BioMed Research International
Volume 2016 (2016), Article ID 7461047, 8 pages
http://dx.doi.org/10.1155/2016/7461047

Review Article

Experimental Models of Oral Biofilms Developed on Inert Substrates: A Review of the Literature

Lopez-Nguyen Darrene¹ and Badet Cecile1,2

¹Université de Bordeaux, 16 Cours de la Marne, 33082 Bordeaux, France
²ISVV, EA 4577 Unité de Recherche Oenologie, Institut Polytechnique de Bordeaux, Université de Bordeaux, 33140 Villenave d’Ornon, France

Received 3 July 2016; Accepted 14 August 2016

Academic Editor: Aruni Wilson

Copyright © 2016 Lopez-Nguyen Darrene and Badet Cecile. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The oral ecosystem is a very complex environment where more than 700 different bacterial species can be found. Most of them are organized in biofilm on dental and mucosal surfaces. Studying this community is important because a rupture in stability can lead to the preeminence of pathogenic microorganisms, causing dental decay, gingivitis, or periodontitis. The multitude of species complicates biofilm analysis so its reproduction, collection, and counting are very delicate. The development of experimental models of dental biofilms was therefore essential and multiple in vitro designs have emerged, each of them especially adapted to observing biofilm formation of specific bacteria within specific environments. The aim of this review is to analyze oral biofilm models.

1. Introduction

The oral cavity is a complex environment harboring more than 700 bacterial taxa. One major player in this ecosystem is dental plaque which develops naturally on hard and soft tissues of the mouth. Most oral bacteria are found in this biofilm whose complex organization remains relatively stable over time despite regular environmental changes [1–4]. Pathologies such as dental caries or periodontitis may arise when the equilibrium is compromised and when an imbalance occurs among the indigenous bacteria [5].

For many years, the oral ecosystem was studied with a reductionist approach, microbiologists studying bacterial species individually. This strategy made it possible to review and understand all the different components of this ecosystem, but without being able to explain how bacteria can form biofilms or to understand their functioning. The development of experimental models of dental biofilms was therefore essential and multiple in vitro models have emerged, each of them especially adapted to observing biofilm formation of specific bacteria within specific environments.

The aim of this review is to present currently available oral biofilm models. Various experimental designs have been developed from simple ones with a single bacterium to more complex multispecies designs.

Interests and limits of each model described below are given in Table 1.

Table 1: Interests and limits of various experimental models of biofilms.

Interest
Limits

Saliva

    Human
(i) Contains a complex & complete blend of proteins, glycosaminoglycans, and ions that form a pellicle on tooth surface
(i) Quality: need healthy volunteers
(ii) Quantity: need many volunteers
(iii) Limited reproducibility

    Artificial
(i) Reproducibility
(ii) Low cost
(i) Less complex blend of molecules
(ii) Do not mimic in vivo conditions

Substrates

    Glass
(i) Allows a simple and fast screening
(ii) Low cost
(i) Direct bacterial adherence: no EAP creation
(ii) Scoring could be operator dependent

    Dentin/enamel
(i) Study of cariogenic, periodontal, endodontic, and Dentin/Composite interface specific biofilms
(ii) Close to in vivo condition
Need for human or bovine teeth

    Polystyrene (96-well plates)
(i) Can be coated with collagen, saliva, and/or different substances
(ii) Allows many simultaneous studies: comparison of different stains, media, and substances in the same array
(i) When not coated: only direct bacterial adherence
(ii) Far from in vivo conditions

    Hydroxyapatite
(i) Best synthetic substrate mimicking human dental tissues
(ii) Avoid the search of extracted teeth and their sterilization
(iii) Can be coated with collagen, saliva & different substances
(i) Cost
(ii) When not coated: only direct bacterial adherence (no EAP creation)

Incubation conditions

    Batch models
(i) Multispecies biofilms
(ii) Allows the study of interactions in bacterial communities and the effect of various substances
(i) Far from in vivo conditions: does not integrate the changing environmental conditions occurring during biofilm growth

    Continuous culture

        Constant depth fermentor
(i) Allows the control of environmental factors: gas flow, real time medium and waste monitoring, biofilm thickness, temperature, and pH
(ii) Allows the formation of multispecies biofilms
(i) Cost
(ii) Complexity of protocol
(iii) No vast simultaneous studies allowed
(iv) Can only handle up to 2 experiments at a time

        Flow cell chamber
(i) Allows the control of environmental factors
(ii) Allows real time microscope observation

Biofilm collection

    Scrapping
Allows the removal of almost all the biofilm
(i) Operator-dependent

    Vortexing & sonification
(i) Reproducibility
(ii) Fast and easy
The first (deeper) bacterial layer can remain on the medium

Biofilm analysis

    Cultivation on agar media
(i) Simple
(ii) Allows further identification methods
(iii) Selection of sustainable strains
(i) Delayed results
(ii) Only for culturable species
(iii) Time consuming

    Gram staining
(i) Low cost
(ii) Fast and easy
(i) Limited identification based on colony and bacterial morphology

    FISH
(i) Can focus on targeted bacteria in a multispecies biofilm
(ii) Possible to combine consecutive FISH with multiple rRNA
(iii) Can be combined with CLSM and PCR
(i) Cost
(ii) Complexity of protocol
(iii) Inability to discriminate live and dead bacteria

    CLSM
(i) Allows discriminating between live and dead bacteria
(ii) Can determine the distribution of all the different species within the biofilm at different development times
(iii) Can be combined with FISH and PCR
(i) Cost
(ii) Complexity of protocol
(iii) Inability to discriminate stains (only on morphology)
(iv) Inability to assess gene expression

    SEM
(i) Can determine the distribution of all the different species within the biofilm
(i) Cost
(ii) Complexity of protocol
(iii) Inability to discriminate live and dead bacteria

    PCR
(i) Allows identifying and counting bacterial stains directly
(ii) Can be combined with culture on specific media
FISH: better results than CFU counts
CLSM
(i) Cost
(ii) Multispecies biofilms need a cultivation and isolation of every colony prior to PCR
(iii) Inability to discriminate live and dead bacteria

2. Saliva and Medium

2.1. Saliva

Adhesion of bacteria to solid substratum is often mediated by a conditioning film of molecules adsorbed to the surface. In the oral cavity, the dental pellicle needs to be deposited on tooth surfaces for oral biofilm to develop. It is mostly composed of salivary proteins.

