BioMed Research International
Volume 2017 (2017), Article ID 6707162, 1 page
https://doi.org/10.1155/2017/6707162

Corrigendum

Corrigendum to “Glutathione Peroxidase Level in Patients with Vitiligo: A Meta-Analysis”

Bi-huan Xiao,¹ Meihui Shi,¹ Hongqiang Chen,² Shaoshan Cui,³ Xing-Hua Gao,¹ Yan Wu,¹ and Hong-Duo Chen¹

¹Department of Dermatology, No. 1 Hospital of China Medical University, Shenyang 110001, China
²Department of General Surgery, Shandong Qianfoshan Hospital, Jinan 250014, China
³Department of Dermatology, The First Affiliated Hospital of Dalian Medical University, Dalian 116011, China

Correspondence should be addressed to Xing-Hua Gao; gaobarry@hotmail.com and Yan Wu; jlwuyan@126.com

Received 21 July 2016; Accepted 27 June 2017; Published 12 July 2017

Copyright © 2017 Bi-huan Xiao et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Glutathione Peroxidase Level in Patients with Vitiligo: A Meta-Analysis” [1], the order of the authors in the author and correspondence list was incorrect. The revised author and correspondence lists are shown above.

References

B.-H. Xiao, M. Shi, H. Chen et al., “Glutathione peroxidase level in patients with vitiligo: a meta-analysis,” BioMed Research International, vol. 2016, Article ID 3029810, 11 pages, 2016.