BioMed Research International
Volume 2017 (2017), Article ID 5785482, 9 pages
https://doi.org/10.1155/2017/5785482

Research Article

An In Situ and In Silico Evaluation of Biophysical Effects of 27 MHz Electromagnetic Whole Body Humans Exposure Expressed by the Limb Current

Jolanta Karpowicz,¹ Patryk Zradziński,¹ Jarosław Kieliszek,² Krzysztof Gryz,¹ Jaromir Sobiech,² and Wiesław Leszko¹

¹Central Institute for Labour Protection-National Research Institute, Laboratory of Electromagnetic Hazards, Warszawa, Poland
²Military Institute of Hygiene and Epidemiology, Laboratory of Electromagnetic Radiation Metrology, Warszawa, Poland

Correspondence should be addressed to Jolanta Karpowicz; jokar@ciop.pl

Received 16 March 2017; Accepted 16 May 2017; Published 5 July 2017

Academic Editor: Davor Zeljezic

Copyright © 2017 Jolanta Karpowicz et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Objectives. The aim was to evaluate correlations between biophysical effects of 27 MHz electromagnetic field exposure in humans (limb induced current (LIC)) and parameters of affecting heterogeneous electric field and body anthropometric properties, in order to improve the evaluation of electromagnetic environmental hazards. Methods. Biophysical effects of exposure were studied in situ by measurements of LIC in 24 volunteers (at the ankle) standing near radio communication rod antenna and in silico in 4 numerical body phantoms exposed near a model of antenna. Results. Strong, positive, statistically significant correlations were found in all exposure scenarios between LIC and body volume index (body height multiplied by mass) (; ). The most informative exposure parameters, with respect to the evaluation of electromagnetic hazards by measurements (i.e., the ones strongest correlated with LIC), were found to be the value of electric field (unperturbed field, in the absence of body) in front of the chest (50 cm from body axis) or the maximum value in space occupied by human. Such parameters were not analysed in previous studies. Conclusions. Exposed person’s body volume and electric field strength in front of the chest determine LIC in studied exposure scenarios, but their wider applicability needs further studies.

1. Introduction

At present, wireless communication belongs to the basic tools used by various rescue and uniformed services, including military units [1–4]. Such devices include a portable radio communication units (known as a radiophones) equipped with rod antenna and operating at a frequency of approximately 27 MHz of emitted electromagnetic radiation (EMR), used by both military and civilian services. Devices of this type provide good quality connections at longer distances than public mobile phone systems and even in an environment not covered by public wireless communication systems, because they may be equipped with terminals of significantly higher output power than public mobile phone systems.

Human exposure to EMR was identified as an environmental factor that may create health and safety hazards, including a potentially carcinogenic outcome of exposure [5–8]. The environmental impact of EMR is characterized by the strength of electric and magnetic fields (-field and -field, resp.), representing its indivisible components [9]. European Directive 2013/35/EU sets out the minimum requirements regarding the protection of workers against health and safety hazards caused by electromagnetic fields (EMF) in the workplace [10]. According to it, as well as according to international guidelines provided by International Commission on Nonionizing Radiation Protection (ICNIRP) and standard from Institute of Electrical and Electronics Engineers (IEEE), in the radiofrequency band used in radio communication (including 27 MHz), the exposure limitations are provided to protect against the thermal effects caused by EMF biophysical influence [5, 11]. Such Exposure Limit Values (ELVs) are specified with regard to the values of the specific energy absorption rate (SAR). SAR is defined as the ratio between absorbed energy and unit weight of tissue (in W/kg) and is only assessable by numerical calculations (recognized as in silico measurements), requiring complex research procedures [5, 9–14]. SAR limits are provided for the effects of exposure averaged over a whole body or localized values as well. For this reason, various numerical phantoms of human body were developed, with different numerical parameters, internal organ details, and anthropometric properties, such as height and body mass [15, 16]. Results of evaluation of effects of EMF exposure in the human body, carried out by in silico measurements, are dependent on both the exposure conditions and structure of the phantoms [9, 17].

Directive 2013/35/EU, ICNIRP, and IEEE also accept a simplified assessment of the biophysical exposure effects and compliance with SAR limits, which can be done using in situ or in silico measurements of -field strength ( in V/m), -field strength ( in A/m), and limb induced current ( in mA), which all need to be lower than their relevant limits [5, 10, 11]. Limits set with respect to limb induced current (LIC) values play a practical role of measurable substitute for the localized SAR evaluation in limbs (achievable only by numerical measurements). Consequently, LIC measurements may be applicable in the evaluation of electromagnetic hazards in the real work environment, as well as validating numerical modelling in the research. Measurements of LIC do not characterize biophysical effects of electromagnetic exposure in other body parts.

