BioMed Research International
Volume 2016 (2016), Article ID 7535604, 8 pages
http://dx.doi.org/10.1155/2016/7535604

Research Article

Cloning, Expression, and Characterization of a Novel Thermophilic Monofunctional Catalase from Geobacillus sp. CHB1

Xianbo Jia, Jichen Chen, Chenqiang Lin, and Xinjian Lin

Soil and Fertilizer Institute, Fujian Academy of Agricultural Sciences, Fuzhou 350003, China

Received 18 March 2016; Accepted 3 July 2016

Academic Editor: Thangavel Lakshmipriya

Copyright © 2016 Xianbo Jia et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Catalases are widely used in many scientific areas. A catalase gene (Kat) from Geobacillus sp. CHB1 encoding a monofunctional catalase was cloned and recombinant expressed in Escherichia coli (E. coli), which was the first time to clone and express this type of catalase of genus Geobacillus strains as far as we know. This Kat gene was 1,467 bp in length and encoded a catalase with 488 amino acid residuals, which is only 81% similar to the previously studied Bacillus sp. catalase in terms of amino acid sequence. Recombinant catalase was highly soluble in E. coli and made up 30% of the total E. coli protein. Fermentation broth of the recombinant E. coli showed a high catalase activity level up to 35,831 U/mL which was only lower than recombinant Bacillus sp. WSHDZ-01 among the reported catalase production strains. The purified recombinant catalase had a specific activity of 40,526 U/mg and of 51.1 mM. The optimal reaction temperature of this recombinant enzyme was 60°C to 70°C, and it exhibited high activity over a wide range of reaction temperatures, ranging from 10°C to 90°C. The enzyme retained 94.7% of its residual activity after incubation at 60°C for 1 hour. High yield and excellent thermophilic properties are valuable features for this catalase in industrial applications.

1. Introduction

Catalases (EC1.11.1.6) are a class of enzymes that specifically catalyze the decomposition of H₂O₂ to H₂O and O₂ [1]. H₂O₂ has been applied to sterilization and bleaching processes in the medical, food, textile, and paper-making industries [2, 3]. Residual H₂O₂ in products or by-products is harmful to human health and environment. Thus, the removal of residual H₂O₂ is necessary in textile production processes, food health, pollution prevention, and other fields [2]. Catalase is an ideal choice for removing H₂O₂ due to its efficiency and lack of secondary pollution compared with chemical decomposition methods [4].

Catalase can be divided into four classes: monofunctional heme catalases, catalase-peroxidases, non-heme catalases, and minor catalases [5]. Catalases are widely present in animals, plants, fungi, most aerobic bacteria, and some anaerobic bacteria [5]. Commercial catalase produced by animals liver, plant tissues, and microbial fermentation is mainly mesophilic catalase, but many industrial applications need thermostable catalase; for example, textile bleaching temperature is always up to 60°C [6], so thermophilic catalase is more comparable on that condition. There have been some thermophilic catalases reported [7–10], but they were either catalase-peroxidase or Mn-dependent catalase. Thermophilic monofunctional heme catalases are rarely reported as we know.

High yielding strains are also necessary for enzyme production in fermentation processes. Recombinant expression is a practical method to increase the yield of a target gene. Currently, Pichia pastoris [11], Hansenula polymorpha [12], Lactococcus lactis [13], Bacillus subtilis (B. subtilis) [14, 15], and Escherichia coli (E. coli) [9] are used as host cells to produce recombinant catalase, but those recombinant catalases were mainly mesophilic, successfully recombinant expression precedents of thermophilic catalases which were few. The advantages of E. coli systems, such as their convenience, high yields, and ease of purification promote their wide application in genetic engineering. But many thermophilic enzymes cannot be overproduced in active forms in mesophilic host [8]. For example, though Thermus thermophilus catalase could solubly be expressed in E. coli, the recombinant catalase was absolutely inactive [8]; recombinant E. coli with Bacillus stearothermophilus catalase-peroxidase gene also showed a comparatively lower catalase level (1055.3 U/mL) [16]. So high soluble expression with an active form in E. coli is important for thermophilic catalase.

