BioMed Research International
Volume 2017 (2017), Article ID 7180293, 1 page
https://doi.org/10.1155/2017/7180293

Corrigendum

Corrigendum to “Topography Prediction of Helical Transmembrane Proteins by a New Modification of the Sliding Window Method”

Maria N. Simakova¹ and Nikolai N. Simakov²

¹A.F. Mozhaisky Military Space Academy, Yaroslavl 150001, Russia
²Yaroslavl State Technical University, Yaroslavl 150023, Russia

Correspondence should be addressed to Maria N. Simakova; simakova.mary@gmail.com

Received 31 August 2017; Accepted 18 October 2017; Published 5 November 2017

Copyright © 2017 Maria N. Simakova and Nikolai N. Simakov. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Topography Prediction of Helical Transmembrane Proteins by a New Modification of the Sliding Window Method” [1], the error occurred in formula (): the summation index of the function was accidentally lost. It should be corrected as follows:

References

M. N. Simakova and N. N. Simakov, “Topography prediction of helical transmembrane proteins by a new modification of the sliding window method,” BioMed Research International, vol. 2014, Article ID 921218, 9 pages, 2014.