BioMed Research International
Volume 2017 (2017), Article ID 7309481, 11 pages
https://doi.org/10.1155/2017/7309481

Research Article

Selective Removal of Hemoglobin from Blood Using Hierarchical Copper Shells Anchored to Magnetic Nanoparticles

Youxun Liu,1,2 Yaokun Wang,¹ Mingyang Yan,¹ and Juan Huang¹

¹School of Basic Medical Sciences, Xinxiang Medical University, Jinsui Avenue 601, Xinxiang, Henan 453003, China
²Henan Collaborative Innovation Center of Molecular Diagnostics and Laboratory Medicine, Jinsui Avenue 601, Xinxiang, Henan 453003, China

Correspondence should be addressed to Juan Huang; huangjuan@xxmu.edu.cn

Received 21 November 2016; Accepted 29 January 2017; Published 21 February 2017

Academic Editor: Kevin M. Coombs

Copyright © 2017 Youxun Liu et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Hierarchical copper shells anchored on magnetic nanoparticles were designed and fabricated to selectively deplete hemoglobin from human blood by immobilized metal affinity chromatography. Briefly, CoFe₂O₄ nanoparticles coated with polyacrylic acid were first synthesized by a one-pot solvothermal method. Hierarchical copper shells were then deposited by immobilizing Cu²⁺ on nanoparticles and subsequently by reducing between the solid CoFe₂O₄@COOH and copper solution with NaBH₄. The resulting nanoparticles were characterized by scanning electron microscopy, transmission electron microscopy, Fourier transform infrared spectrometry, X-ray photoelectron spectroscopy, and vibrating sample magnetometry. The particles were also tested against purified bovine hemoglobin over a range of pH, contact time, and initial protein concentration. Hemoglobin adsorption followed pseudo-second-order kinetics and reached equilibrium in 90 min. Isothermal data also fit the Langmuir model well, with calculated maximum adsorption capacity 666 mg g⁻¹. Due to the high density of Cu²⁺ on the shell, the nanoparticles efficiently and selectively deplete hemoglobin from human blood. Taken together, the results demonstrate that the particles with hierarchical copper shells effectively remove abundant, histidine-rich proteins, such as hemoglobin from human blood, and thereby minimize interference in diagnostic and other assays.

1. Introduction

In clinical diagnosis and medical research, changes in blood indices are critical parameters that reflect physiological status or indicate pathology [1]. However, some biomarkers in the blood, including DNA, RNA, and many proteins, are generally present at very low concentrations [2, 3] and are difficult to detect due to severe interference from highly abundant proteins such as hemoglobin [4, 5]. Consequently, depletion of such abundant proteins is an essential prerequisite.

Among the many depletion methods currently available, affinity-based techniques are some of the most effective and have become routine [6–8]. For example, immobilized metal affinity chromatography is now frequently used to separate histidine-rich proteins based on the selective interaction between immobilized metal ions and electron donor groups in proteins containing several consecutive histidine residues [9]. Separation is typically achieved via transition metal ions like Cu²⁺, Ni²⁺, Zn²⁺, or Co²⁺, which are typically chelated into molecules covalently bound to matrices such as dextrin gels, polystyrene beads, or nanoparticles. Of these, magnetic nanoparticles (MNPs) have been widely used because of biocompatibility, biodegradability, stability, facile surface functionalization, and magnetic features that facilitate convenient separation. Indeed, these nanoparticles have been used not only in protein purification, but also in drug delivery, diagnostic imaging, pollution removal, and enzyme immobilization [10–13]. For instance, metals immobilized on a magnetic matrix are widely used to effectively deplete abundant proteins and peptides from proteomic samples [14]. Unfortunately, the most commonly used MNPs are based on iron oxides and are thus susceptible to leaching in acidic conditions. Consequently, inorganic SiO₂ has been used as a shell to protect magnetic cores [15, 16], although such a shell may also significantly reduce magnetism. Thus, it is necessary to fabricate new multifunctional composites that are both strongly magnetic and chemically stable. CoFe₂O₄, a thermally and chemically stable ferrite, appears to be one such composite [17, 18].