In order to mimic this coat, some authors recommend using artificial saliva, the major advantage being that it is reproducible.

Pratten compared various artificial saliva compositions: basic saliva first described by Russell and Coulter [6], hybrid saliva (with modified proportions), modified saliva (without lab-lemco), and complete saliva (with more mucins). Complete saliva seems to be the most reasonable compromise [7]. Basic saliva has also been used in other works that aimed to test the effect of antimicrobial agents on orthodontic bonding materials [8], the effect of manganese on Streptococcus mutans biofilm [9], or the effect of various oral rinses on the detachment of an artificial oral biofilm [10]. Wong and Sissons compared two different types of saliva: BMM (Basal Medium Mucin) and DMM (Defined Medium Mucin) [11]. BMM is a complex mucin-containing but chemically undefined medium, while DMM is based on the Shellis artificial saliva [12] and contains various ions, vitamins, amino acids, and growth factors at the same rate as in human saliva. Other authors also supplied their biofilm with DMM in order to test the effect of nutrient variations on the formation of biofilms [12–15].

All these artificial media have a simpler composition than natural human saliva. Particularly, they do not contain the various proteins present in the acquired pellicle (e.g., histatins, proline rich proteins) which play an important role in the mechanisms of bacterial adherence. For this reason, human saliva was used in many other studies in order to be closer to oral conditions [16–18]. Human saliva can be collected from only one or several healthy volunteers [19, 20]. It is obtained by splitting at least 1 hour and a half after eating, drinking, and tooth cleaning. Samples are pooled and centrifuged, and the supernatants are pasteurized and recentrifuged before being stored at −20°C [21].

In order to grow biofilms, media have to reach all the complex nutritional requirements to allow the growth of bacteria. Saliva only or its combination with selective media can be used. Regarding selective media, in case of mono-species biofilms, each bacterium has its preferred medium that eases its growth.

In case of plurispecies biofilms, the Fluid Universal Medium, described by Guggenheim et al. [21], can generally allow the growth of many bacterial species, so it has been used as a support for multispecies biofilms. This FUM went through modifications and created the modified FUM (supplemented with 67 mmol/L Sorensen’s buffer, pH 7.2), the enriched FUM (+0.15% sucrose, 0.15% glucose). 50% heat inactivated horse serum can be added to help the growth of certain bacteria, as well as N-acetylmuramic acid for T. forsythia, of 0.34 mM hemin for P. gingivalis [22].

3. Substrates

3.1. Experimental Oral Biofilms Are Developed on Various Supports

3.1.1. Glass Surfaces

Hamada and Torii described a very simple device for testing biofilm formation on an inert surface [23]. Briefly, an overnight culture was added to a glass tube containing specific medium and sucrose 1%. The cultures were incubated at 37°C with an angle of 30 degrees. Biofilm formation was evaluated after 24 to 48 hours with the Murchison scale from 0 (no adhesion) to 4 (strongly adhesive) [24]. Hasan et al. used this support to study the effect on sucrose-dependent and sucrose-independent adherence of S. mutans and the inhibitory effect of a plant extract on these bacteria [25, 26].

This model also enabled the investigation of the adherence capacities of oral lactobacilli for potential probiotic purposes [27] and the antiadherence properties of polyphenolic compounds on oral bacteria [28]. However, this design does not include the formation of the acquired pellicle: the bacteria directly adhere on the glass surface. For the authors, the ability of S. mutans cells to colonize various smooth surfaces may be due to the insoluble glucans synthesized from sucrose by the bound glucosyltransferase. Therefore, this experimental model makes it possible to quickly screen the biofilm formation capacity of various strains that possess this enzyme.

3.1.2. Dentin

Most studies carried out on dentin have focused on endodontic infection. Endodontic disease is a biofilm-mediated infection in which Enterococcus faecalis is commonly found [29]. The dentin discs used can be of human [30–32] or bovine origin [33–36]. Some other studies have also been performed on human whole teeth [37]. Many studies aimed to evaluate the antimicrobial activity of various solutions and their capacity to eradicate E. faecalis biofilm [30, 31, 34, 36]. Unlike the above-mentioned studies, Li et al. worked on the dentin-composite interface subjected to multispecies biofilm [35]. Bovine dentin discs have also been used in a continuous culture model to study the effects of shiitake mushrooms on biofilms composition and cariogenic properties [33].

3.1.3. Enamel

Enamel is mostly used as a substratum for cariogenic biofilm models. Like dentin, it may be of human or bovine origin [38, 39]. The role of sucrose as a cariogenic molecule has been widely investigated using this substratum in batch models [39, 40] or in an artificial mouth [38].

3.1.4. Polystyrene Surfaces

Polystyrene microtiter plates provide a convenient and sterile abiotic surface for studying bacterial biofilm formation. Loo et al. used this support to study Streptococcus gordonii biofilm and particularly to identify the genes that code for biofilm phenotypes [41]. Oettinger-Barak et al. as well as Izano et al. used static 96-well plates to investigate the effect of antibiotics on biofilm formation [42, 43]. The biofilms were highlighted with crystal violet staining after a 24-hour incubation. To analyze the effect of the xylitol and ursolic combination or a synthetic peptide, 24-well plates were used to grow biofilms of various Streptococcus species [44, 45]. Other species have also been investigated using this medium: for example, Actinomyces naeslundii [46] and E. faecalis [47]. A comparison between mono-species and duo-species biofilm combining S. mutans and Veillonella parvula was made by Kara et al. on 96-well plates [48].