The aim of the study was to evaluate correlations between the biophysical effects of EMR exposure in the human body, represented by LIC, and the parameters of heterogeneous E-field affecting humans and the anthropometric properties of the human body, with respect to improvement of the protocol of environmental electromagnetic hazards evaluation.

2. Material and Methods

The investigations involved the following:

(i)Experimental studies (in situ measurements) into the LIC (at ankle) in volunteers staying close to EMR source and mapping the -field spatial distribution near the source to create and validate the numerical model of this EMR source and the EMR exposure scenario to be used in in silico measurements(ii)A series of numerical calculations (in silico measurements) representing a whole body exposure to an EMR of 27 MHz, a scenario that mimics the one of in situ measurements (with respect to -field spatial distribution), and also the biophysical influence of EMR on various human body numerical phantoms (with respect to LIC)(iii)Determining the correlation between the values of LIC (measured in situ or in silico) and various parameters of spatially heterogeneous -field characterizing exposure with respect to the EMR coupling with a body of individual properties and the anthropometric properties of the human body (volunteers and numerical phantoms)(iv)Analysis of LIC in humans exposed to heterogeneous EMR from radiophone rod antenna of -field strength equal to limits of exposure established by labour law in European Union (Directive 2013/35/EU, further mentioned as D2013/35/EU [10]).

2.1. Field Source: Rod Antenna of a Radiophone

The EMR source used in the experimental investigations was a radio communication unit (radiophone) equipped with an upright rod antenna 500 cm long, placed outdoor in the open space at the top of the wooden frame, at a height of 82 cm from the ground (Figure 1), working at a frequency of 27 MHz. Such devices are used for wireless communication and may be mounted on vehicles.

(a)

(b)

Figure 1: The scheme of exposure set-up used or modelled during in situ and in silico measurements: (a) side view and (b) top view; L1–L3: locations of measurement lines; dimensions in cm.

2.2. Volunteers

Volunteers, 24 males, with the anthropometric properties presented in Table 1, were involved in the experimental part of the study. They were asked to report anonymously the following properties: height, body mass, chest, and waist circumferences. Additionally, the body mass index (BMI) and the body volume index (BV) values were calculated (Table 1).

Table 1: Statistical parameters of anthropometric properties reported by volunteers.

Statistical parameter
Anthropometric properties ()

Height
Body mass
BV
BMI
WC
CC

(cm)
(kg)
(mkg)
(kg/m²)
(cm)
(cm)

Mean ± SD
178.2 ± 7.1
88.2 ± 14.7
157 ± 29
27.8 ± 4.3
101.1 ± 11.3
106.8 ± 9.7

Median
179.5
86.0
152
27.5
99
105

IQR
172.8–182.3
77.8–94.8
136–168
24.9–29.3
95.8–105.8
101.8–108.5

Min–Max
160–190
60–120
106–222
21.0–36.3
82–129
93–135

SD: standard deviation; IQR: interquartile range (range between 25. and 75. percentile values); body mass index: BMI = body mass/(height)²; body volume index: BV = height body mass. WC = waist circumference; CC = chest circumference.

2.3. In Situ Measurements

During the LIC measurements, the volunteers were in a upright posture with lowered upper limbs. They were standing on an aluminium plate. The plate with dimensions of 40 × 40 × 1 cm laid on the ground and its centre was 60 cm (variant 1) or 110 cm (variant 2) apart from the antenna axis (Figure 1). The main axis of the volunteers participating in the research was also fitted in the centre of the plate. The grounding conditions of the volunteers were unified with the use of the plate. In both exposure variants, the following subvariants were investigated: the volunteers used unified shoes (the same, 1a and 2a); they used their own shoes (regular shoes of each volunteer, different, 1b and 2b); and they were barefooted (1c and 2c).

The research protocol concerning the volunteers was approved by the local ethics committee. The clamp-on probe was placed over the clothing (not in direct contact with the body) and the volunteer did not touch any elements of the EMR source, nor any metal object nearby the EMR source. Exposure to EMR was also controlled and did not exceed the worker’s exposure limit, being at the typical level of exposure of personnel present near a radiophone in regular use. The volunteers were informed about the aim of the experiment and the principles of the measurement method. They could withdraw at any phase of the research.