Cu²⁺ and Ni²⁺ are the most frequently used metal ions to magnetically separate proteins by affinity chromatography. For example, Chen et al. [19, 20] fabricated MNPs coated with iminodiacetic acid and charged with Cu²⁺ or Ni²⁺ to selectively adsorb histidine-rich bovine hemoglobin (BHb). BHb was also selectively captured on Cu²⁺-EDTA-Fe₃O₄ magnetic particles synthesized by Ding et al. through a one-pot solvothermal method [21]. However, a major disadvantage of the above systems is the low metal ion density on the surface, which leads to a low adsorption capacity for protein and restricts their practical application in protein separation. Consequently, well-designed magnetic nanomaterials with higher metal density have emerged as powerful candidates for meeting the above-mentioned requirement. Recently, Liu and coworkers [22] achieved highly selective isolation of polyhistidine-tagged proteins from cell lysates using a graphene-nickel composite. Intriguingly, Lee et al. [23] demonstrated that Ni nanoparticles are coated with NiO capture and magnetically separate histidine-tagged proteins. A hierarchical nickel shell anchored on silica coated magnetic Fe₃O₄@SiO₂ nanoparticles has been designed and constructed, and the high Ni²⁺ density is found on the shell, which results in a high adsorption capacity for BHb [24]. The above literature shows that a hierarchical nickel shell can provide higher metal ion density on the surface of MNPs, which help to improve the protein adsorption capacity. However, there are few reports that Cu-coated core-shell magnetite nanoparticles are used for selective capture of histidine-rich proteins. This inspired us to evaluate whether magnetite nanoparticles coated with copper could be applied to selectively capture histidine-rich BHb or human hemoglobin. We note that Cu-coated core-shell CoFe₂O₄ composite microspheres are easily and magnetically separated from aqueous solutions and have improved chemical stability due to addition of Co²⁺. Further, Cu shell/core architecture may also protect a magnetic core without compromising purification efficiency. More importantly, a hierarchical copper shell may provide a high Cu²⁺ density on the surface of MNPs, which can increase adsorption capacity for protein.

Here, we describe a simple method to synthesize carboxyl-functionalized, Cu-coated, magnetic CoFe₂O₄ composite microspheres that rapidly and efficiently capture proteins like hemoglobin. In this method, CoFe₂O₄ particles functionalized with polyacrylic acid are first synthesized via a one-pot solvothermal route and then coated with copper ions. The copper ions are then reduced to Cu metal by aqueous NaBH₄, resulting in anchored, hierarchical Cu shells. The particles were then characterized without further processing by scanning electron microscopy (SEM), transmission electron microscopy (TEM), Fourier transform infrared spectrometry (FT-IR), energy dispersive X-ray spectroscopy (EDX), and vibrating sample magnetometry (VSM). The particles were then tested against bovine hemoglobin to assess kinetic and isothermal adsorption. Finally, the particles were tested against human blood.

2. Materials and Methods

2.1. Reagents and Materials

All chemicals, including ferric chloride hexahydrate (FeCl₃·6H₂O), cobalt chloride (CoCl₂), copper (II) sulfate pentahydrate (CuSO₄·5H₂O), polyacrylic acid, and sodium borohydride (NaBH₄) were analytical grade (Sinopharm Chemical Reagent Company) and were used as received without further purification. Deionized water was used throughout. Protein molecular weight markers, bovine hemoglobin (BHb, molecular weight 64.5 kDa, pI 6.8), and bovine serum albumin (BSA, molecular weight 67 kDa, pI 4.7) were purchased from Dingguo Biological Technology Company (Beijing, China). Human blood was obtained from a healthy volunteer and immediately used.