Previously, we screened thermophilic bacteria strains isolated from different high-temperature compost samples and Geobacillus sp. CHB1 was found to be a high catalase production strain. So, in this work, we cloned a novel Kat gene encoding a monofunctional catalase from thermophiles Geobacillus sp. CHB1 and recombinant expressed this gene in E. coli in a highly soluble form. The recombinant catalase was also purified and characterized.

2. Materials and Methods

2.1. Materials, Bacterial Strains, Plasmids, and Medium

E. coli BL21 (DE3) was cultured in our laboratory, and the expression vector pEASY-E2 was purchased from Beijing TransGen Biotech. The Geobacillus sp. CHB1 was isolated in Fuzhou, China. LB medium (10 g/L tryptone, 5 g/L yeast extract, 10 g/L NaCl, pH 7.0) was used in culturing E. coli BL21 (DE3). Auto-induction medium ZYM-5052 [17] was used for inducing the expression of recombinant catalase. The medium for culturing the Geobacillus sp. CHB1 consisted of soya peptone 0.9%, yeast extract 0.5%, NaCl 0.1%, K₂HPO₄ 0.1%, and KH₂PO₄ 0.075%, at pH 7.2.

2.2. Expression Vector Construction

Geobacillus sp. CHB1 was incubated at 60°C for 18 h at 180 r/min; then the genome was extracted according to the method of Zhou et al. [18]. The Kat gene was amplified using primers CatalaseF: (5′-GCAGATACAAAAAAGCTCACAAC-3′) and CatalaseR: (5′-TGCGTTTGTAATCACATCGTCCG-3′). Polymerase chain reaction (PCR) was performed with ExTaq DNA polymerase (TaKaRa, Dalian, China) under the following conditions: 95°C initial denaturation for 5 min, followed by 32 cycles of 40 s at 94°C, 40 s at 55°C, and 1 min 30 s at 72°C. The PCR product was purified using a PCR purification kit (Omega Bio-Tek, Inc., USA) and sequenced by Sangon Biotech Co., Ltd. (Shanghai, China).

Homology search of gene and amino acid sequence was carried out at BLAST server (http://blast.ncbi.nlm.nih.gov). Program blastp was used to analyze homology of the amino acid sequences; nonredundant protein sequences (Nr) database and Swiss Prot database were both used for blastp program. Sequences with high similarity in Swiss Prot database were selected to construct phylogenetic tree and do multiple alignment. MEGA 4.0.2 was used to construct the phylogenetic tree. Multiple alignment of the amino acid sequences was carried out using DNAMAN V6.0.3.99.

The purified fragment was ligated with pEASY-E2 using the described protocol of the kit. The ligated product was transformed into the competent E. coli cell strain Trans-T1 (TransGen Biotech, Beijing, China). A positive clone was selected using the T7 promoter primer (5′-TAATACGACTCACTATAGGG-3′) and CatalaseR (5′-TGCGTTTGTAATCACATCGTCCG-3′) and then cultured with LB medium containing 100 μg/mL of ampicillin. The recombinant vector pEASY-E2-Kat was extracted using a Plasmid Mini Kit (Omega Bio-Tek, Inc., USA) and then transformed into competent E. coli BL21 (DE3) cells. A positive clone for BL21/pEASY-E2-Kat was selected using PCR as described above.

2.3. Inducing Expression and Purification of Recombinant Catalase

Positive clones were cultured in 5 mL of LB medium containing 100 μg/mL of ampicillin at 37°C at 220 rpm for 12 h. Next, 1 mL of the above culture was inoculated into 50 mL of ZYM-5052 medium and was cultured at 30°C and 220 rpm for 16 h to induce the expression of the enzyme. To confirm expression, 8 mL of the induced culture was centrifuged at 10,000 ×g for 2 min and then suspended with 3 mL PBS (50 mM, pH 7.0). The suspended culture was subjected to ultrasonication at 400 W until clear. Then, 200 μL of ultrasonicated sample was centrifuged at 12,000 ×g for 5 min at 4°C, and the supernatant was transferred to a new centrifuge tube. The supernatant and sediment sample were both subjected to 12% SDS-PAGE to detect the expression of the recombinant enzyme; a sample containing an empty vector was used as a blank control. Electrophoresis parameters were set as follows: 30 V for 30 min, followed by 80 V until the end. The coomassie brilliant blue R250 protocol [23] was used to dye the gel.