In all these studies, bacteria adhered directly on polystyrene surfaces. Other authors have used microtiter plates coated with various substrates. Human saliva was found to allow the growth of mono-species biofilms [49]. Saito et al. inoculated periapical microorganisms on plates coated with collagen to confirm the stimulation of Fusobacterium nucleatum biofilm formation by Porphyromonas gingivalis [50]. The effect of Kaempferia pandurata on multispecies biofilm was investigated by Yanti et al. by coating it on the plates before growing the biofilm [51].

3.1.5. Hydroxyapatite

The use of hydroxyapatite allows studies on synthetic media mimicking dental tissues, thereby avoiding the search for extracted teeth. Many authors have used this medium in form of either beads or discs. Saliva-coated hydroxyapatite beads have been used in various studies. The growth rate and biofilm thickness of a dual biofilm of S. mutans and Streptococcus sobrinus were studied by Rozen et al. [52]. The adherence properties of bacterial strains as oral probiotic candidates have also been processed on saliva-coated hydroxyapatite beads [53] or discs [27]. Furthermore, hydroxyapatite has been used to investigate the effects of various molecules on S. mutans biofilm formation on both beads [50, 54–56] and discs [57–59].

Other authors have investigated dual-species biofilms. Li et al. tested the effect of nicotine on dual-species biofilms of S. mutans and Streptococcus sanguinis [60]. Ali Mohammed et al. worked on the DNase I and proteinase K treatment of F. nucleatum and P. gingivalis biofilms [61]. Dual-species biofilms allowed the observation of differences in growth and acid formation between S. mutans and V. parvula strains [48].

Hydroxyapatite discs were also the medium used in the Zürich model described below [21].

4. Incubation Conditions

Bacterial oral biofilm model systems can be divided into two groups: closed batch culture and open continuous culture models.

4.1. Batch Models

One commonly used model developed by Guggenheim et al. is called the Zürich model [21]. This multispecies model allows the study of interactions in bacterial communities.

The first version of this model contained five different species (A. naeslundii, Veillonella dispar, F. nucleatum, S. sobrinus, and Streptococcus oralis). Biofilms are developed on hydroxyapatite discs coated with pasteurized human saliva for 64 hours in anaerobic conditions before collection. This model was subsequently improved by adding more bacterial species [62]. Using this more recent model, Ammann et al. demonstrated the importance of nutritional conditions for biofilm development and brought some changes to the culture conditions. The Zürich model has been used extensively to test the effect of various components like plant extracts, polyphenolic compounds, and mouthwashes [28, 59, 63, 64]. Furthermore, it has been used to study the effect of xylitol on a growing biofilm [65]. While various studies have described biofilm formation in static systems, bacteria in the oral cavity are subject to constantly changing environmental conditions (e.g., saliva flow conditions). Static models are not able to simulate these conditions so dynamic models are required.

4.2. Continuous Culture Models

4.2.1. Constant Depth Film Fermenter

The Constant Depth Film Fermenter is a dynamic biofilm model that allows the control of environmental factors such as the substratum, the nutrient source, and the gas flow [66]. Even biofilm thickness can be controlled [67]. Mono-species biofilm can be studied in this apparatus [68], but the principal advantage is to work with multispecies biofilm mimicking in vivo conditions as closely as possible. For example, Ready et al. assessed the resistance of a multispecies oral biofilm to tetracycline with this model [69].

The concept consists in a glass cylinder that contains a stainless steel plate linked to an electric motor that allows the plate rotation. Pores at the cylinder summit enable gas and medium to enter and exit. On the plate, wells are dug into which discs or substratum can be dropped. Temperature and gas flow are controlled and medium and saliva are injected with a pump. Excessive medium is absorbed. The Constant Depth Film Fermenter is a complex system allowing only one antimicrobial formula to be tested at a time so it has been improved, and two different treatments can now be performed at the same time [33, 70].

4.2.2. Flow Cell Chamber System

This model consists in a glass slide coated with saliva that is placed in a chamber and is crossed by a continuous flow of medium [71, 72]. Schlafer et al. tested the effect of osteopontin on a multispecies biofilm using this model [73]. Furthermore, by allowing the evaluation of biofilm development under flow and shear conditions, it has been used to assess antibiotics [42]. Periodontal biofilm can also be developed with it [74].

5. Biofilm Collection and Analysis

The methods used to identify different microorganisms in a microcosm biofilm vary according to the models. There are two approaches: cultivation-based and non-cultivation-based.

5.1. Cultivation-Based Methods

This technique needs the biofilm to be collected. Some authors recommend vigorous vortexing to remove cells from the biofilm [64, 75]. Ready et al. add a sonication step after vortexing the biofilm [69]. Wirtanen et al. harvest the biofilm by scratching the surface of the tray with a swab and then immersing it in a dilution medium [76]. In their Zürich model, Guggenheim et al. scratch the surface of the disc with a sterile curette to harvest all the cells of the biofilm, even those that are firmly attached [21]. The collected biofilm is then plated on various selective agar media. The distinct colony morphology and gram staining allow the species to be differentiated. This technique of counting colony forming units makes it possible to investigate the effect of various components on the viability of bacteria both on mono-species biofilms [44, 45, 56] and on plurispecies ones [63, 65, 77, 78]. However, it is a time-consuming method and noncultivable species cannot be included in the biofilm. Moreover, scratching of biofilms on hydroxyapatite surfaces may not be easily reproducible.