In the process of numerical model validation, the -field strength spatial distribution was evaluated. Safety guidelines provide limits to evaluate both - and -field exposure of workers, but it is known from other studies that when evaluating LIC in the lower legs of a worker who stays some distance away from the EMR source, the -field component plays a dominant role [18, 19]. In accordance with D2013/35/EU methodology, spatial distributions of rms (root-mean-square) values in an unperturbed -field (in the absence of workers) strength were evaluated by the in situ measurements. -field was measured along three vertical measurement lines: L1, at a distance of 10 cm from the antenna; L2, at a distance of 60 cm (covering the location of the main axis of the body of the volunteers participating in LIC measurements in variant 1, above the centre of the metal plate); and L3, at a distance of 110 cm (covering the location of the main axis of the body of the volunteers participating in LIC measurements in variant 2, above the centre of the metal plate) (Figure 1). The -field strength values were measured along lines L1–L3, at the height above the ground ranging from 30 cm up to 200 cm, with 10 cm steps between successive measurement points.

The lower limb current measurements at the ankle of volunteers (staying close to the rod antenna) were carried out with the use of an induction (clamp-on) meter HI-3702&HI-4416, manufactured by Holladay, USA (Figure 2) (http://www.ets-lindgren.com), which measures the rms value of current in the range: (0.01–1000) mA; 9 kHz–110 MHz; standard uncertainty of up to ±15%. The research used also a EMR-300 meter manufactured by Wandel & Goltermann, Germany, equipped with an isotropic -field probe of measurement range of rms values: (0.4–800) V/m; 100 kHz–3 GHz, standard uncertainty of up to ±15%.

Figure 2: The induction clamp-on meter of limb current (HI-3702 probe and HI-4416 monitor).

2.4. In Silico Measurements

International guidelines and standards require that numerical calculations aimed at evaluating EMR exposure have to reflect the exposure scenario considered at the workplace but do not specify in detail the procedures for such an evaluation [5, 10, 13, 14]. The numerical modelling (in silico measurements) reported in this paper covered the following:

(i)The source of spatially heterogeneous EMR, which mimics rod antenna emitting EMR at a frequency of 27 MHz, is modelled.(ii)Four free standing (nongrounded) numerical phantoms in standing upright posture with lowered upper limbs are used: two models of the female body, Donna and Laura, and two models of the male body, Gustav and Hugo. The dielectric and anthropometric properties of these phantoms were already presented and analysed in the context of correlation with parameters representing the population of adults in various countries [11, 15, 16].(iii)The results of the in silico measurements were validated by the relevant in situ measurement results: spatial distribution of -field along lines L1, L2, and L3 and LIC in volunteers.

Numerical calculations were performed with specialized software for EMR analysis, CST Studio [20], based on the finite integration technique (FIT), using Microwave modules Transient (time domain solver), boundary conditions open (add space), and 15–18 million voxels per numerical model, with smallest voxel in a model of the body 1-2 mm in size. The estimated standard uncertainty of the numerical simulation results of -field distribution near its source is evaluated to be ±(15–18)%. In further analysis, it has been assumed that the uncertainty of numerical simulation of -field distribution is ±18%. The standard uncertainty of in silico measurements on LIC () during exposure to an EMR of 27 MHz matches ±(16–21)%, as estimated based on data in [21, 22]. In further analysis, it has been assumed that the uncertainty of numerical simulation of LIC is ±21%.

2.5. Validation of Models

For the purpose of validating the results of numerical calculations, the unperturbed -field strength in the vicinity of rod antenna (affecting the volunteer involved later in the LIC measurements) was analysed with respect to the values of the measured limbs electric current (LIC at ankle) of the volunteers staying there. The in silico results were validated by the in situ results, using analytical formula to test the identity of the results of two independent studies [23], derived from the assumption that two results obtained with a particular uncertainties are equal ():

where is -field strength () or LIC () values obtained from measurements, is relevant or values obtained from numerical calculations, is standard uncertainty of measurements (±0,15, in the case of or values), and is standard uncertainty of numerical calculations (±0,18, in the case of values; ±0,21, in case of values).

The in silico and in situ results were taken to be identical when the absolute value of the parameter did not exceed unity:

2.6. Statistical Analysis

In the analysis of the correlation between the LIC and the -field strength and the anthropometric properties of the human body, the STATISTICA software version 9.0 PL (StatSoft, USA) was applied. The analysed anthropometric properties of numerical phantoms and volunteers were height, body mass, body mass index (BMI), body volume index (BV), and chest and waist circumferences. Correlation analysis between particular subsets of results was made based on the -Pearson correlation coefficient (when normal distributions of analysed data sets have been proven by a Shapiro-Wilk test ()) [23, 24]. The power of correlation was assessed applying the four-step criterion for the -values [25].

3. Results and Discussion

The modelled source of heterogeneous EMR (the rod antenna, emitting EMR of 27 MHz frequency) may be treated as the part of scenarios of the exposure representative for diverse situations appearing under real-life conditions, both using military equipment (e.g., the exposure of soldiers staying outside a vehicle equipped with the radiophone)and using civil radio devices (e.g., the exposure of people staying outside the vehicle equipped with citizens band (CB) radio).