2.4. Recombinant Strain Enzyme Production Curve

First, 1 mL of seed liquid was inoculated into shake flasks containing 50 mL of ZYM-5052 medium, and the flasks were placed in shaking tables at 220 rpm and 30°C. Every 4 h, samples were collected and analyzed for catalytic activity. The samples were ultrasonicated before activity measurement collection. Enzyme production curves were then obtained.

2.5. Purification of Recombinant Catalase

First, 100 mL of the induced recombinant E. coli was centrifuged at 10,000 ×g for 5 min and washed once with Buffer A (50 mM NaH₂PO₄, 300 mM NaCl, pH 8.0). After centrifugation, the recombinant E. coli pellet was resuspended with 3 mL of Buffer A. The resuspended sample was ultrasonicated until clear. The ultrasonicated sample was centrifuged, and the supernatant was subjected to a Nickel-iminodiacetic acid (Ni-IDA) column. Then, 10 volumes of Buffer A (50 mM NaH₂PO₄, 300 mM NaCl, pH 8.0) were used to wash proteins that were nonspecifically bound to the column. Then, 10 volumes of Buffer B (50 mM NaH₂PO₄, 300 mM NaCl, 20 mM imidazole, pH 8.0) were used to remove other proteins. Finally, 5 volumes of Buffer C (50 mM NaH₂PO₄, 300 mM NaCl, 100 mM imidazole, pH 8.0) and 5 volumes of Buffer D (50 mM NaH₂PO₄, 300 mM NaCl, 500 mM imidazole, pH 8.0) were applied to elute the recombinant catalase. The purity of catalase was confirmed by SDS-PAGE. The purified catalase was placed into a dialysis bag and dialyzed against Buffer A to remove the high concentrations of imidazole. Buffer A was replaced every several hours until the imidazole was removed. The quantity of purified catalase was assayed using the Bradford method [24].

2.6. Recombinant Catalase Characteristics

A catalase activity assay was performed according to the method described by Beers Jr. and Sizer [25]. Purified recombinant catalase was diluted several times with PBS (20 mM, pH 7.0) to a suitable concentration, and 2.7 mL of 30 mM H₂O₂ (diluted with 20 mM PBS, pH 7.0) was then immediately added to 300 μL of diluted enzyme. The absorbance changes at 240 nm were measured every 5 s for 1 min. 1 U of activity was defined as the amount of enzyme to decompose 1 μmol of H₂O₂ per min. Each measurement was performed at least three times.

To assess the optimal reaction temperature, 30 mM H₂O₂ was preincubated at different temperatures from 10°C to 90°C (in 10°C increment), and then activities at different temperatures were measured with above preincubated H₂O₂.

To assess enzyme thermostability, diluted enzyme was incubated at 40, 50, 60, 70, 80, and 90°C for 30 min and 1 hour. After the incubation time, the heated enzyme was immediately transferred onto ice. Residual activities were measured with method described above.

The optimum pH was assayed with 30 mM H₂O₂ prepared in the following 50 mM buffers: sodium citrate 50 mM (pH 4–6), sodium phosphate 50 mM (pH 6–8), and glycine-NaOH 50 mM (pH 9–11). Activities at different pH values were measured as above in least three replicates.

Kinetic parameters were assayed by calculating the activity of the enzyme under different concentrations of H₂O₂ ranging from 2.5 to 25 mM in 20 mM PBS (pH 7.0) at 30°C. was obtained by double-reciprocal plots according to Lineweaver and Burk [26].

