BioMed Research International
Volume 2016 (2016), Article ID 8301624, 8 pages
http://dx.doi.org/10.1155/2016/8301624

Research Article

Bone Healing Improvements Using Hyaluronic Acid and Hydroxyapatite/Beta-Tricalcium Phosphate in Combination: An Animal Study

Yen-Lan Chang,1,2 Yi-June Lo,³ Sheng-Wei Feng,1,4 Yu-Chih Huang,¹ Hsin-Yuan Tsai,¹ Che-Tong Lin,¹ Kan-Hsin Fan,⁵ and Haw-Ming Huang1,6

¹School of Dentistry, College of Oral Medicine, Taipei Medical University, Taipei, Taiwan
²Dental Department, Mackey Memorial Hospital, Taipei, Taiwan
³Dental Department, Wan Fang Hospital, Taipei Medical University, Taipei, Taiwan
⁴School of Oral Hygiene, College of Oral Sciences, Taipei Medical University, Taipei, Taiwan
⁵Dental Department, En Chu Kong Hospital, New Taipei City, Taiwan
⁶Graduate Institute of Biomedical Materials and Tissue Engineering, College of Biomedical Engineering, Taipei Medical University, Taipei, Taiwan

Received 3 October 2016; Accepted 23 November 2016

Academic Editor: Ren-Yeong Huang

Copyright © 2016 Yen-Lan Chang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The purpose of this study was to investigate whether the use of HLA as an aqueous binder of hydroxyapatite/beta-tricalcium phosphate (HA-βTCP) particles can reduce the amount of bone graft needed and increase ease of handling in clinical situations. In this study, HA/βTCP was loaded in commercially available crosslinking HLA to form a novel HLA/HA-βTCP composite. Six New Zealand White rabbits (3.0–3.6 kg) were used as test subjects. Four 6 mm defects were prepared in the parietal bone. The defects were filled with the HLA/HA-βTCP composite as well as HA-βTCP particle alone. New bone formation was analyzed by micro-CT and histomorphometry. Our results indicated that even when the HA-βTCP particle numbers were reduced, the regenerative effect on bone remained when the HLA existed. The bone volume density (BV/TV ratio) of HLA/HA-βTCP samples was 1.7 times larger than that of the control sample at week 2. The new bone increasing ratio (NBIR) of HLA/HA-βTCP samples was 1.78 times higher than the control group at week 2. In conclusion, HA-βTCP powder with HLA contributed to bone healing in rabbit calvarial bone defects. The addition of HLA to bone grafts not only promoted osteoconduction but also improved handling characteristics in clinical situations.

1. Introduction

Guided bone regeneration is a surgical procedure to regenerate enough bone for successful implant placement. It can be achieved by performing ridge augmentation and bone regeneration procedures which increase bone volume at bone defect areas. The materials used for guided bone regeneration should be osteoconductive or osteoinductive. Although commercialized bone graft materials have been available for some time and are proven to be a useful material for bone regeneration, there is still room for improvement.

Sinus elevation is a surgical procedure that adds bone volume to a patient’s upper jaw in the area of molars and premolars. During surgery, bone graft material was packed into space where the sinus was. The most commonly used compositions for sinus elevation and guided bone regeneration is a mixture of hydroxyapatite (HA) and beta-tricalcium phosphate (βTCP) [1–3]. However, shaping this material to fit the sinus cavity is difficult. In addition, it is hard to adhere the material without loss during operation.

Hyaluronic acid (HLA) is a polysaccharide consisting of alternating residues of D-glucuronic acid and N-acetylglucosamine [4]. It is found in abundance in the extracellular space [5] and load-bearing joints [6, 7]. In addition, HLA is also involved in skin moisture due to its unique capacity to retain water [8]. It has been reported that HLA can be used for knee and temporomandibular osteoarthritis treatments [9]. In the field of dentistry, hyaluronic acid demonstrated anti-inflammatory, antioxidant, and antibacterial properties in the treatment of periodontal diseases [10]. In addition, due to its viscoelastic properties, it can be used as an adjunct to maintain space during the treatment of periodontitis.