5.2. Non-Cultivation-Based Methods

Since oral diseases have a complex etiology and because only around 50% of oral biofilm can be grown at present, culture-independent molecular-based approaches have been developed that give a more comprehensive assessment of the presence of a range of putative pathogens in samples [78]. In studies on E. faecalis biofilms, dentin specimens were stained with BacLight and observed with a fluorescence microscope [30]. In multispecies models, fluorescence in situ hybridization (FISH) in combination with epifluorescence and confocal laser scanning microscopy (CLSM) are other standard methods for the visualization and identification of species.

5.2.1. In Situ Hybridization Fluorescence (FISH)

A sequential FISH approach allows multiple populations to be detected in a biofilm sample [79]. Indeed, FISH is a recognized tool for the specific identification of targeted bacteria within multispecies biofilms [62]. Moreover, Thurnheer et al. showed that it is possible to perform several consecutive FISH procedures with multiple rRNA to identify simultaneously many members of biofilms [80]. FISH can also be combined with CLSM [62, 64].

5.2.2. Epifluorescence Microscopy and Confocal Laser Scanning Microscopy (CLSM)

The LIVE/DEAD® BacLight™ fluorescence solution can be used to differentiate viable cells from nonviable ones in terms of membrane integrity. Viable cells are stained with SYTO9® which fluoresces green, while the nonviable ones are stained with propidium iodide which fluoresces red. Using BacLight LIVE/DEAD, Standar et al. inspected cells by fluorescence microscopy when they worked on the biofilm behavior of mixed-species cultures with dental and periodontal pathogens [81]. Chávez de Paz also used this technique to assess cell viability within multispecies biofilms in root canals [82].

CLSM has also been widely used to observe biofilms in three dimensions. It allows the systematic collection of high-quality biofilm images suitable for digital image analysis [79]. After 15 mn dark incubation, de Carvalho et al. use an excitation wavelength of 488 nm to collect all light emitted between 500 and 550 nm and over 560 nm by various filters. They use the scan mode time series to take a series of time-lapse scans at intervals of 10 s during 590 s in continuous scanning mode with a 10x objective lens [83]. Hobby et al. incubate the wells for 18 mn before using a Zeiss LSM 510 Meta confocal scanning system [84].

Some models combine non-cultivation-based and cultivation-based methods. According to Blanc et al., it is thus possible to determine the presence of all the species within the biofilm structure, the volume occupied by the bacteria, and the distribution of live and dead cells at the different biofilm development times [85].

5.2.3. Scanning Electron Microscopy (SEM)

Standar et al. use SEM to observe their multispecies biofilms models. Biofilms are fixed for 24 hours in a 2.5% glutaraldehyde solution and the supports are rinsed with 0.1 M Na-acetate buffer and dehydrated with a graded ethanol series. Then they are subjected to critical point drying with CO₂, covered with gold (10 nm thickness) and examined with a Zeiss DSM 960 A electron microscope [81]. Howlin et al. also use this technique to visualize biofilms after their removal with an ultrasonically activated water stream [86]. Thurnheer et al. also use SEM to study the role of red complex bacteria in the colonization of gingival epithelia by subgingival biofilms in vitro [74].

5.2.4. PCR

Until recently, PCR was mostly used to identify and count bacterial species in vivo or in dental plaque samples in connection with oral diseases (caries, periodontitis) [87, 88]. However, in more recent studies, it has also been used to identify species in in vitro models either after culture or directly within the biofilm. For example, Zaura et al. used quantitative real-time PCR (qPCR) to observe microbial shifts due to the effect of shiitake mushroom on an in vitro caries model [33].

In 2013, Ammann at al. compared a qPCR assay with fluorescence microscopy and colony forming unit counting on selective agars. They found that all ten species included in their in vitro biofilm were successfully quantified using qPCR and FISH or immunofluorescence as well as the eight species culturable on selective agar plates. They concluded that CFU counts yielded lower values than the other methods. The same authors also used qPCR combined with CLSM following FISH to compare the quantitative distribution of bacteria and the three-dimensional structure of biofilms either with or without early colonizing species added at a later time point [22]. For a very close purpose, Karched et al. using only qPCR showed that six periodontal species were able to form multispecies biofilm up to eight days in vitro without pioneer plaque bacteria [89].

The limitation of qPCR is its inability to discriminate between live and dead cells. Extracellular DNA present in the matrix of the biofilm can also be quantified. To overcome this problem, propidium monoazide has been used in association with qPCR [90, 91]. The results of these studies demonstrated the efficiency of PMA for differentiating viable and dead strains of various species.

6. Conclusion

Because biofilms constitute a privileged way of life for oral bacteria, a clear understanding of the processes involved in their formation, their pathogenicity, and their resistance in various biocides is essential for their control. While several experimental models have been proposed to date, differences in biofilm formation times, growth media, incubation conditions (static or flow, aerobic or anaerobic), and the procedures for collecting and analyzing biofilms make a comparison difficult. Choosing the most suitable procedure depends on the particular objective that is sought and on the laboratory facilities that are available.

Competing Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

References

P. E. Kolenbrander and J. London, “Adhere today, here tomorrow: oral bacterial adherence,” Journal of Bacteriology, vol. 175, no. 11, pp. 3247–3252, 1993.

P. D. Marsh and D. J. Bradshaw, “Dental plaque as a biofilm,” Journal of Industrial Microbiology, vol. 15, no. 3, pp. 169–175, 1995.

J. S. Foster and P. E. Kolenbrander, “Development of a multispecies oral bacterial community in a saliva-conditioned flow cell,” Applied and Environmental Microbiology, vol. 70, no. 7, pp. 4340–4348, 2004.

P. G. Egland, R. J. Palmer Jr., and P. E. Kolenbrander, “Interspecies communication in Streptococcus gordonii-Veillonella atypica biofilms: signaling in flow conditions requires juxtaposition,” Proceedings of the National Academy of Sciences of the United States of America, vol. 101, no. 48, pp. 16917–16922, 2004.