3. Results and Discussion

3.1. Kat Sequence

The PCR product (Figure 1) and sequencing results showed that the total length of the Kat gene was 1,467 bp, which encoded a protein with 488 amino acids. Nucleotide sequence was submitted to GenBank, and GenBank accession number KP202252 was assigned. blastp was run in the nonredundant protein sequences of NCBI database for homologs of the amino acid sequence. The amino sequence had higher similarity with the catalase sequences of other Geobacillus spp.; however, all of these highly similar Kat genes were submitted in the form of sequenced genomes, and none had been previously cloned or expressed. Among all studied catalase sequences obtained from Swiss Prot database, this catalase was most similar to that of a Bacillus sp. [27], and its identity was 80%. Phylogenetic tree (Figure 2) based on the amino acid sequences similarity showed this catalase shared closest phylogenetic relationship with catalase of Bacillus subtilis and Lactobacillus sakei in Swiss Prot database. Multiple alignment of the amino acid sequence showed this catalase has seven typically conserved amino acid residuals for heme binding (Figure 3). All of the reported thermostable catalases [28, 29] from Geobacillus stearothermophilus were different from this catalase herein because they belonged to the second group of catalase family (catalase-peroxidase) and were encoded by Per gene, but catalase in this paper belonged to the first group (monofunctional heme catalase) which was encoded by gene Kat [5]. Therefore, to our knowledge this study was the first to clone and express this type of Geobacillus spp. Kat gene.

Figure 1: PCR product showing a 1,452-length band that corresponds to Kat from a Geobacillus sp. CHB1. Lanes: M, DNA marker; Lane 1, PCR product.

Figure 2: Phylogenetic tree of CHB1 catalase amino acid showing the relationship with other strains on catalase amino acid sequence. Protein sequences were selected by running blastp program with CHB1 catalase sequence in Swiss Prot database; accession numbers in brackets were the corresponding accession numbers of the strains in Swiss Prot database. Phylogenetic tree was constructed with MEGA 4.0.2 with the method Neighbor-Joining. Test of inferred phylogeny was Bootstrap for 1000 replications.

Figure 3: Multiple alignment of amino acid sequences for CHB1 catalase and catalase from Swiss Prot database. The sequences were those from Bacillus subtilis subsp. str. 168 (Swiss Prot number P26901), Methanosarcina barkeri str. Fusaro (Swiss Prot number O93662), Streptomyces venezuelae ATCC 10712 (Swiss Prot number P33569), and Geobacillus sp. CHB1 (GenBank number AJO27032.1). Identical amino acid residuals were shaded in black and conserved residuals were shaded in gray. Arrows showed the conserved residuals of home binding pocket of this kind of catalase.

3.2. Construction of Recombinant Expression Vector pEASY-E2-Kat

A positive clone was selected, and its sequence was confirmed by sequencing. The expression vector pEASY-E2-Kat (Figure 4) was transformed into BL21 (DE3) cells. Then, SDS-PAGE was applied to confirm whether the catalase was expressed and to determine the molecular weight of the enzyme. A band was observed between 60 and 70 kDa, and the recombinant catalase was highly soluble (make up to 30% of the total E coli protein) with a low inclusion body content (Figure 5). The theoretical molecular weight of the recombinant enzyme herein, calculated using its amino sequence, was 56 kDa, including the 6×His tag, which conflicted with the molecular weight of 65 kDa observed via SDS-PAGE. Some studies [30] have found that the 6×His tag might result in a recombinant protein with a greater molecular weight; however, the reason for this phenomenon remains unclear. The specific activity of the purified catalase was 40,526 U/mg under optimal conditions (60°C, pH 7.0).

Figure 4: Recombinant expression construction of vector pEASY-E2-kat. A schematic diagram of recombinant expression vector pEASY-E2-kat. The kat gene encoding catalase was inserted into an expression vector with upstream RBS and T7 promoters and downstream 6×His.