Recently HLA has been studied as a biomaterial for tissue engineering. In 2011, Correia et al. prepared freeze-dried composite scaffolds of chitosan and HLA for cartilage tissue engineering and found that the incorporation of HLA enhanced cartilage ECM production [6]. In an animal study, Sasaki and Watanabe (1995) studied the osteoinductive action of HLA and found that HLA is capable of accelerating new bone formation through mesenchymal cell differentiation in bone wounds [11]. This is because bone grafts mixed with HLA can alter the physical and chemical properties of graft materials which results in enhanced capability for cell adhesion, proliferation, and migration. Their conclusion indicated that scaffolds incorporating HLA served as a support system for enhancing bone regeneration. Other recent animal studies also support the idea that composites made of bone grafts and HLA enhance bone growth and mineralization [7, 12, 13]. According to these results, Schulz et al. (2014) coated HLA on the surface of dental titanium implants and inserted them into the maxilla of miniature pigs. Their results demonstrated that HLA increases bone formation at implant/bone interface in the early healing period [4].

In 2013, ELkarargy conducted a histomorphometric study to investigate the usefulness of HA/βTCP with HLA for alveolar sockets preservation. He found that HA/βTCP with HLA exhibits a more efficient in osteoconduction when compared to the samples without HLA [14]. Bone grafts such as HA/βTCP used for sinus elevation and guided bone regeneration are expensive. Thus reducing the amount of the bone graft material used without affecting treatment efficiency is a challenge for scientists and dentists. Due to HLA’s unique viscoelastic and osteogenetic properties, the combination of HLA and HA/βTCP should provide advantages compared to the use of either alone. Accordingly, the aim of this study is to test the hypothesis that an HLA and HA/βTCP composite material can reduce the amount of bone graft needed and increase ease of handling in clinical situations.

2. Materials and Methods

2.1. Physical Properties of HLA

The HLA used in this study is a commercially available HLA (Global Xtra, DermaFill Global, Paris, France) with a molecular weight of 2.5–3.0 MDa. The HLA was crosslinked with 1,4-butanediol diglycidyl ether (BDDE) and its concentration is 25 mg/mL. Measurement of HLA particle size distribution in this study was performed using a particle size analyzer (90 Plus, Brookhaven Instruments Corporation, Holtsville, NY, USA). Before the test, a 1 mL sample was diluted 1 : 500 with purified water and stirred for 12 hrs. The pH value of the HLA used in this study was measured using a pH-meter at room temperature (Model 6173, JENCO Quality Instruments, San Diego, USA). The rheological characteristic of the tested HLA was performed on a rheometer (RheoStress 1, Haake, Germany). The HLA properties were characterized under steady and oscillatory regimes at 25°C as a previous study [15]. Briefly, oscillatory measurements were performed at a stress of 1.88 Pa in the linear region. The frequency range and shear ratio were set at 0.1–10 Hz and 0.1–20 s⁻¹, respectively. Storage () and loss () moduli of the tested HLA were recorded as a function of frequency. Dynamic viscosity () of the tested HLA was recorded as a function of oscillation frequency.

2.2. Animal Study

In this study, 6 New Zealand White rabbits, weighing 3.0–3.6 kg, were used as test subjects. The rabbits were fed solid food and water for adaptation in bracket cages at a temperature of 25°C and a humidity of 50%. All rabbits were maintained and used according to the guidelines set out in “The Care and Use of Laboratory Animals of Taipei Medical University” (LAC-2014-0087). To prepare the HLA/HA-βTCP sample, 1 mL commercialized hyaluronic acid (Global Xtra, DermaFill, Paris, France) was diluted with 3.5 mL phosphate buffer solution (PBS). Then 100 mg HA-βTCP (250–500 μm, MBCP, Biomatlante, Belin, France) was added to the diluted HLA solution.

