type
18
1

Extruded-type
13
6
0.09

Sequestered-type
0
0

After discectomy
Protruded-type
14
3

Extruded-type
17
4
1.00

Sequestered-type
0
0

Data presented as mean ± SD. < 0.05 was considered to be significant.

Perioperative parameters including incision length, blood loss, drainage volume, operative time, and hospital time were shown in Table 3. There was no statistical significant difference existing between the ipsilateral and contralateral group regarding the perioperative parameters except the operative time. One patient in ipsilateral group had superficial wound infection after surgery. The situation was under control after several dressing changes. No other complications such as dural tear were observed among these patients during the perioperative period. For radiographic data, DH, LL, and FSU angle and fused segment have no statistical difference for two groups before and after discectomy and after fusion with unilateral fixation TLIF (Table 4). Compared with preoperative values, the lumbar JOA scores of last followup were obviously improved. The postoperative VAS score was obviously lower than that of preoperative. Both groups showed no statistical significance in preoperative and postoperative score and fusion rate (Table 5). The satisfactory rates were decreasing in both groups with time passing. After 6 months from the first surgery, the satisfactory rate was 93.5% (excellent and good according to the Macnab criteria) in ipsilateral group, while in contralateral group the rate was 100% and the rate decreased at 2 years after the discectomy (58.1% in ipsilateral group and 71.4% in contralateral group) and was lower at 4 years after surgery (41.9% in ipsilateral group and 57.1% in contralateral group) (Table 6).

Table 3: Perioperative parameters in patients undergoing unilateral fixation TLIF for the treatment of recurrent herniation.

Variable
Ipsilateral (31)
Contralateral (7)

Incision length (cm)

0.408

Intraoperative blood loss (mL)

0.161

Drainage volume (mL)

0.139

Operative time (minutes)

0.038

Hospital time (days)

0.713

Data presented as mean ± SD. < 0.05 was considered to be significant.

Table 4: Radiographic evaluation before and after discectomy and after fusion with unilateral fixation TLIF for the treatment of recurrent herniation.

Period
Parameters
Groups

Ipsilateral (31)
Contralateral (7)

Before discectomy
Disc height

0.211

Functional spine unit

0.113

Lumbar lordosis

0.468

After discectomy
Disc height

0.404

Functional spine unit

0.472

Lumbar lordosis

0.322

After fusion
Disc height

0.170

Functional spine unit

0.054

Lumbar lordosis

0.590

Data presented as mean ± SD. < 0.05 was considered to be significant.

Table 5: Clinical evaluation before and after unilateral fixation TLIF for the treatment of recurrent herniation.

Variable
Ipsilateral (31)
Contralateral (7)
P

Preoperative

    Back pain VAS score

0.403

    Leg pain VAS score

0.280

    JOA score

0.367

Last followup

    Back pain VAS score

0.709

    Leg pain VAS score

0.473

    JOA score

0.614

Fusion rate
90.3%
85.7%
1.000

Data presented as mean ± SD, <0.05 was considered to be significant.

Table 6: Satisfactory rate for two groups after the discectomy and fusion.

Satisfactory rate
Time
Groups

Ipsilateral (31)
Contralateral (7)

After the discectomy
6 months
93.5%
100%

2 years
58.1%
71.4%

4 years
41.9%
57.1%

After the fusion
6 months
100%
100%

Last followup
96.8%
100%

4. Discussion

Recurrent lumbar herniation has become a common reason for revision surgery. The incidence of rLDH ranges from 5% to 11% and increases over time [13]. Many risk factors have been reported to be associated with rLDH. Suk et al. reported that young age, male gender, smoking, and traumatic history may be the risk factors for recurrent herniation after conventional open discectomy [1]. In another report, Choi et al. conducted a study which showed that long pain-free interval and mild disc degeneration could differentiate the development of contralateral reherniation from that of ipsilateral reherniation [5]. In our study, pain-free period of contralateral group was significantly longer than that of ipsilateral group as Choi et al. reported. Besides, a longer pain-free time may indicate a high satisfactory rate to some extent. Contralateral reherniation may have a different pathology mechanism from that of ipsilateral. The extruded type was more common in contralateral group, for this type of herniation requires more removal of disc materials which may reduce the rate of rLDH in a short time; however, it may also potentially affect the segmental stability and accelerate the disc degeneration. As a result, rLDH will be induced, and it may play more important role in contralateral reherniation.

Surgical treatment for rLDH has been controversial and can be broadly categorized as revision discectomy alone or revision discectomy with fusion; however, some authors argued that repeat discectomy would weaken the stability of the involved spine and increased the risk of rLDH. Österman et al. in a large retrospective study revealed that patients undergoing multiple revisions after lumbar discectomy got markedly reduced risk for subsequent operations if the first procedure was a spinal fusion [14]. Therefore, it appears to be a reasonable choice for fusing the index level in cases of rLDH. There are many fusing choices including PLF, PLIF, ALIF, and TLIF, the latter of which has been a well-accepted procedure [15]. The use of unilateral pedicle screw fixation with TLIF for rLDH was also reported in some study and the clinical effect was satisfied [10, 11]. Our study demonstrated that JOA and VAS score improved significantly after surgery. Postoperative radiographic result showed a good fusion rate which indicated the effect of this surgical technical. Besides, a miniopen paramedian approach about 4 cm long was applied, which can provide a greater surgical field, and miniopen TLIF required shorter time to learn compared to minimally invasive TLIF [16].