Figure 5: SDS-PAGE analyses of recombinant catalase expression and the purified enzyme. Lanes: M, protein marker; Lane 1, total bacterial protein of BL21 (DE3) cells with empty vector pEASY-E2; Lane 2, insoluble bacterial proteins of BL21 (DE3) with vector pEASY-E2-kat after induced expression; Lane 3, soluble bacterial proteins of BL21 (DE3) with vector pEASY-E2-kat after induced expression; Lane 4, SDS-PAGE analysis of purified catalase using a Ni-IDA column.

3.3. Production Curve for Recombinant Catalase

Production curves for the recombinant catalase were constructed at 30°C. When cultured at 30°C for 20 h, the total activity of the fermentation broth reached a maximum level of 35,831 U/mL assayed under optimal conditions (Figure 6). This level was much higher than many catalase production strains and only lower than recombinant Bacillus sp. WSHDZ-01 (Table 1) as we know. High production ensured further application of this catalase.

Table 1: Catalase production levels of recombinant E. coli BL21 and other strains.

Strains
Activity
(U/mL)
Reference

Recombinant E. coli BL21 (DE3)
35,831
This study

Recombinant Bacillus sp. WSHDZ-01
39,117
[15]

Bacillus sp. WSHDZ-01
28,990
[19]

Exiguobacterium oxidotolerans T-2-2T
22,000
[20]

Serratia marcescens SYBC08
20,353
[21]

Rhizobium radiobacter strain 2-1
17,035
[22]

M. luteus
6920
[22]

Figure 6: Catalase production curve of the recombinant E. coli BL21 (DE3).

3.4. Purified Recombinant Catalase Characteristics

3.4.1. Effect of Temperature and pH on This Catalase

Temperature is a major factor in the application of many enzymes. The activity and stability of our purified catalase at different temperatures were assayed. The catalase in this study showed a high activity over a wide range of temperatures, from 10°C to 90°C (Figure 7(a)), and showed maximum activity at 60°C to 70°C. The temperature range was wider and optimal temperature was higher than many reported catalases, such as Serratia marcescens SYBC08 at temperatures ranging from 0°C to 70°C with optimal temperature of 20°C [31]; Psychrobacter piscatorii T-3 from 10°C to 60°C with optimal temperature of 45°C [32]; and Bacillus altitudinis SYBC hb4 from 20°C to 40°C with optimal temperature of 30°C [33]. This catalase was stable at temperatures ≤60°C (Figure 7(b)) and when incubated at 70°C for 1 h, the enzyme maintained >70% residual activity; however, when the incubation temperature was >80°C, the residual activity was <10% after incubation for 1 h. Although this enzyme was inactive at ≥80°C, it still maintained high activity when added to reaction systems at 80°C and 90°C. Thermophilic catalase isolated from thermophilic Thermoascus aurantiacus [34] can retain 100% residual activity after incubation at 60°C for 1 h, which was similar to that of CHB1 catalase. This thermophilic property was much better than the properties of other catalases, such as those from Psychrobacter piscatorii (P. piscatorii) (65°C, 15 min, 20%) [32, 35], Vibrio salmonicida (60°C, 20 min, 0%) [36], Vibrio rumoiensis S-1T (65°C, 10 min, 0%) [37], and Halomonas sp. SK1 (55°C, 30 min, 0%) [38]. These properties enable the enzyme to be applied in both low and high-temperature processes in industry. The optimal pH of the enzyme was 6-7, and the enzyme retained >50% of its activity between pH 5 and 9 (Figure 8).

(a)

(b)

Figure 7: Effect of temperature on recombinant catalase activity. (a) Relative activity of the enzyme at 10, 20, 30, 40, 50, 60, 70, 80, and 90°C; (b) temperature stability of the enzyme. Residual activity of the recombinant enzyme by incubation at 40, 50, 60, 70, 80, and 90°C for 0.5 and 1 h.

Figure 8: Optimal pH of the recombinant catalase. The buffers used for each pH region were 50 mM sodium citrate (pH 4–6), 50 mM sodium phosphate (pH 6–8), and 50 mM glycine-NaOH (pH 9–11). Each pH was assayed at least three times.