Before surgery, the rabbits were anesthetized with intramuscular Zoletil 50 at a dose of 0.5 mL (Virbac, Carros Cedex, France). The operation site was shaved and the calvaria bone was exposed through a skin incision. According to previous studies [16, 17], four circular defects with a diameter of 6 mm were prepared in the parietal bone (Figure 1). The two right defects were grafted with 0.2 g of prepared HA-βTCP and HLA/HA-βTCP. The two left defects were unfilled controls.

Figure 1: Skull defects for currently prepared material implantation. The two defects on the right were used for HLA/HA-βTCP and HA-βTCP implantation, while the two on the left were unfilled controls.

After 2 and 4 weeks of healing, the rabbits were euthanized under anesthesia by CO₂ gas asphyxiation and tissues from inside the surgical sites were collected. Bone blocks were obtained using a surgical burr attached to a slow-speed electrical hand piece. The blocks were then preserved and fixed in a 10% formaldehyde solution at pH 7.0 for further analysis.

2.3. Micro-CT Examination

To test the new bone formation, the collected bone blocks were scanned in a micro-CT scanner (SkyScan 1076, Bruker, Kontich, Belgium). The machine was set with the following parameters: images were acquired at 49 kV, 200 μA, through a 0.5 mm thick aluminum filter with a pixel size of 18.27 μm. The reconstructed images were imported into the analysis software (CTAn, Bruker) for calculating bone volume. According to previous studies [18–20], the volume of interest (VOI) was defined as the relative changes in bone volume density (BV/TV%), the percentage of bone volume (BV) to the total tissue volume (TV). The new bone growth was evaluated using calculated VOI. In addition, the numbers of HA-βTCP particles found in the defect were counted using the micro-CT images.

2.4. Histological Analysis

To quantitate bone growth condition, the bone specimens were decalcified. The samples were immersed in 10% EDTA (0.1 M phosphate buffer, pH 7.4) for 4 weeks. After embedding the samples in paraffin, they were cut into 5 μm thick sections. The dehydrating procedure was performed in an ascending alcohol gradient (60%–100%). Then the samples were stained with hematoxylin and eosin. Histological images were observed with a light microscope connected to a digital camera. The new bone growth condition was obtained by counting the area of newly formed bone in the defect using commercial imaging software (ImageJ, National Institutes of Health, USA). In this study, the new bone increase ratio was calculated to represent the bone growth condition. This normalized value was defined as the newly formed bone area of filled samples divided by the control sample analogue value.

2.5. Statistical Analysis

Mean values and standard deviations of each measurement were obtained. To evaluate differences between the sample and control, one-way analysis of variance (ANOVA) (SPSS Inc., Chicago, IL, USA) with Tukey’s post hoc was performed. A value lower than 0.05 was considered statistically significant.

3. Results

3.1. Physical Properties of HLA

Figure 2 shows the particle size distributions of HLA used in this study. Our results show that the diameter of HLA particles is concentrated at 0.1–0.8 μm with an average of  μm. The pH value of HLA was . Figure 3(a) shows the mechanical tests of the dynamic moduli. The elastic modulus () is higher than loss modulus (). The slope of the line is small and displays a frequency dependence manner. Figure 3(b) shows the curve of complex viscosity () versus oscillation frequency. The HLA demonstrates a strong shear thinning property at higher shear rates. This phenomenon indicates that the test HLA is a non-Newtonian pseudoplastic material.

Figure 2: Particle diameter distribution of the HLA used in this study.

(a)

(b)

Figure 3: The mechanical spectra of the dynamic moduli of the HLA used in this study. Storage modulus () is shown in graph (a) and loss modulus () is shown in graph (b). Graph (c) shows complex viscosity () as a function of oscillation frequency.

3.2. Micro-CT Examination

Typical results of micro-CT images of bone specimens are shown in Figure 4. At both weeks 2 and 4, new bone formation can be observed in all the three groups. For the control group, newly formed bone can be found only at the area around the inner surface of the defect (Figures 4(a) and 4(d)). However, newly formed bone can be observed in the central area of the defect that was filled with HA-βTCP (Figures 4(b) and 4(e)). For the HLA/HA-βTCP samples, a similar phenomenon can also be identified (Figures 4(c) and 4(f)).