W. F. Liljemark and C. Bloomquist, “Human oral microbial ecology and dental caries and periodontal diseases,” Critical Reviews in Oral Biology and Medicine, vol. 7, no. 2, pp. 180–198, 1996.

C. Russell and W. A. Coulter, “Continuous monitoring of pH and Eh in bacterial plaque grown on a tooth in an artificial mouth,” Applied Microbiology, vol. 29, no. 2, pp. 141–144, 1975.

J. Pratten, K. Wills, P. Barnett, and M. Wilson, “In vitro studies of the effect of antiseptic-containing mouthwashes on the formation and viability of Streptococcus sanguis biofilms,” Journal of Applied Microbiology, vol. 84, no. 6, pp. 1149–1155, 1998.

M. Y. H. Chin, H. J. Busscher, R. Evans, J. Noar, and J. Pratten, “Early biofilm formation and the effects of antimicrobial agents on orthodontic bonding materials in a parallel plate flow chamber,” European Journal of Orthodontics, vol. 28, no. 1, pp. 1–7, 2006.

P. Arirachakaran, S. Luengpailin, J. A. Banas, J. E. Mazurkiewicz, and E. Benjavongkulchai, “Effects of manganese on streptococcus mutans planktonic and biofilm growth,” Caries Research, vol. 41, no. 6, pp. 497–502, 2007.

A. S. Landa, H. C. van der Mei, and H. J. Busscher, “Detachment of linking film bacteria from enamel surfaces by oral rinses and penetration of sodium lauryl sulphate through an artificial oral biofilm,” Advances in Dental Research, vol. 11, no. 4, pp. 528–538, 1997.

L. Wong and C. H. Sissons, “Human dental plaque microcosm biofilms: effect of nutrient variation on calcium phosphate deposition and growth,” Archives of Oral Biology, vol. 52, no. 3, pp. 280–289, 2007.

R. P. Shellis, “A synthetic saliva for cultural studies of dental plaque,” Archives of Oral Biology, vol. 23, no. 6, pp. 485–489, 1978.

C. H. Sissons, S. A. Anderson, L. Wong, M. J. Coleman, and D. C. White, “Microbiota of plaque microcosm biofilms: effect of three times daily sucrose pulses in different simulated oral environments,” Caries Research, vol. 41, no. 5, pp. 413–422, 2007.

L. Wong and C. H. Sissions, “A comparison of human dental plaque microcosm biofilms grown in an undefined medium and a chemically defined artificial saliva,” Archives of Oral Biology, vol. 46, no. 6, pp. 477–486, 2001.

M.-L. Mei, C.-H. Chu, E.-C. Lo, and L.-P. Samaranayake, “Preventing root caries development under oral biofilm challenge in an artificial mouth,” Medicina Oral, Patología Oral y Cirugia Bucal, vol. 18, no. 4, pp. e557–e563, 2013.

M. J. Sedlacek and C. Walker, “Antibiotic resistance in an in vitro subgingival biofilm model,” Oral Microbiology and Immunology, vol. 22, no. 5, pp. 333–339, 2007.

M. J. Verkaik, H. J. Busscher, D. Jager, A. M. Slomp, F. Abbas, and H. C. van der Mei, “Efficacy of natural antimicrobials in toothpaste formulations against oral biofilms in vitro,” Journal of Dentistry, vol. 39, no. 3, pp. 218–224, 2011.

M. J. Verkaik, H. J. Busscher, M. Rustema-Abbing, A. M. Slomp, F. Abbas, and H. C. van der Mei, “Oral biofilm models for mechanical plaque removal,” Clinical Oral Investigations, vol. 14, no. 4, pp. 403–409, 2010.

S. Shani, M. Friedman, and D. Steinberg, “The anticariogenic effect of amine fluorides on Streptococcus sobrinus and glucosyltransferase in biofilms,” Caries Research, vol. 34, no. 3, pp. 260–267, 2000.

J. Pratten, C. S. Andrews, D. Q. M. Craig, and M. Wilson, “Structural studies of microcosm dental plaques grown under different nutritional conditions,” FEMS Microbiology Letters, vol. 189, no. 2, pp. 215–218, 2000.

B. Guggenheim, E. Giertsen, P. Schüpbach, and S. Shapiro, “Validation of an in vitro biofilm model of supragingival plaque,” Journal of Dental Research, vol. 80, no. 1, pp. 363–370, 2001.

T. W. Ammann, G. N. Belibasakis, and T. Thurnheer, “Impact of early colonizers on in vitro subgingival biofilm formation,” PLoS ONE, vol. 8, no. 12, article 0083090, 2013.

S. Hamada and M. Torii, “Effect of sucrose in culture media on the location of glucosyltransferase of Streptococcus mutans and cell adherence to glass surfaces,” Infection and Immunity, vol. 20, no. 3, pp. 592–599, 1978.

H. Murchison, S. Larrimore, and R. Curtiss III, “Isolation and characterization of Streptococcus mutans mutants defective in adherence and aggregation,” Infection and Immunity, vol. 34, no. 3, pp. 1044–1055, 1981.

S. Hasan, K. Singh, M. Danisuddin, P. K. Verma, and A. U. Khan, “Inhibition of major virulence pathways of Streptococcus mutans by Quercitrin and Deoxynojirimycin: a synergistic approach of infection control,” PLoS ONE, vol. 9, no. 3, Article ID e91736, 2014.

S. Hasan, M. Danishuddin, and A. U. Khan, “Inhibitory effect of zingiber officinale towards Streptococcus mutans virulence and caries development: in vitro and in vivo studies,” BMC Microbiology, vol. 15, no. 1, article 1, 2015.

J. Samot, J. Lebreton, and C. Badet, “Adherence capacities of oral lactobacilli for potential probiotic purposes,” Anaerobe, vol. 17, no. 2, pp. 69–72, 2011.

