BioMed Research International
Volume 2017 (2017), Article ID 3689716, 1 page
https://doi.org/10.1155/2017/3689716

Erratum

Erratum to “Collagen Sponge Functionalized with Chimeric Anti-BMP-2 Monoclonal Antibody Mediates Repair of Critical-Size Mandibular Continuity Defects in a Nonhuman Primate Model”

Yilin Xie,1,2 Yingying Su,¹ Seiko Min,³ Jianxia Tang,⁴ Bee Tin Goh,⁵ Leonardo Saigo,⁵ Sahar Ansari,⁶ Alireza Moshaverinia,⁷ Chunmei Zhang,¹ Jinsong Wang,1,8 Yi Liu,² Arash Khojasteh,⁹ Homayoun H. Zadeh,³ and Songlin Wang1,8

¹Molecular Laboratory for Gene Therapy and Tooth Regeneration, Beijing Key Laboratory of Tooth Regeneration and Function Reconstruction, Capital Medical University School of Stomatology, Tian Tan Xi Li No. 4, Beijing 100050, China
²Laboratory of Tissue Regeneration and Immunology and Department of Periodontics, Beijing Key Laboratory of Tooth Regeneration and Function Reconstruction, Capital Medical University School of Stomatology, Tian Tan Xi Li No. 4, Beijing 100050, China
³Laboratory for Immunoregulation and Tissue Engineering (LITE), Ostrow School of Dentistry, University of Southern California, Los Angeles, CA, USA
⁴Department of Oral and Maxillofacial Surgery, Xiangya Stomatological Hospital, Central South University, Changsha, Hunan, China
⁵Department of Oral & Maxillofacial Surgery, National Dental Centre, Singapore
⁶Division of Growth and Development, School of Dentistry, University of California, Los Angeles, CA, USA
⁷Division of Advanced Prosthodontics, School of Dentistry, University of California, Los Angeles, CA, USA
⁸Department of Biochemistry and Molecular Biology, Capital Medical University School of Basic Medical Sciences, You An Men Wai Xi Tou Tiao No. 10, Beijing 100069, China
⁹Department of Tissue Engineering, School of Advanced Technologies in Medicine, Shahid Beheshti University of Medical Sciences, Tehran, Iran

Correspondence should be addressed to Homayoun H. Zadeh; zadeh@usc.edu and Songlin Wang; slwang@ccmu.edu.cn

Received 15 November 2017; Accepted 21 November 2017; Published 3 December 2017

Copyright © 2017 Yilin Xie et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Collagen Sponge Functionalized with Chimeric Anti-BMP-2 Monoclonal Antibody Mediates Repair of Critical-Size Mandibular Continuity Defects in a Nonhuman Primate Model” [1], Dr. Songlin Wang should be listed as the second corresponding author.

References

Y. Xie, Y. Su, S. Min et al., “Collagen sponge functionalized with chimeric anti-BMP-2 monoclonal antibody mediates repair of critical-size mandibular continuity defects in a nonhuman primate model,” BioMed Research International, vol. 2017, Article ID 8094152, 11 pages, 2017.