Figure 4: Micro-CT images of the artificial defects. (a) and (d) are the blank control at weeks 2 and 4, respectively. (b) and (e) are HA-βTCP filled groups at weeks 2 and 4, respectively. (c) and (f) are HLA/HA-βTCP filled groups at weeks 2 and 4, respectively.

The differences in newly formed bone volume density (BV/TV ratio) between filled samples and controls were noted at both weeks 2 (Figure 5(a)) and 4 (Figure 5(b)) but were more obvious in the second week. However, no difference can be observed when comparing the HA-βTCP and HLA/HA-βTCP groups. At week 2, the BV/TV ratios for the HA-βTCP and HLA/HA-βTCP samples were % and %, respectively. These values were almost 1.7 times larger than that of the control sample (). At week 4, the BV/TV ratios of the HA-βTCP and HLA/HA-βTCP samples increased to % and %. However, there was a lower 1.25-fold difference between the filled group and blank control (Figure 5(b)). Figure 6 shows the particles in the defect at week 2. The number of particles in the HA-βTCP group was which is significantly higher than that of the HLA/HA-βTCP group (). Statistical analysis revealed that this increase was significant ().

(a)

(b)

Figure 5: BV/TV% for the artificial defects filled with HA-βTCP alone and HLA/HA-βTCP from 2 weeks (a) and 4 weeks (b) after implantation surgery ().

Figure 6: Particle numbers used in artificial defects filled with HA-βTCP alone and HLA/HA-βTCP at 2 weeks after surgery ().

3.3. Histological Analysis

Histological evaluation for all groups at each time point was shown in Figure 7. After 2 weeks of healing, the newly formed woven bone was in partial direct contact with the filled HA-βTCP surface in both the HA-βTCP and the HLA/HA-βTCP groups (Figures 7(b) and 7(c)). At 4 weeks, the newly formed bone was in close contact with the filled HA-βTCP surface (Figures 7(e) and 7(f)).

Figure 7: Histomorphometric images of the blank control, HA-βTCP alone, and HLA/HA-βTCP treated samples at 2 and 4 weeks.

The histomorphometrical evaluation and the quantitative results seen in the new bone increase ratio (NBIR) are presented in Figure 8. Mean NBIR values were higher when the defect was filled with HA-βTCP, a 1.58-fold increase compared to the control. The ratio difference increased to 1.78-fold when HLA/HA-βTCP was used as the filling material. However, the NBIR values were not significantly different at 4 weeks.

(a)

(b)

Figure 8: New bone increase ratio (NBIR) for the artificial defects filled with HA-βTCP alone and HLA/HA–βTCP from 2 weeks (a) and 4 weeks (b) after implantation surgery.

4. Discussion

The H&E staining and micro-CT data obtained in this study showed that the prepared HLA/HA-βTCP had excellent biocompatibility and osteointegration (Figures 7(c) and 7(f)). Micro-CT analysis showed that the BV/TV ratio increased in both HA-βTCP and HLA/HA-βTCP samples (Figure 5). In Figure 4, significant empty space can be observed in the HLA/HA-βTCP filled sample. A previous report indicated that HLA in the space between bone graft powder and bone tissue may affect new bone formation [21]. However, when comparing the BV/TV ratio between HA-βTCP and HLA/HA-βTCP groups, the addition of HLA did not significantly reduce BV/TV ratio at both weeks 2 and 4 (Figure 5). The histological results showed that HLA/HA-βTCP-treated defects had a greater new bone increase ratio than in defects treated with HA-βTCP alone and untreated controls (Figure 8). This inconsistency may be due to the limitation of micro-CT, which cannot detect bone quality change until the alternation reaches 30–40% [21].

From Figures 6 and 8, we found that while the particle number for HA-βTCP was reduced, the bone regenerative effect remained when the HLA was present. These results provide evidence that HLA/HA-βTCP is useful for tissue engineering, which is consistent with previous reports suggesting that bone grafts combined with HLA enhance bone growth [7, 13, 14, 21] and mineralization [12]. From the results of micro-CT images and BV/TV ratio, a smaller number of particles were used in HLA/HA-βTCP group and have the same healing results compared to the HA-βTCP group. It is reasonable to suggest that incorporating HA-βTCP with HLA provides higher regenerative efficiency for bone healing.