Figure 3 shows the values of the -field strength, the results of both measurements, and numerical calculations, along with standard uncertainties of their determination, normalized with regard to the maximum value along line L2 (i.e., the axis of exposed body in variant 1).

Figure 3: Unperturbed electric field strength in the vicinity of rod antenna of the radiophone: comparison of measured and numerically calculated values along lines L1–L3 (see Figure 1) with standard uncertainty of their evaluation (reference value, maximum value along the line L2).

The distribution of -field level along lines L1–L3 is varying significantly, over 10 times. Therefore, it is not justified to assume that the quasi-homogenous -field exposure was investigated, which was considered in previous studies focused on LIC at lower limbs [19, 25].

An analysis of the spatial distributions of -field strength, obtained from the measurement and numerical calculations, in the vicinity of real rod antenna and its corresponding numerical model, carried out with the use of parameter (formula (1)), showed their identity at each of the 90 evaluation points () (Figure 4), at the level of mentioned standard uncertainty of their evaluation.

Figure 4: The level of identity (ID parameter, formula (1)) of the results of in situ and in silico measurements of the unperturbed electric field strength distribution in the vicinity of real rod antenna and its corresponding virtual model; L1–L3 lines (see Figure 1).

Statistical analysis of the distribution in the analysed results of LIC measurements at the volunteers exposed to the EMF near the radio communication rod antenna and the anthropometric properties of the volunteers, carried out using the Shapiro-Wilk test (), showed the normal distribution of all data sets. A correlation analysis showed strong, statistically significant correlations (Pearson , ) between anthropometric properties of the volunteers: body mass, BV, BMI, and waist and chest circumferences (Table 2).

Table 2: The correlation between anthropometric properties of volunteers ().

Height
Body mass
BV
BMI
WC
CC

Height
1.0
—
0.40
0.06
0.58
0.003
−0.11
0.62
0.06
0.80
0.11
0.62

Body mass
0.40
0.06
1.0
—
0.98
<0.001
0.87
<0.001
0.89
<0.001
0.88
<0.001

BV
0.58
0.003
0.98
<0.001
1.0
—
0.74
<0.001
0.77
<0.001
0.81
<0.001

BMI
−0.11
0.62
0.87
<0.001
0.74
<0.001
1.0
—
0.90
<0.001
0.89
<0.001

WC
0.06
0.80
0.89
<0.001
0.77
<0.001
0.90
<0.001
1.0
—
0.85
<0.001

CC
0.11
0.62
0.88
<0.001
0.81
<0.001
0.89
<0.001
0.85
<0.001
1.0
—

Strong, statistically significant correlations (, ) are in bold; body mass index: BMI = body mass/(height)²; body volume index: BV = height body mass; WC = waist circumference; CC = chest circumference; -Pearson correlation coefficient and significance level .

In both investigated variants of exposure scenario (i.e., two distances from the EMF source), positive, statistically significant correlation was found between LIC measured at the volunteers () and the volunteers’ height or BV index (Table 3). The lowest LIC at barefooted volunteers in variant 1 ( = 29.8 mA) have been found at subject of 172 cm height, 62 kg mass, and 106.6 BV index, when the highest ( = 45.1 mA) have been found at subject of 182 cm height, 120 kg mass, and 218 BV index. The lowest LIC at barefooted volunteers in variant 2 ( = 13.4 mA) have been found at subject of 172 cm height, 62 kg mass, and 106.6 BV index, when the highest ( = 27.8 mA) have been found at subject of 185 cm height, 120 kg mass, and 222 BV index. LIC measured at barefooted volunteers (subvariants 1c and 2c) were 20–40% higher than at volunteers using their own shoes (subvariants 1b and 2b) and 40–50% higher than at volunteers using unified shoes (subvariants 1a and 2a). It suggests that in the exposure scenario near a rod antenna in upright position the regular shoes protect only up to 2 times against LIC; for better protection the soles should be made out of more insulating materials.

Table 3: The correlation between the limb induced current measured at volunteers () exposed to the electromagnetic field (27 MHz) near the rod antenna and the volunteers’ anthropometric properties.