3.4.2. Kinetic Parameters of This Catalase

The enzyme kinetics of the recombinant catalase were assayed using different H₂O₂ concentrations as substrates; a Lineweaver–Burk plot was used to calculate , 51.1 mM, and , 151.5 mol/minmg (Figure 9), which is similar to previously reported values (52.5 mM [23] and 40.1 mM [2]). Many other catalases from P. piscatorii T-3, Micrococcus luteus, Bacteroides fragilis, Helicobacter pylori, Serratia marcescens, and Xanthomonas campestris have higher values compared to the purified catalase [39]. The relatively low indicates that the enzyme has a high affinity for H₂O₂ and that the enzyme is stable under high H₂O₂ concentrations. is an important characteristic of enzymes and is vital for the assessment of their potential applications.

Figure 9: A Lineweaver–Burk plot of the recombinant catalase. Enzyme activity was assayed in 50 mM phosphate buffer (pH 7.0) and at 30°C.

4. Conclusions

In this paper, we cloned, expressed, purified, and characterized a Kat gene of thermophilic bacteria Geobacillus sp. CHB1 for the first time. The recombinant enzyme could maintain its stability and showed a high activity over a wide range of temperatures from 10°C to 90°C. Specific activity of the purified recombinant catalase was 40,526 U/mg of protein, and recombinant E. coli BL21 strain reached a high level of catalase production to 35,831 U/mL. This enzyme’s wide range of reaction temperatures, good thermostability, and high production may be suitable for the textile, paper-making, and other industries.

Competing Interests

The authors declare no conflict of interests.

Acknowledgments

This work was supported by the Argoscientific Research in the Public Interest (201303094-05) and Fujian Finance no. 1464.

References

H.-S. Ko, H. Fujiwara, Y. Yokoyama et al., “Inducible production of alcohol oxidase and catalase in a pectin medium by Thermoascus aurantiacus IFO 31693,” Journal of Bioscience and Bioengineering, vol. 99, no. 3, pp. 290–292, 2005.

H.-W. Zeng, Y.-J. Cai, X.-R. Liao, S.-L. Qian, F. Zhang, and D.-B. Zhang, “Optimization of catalase production and purification and characterization of a novel cold-adapted Cat-2 from mesophilic bacterium Serratia marcescens SYBC-01,” Annals of Microbiology, vol. 60, no. 4, pp. 701–708, 2010.

H. D. Rowe, “Biotechnology in the textile/clothing industry—a review,” Journal of Consumer Studies & Home Economics, vol. 23, no. 1, pp. 53–61, 1999.

X. Fu, W. Wang, J. Hao, X. Zhu, and M. Sun, “Purification and characterization of catalase from marine bacterium Acinetobacter sp. YS0810,” BioMed Research International, vol. 2014, Article ID 409626, 7 pages, 2014.

B. S. Sooch, B. S. Kauldhar, and M. Puri, “Recent insights into microbial catalases: isolation, production and purification,” Biotechnology Advances, vol. 32, no. 8, pp. 1429–1447, 2014.

M. Spiro and W. P. Griffith, “The mechanism of hydrogen peroxide bleaching,” Textile Chemist and Colorist, vol. 29, no. 11, pp. 12–13, 1997.

M. Kagawa, N. Murakoshi, Y. Nishikawa et al., “Purification and cloning of a thermostable manganese catalase from a thermophilic bacterium,” Archives of Biochemistry and Biophysics, vol. 362, no. 2, pp. 346–355, 1999.

A. Hidalgo, L. Betancor, R. Moreno et al., “Thermus thermophilus as a cell factory for the production of a thermophilic Mn-dependent catalase which fails to be synthesized in an active form in Escherichia coli,” Applied and Environmental Microbiology, vol. 70, no. 7, pp. 3839–3844, 2004.

S. Ebara and Y. Shigemori, “Alkali-tolerant high-activity catalase from a thermophilic bacterium and its overexpression in Escherichia coli,” Protein Expression and Purification, vol. 57, no. 2, pp. 255–260, 2008.