Previous studies have also suggested that the positive effect on bone healing is found at an early stage. For example, Schulz et al. (2014) coated HLA on the surface of dental titanium implants and inserted them into the maxilla of miniature pigs [4]. They found that HLA increases bone formation at the implant-bone interface in the early healing period. An animal study by Krause et al. (2014) investigated a new bone substitute paste composed of pure phase β-TCP and HLA. They found that the substitute showed an early indication of bone formation [22]. In 2014, Nguyen and Lee prepared a scaffold by loading HLA hydrogel into a biphasic calcium phosphate (BCP) ceramic. After a series of animal studies, they suggested that this novel bone substitute exhibited rapid new bone formation and a high rate of collagen mineralization [12]. In the present study, the BV/TV ratio for the HLA/HA-βTCP filled samples was almost 1.7 times larger than that of the control sample at week 2. However, the difference between ratios was 1.25 at week 4. This phenomenon confirmed the results of previous studies which indicated that the positive effect of HLA on bone healing is seen at an early healing period because HLA is one of the components of the extracellular matrix that serves as a scaffold for mesenchymal cell migration [23]. This effect induced the mesenchymal cells to differentiate, proliferate [11, 24], and migrate [25] which induced growth of osteoblasts and osteocytes at the early healing stage.

It has been reported that HLA’s regenerative function is strongly affected by its physical properties. The HLA used in this study is a commercially available crosslinked product with high molecular weight. According to a previous study, the reticulated HLA can demonstrate a better regenerative function compared to linear HLA when it is mixed with βTCP granules [26]. In addition, particle size and molecular weight also strongly affects the biofunction of HLA [8, 27]. In 2015, Zhao et al. found that high molecular weight HLA increased the mRNA expressions of ALP, RUNX-2, and OCN [28]. That is, HLA of higher molecular weight promoted bone formation. It is well known that high molecular weight and crosslinking degree result in high HLA viscosity. Figure 3(a) shows mechanical tests of the dynamic moduli. The elastic is higher than . In addition, the slope of the line is small and displays a minimum at intermediate frequencies dependence manner as previously reported [14]. This result demonstrates that the HLA used in this study is a gel with high viscosity. This phenomenon suggests that the HLA used in this study may provide bone growth effect as mentioned above. Although HA and βTCP granules are commonly used biomaterials for repairing bone defects, when they are dried these granules are difficult to handle in the surgical room because of low weight and lacking cohesion [26]. Incorporating these bone graft particles into a hydrogel could be a possible way to solve this problem. From the result, we concluded that incorporating HA-βTCP with HLA could be a satisfactory method for improving both regenerative efficiency and ease of handling [29–31].

5. Conclusion

In conclusion, the HLA/HA-βTCP present in this study provides bone regeneration in situations with a low amount of HA-βTCP granules. In addition, this novel material provides handling efficiency during the surgical process. Overall, HLA/HA-βTCP exhibits great promise for use in stimulating new bone formation for the treatment of sinus elevation and guided bone regeneration.

Competing Interests

The authors have declared that there is no conflict of interests.

Authors’ Contributions

Yen-Lan Chang and Yi-June Lo contributed equally to this work.

Acknowledgments

This study was supported by the Ministry of Science and Technology, Taiwan (Grant MOST 104-2221-E-038-002) and in part by Wan Fang Hospital, Taipei Medical University, Taipei, Taiwan (Grant 104TMU-WFH-10).

References

R. F. Ellinger, E. B. Nery, and K. L. Lynch, “Histological assessment of periodontal osseous defects following implantation of hydroxyapatite and biphasic calcium phosphate ceramics: a case report,” The International Journal of Periodontics & Restorative Dentistry, vol. 6, no. 3, pp. 22–33, 1986.