A. Furiga, A. Lonvaud-Funel, G. Dorignac, and C. Badet, “In vitro anti-bacterial and anti-adherence effects of natural polyphenolic compounds on oral bacteria,” Journal of Applied Microbiology, vol. 105, no. 5, pp. 1470–1476, 2008.

K. Jhajharia, L. Mehta, A. Parolia, and K. Shetty, “Biofilm in endodontics: a review,” Journal of International Society of Preventive & Community Dentistry, vol. 5, no. 1, pp. 1–12, 2015.

A. Kishen, C.-P. Sum, S. Mathew, and C.-T. Lim, “Influence of irrigation regimens on the adherence of enterococcus faecalis to root canal dentin,” Journal of Endodontics, vol. 34, no. 7, pp. 850–854, 2008.

P. Baca, P. Junco, M. T. Arias-Moliz, M. P. González-Rodríguez, and C. M. Ferrer-Luque, “Residual and antimicrobial activity of final irrigation protocols on Enterococcus faecalis biofilm in dentin,” Journal of Endodontics, vol. 37, no. 3, pp. 363–366, 2011.

M. T. Arias-Moliz, R. Ordinola-Zapata, P. Baca et al., “Antimicrobial activity of chlorhexidine, peracetic acid and sodium hypochlorite/etidronate irrigant solutions against Enterococcus faecalis biofilms,” International Endodontic Journal, vol. 48, no. 12, pp. 1188–1193, 2015.

E. Zaura, M. J. Buijs, M. A. Hoogenkamp et al., “The effects of fractions from shiitake mushroom on composition and cariogenicity of dental plaque microcosms in an in vitro caries model,” Journal of Biomedicine and Biotechnology, vol. 2011, Article ID 135034, 10 pages, 2011.

T. Du, Q. Shi, Y. Shen et al., “Effect of modified nonequilibrium plasma with chlorhexidine digluconate against endodontic biofilms in vitro,” Journal of Endodontics, vol. 39, no. 11, pp. 1438–1443, 2013.

Y. Li, C. Carrera, R. Chen et al., “Degradation in the dentin-composite interface subjected to multi-species biofilm challenges,” Acta Biomaterialia, vol. 10, no. 1, pp. 375–383, 2014.

C. A. Nascimento, M. Tanomaru-Filho, N. B. Faria-Junior, G. Faria, J. M. Guerreiro-Tanomaru, and S. G. Patil, “Antimicrobial activity of root canal irrigants associated with cetrimide against biofilm and planktonic Enterococcus faecalis,” The Journal of Contemporary Dental Practice, vol. 15, no. 5, pp. 603–607, 2014.

C. Estrela, G. B. Sydney, J. A. P. Figueiredo, and C. R. De Araújo Estrela, “A model system to study antimicrobial strategies in endodontic biofilms,” Journal of Applied Oral Science, vol. 17, no. 2, pp. 87–91, 2009.

R. A. Arthur, E. K. Kohara, R. A. Waeiss, G. J. Eckert, D. Zero, and M. Ando, “Enamel carious lesion development in response to sucrose and fluoride concentrations and to time of biofilm formation: an artificial-mouth Study,” Journal of Oral Diseases, vol. 2014, Article ID 348032, 8 pages, 2014.

F. H. van de Sande, M. S. Azevedo, R. G. Lund, M. C. D. N. J. M. Huysmans, and M. S. Cenci, “An in vitro biofilm model for enamel demineralization and antimicrobial dose-response studies,” Biofouling, vol. 27, no. 9, pp. 1057–1063, 2011.

C. C. Ribeirom, R. A. Ccahuana-Vásquez, C. D. Carmo et al., “The effect of iron on Streptococcus mutans biofilm and on enamel demineralization,” Brazilian Oral Research, vol. 26, no. 4, pp. 300–305, 2012.

C. Y. Loo, D. A. Corliss, and N. Ganeshkumar, “Streptococcus gordonii biofilm formation: identification of genes that code for biofilm phenotypes,” Journal of Bacteriology, vol. 182, no. 5, pp. 1374–1382, 2000.

O. Oettinger-Barak, S. G. Dashper, D. V. Catmull et al., “Antibiotic susceptibility of aggregatibacter actinomycetemcomitans JP2 in a biofilm,” Journal of Oral Microbiology, vol. 5, Article ID 20320, pp. 1–8, 2013.

E. A. Izano, H. Wang, C. Ragunath, N. Ramasubbu, and J. B. Kaplan, “Detachment and killing of Aggregatibacter actinomycetemcomitans biofilms by dispersin B and SDS,” Journal of Dental Research, vol. 86, no. 7, pp. 618–622, 2007.

B. R. da Silva, V. A. A. de Freitas, V. A. Carneiro et al., “Antimicrobial activity of the synthetic peptide Lys-a1 against oral streptococci,” Peptides, vol. 42, pp. 78–83, 2013.

Y. Zou, Y. Lee, J. Huh, and J. Park, “Synergistic effect of xylitol and ursolic acid combination on oral biofilms,” Restorative Dentistry & Endodontics, vol. 39, no. 4, pp. 288–295, 2014.

S. Yoneda, T. Kawarai, N. Narisawa et al., “Effects of short-chain fatty acids on Actinomyces naeslundii biofilm formation,” Molecular Oral Microbiology, vol. 28, no. 5, pp. 354–365, 2013.

J. M. Duggan and C. M. Sedgley, “Biofilm formation of oral and endodontic Enterococcus faecalis,” Journal of Endodontics, vol. 33, no. 7, pp. 815–818, 2007.

D. Kara, S. B. I. Luppens, and J. M. T. Cate, “Differences between single- and dual-species biofilms of Streptococcus mutans and Veillonella parvula in growth, acidogenicity and susceptibility to chlorhexidine,” European Journal of Oral Sciences, vol. 114, no. 1, pp. 58–63, 2006.