2.2. Synthesis of Cu Magnetic Particles

Cu magnetic particles (Cu-MNPs) were synthesized in two continuous steps. First, magnetic particles functionalized with polyacrylic acid were synthesized via a simple solvothermal route as previously described [24], with some modification. Briefly, FeCl₃·6H₂O (0.5 g) and CoCl₂ (0.23 g) were dissolved into a clear solution in 50 mL water and mixed with 15 mL polyacrylic acid (PAA) and 15 mL 80% hydrated hydrazine. The mixture was vigorously stirred until homogeneous, transferred to a 250 mL Teflon-lined stainless-steel autoclave, and reacted at 180°C for 10 h. The final product was collected with a magnet, washed with ethanol and deionized water several times in this order, and dried overnight at 50°C in a vacuum oven. The PAA@MNPs were obtained. Subsequently, 0.5 g of the product was mixed with 50 mL 0.2 mM CuSO₄ and then with 10 mL water containing 0.4 g NaBH₄. The mixture was mechanically stirred at room temperature overnight, and the resulting nanoparticles were isolated by magnetic decantation, washed with ethanol and deionized water several times in this order, and dried overnight at 50°C in a vacuum oven. Following the steps above, Co²⁺@PAA@MNPs, Ni²⁺@PAA@MNPs, and Cu²⁺ @PAA@MNPs were synthesized without adding NaBH4.

2.3. Characterization

Nanoparticles were characterized on an FT-IR spectrometer (Thermo Nicolet Corporation, Waltham, MA, USA), a Zetasizer Nano 100 (Malvern, Worcestershire, UK), and a high-resolution transmission electron microscope (HRTEM; JEOL-2010, Japan). SEM and EDX micrographs were obtained with a field emission scanning electron microscope (ZEISS Ultra 55, Carl Zeiss, Germany), while X-ray photoelectron spectra were recorded on an electron spectrometer emitting a 300 W Al KR radiation (ESCALAB220i-XL, VG Scientific, UK). Magnetization was measured at room temperature on a vibrating sample magnetometer (PPMS-9, Quantum Design, San Diego, USA).

2.4. Adsorption of BHb

Due to its similarity to human hemoglobin, BHb was used as a model histidine-rich protein. Adsorption to Cu-MNPs was assessed over a range of pH, contact time, and initial protein concentration. The adsorption kinetic and adsorption isotherm were measured in batch experiments. In a typical adsorption experiment, 0.02 g Cu-MNPs was shaken for 90 min at room temperature with 20 mL 1 mg/mL BHb in Tris-HCl pH 8.5. After magnetic decantation, the absorbance of the supernatant at 408 nm was measured using a UV-1700 spectrophotometer (Shimadzu, Kyoto, Japan). We note that BHb has maximum absorbance at 408 nm (Figure 1).

Figure 1: UV-visible spectrum of BHb.

Adsorption was calculated according to

where (mg g⁻¹) is the amount of BHb adsorbed, (mg mL⁻¹), and (mg mL⁻¹) are the initial and residual concentration of BHb in the supernatant, respectively, (mL) is the reaction volume, and (g) is the mass of Cu-MNPs. The effect of pH on adsorption was tested from 4.0 to 7.0 in 0.1 M citric acid sodium hydrogen phosphate buffer, and from 7.5 to 9.5 in 0.1 M Tris-HCl buffer. The effect of contact time was assessed while keeping the initial concentration of BHb constant at 1.0 mg mL⁻¹. Adsorption kinetic data were fitted to pseudo-first-order or pseudo-second-order models [25, 26], which can be expressed as

where (mg g⁻¹) is the adsorbed BHb at time and and (mg g⁻¹) is the adsorbed BHb at equilibrium. (min⁻¹) and (g mg⁻¹ min⁻¹) are the pseudo-first-order rate constant and pseudo-second-order rate constant, respectively.