G. Daculsi, R. Z. LeGeros, E. Nery, K. Lynch, and B. Kerebel, “Transformation of biphasic calcium phosphate ceramics in vivo: ultrastructural and physicochemical characterization,” Journal of Biomedical Materials Research, vol. 23, no. 8, pp. 883–894, 1989.

E. B. Nery, R. Z. LeGeros, K. L. Lynch, and K. Lee, “Tissue response to biphasic calcium phosphate ceramic with different ratios of HA/beta TCP in periodontal osseous defects,” Journal of Periodontology, vol. 63, no. 9, pp. 729–735, 1992.

M. C. Schulz, P. Korn, B. Stadlinger et al., “Coating with artificial matrices from collagen and sulfated hyaluronan influences the osseointegration of dental implants,” Journal of Materials Science: Materials in Medicine, vol. 25, no. 1, pp. 247–258, 2014.

P. Korn, M. C. Schulz, V. Hintze et al., “Chondroitin sulfate and sulfated hyaluronan-containing collagen coatings of titanium implants influence peri-implant bone formation in a minipig model,” Journal of Biomedical Materials Research Part A, vol. 102, no. 7, pp. 2334–2344, 2014.

C. R. Correia, L. S. Moreira-Teixeira, L. Moroni et al., “Chitosan scaffolds containing hyaluronic acid for cartilage tissue engineering,” Tissue Engineering Part C: Methods, vol. 17, no. 7, pp. 717–730, 2011.

P. Dahiya and R. Kamal, “Hyaluronic acid: a boon in periodontal therapy,” North American Journal of Medical Sciences, vol. 5, no. 5, pp. 309–315, 2013.

J. Kablik, G. D. Monheit, L. Yu, G. Chang, and J. Gershkovich, “Comparative physical properties of hyaluronic acid dermal fillers,” Dermatologic Surgery, vol. 35, supplement 1, pp. 302–312, 2009.

S.-F. Sun, Y.-J. Chou, C.-W. Hsu et al., “Efficacy of intra-articular hyaluronic acid in patients with osteoarthritis of the ankle: a prospective study,” Osteoarthritis and Cartilage, vol. 14, no. 9, pp. 867–874, 2006.

H. Jentsch, R. Pomowski, G. Kundt, and R. Göcke, “Treatment of gingivitis with hyaluronan,” Journal of Clinical Periodontology, vol. 30, no. 2, pp. 159–164, 2003.

T. Sasaki and C. Watanabe, “Stimulation of osteoinduction in bone wound healing by high-molecular hyaluronic acid,” Bone, vol. 16, no. 1, pp. 9–15, 1995.

T. B. L. Nguyen and B.-T. Lee, “A combination of biphasic calcium phosphate scaffold with hyaluronic acid-gelatin hydrogel as a new tool for bone regeneration,” Tissue Engineering A, vol. 20, no. 13-14, pp. 1993–2004, 2014.

M. R. Nejadnik, X. Yang, M. Bongio et al., “Self-healing hybrid nanocomposites consisting of bisphosphonated hyaluronan and calcium phosphate nanoparticles,” Biomaterials, vol. 35, no. 25, pp. 6918–6929, 2014.

A. ELkarargy, “Alveolar sockets preservation using hydroxyapatite/beta tricalcium phosphate with hyaluronic acid (histomorphometric study),” Journal of American Science, vol. 9, no. 1, pp. 556–563, 2013.

A. A. M. Shimojo, A. M. B. Pires, L. G. De La Torre, and M. H. A. Santana, “Influence of particle size and fluid fraction on rheological and extrusion properties of crosslinked hyaluronic acid hydrogel dispersions,” Journal of Applied Polymer Science, vol. 128, no. 3, pp. 2180–2185, 2013.

F. M. Tamimi, J. Torres, I. Tresguerres, C. Clemente, E. López-Cabarcos, and L. J. Blanco, “Bone augmentation in rabbit calvariae: comparative study between Bio-Oss® and a novel β-TCP/DCPD granulate,” Journal of Clinical Periodontology, vol. 33, no. 12, pp. 922–928, 2006.