M. R. T. R. Oliveira, M. H. Napimoga, K. Cogo et al., “Inhibition of bacterial adherence to saliva-coated through plant lectins,” Journal of Oral Science, vol. 49, no. 2, pp. 141–145, 2007.

Y. Saito, R. Fujii, K.-I. Nakagawa, H. K. Kuramitsu, K. Okuda, and K. Ishihara, “Stimulation of Fusobacterium nucleatum biofilm formation by Porphyromonas gingivalis,” Oral Microbiology and Immunology, vol. 23, no. 1, pp. 1–6, 2008.

Yanti, Y. Rukayadi, K.-H. Lee, and J.-K. Hwang, “Activity of panduratin A isolated from Kaempferia pandurata Roxb. against multi-species oral biofilms in vitro,” Journal of Oral Science, vol. 51, no. 1, pp. 87–95, 2009.

R. Rozen, G. Bachrach, B. Zachs, and D. Steinberg, “Growth rate and biofilm thickness of Streptococcus sobrinus and Streptococcus mutans on hydroxapatite,” Acta Pathologica, Microbiologica, et Immunologica Scandinavica, vol. 109, no. 2, pp. 155–160, 2001.

E. M. Comelli, B. Guggenheim, F. Stingele, and J.-R. Neeser, “Selection of dairy bacterial strains as probiotics for oral health,” European Journal of Oral Sciences, vol. 110, no. 3, pp. 218–224, 2002.

S. B. Ekenbäck, L. E. Linder, M.-L. Sund, and H. Lönnies, “Effect of fluoride on glucose incorporation and metabolism in biofilm cells of Streptococcus mutans,” European Journal of Oral Sciences, vol. 109, no. 3, pp. 182–186, 2001.

A. Yamanaka, R. Kimizuka, T. Kato, and K. Okuda, “Inhibitory effects of cranberry juice on attachment of oral streptococci and biofilm formation,” Oral Microbiology and Immunology, vol. 19, no. 3, pp. 150–154, 2004.

A. Yano, S. Kikuchi, T. Takahashi, K. Kohama, and Y. Yoshida, “Inhibitory effects of the phenolic fraction from the pomace of Vitis coignetiae on biofilm formation by Streptococcus mutans,” Archives of Oral Biology, vol. 57, no. 6, pp. 711–719, 2012.

H. Koo, M. F. Hayacibara, B. D. Schobel et al., “Inhibition of Streptococcus mutans biofilm accumulation and polysaccharide production by apigenin and tt-farnesol,” Journal of Antimicrobial Chemotherapy, vol. 52, no. 5, pp. 782–789, 2003.

P. T. M. Nguyen, M. L. Falsetta, G. Hwang, M. Gonzalez-Begne, and H. Koo, “α-Mangostin disrupts the development of Streptococcus mutans biofilms and facilitates its mechanical removal,” PLoS ONE, vol. 9, no. 10, Article ID e111312, 2014.

M. Barnabé, C. H. C. Saraceni, M. Dutra-Correa, and I. B. Suffredini, “The influence of Brazilian plant extracts on Streptococcus mutans biofilm,” Journal of Applied Oral Science, vol. 22, no. 5, pp. 366–372, 2014.

M. Li, R. Huang, X. Zhou, K. Zhang, X. Zheng, and R. L. Gregory, “Effect of nicotine on dual-species biofilms of Streptococcus mutans and Streptococcus sanguinis,” FEMS Microbiology Letters, vol. 350, no. 2, pp. 125–132, 2014.

M. M. Ali Mohammed, A. H. Nerland, M. Al-Haroni, and V. Bakken, “Characterization of extracellular polymeric matrix, and treatment of Fusobacterium nucleatum and Porphyromonas gingivalis biofilms with DNase I and proteinase K,” Journal of Oral Microbiology, vol. 5, article 10, 2013.

T. W. Ammann, R. Gmür, and T. Thurnheer, “Advancement of the 10-species subgingival Zurich Biofilm model by examining different nutritional conditions and defining the structure of the in vitro biofilms,” BMC Microbiology, vol. 12, article 227, 2012.

A. Furiga, C. Roques, and C. Badet, “Preventive effects of an original combination of grape seed polyphenols with amine fluoride on dental biofilm formation and oxidative damage by oral bacteria,” Journal of Applied Microbiology, vol. 116, no. 4, pp. 761–771, 2014.

S. Shapiro, E. Giertsen, and B. Guggenheim, “An in vitro oral biofilm model for comparing the efficacy of antimicrobial mouthrinses,” Caries Research, vol. 36, no. 2, pp. 93–100, 2002.

C. Badet, A. Furiga, and N. Thébaud, “Effect of xylitol on an in vitro model of oral biofilm,” Oral Health & Preventive Dentistry, vol. 6, no. 4, pp. 337–341, 2008.

J. Pratten, “Growing oral biofilms in a constant depth film fermentor (CDFF),” in Current Protocols in Microbiology, chapter 1, Unit 1B.5, 2007.

A. J. McBain, “Chapter 4 in vitro biofilm models. An overview,” Advances in Applied Microbiology, vol. 69, pp. 99–132, 2009.

S. P. Valappil, G. J. Owens, E. J. Miles et al., “Effect of gallium on growth of Streptococcus mutans NCTC 10449 and dental tissues,” Caries Research, vol. 48, no. 2, pp. 137–146, 2014.

D. Ready, A. P. Roberts, J. Pratten, D. A. Spratt, M. Wilson, and P. Mullany, “Composition and antibiotic resistance profile of microcosm dental plaques before and after exposure to tetracycline,” The Journal of Antimicrobial Chemotherapy, vol. 49, no. 5, pp. 769–775, 2002.