Anthropometric properties
Exposure variants

1a
1b
1c
2a
2b
2c

Height
0.74
<0.001
0.65
0.001
0.49
0.014
0.70
<0.001
0.63
0.001
0.64
0.001

Body mass
0.67
<0.001
0.74
<0.001
0.82
<0.001
0.63
<0.001
0.74
<0.001
0.75
<0.001

BV
0.76
<0.001
0.80
<0.001
0.84
<0.001
0.71
<0.001
0.80
<0.001
0.81
<0.001

BMI
0.31
0.147
0.46
0.025
0.60
0.002
0.29
0.165
0.46
0.022
0.46
0.022

WC
0.32
0.128
0.47
0.020
0.59
0.002
0.27
0.197
0.44
0.033
0.50
0.012

CC
0.39
0.059
0.50
0.014
0.65
0.001
0.37
0.076
0.49
0.016
0.54
0.007

Body mass index: BMI = body mass/(height)²; body volume index: BV = height body mass; WC = waist circumference; CC = chest circumference; variant 1 of exposure: the axe of volunteer’s body 60 cm away from the antenna; variant 2 of exposure: the axe of volunteer’s body 110 cm away from the antenna; a: the volunteers used unified shoes; b: the volunteers used their own (regular) shoes; c: the volunteers were barefooted; strong, statistically significant correlations (, ) are in bold; -Pearson correlation coefficients and significance level .

Distributions of the values of LIC measured at the volunteers and numerically calculated in the numerical phantoms of the human body exposed to EMF in the vicinity of the radio communication rod antenna (including the standard uncertainty of their evaluation) were shown in Figure 5 in the function of BV index, the anthropometric property found as the strongest correlated with the LIC values.

Figure 5: Limb induced current values measured at the volunteers and numerically calculated in the virtual human body phantoms, exposed to EMR emitted by the radio communication antenna (whiskers, standard uncertainty of limb induced current evaluation) in the function of the BV index; variant 1a: volunteers present 60 cm from the antenna; variant 2a: volunteers present 110 cm from the antenna; unified shoes.

The LIC measured at the lower limbs (at ankle) of the volunteers were also analysed in order to validate relevant results of numerical calculations. Identity analysis of LIC values measured in the volunteers () and numerically calculated in phantoms () was carried out with regard to the subjects of the most approximated values of anthropometric properties. The parameter (formula (1)) showed their identity at each investigated case of height and BV index (), at the level of mentioned standard uncertainties of their evaluation (Figure 6).

Figure 6: The identity level of limb induced current measured at volunteers and numerically calculated in virtual human body phantoms with the most approximated values of anthropometric properties, exposed to electromagnetic field from radiophone rod antenna: ID parameter (formula (1)).

The results of LIC measurements at the volunteers were correlated with the following parameters derived from the calculated distribution of absolute value (module) of unperturbed -field (without human body presence), to represent interperson variability of exposure level in the heterogeneous EMR near the rod antenna:

(a)The -field at the top of the volunteer’s body (at the distance from the ground equal to the volunteer’s height), along the measurement line L2 or L3, respectively, for exposure variant 1 or 2 (as shown in Figure 1, the line covering the main axis of the volunteer’s torso; as shown in Table 1, at the height from the ground in the range 160–190 cm), (BA-TV-L2/L3)(b)The arithmetic averaged value of the -field along the main axis of the volunteer’s body, respectively, for exposure variant 1 or 2 (line L2 or L3), ranging between 30 cm from the ground and volunteer’s height, (BA-AV-L2/L3)(c)The -field, located in front of the volunteer’s chest (Variant 1 or 2), that is, in line L1 or L2, at a distance from the ground of approximately 70% of the volunteer’s height (50 cm from the body axis and, as shown in Table 1, at a distance from the ground in the range 112–133 cm), (FB-0.7VH-L1/L2)(d)The maximum in space value of -field affecting the workers’ body in exposure variant 1 or 2, according to Directive 2013/35/UE, (D2013/35/EU).

In all investigated exposure variants and their subvariants, the strongest, proportional (physically correct), statistically significant correlations (, ) were found between the results of the LIC measurements and the following parameters of EMR exposure (Table 4):

(i)The maximum in space value of -field affecting the workers’ body, (D2013/35/EU)(ii)The -field in front of the volunteer’s chest, (FB-0.7VH-L1/L2).

Both parameters (exposure measures) are more strongly correlated with the LIC values than parameters discussed in the literature [17, 23]: the -field at the top of the volunteer’s body (BA-TV-L2/L3) and the arithmetic averaged value of the -field along the main axis of the volunteer’s body (BA-AV-L2/L3).

Table 4: The correlation between the electric field parameters and the limb induced current measured at volunteers () exposed to the electromagnetic field (27 MHz) near the rod antenna (all measurements: 1a, 1b, 1c, 2a, 2b, 2c; = 144 cases).

