BioMed Research International
Volume 2016 (2016), Article ID 7621639, 1 page
http://dx.doi.org/10.1155/2016/7621639

Corrigendum

Corrigendum to “Design of CGMP Production of ¹⁸F- and ⁶⁸Ga-Radiopharmaceuticals”

Yen-Ting Chi, Pei-Chun Chu, Hao-Yu Chao, Wei-Chen Shieh, and Chuck C. Chen

PET Pharm Biotech Company Limited, 1-2F No. 143 and 1-2F No. 141 HouGang, Xinzhuang District, New Taipei City 24257, Taiwan

Received 15 May 2016; Accepted 12 June 2016

Copyright © 2016 Yen-Ting Chi et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The published version of the article titled “Design of CGMP Production of ¹⁸F- and ⁶⁸Ga-Radiopharmaceuticals” [1] failed to indicate that the “automated synthesizer” pictured in Figure (a) of the article was designed and developed by Scintomics GmbH. The synthesizer was purchased by PET Pharm Biotech Company Limited from Scintomics GmbH and installed by engineers employed by Scintomics GmbH. The authors wish to make it clear that they had no role in the development of the software or hardware of the synthesizer nor in its installation in the hot cell, as described in Sections and of the paper. We apologize to Scintomics GmbH and our readers for the potentially misleading oversight.

References

Y.-T. Chi, P.-C. Chu, H.-Y. Chao, W.-C. Shieh, and C. C. Chen, “Design of CGMP production of ¹⁸F- and ⁶⁸Ga-radiopharmaceuticals,” BioMed Research International, vol. 2014, Article ID 680195, 8 pages, 2014.