M. Gudelj, G. O. Fruhwirth, A. Paar et al., “A catalase-peroxidase from a newly isolated thermoalkaliphilic Bacillus sp. with potential for the treatment of textile bleaching effluents,” Extremophiles, vol. 5, no. 6, pp. 423–429, 2001.

X.-L. Shi, M.-Q. Feng, J. Shi, Z.-H. Shi, J. Zhong, and P. Zhou, “High-level expression and purification of recombinant human catalase in Pichia pastoris,” Protein Expression and Purification, vol. 54, no. 1, pp. 24–29, 2007.

G. Gellissen, M. Piontek, U. Dahlems et al., “Recombinant Hansenula polymorpha as a biocatalyst: coexpression of the spinach glycolate oxidase (GO) and the S. cerevisiae catalase T (CTT1) gene,” Applied Microbiology and Biotechnology, vol. 46, no. 1, pp. 46–54, 1996.

T. Rochat, A. Miyoshi, J. J. Gratadoux et al., “High-level resistance to oxidative stress in Lactococcus lactis conferred by Bacillus subtilis catalase KatE,” Microbiology, vol. 151, no. 9, pp. 3011–3018, 2005.

X. Shi, M. Feng, Y. Zhao, X. Guo, and P. Zhou, “Overexpression, purification and characterization of a recombinant secretary catalase from Bacillus subtilis,” Biotechnology Letters, vol. 30, no. 1, pp. 181–186, 2008.

S. Xu, Y. Guo, G. Du, J. Zhou, and J. Chen, “Self-cloning significantly enhances the production of catalase in Bacillus subtilis WSHDZ-01,” Applied Biochemistry and Biotechnology, vol. 173, no. 8, pp. 2152–2162, 2014.

H. Luo, Y. Zhou, Y. H. Chang, L. Xiong, and L. Z. Liu, “Rapid gene cloning, overexpression and characterization of a thermophilic catalase in E. coli,” Advanced Materials Research, vol. 365, pp. 367–374, 2012.

F. W. Studier, “Protein production by auto-induction in high density shaking cultures,” Protein Expression and Purification, vol. 41, no. 1, pp. 207–234, 2005.

J. Zhou, M. A. Bruns, and J. M. Tiedje, “DNA recovery from soils of diverse composition,” Applied and Environmental Microbiology, vol. 62, no. 2, pp. 316–322, 1996.

Y. Deng, Z. Hua, Z. Zhao, D. Yao, G. Du, and J. Chen, “Effect of nitrogen sources on catalase production by Bacillus subtilis WSHDZ-01,” Chinese Journal of Applied and Environmental Biology, vol. 14, no. 4, pp. 544–547, 2008.

Y. Hanaoka and I. Yumoto, “Manipulation of culture conditions for extensive extracellular catalase production by Exiguobacterium oxidotolerans T-2-2T,” Annals of Microbiology, vol. 65, pp. 1183–1187, 2014.

H.-W. Zeng, Y.-J. Cai, X.-R. Liao et al., “Serratia marcescens SYBC08 catalase isolated from sludge containing hydrogen peroxide shows increased catalase production by regulation of carbon metabolism,” Engineering in Life Sciences, vol. 11, no. 1, pp. 37–43, 2011.

M. Nakayama, T. Nakajima-Kambe, H. Katayama, K. Higuchi, Y. Kawasaki, and R. Fuji, “High catalase production by Rhizobium radiobacter strain 2-1,” Journal of Bioscience and Bioengineering, vol. 106, no. 6, pp. 554–558, 2008.

V. Neuhoff, N. Arold, D. Taube, and W. Ehrhardt, “Improved staining of proteins in polyacrylamide gels including isoelectric focusing gels with clear background at nanogram sensitivity using Coomassie Brilliant Blue G-250 and R-250,” Electrophoresis, vol. 9, no. 6, pp. 255–262, 1988.

M. M. Bradford, “A rapid and sensitive method for the quantitation of microgram quantities of protein utilizing the principle of protein-dye binding,” Analytical Biochemistry, vol. 72, no. 1-2, pp. 248–254, 1976.