-field parameter
Limb induced current measured during exposure near the rod antenna

(BA-TV-L2/L3)
0.724
<0.001

(BA-AV-L2/L3)
0.746
<0.001

(FB-0.7HV-L1/L2)
0.747
<0.001

(D2013/35/EU)
0.770
<0.001

Strong, statistically significant correlations (, ) are in bold; the parameters of the calculated unperturbed -field related to the absolute (ABS) value of the -field root-mean-square (RMS) value: (BA-TV-L2/L3): the -field calculated at the top of the volunteer body, along the measurement line L2 or L3, respectively, for exposure variant 1 or 2 (as shown at Figure 1, the line covering the main axis of the volunteer’s torso); (BA-AV-L2/L3): the arithmetic average value of the -field calculated along the main axis of the volunteer’s body, line L2 or L3, respectively, for exposure variant 1 or 2, ranging between 30 cm from the ground and volunteer’s body height; (FB-0.7VH-L1/L2): the -field calculated in line L1 or L2, located in front of the volunteer’s chest (variant 1 or 2); (D2013/35/EU): the maximum in space of -field value of field affecting the workers’ body in exposure variant 1 or 2, according to Directive 2103/35/EU; -Pearson correlation coefficients and significance level .

The obtained results indicate that, at the investigated type of workplace EMR exposure, the values can be evaluated on the basis of mentioned -field parameters shown to be strongly correlated with LIC (Table 4). The lowest uncertainty of such evaluation is provided by the use of -field parameter which creates the values of ratio which is the lowest dependent on exposure conditions, -field spatial distribution, and anthropometric properties of exposed workers. In the 6 analysed exposure variants the most stable values of -ratio were found for (D2013/35/EU) and (FB-0.7HV-L1/L2) exposure parameters (Figure 7).

Figure 7: The ratio, , between limb induced currents measured at volunteers () and parameters characterizing the level of -field exposure; arithmetic mean and min–max range (whiskers) in the worst case scenario of exposure (volunteers barefooted); -field parameters are defined in Table 4.

Between the -field exposure measures, which have been shown to be correlated with the LIC, the most practical in the workplace exposure evaluation seems to be (FB-0.7VH-L1/L2), because it needs only a single spot measurement in the location which is easy to be found at the workplace. The main limitation in the use of this measure is exposure at very short distance of worker from the EMR source (shorter than 50 cm). But it needs to be pointed out that, following the ICNIRP’s guidelines (referenced by D2013/35/EU), in such a situation direct evaluation of thermal effects is advised, using SAR numerical calculations. In longer distance the evaluation of (FB-0.7VH-L1/L2) may be advised.

The second conclusion may be drawn where in the legal implementation of D2013/35/EU it is necessary to define dimensions of the “reference EMR probe” applicable in the exposure evaluation at the workplace. The Directive statement to use “calculated or measured maximum field” affecting worker’s body is significantly unprecise, which may create significant uncertainty in practice. In the vicinity of EMF source some discrepancy between calculated and measured maximum value exists and it depends on the spatial distribution of the exposure level. It is because, during the measurement, EMR is averaged over the volume of the probe. Assuming the 3-dimensional volume of the -field probe to be 10 10 10 cm (as may be found in the equipment), discrepancy between calculated and measured maximum -field value may be evaluated by the parameter defined by the formula:

where is calculated maximum value of -field affecting worker (at worker’s body position), is measured maximum value of -field affecting worker, estimated based on the calculated value of -field averaged over the volume of the probe (assumed to be of 10 10 10 cm dimensions), and is location under consideration (where max -field was found).

In the vicinity of rod antenna the following discrepancy () was found: 190% at the distance of 2 cm from the antenna, 80% at 5 cm, 40% at 10 cm, 9% at 60 cm, and 7% at 110 cm. It is shown that the discrepancy between measured and calculated maximum value of -field, which is affecting worker, may significantly contribute to the uncertainty of exposure evaluation (and evaluation of the compliance with exposure limits). In small distance from the EMR source, mentioned influence is stronger than from the measurement or calculations uncertainty itself. In the distance from the rod antenna exceeding 60 cm, the analysed discrepancy is less than 10% (being within the range of standard uncertainty of -field measurements itself).

The other technical limitation in evaluating EMR exposure near the source comes from the properties of EMR measurement devices, which may be directly coupled with the EMF source and indicates not calibrated values. In consequences, the measure of EMR exposure, which is the strongest correlated with hazards related to the LIC in the radiofrequency EMR, may be not achievable by measurements in the work environment.

In volunteers of the height 160–190 cm exposed to EMR from radiophone rod antenna at the level of -field strength equal to 61 V/m (established by D2013/35/EU as the maximum value of -field strength in the workers’ body position, in the absence of worker), the LIC (at ankle) ranged from 45% up to 85% in variant 1 of exposure scenario and from 76% up to 144% in variant 2 of its limit values, provided by D2013/35/EU (100 mA). Limb induced current in the worst case of exposure, barefooted workers on grounded basis (variants 1c and 2c), evaluated based on the ratio exceeds 50% of mentioned limit ( mA) at the level of exposure to -field expressed as (D2013/35/EU) > 20 V/m or (FB-0.7HV-L1/L2) > 35 V/m. Both exposure levels are below the directive limits of E-field strength in the workplace. Because of the negative correlation between LIC and exposed person height values, in analysed exposure conditions, the highest volunteer does not represent the worst case of LIC value at the particular workplace.

