BioMed Research International
Volume 2016 (2016), Article ID 8305414, 1 page
http://dx.doi.org/10.1155/2016/8305414

Corrigendum

Corrigendum to “Prognostic Factors of Returning to Work after Sick Leave due to Work-Related Common Mental Disorders: A One- and Three-Year Follow-Up Study”

Bo Netterstrøm, Nanna Hurwitz Eller, and Marianne Borritz

Department of Occupational and Environmental Medicine, Bispebjerg University Hospital, Bispebjerg Bakke 23, 2400 Copenhagen NV, Denmark

Received 6 April 2016; Accepted 5 May 2016

Copyright © 2016 Bo Netterstrøm et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the Materials and Methods section in the article titled “Prognostic factors of returning to work after sick leave due to work-related common mental disorders: A one- and three- year follow-up study,” [1] the sentence “All procedures followed were in accordance with the Helsinki Declaration of 1975, as revised in October 2013” should be corrected to “The randomization procedure (i.e. drawing lots) was conducted by a secretary who was located at another hospital. The outcome of the draw was stated in the referral document and sent to the Bispebjerg Hospital where the assessment interview took place. Interviews of participants randomized to the WLCG were conducted by a trained medical physician or a psychologist, who was able to address any disappointments of the participants and thereby attempt to prevent biases in the responses to the questionnaires. Assessment interviews involving the other participants were conducted by psychology students. The participants were informed of their group assignment after they had agreed to enter the project and they had signed the written informed consent.”

References

B. Netterstrøm, N. H. Eller, and M. Borritz, “Prognostic factors of returning to work after sick leave due to work-related common mental disorders: a one- and three-year follow-up study,” BioMed Research International, vol. 2015, Article ID 596572, 7 pages, 2015.