R. F. Beers Jr. and I. W. Sizer, “A spectrophotometric method for measuring the breakdown of hydrogen peroxide by catalase,” The Journal of Biological Chemistry, vol. 195, no. 1, pp. 133–140, 1952.

H. Lineweaver and D. Burk, “The determination of enzyme dissociation constants,” Journal of the American Chemical Society, vol. 56, no. 3, pp. 658–666, 1934.

D. K. Bol and R. E. Yasbin, “The isolation, cloning and identification of a vegetative catalase gene from Bacillus subtilis,” Gene, vol. 109, no. 1, pp. 31–37, 1991.

F. Wang, Z. Wang, W. Shao, J. Liu, C. Xu, and J. Zhuge, “Purification and properties of thermostable catalase in engineered E. coli,” Acta microbiologica Sinica, vol. 42, no. 3, pp. 348–353, 2002.

S. Loprasert, S. Negoro, and H. Okada, “Cloning, nucleotide sequence, and expression in Escherichia coli of the Bacillus stearothermophilus peroxidase gene (perA),” Journal of Bacteriology, vol. 171, no. 9, pp. 4871–4875, 1989.

Y. Zhong, X.-H. Zhang, J. Chen et al., “Overexpression, purification, characterization, and pathogenicity of Vibrio harveyi hemolysin VHH,” Infection and Immunity, vol. 74, no. 10, pp. 6001–6005, 2006.

H.-W. Zeng, Y.-J. Cai, X.-R. Liao, F. Zhang, and D.-B. Zhang, “Production, characterization, cloning and sequence analysis of a monofunctional catalase from Serratia marcescens SYBC08,” Journal of Basic Microbiology, vol. 51, no. 2, pp. 205–214, 2011.

H. Kimoto, K. Yoshimune, H. Matsuyma, and I. Yumoto, “Characterization of catalase from psychrotolerant Psychrobacter piscatorii T-3 exhibiting high catalase activity,” International Journal of Molecular Sciences, vol. 13, no. 2, pp. 1733–1746, 2012.

Y. Zhang, X. Li, R. Xi, Z. Guan, Y. Cai, and X. Liao, “Characterization of an acid-stable catalase KatB isolated from Bacillus altitudinis SYBC hb4,” Annals of Microbiology, vol. 66, no. 1, pp. 131–141, 2016.

H. Wang, Y. Tokusige, H. Shinoyama, T. Fujii, and T. Urakami, “Purification and characterization of a thermostable catalase from culture broth of Thermoascus aurantiacus,” Journal of Fermentation and Bioengineering, vol. 85, no. 2, pp. 169–173, 1998.

W. Wang, M. Sun, W. Liu, and B. Zhang, “Purification and characterization of a psychrophilic catalase from Antarctic Bacillus,” Canadian Journal of Microbiology, vol. 54, no. 10, pp. 823–828, 2008.

M. S. Lorentzen, E. Moe, H. M. Jouve, and N. P. Willassen, “Cold adapted features of Vibrio salmonicida catalase: characterisation and comparison to the mesophilic counterpart from Proteus mirabilis,” Extremophiles, vol. 10, no. 5, pp. 427–440, 2006.

I. Yumoto, D. Ichihashi, H. Iwata et al., “Purification and characterization of a catalase from the facultatively psychrophilic bacterium Vibrio rumoiensis S-1T exhibiting high catalase activity,” Journal of Bacteriology, vol. 182, no. 7, pp. 1903–1909, 2000.

K. Phucharoen, K. Hoshino, Y. Takenaka, and T. Shinozawa, “Purification, characterization, and gene sequencing of a catalase from an alkali- and halo-tolerant bacterium, Halomonas sp. SK1,” Bioscience, Biotechnology and Biochemistry, vol. 66, no. 5, pp. 955–962, 2002.

J. Switala and P. C. Loewen, “Diversity of properties among catalases,” Archives of Biochemistry and Biophysics, vol. 401, no. 2, pp. 145–154, 2002.