D. M. Deng, C. van Loveren, and J. M. ten Cate, “Caries-preventive agents induce remineralization of dentin in a biofilm model,” Caries Research, vol. 39, no. 3, pp. 216–223, 2005.

S. Periasamy and P. E. Kolenbrander, “Mutualistic biofilm communities develop with Porphyromonas gingivalis and initial, early, and late colonizers of enamel,” Journal of Bacteriology, vol. 191, no. 22, pp. 6804–6811, 2009.

S. Periasamy and P. E. Kolenbrander, “Central role of the early colonizer Veillonella sp. in establishing multispecies biofilm communities with initial, middle, and late colonizers of enamel,” Journal of Bacteriology, vol. 192, no. 12, pp. 2965–2972, 2010.

S. Schlafer, M. K. Raarup, P. L. Wejse et al., “Osteopontin reduces biofilm formation in a multi-species model of dental biofilm,” PLoS ONE, vol. 7, no. 8, Article ID e41534, 2012.

T. Thurnheer, G. N. Belibasakis, and N. Bostanci, “Colonisation of gingival epithelia by subgingival biofilms in vitro: role of ‘red complex’ bacteria,” Archives of Oral Biology, vol. 59, no. 9, pp. 977–986, 2014.

J. Pratten, A. W. Smith, and M. Wilson, “Response of single species biofilms and microcosm dental plaques to pulsing with chlorhexidine,” The Journal of Antimicrobial Chemotherapy, vol. 42, no. 4, pp. 453–459, 1998.

G. Wirtanen, S. Salo, I. M. Helander, and T. Mattila-Sandholm, “Microbiological methods for testing disinfectant efficiency on Pseudomonas biofilm,” Colloids and Surfaces B: Biointerfaces, vol. 20, no. 1, pp. 37–50, 2001.

B. Guggenheim and A. Meier, “In vitro effect of chlorhexidine mouth rinses on polyspecies biofilms,” Schweizer Monatsschrift für Zahnmedizin, vol. 121, no. 5, pp. 432–441, 2011.

T. Do, D. Devine, and P. D. Marsh, “Oral biofilms: molecular analysis, challenges, and future prospects in dental diagnostics,” Clinical, Cosmetic and Investigational Dentistry, vol. 5, pp. 11–19, 2013.

R. Almstrand, H. Daims, F. Persson, F. Sörensson, and M. Hermansson, “New methods for analysis of spatial distribution and coaggregation of microbial populations in complex biofilms,” Applied and Environmental Microbiology, vol. 79, no. 19, pp. 5978–5987, 2013.

T. Thurnheer, R. Gmür, and B. Guggenheim, “Multiplex FISH analysis of a six-species bacterial biofilm,” Journal of Microbiological Methods, vol. 56, no. 1, pp. 37–47, 2004.

K. Standar, B. Kreikemeyer, S. Redanz, W. L. Münter, M. Laue, and A. Podbielski, “Setup of an in vitro test system for basic studies on biofilm behavior of mixed-species cultures with dental and periodontal pathogens,” PLoS ONE, vol. 5, no. 10, article e13135, 2010.

L. E. Chávez de Paz, “Development of a multispecies biofilm community by four root canal bacteria,” Journal of Endodontics, vol. 38, no. 3, pp. 318–323, 2012.

F. G. de Carvalho, R. M. Puppin-Rontani, S. B. P. de Fúcio, T. de Cássia Negrini, H. L. Carlo, and F. Garcia-Godoy, “Analysis by confocal laser scanning microscopy of the MDPB bactericidal effect on S. mutans biofilm CLSM analysis of MDPB bactericidal effect on biofilm,” Journal of Applied Oral Science, vol. 20, no. 5, pp. 568–575, 2012.

G. H. Hobby, C. L. Quave, K. Nelson, C. M. Compadre, K. E. Beenken, and M. S. Smeltzer, “Quercus cerris extracts limit Staphylococcus aureus biofilm formation,” Journal of Ethnopharmacology, vol. 144, no. 3, pp. 812–815, 2012.

V. Blanc, S. Isabal, M. C. Sánchez et al., “Characterization and application of a flow system for in vitro multispecies oral biofilm formation,” Journal of Periodontal Research, vol. 49, no. 3, pp. 323–332, 2014.

R. P. Howlin, S. Fabbri, D. G. Offin et al., “Removal of dental biofilms with an ultrasonically activated water stream,” Journal of Dental Research, vol. 94, no. 9, pp. 1303–1309, 2015.

Y. Abiko, T. Sato, G. Mayanagi, and N. Takahashi, “Profiling of subgingival plaque biofilm microflora from periodontally healthy subjects and from subjects with periodontitis using quantitative real-time PCR,” Journal of Periodontal Research, vol. 45, no. 3, pp. 389–395, 2010.

P. Liu, Y. Liu, J. Wang, Y. Guo, Y. Zhang, and S. Xiao, “Detection of Fusobacterium nucleatum and fadA adhesin gene in patients with orthodontic gingivitis and non-orthodontic periodontal inflammation,” PLoS ONE, vol. 9, no. 1, Article ID e85280, 2014.

M. Karched, R. G. Bhardwaj, A. Inbamani, and S. Asikainen, “Quantitation of biofilm and planktonic life forms of coexisting periodontal species,” Anaerobe, vol. 35, pp. 13–20, 2015.

G. Àlvarez, M. González, S. Isabal, V. Blanc, and R. León, “Method to quantify live and dead cells in multi-species oral biofilm by real-time PCR with propidium monoazide,” AMB Express, vol. 3, pp. 1–8, 2013.

M. C. Sánchez, M. J. Marín, E. Figuero et al., “Quantitative real-time PCR combined with propidium monoazide for the selective quantification of viable periodontal pathogens in an in vitro subgingival biofilm model,” Journal of Periodontal Research, vol. 49, no. 1, pp. 20–28, 2014.