Results presented in this paper showed that in the distance from the antenna exceeding 100 cm (variant 2 of exposure scenario) the compliance with -field exposure limits does not ensure automatic compliance with LIC limits. Taking into consideration limited availability of LIC measurement devices, in the workplace under the questionable exposure condition, the application of sufficient protection measures should be advised. In that context it needs attention that, in the investigated exposure cases near the upright rod antenna, it was found that regular shoes insufficiently protect workers; they are reducing the LIC values only up to 2 times. In the case of the need of better protection against EMR exposure effects it is necessary to use shoes equipped with the soles made from materials which are insulators for radiofrequency currents.

4. Conclusions

In situ and in silico measurements of limb induced current at ankle of volunteers of height in the range 160–190 cm exposed to electromagnetic field of 27 MHz frequency, emitted from nearby radiophone upright rod antenna 500 cm long (e.g., such as that used in military vehicles), showed in all exposure scenarios the strong, statistically significant correlation between limb induced current and the body volume index of exposed persons (body mass multiplied by body height, in kgm) (; ).

The relations between the limb induced current and selected parameters of unperturbed electric field affecting the workers’ body are allowing for estimating the range of values of lower limbs currents experienced by exposed persons. The most informative exposure parameters, with respect to the evaluation of electromagnetic hazards by measurements (the strongest correlated with limb induced current), were found to be the value of electric field in front of chest (50 cm from body axis) or the maximum value in space occupied by human (unperturbed field exists in the investigated space in the absent of human body).

Exposed person’s body volume and electric field strength in front of the chest determine limb induced current in studied exposure scenarios but mentioned parameters have not been analysed yet in other studies and they need further studies regarding their usefulness in other exposure scenarios in the workplace.

Conflicts of Interest

The authors declare that there are no conflicts of interest regarding the publication of this paper.

Acknowledgments

The authors thank the headquarter and the personnel of Military Centre for Preventive Medicine in Bydgoszcz, Poland, for supporting investigation. This paper has been based on the results of a research carried out within the scope of the statutory activity of the Central Institute for Labour Protection-National Research Institute (CIOP-PIB) supported by the Ministry of Science and Higher Education (task II-29, project manager: P. Zradziński) and the National Programme, Improvement of Safety and Working Conditions, partly supported, within the scope of state services by the Ministry of Labour and Social Policy in Poland (task 2.Z.30, project manager: J. Karpowicz; the main coordinator of the programme: CIOP-PIB), as well as the results of research carried out in Laboratory of Electromagnetic Radiation Metrology of Military Institute of Hygiene and Epidemiology within the task, Evaluation of Exposure of Military Personnel to Electromagnetic Field Emitted by Military Technique Devices (project manager: J. Kieliszek), supported by the Ministry of Defence. The selected results from the work discussed in the article were shown during the poster session at the BIOEM’2017, the Joint Annual Meeting of the Bioelectromagnetics Society and the European BioElectromagnetics Association Conference, Ghent, Belgium, 5–10 June 2017.

References

J. Sobiech, J. Kieliszek, R. Puta, D. Bartczak, and W. Stankiewicz, “Occupational exposure to electromagnetic fields in the Polish Armed Forces,” International Journal of Occupational Medicine and Environmental Health, vol. 30, no. 4, pp. 565–577, 2017.

J. Sobiech, J. Kieliszek, and W. Stankiewicz, “Model of work environment in numerical evaluation of exposure of manpack radio operators to electromagnetic fields,” Przeglad Elektrotechniczny, vol. 87, no. 12b, pp. 152–154, 2011 (Polish).

J. Kieliszek, J. Sobiech, W. Stankiewicz, and W. Rongies, “Measurements of induced currents as the part of assessment of professional exposition on electromagnetic field,” Przeglad Elektrotechniczny, vol. 86, no. 12, pp. 65–67, 2010 (Polish).

J. Kieliszek and J. Sobiech, “Induced current measurements in the body of manpack radio operators,” Przeglad Elektrotechniczny, vol. 12, pp. 73–75, 2009.

International Commission on Non-Ionizing Radiation Protection (ICNIRP), “Guidelines for limiting exposure to time-varying electric, magnetic and electromagnetic fields (up to 300 GHz),” Health Physics, vol. 74, no. 4, pp. 494–522, 1998.