L. Andersson, A. Ramzi, and B. Joseph, “Studies on dentin grafts to bone defects in rabbit tibia and mandible; development of an experimental model,” Dental Traumatology, vol. 25, no. 1, pp. 78–83, 2009.

R. Bedini, D. Meleo, R. Pecci, and L. Pacifci, “The use of microtomography in bone tissue and biomaterial three-dimensional analysis,” Annali dell'Istituto Superiore di Sanita, vol. 45, no. 2, pp. 178–184, 2009.

N. Bakhshalian, S. Hooshmand, S. C. Campbell, J.-S. Kim, K. Brummel-Smith, and B. H. Arjmandi, “Biocompatibility and microstructural analysis of osteopromotive property of allogenic demineralized dentin matrix,” The International Journal of Oral & Maxillofacial Implants, vol. 28, no. 6, pp. 1655–1662, 2013.

S. W. Feng, K. N. Ho, Y. H. Chan, K. Chang, W. Lai, and H. Huang, “Damping factor as a diagnostic parameter for assessment of osseointegration during the dental implant healing process: an experimental study in rabbits,” Annals of Biomedical Engineering, vol. 44, no. 12, pp. 3668–3678, 2016.

H. I. Atilgan, K. Demirel, Y. Kankaya et al., “Scintigraphic and histopathologic evaluation of combined bone grafts,” Journal of Craniofacial Surgery, vol. 24, no. 6, pp. 1902–1907, 2013.

M. Krause, R. Oheim, P. Catala-Lehnen et al., “Metaphyseal bone formation induced by a new injectable β-TCP-based bone substitute: a controlled study in rabbits,” Journal of Biomaterials Applications, vol. 28, no. 6, pp. 859–868, 2014.

S. Mathews, R. Bhonde, P. K. Gupta, and S. Totey, “Novel biomimetic tripolymer scaffolds consisting of chitosan, collagen type 1, and hyaluronic acid for bone marrow-derived human mesenchymal stem cells-based bone tissue engineering,” Journal of Biomedical Materials Research—Part B Applied Biomaterials, vol. 102, no. 8, pp. 1825–1834, 2014.

M. Aslan, G. Şimşek, and E. Dayi, “The effect of hyaluronic acid-supplemented bone graft in bone healing: experimental study in rabbits,” Journal of Biomaterials Applications, vol. 20, no. 3, pp. 209–220, 2006.

N. Karaçal, P. Koşucu, U. Cobanglu, and N. Kutlu, “Effect of human amniotic fluid on bone healing,” The Journal of Surgical Research, vol. 129, no. 2, pp. 283–287, 2005.

E. Aguado, F. Pascaretti-Grizon, C. Gaudin-Audrain, E. Goyenvalle, and D. Chappard, “β-TCP granules mixed with reticulated hyaluronic acid induce an increase in bone apposition,” Biomedical Materials, vol. 9, no. 1, Article ID 015001, 2014.

J. Necas, L. Bartosikova, P. Brauner, and J. Kolar, “Hyaluronic acid (hyaluronan): a review,” Veterinarni Medicina, vol. 53, no. 8, pp. 397–411, 2008.

N. Zhao, X. Wang, L. Qin, Z. Guo, and D. Li, “Effect of molecular weight and concentration of hyaluronan on cell proliferation and osteogenic differentiation in vitro,” Biochemical and Biophysical Research Communications, vol. 465, no. 3, pp. 569–574, 2015.

K. Park, “Injectable hyaluronic acid hydrogel for bone augmentation,” Journal of Controlled Release, vol. 152, no. 2, pp. 207–208, 2011.

H. Tan, H. Li, J. P. Rubin, and K. G. Marra, “Controlled gelation and degradation rates of injectable hyaluronic acid-based hydrogels through a double crosslinking strategy,” Journal of Tissue Engineering and Regenerative Medicine, vol. 5, no. 10, pp. 790–797, 2011.

K. Edsman, L. I. Nord, Å. Öhrlund, H. Lärkner, and A. H. Kenne, “Gel properties of hyaluronic acid dermal fillers,” Dermatologic Surgery, vol. 38, no. 7, pp. 1170–1179, 2012.