Perioperative parameters data showed no difference between ipsilateral and contralateral group except the operative time, even though the paramedian TLIF can provide a facilitated pathway through the unscarred tissue. However, more attention is still needed to avoid dural rupture or root injury, and this may illustrate the reason for more time in ipsilateral group. Preoperative and postoperative functional evaluation including JOA and VAS had no statistical difference between two groups; the fusion rate was comparable to that of other studies [11, 17]. Satisfactory rate after fusion was quite good at last followup. Taken together, miniopen TLIF with unilateral pedicle screw fixation can be a recommendable way for single level rLDH regardless of ipsilateral or contralateral reherniation.

There are some limitations in this study. Firstly, it is a retrospective case-control study, which inevitably has selection and recall bias, despite the fact that we collected and analyzed the data meticulously. Secondly, the number of patients included in this study is relatively small and the followup time is relatively short in some patients. Thus, a randomized controlled study with enough samples is needed to further confirm the safety and effectiveness of this surgical technology.

5. Conclusion

Difference in pain-free interval may be a distinction for ipsilateral and contralateral reherniation. Unilateral pedicle screw instrumented TLIF via a miniopen paramedian incision can provide a safe, effective, and less invasive way for the treatment of rLDH regardless of ipsilateral or contralateral reherniation.

Competing Interests

The authors declare that they have no competing interests.

Authors’ Contributions

Zheng Li and Fubing Liu contributed equally to this study.

References

K.-S. Suk, H.-M. Lee, S.-H. Moon, and N.-H. Kim, “Recurrent lumbar disc herniation: results of operative management,” Spine, vol. 26, no. 6, pp. 672–676, 2001.

C.-C. Niu, L.-H. Chen, P.-L. Lai, T.-S. Fu, and W.-J. Chen, “Single cylindrical threaded cage used in recurrent lumbar disc herniation,” Journal of Spinal Disorders and Techniques, vol. 18, no. 1, pp. S65–S72, 2005.

M. J. McGirt, G. L. Garcés Ambrossi, G. Datoo et al., “Recurrent disc herniation and long-term back pain after primary lumbar discectomy: review of outcomes reported for limited versus aggressive disc removal,” Neurosurgery, vol. 64, no. 2, pp. 338–344, 2009.

M. Shimia, A. Babaei-Ghazani, B. E. Sadat, B. Habibi, and A. Habibzadeh, “Risk factors of recurrent lumbar disk herniation,” Asian Journal of Neurosurgery, vol. 8, no. 2, pp. 93–96, 2013.

K. B. Choi, D. Y. Lee, and S.-H. Lee, “Contralateral reherniation after open lumbar microdiscectomy: a comparison with ipsilateral reherniation,” Journal of Korean Neurosurgical Society, vol. 44, no. 5, pp. 320–326, 2008.

G. Cinotti, S. Gumina, G. Giannicola, and F. Postacchini, “Contralateral recurrent lumbar disc herniation: results of discectomy compared with those in primary herniation,” Spine, vol. 24, no. 8, pp. 800–806, 1999.

S. Ozgen, S. Naderi, M. M. Ozek, and M. N. Pamir, “Findings and outcome of revision lumbar disc surgery,” Journal of Spinal Disorders, vol. 12, no. 4, pp. 287–292, 1999.

Z. Li, J. Tang, S. Hou et al., “Four-year follow-up results of transforaminal lumbar interbody fusion as revision surgery for recurrent lumbar disc herniation after conventional discectomy,” Journal of Clinical Neuroscience, vol. 22, no. 2, pp. 331–337, 2015.

Z. Chen, J. Zhao, A. Liu, J. Yuan, and Z. Li, “Surgical treatment of recurrent lumbar disc herniation by transforaminal lumbar interbody fusion,” International Orthopaedics, vol. 33, no. 1, pp. 197–201, 2009.

E. Sonmez, I. Coven, F. Sahinturk, C. Yilmaz, and H. Caner, “Unilateral percutaneous pedicle screw instrumentation with minimally invasive tlif for the treatment of recurrent lumbar disk disease: 2 years follow-up,” Turkish Neurosurgery, vol. 23, no. 3, pp. 372–378, 2013.

H. Xue, Y. Tu, and M. Cai, “Comparison of unilateral versus bilateral instrumented transforaminal lumbar interbody fusion in degenerative lumbar diseases,” Spine Journal, vol. 12, no. 3, pp. 209–215, 2012.

L. Hackenberg, H. Halm, V. Bullmann, V. Vieth, M. Schneider, and U. Liljenqvist, “Transforaminal lumbar interbody fusion: a safe technique with satisfactory three to five year results,” European Spine Journal, vol. 14, no. 6, pp. 551–558, 2005.

P. Gaston and R. W. Marshall, “Survival analysis is a better estimate of recurrent disc herniation,” Journal of Bone and Joint Surgery—Series B, vol. 85, no. 4, pp. 535–537, 2003.

H. Österman, R. Sund, S. Seitsalo, and I. Keskimäki, “Risk of multiple reoperations after lumbar discectomy: a population-based study,” Spine, vol. 28, no. 6, pp. 621–627, 2003.

T. E. Mroz, D. Lubelski, S. K. Williams et al., “Differences in the surgical treatment of recurrent lumbar disc herniation among spine surgeons in the United States,” Spine Journal, vol. 14, no. 10, pp. 2334–2343, 2014.

W.-L. Lo, C.-M. Lin, Y.-S. Yeh et al., “Comparing miniopen and minimally invasive transforaminal interbody fusion in single-level lumbar degeneration,” BioMed Research International, vol. 2015, Article ID 168384, 5 pages, 2015.

K. S. Suk, H. M. Lee, N. H. Kim, and J. W. Ha, “Unilateral versus bilateral pedicle screw fixation in lumbar spinal fusion,” Spine, vol. 25, no. 14, pp. 1843–1847, 2000.