International Agency for Research on Cancer (IARC), “Non-ionizing radiation. part 2: radiofrequency electromagnetic fields,” in IARC Monographs: Volume 102, WHO/IARC, Lyon, France, 2013.

Scientific Committee on Emerging and Newly Identified Health Risks (SCENIHR), Potential Health Effects of Exposure to Electromagnetic Fields (EMF), European Commission, 2015.

A. Bortkiewicz, E. Gadzicka, W. Szymczak, and M. Zmyålony, “Heart rate variability (HRV) analysis in radio and TV broadcasting stations workers,” International Journal of Occupational Medicine and Environmental Health, vol. 25, no. 4, pp. 446–455, 2012.

K. H. Mild, T. Alanko, M. Hietanen et al., “Exposure of workers to electromagnetic fields. A review of open questions on exposure assessment techniques,” International Journal of Occupational Safety and Ergonomics, vol. 15, no. 1, pp. 3–33, 2009.

Directive 2013/35/EU of the European Parliament and of the Council of 26 June 2013 on the minimum health and safety requirements regarding the exposure of workers to the risks arising from physical agents (electromagnetic fields) (20th individual Directive within the meaning of Article 16(1) of Directive 89/391/EEC), O.J. No. L-179 of 29 June 2013, Brussels, Belgium.

Institute of Electrical and Electronics Engineers, “IEEE standard for safety levels with respect to human exposure to radio frequency electromagnetic fields, 3 kHz to 300 GHz,” Tech. Rep. IEEE C95.1-2005, Institute of Electrical and Electronics Engineers, New York, NY, USA.

P. Zradziński, J. Karpowicz, K. Gryz, and W. Leszko, “Anthropometric differentiation of effects of radiofrequency electromagnetic fields of frequency 100 MHz on workers,” Medycyna Pracy, vol. 65, no. 3, pp. 351–360, 2014.

European Committee for Electrotechnical Standardization (CENELEC), “Basic standard on measurement and calculation procedures for human exposure to electric. magnetic and electromagnetic fields (0 Hz - 300 GHz),” Tech. Rep. EN 50413:2009, CENELEC, Brussels. Belgium, 2009.

International Electrotechnical Commission (IEC), “Determination of RF field strength and SAR in the vicinity of radiocommunication base stations for the purpose of evaluating human exposure,” Tech. Rep. IEC 62232-2011, IEC, Geneva, Switzerland, 2011.

P. Zradziński, “The properties of human body phantoms used in calculations of electromagnetic fields exposure by wireless communication handsets or hand-operated industrial devices,” Electromagnetic Biology and Medicine, vol. 32, no. 2, pp. 226–235, 2013.

P. Zradziński, “Examination of virtual phantoms with respect to their possible use in assessing compliance with the electromagnetic field exposure limits specified by Directive 2013/35/EU,” International Journal of Occupational Medicine and Environmental Health, vol. 28, no. 5, pp. 781–792, 2015.

P. Zradziński, “Difficulties in applying numerical simulations to an evaluation of occupational hazards caused by electromagnetic fields,” International Journal of Occupational Safety and Ergonomics, vol. 21, no. 2, pp. 213–220, 2015.

K. Gryz and J. Karpowicz, “Principles for electromagnetic hazards assessment related to induced and contact currents,” Podstawy I Metody Oceny Srodowiska Pracy, vol. 4, no. 58, pp. 137–171, 2008.

J. Wilén, K. H. Mild, L.-E. Paulsson, and G. Anger, “Induced current measurements in whole body exposure condition to radio frequency electric fields,” Bioelectromagnetics, vol. 22, no. 8, pp. 560–567, 2001.

Cst.com [Internet], “Computer simulation technology,” 2016, http://cst.com.

I. Laakso, Uncetainty in computational RF dosimetry [Doctoral dissertations], School of Electrical Engineering, Helsinki, Finland, 2011.

G. Schmid, T. Bolz, R. Überbacher et al., “Design and dosimetric analysis of a 385MHz TETRA head exposure system for use in human provocation studies,” Bioelectromagnetics, vol. 33, no. 7, pp. 594–603, 2012.

J. Greń, Mathematical Statistics: Models and Exercises, PWN, Warszawa, Poland, 1976, (in Polish).

C. Dancey and J. Reidy, Statistics Without Mats for Psychology, Pearson Education Limited, Harlow, UK, 5th edition, 2011.

L. H. Korpinen, J. A. Elovaara, and H. A. Kuisti, “Occupational exposure to electric fields and induced currents associated with 400 kV substation tasks from different service platforms,” Bioelectromagnetics, vol. 32, no. 1, pp. 79–83, 2011.