The effect of initial protein concentration was investigated from 0.1 to 3.0 mg mL⁻¹, and the adsorption isothermal data were fitted to the Freundlich model or the Langmuir [27, 28], which can be expressed as

where (mg g⁻¹) is the adsorbed BHb at equilibrium and (mg g⁻¹) is the maximum BHb that can be adsorbed. (mg mL⁻¹) denotes the residual concentration of BHb in solution at equilibrium, while (mg g⁻¹) is the Freundlich constant reflecting the maximum adsorption capacity. is the adsorption intensity and (mL mg⁻¹) is the Langmuir constant, which is related to the energy of adsorption.

2.5. Selectivity

Due to similarities in abundance, molecular weight, and volume [29], BSA was used as a model competing protein to evaluate the selectivity of Cu-MNPs for BHb. Selectivity was tested using 20 mL solutions containing either protein at 1 mg mL⁻¹ or a mix of both proteins at 1 mg mL⁻¹ each. Supernatants were analyzed on a UV-1700 spectrophotometer (Shimadzu, Kyoto, Japan), as BHb and serum albumin have characteristic absorbance peaks at 406 nm and 280 nm, respectively.

2.6. Depletion of Hemoglobin from Human Blood

To evaluate potential use in the clinic, Cu-MNPs (0.02 g) were used to deplete hemoglobin from a sample of human blood, which was diluted 100-fold in 0.1 M Tris-HCl pH 8.5. After magnetic separation, depleted and control samples were analyzed by spectrophotometry and sodium dodecyl sulfate-polyacrylamide gel electrophoresis (SDS-PAGE).

3. Results and Discussion

3.1. Adsorption Capacity of the Nanoparticles with Different Metal Ions on the Surface

As shown in Figure 2, the adsorption capacities of the PAA@MNPs, Co²⁺@PAA@MNPs, Ni²⁺@PAA@MNPs, and Cu²⁺@PAA@MNPs were compared. The result showed that the adsorption capacity of MNPs with Cu²⁺ on the surface was highest among these nanoparticles, so Cu²⁺ was chosen for BHb adsorption and magnetic particles with copper shell had been explored further for BHb adsorption. In fact, the adsorption capacity of MNPs after coating copper shell was higher than that of Cu²⁺ @PAA@MNPs.

Figure 2: Adsorption capacity of the nanoparticles with different metal ions on the surface.

3.2. Synthesis and Characterization of Cu-MNPs

The preparation of Cu-MNPs is illustrated in Scheme 1, along with the proposed mechanism by which it separates target proteins by metal affinity. Surface morphology and architecture are shown in TEM and SEM images in Figure 3, which reveal that magnetic nanoparticles functionalized with polyacrylic acid (P-MNPs) are spherical before (Figure 3(a)) and after loading with Cu (Figure 3(d)). Based on TEM images, the nanoparticles gained an obvious flower-like core with a clear shell upon loading with copper (Figure 3(d)). In comparison to P-MNPs (Figures 3(b) and 3(c)), the surface became rougher and very fine particles appeared (Figures 3(e) and 3(f)) after immobilized Cu²⁺ was reduced to Cu metal by NaBH₄, perhaps due to the formation of Cu core/shell composite microspheres. The TEM images showed that P-MNPs were well-dispersed, but Cu-MNPs had slight aggregation in water. Furthermore, these TEM and SEM images indicated that the sizes of P-MNPs and Cu-MNPs were not uniform.

Scheme 1: Schematic illustration of the strategy for preparation of Cu-MNPs and Hb adsorption.

(a)

(b)

(c)

(d)

(e)

(f)

Figure 3: TEM images of magnetic nanoparticles (P-MNPs) before (a, b) and after loading with copper (Cu-MNPs) (d, e). SEM images of magnetic nanoparticles (P-MNPs) before (c) and after loading with copper (Cu-MNPs) (f).

Figure 4 shows the particle size distribution of magnetic nanoparticles with or without copper. The latter had an average hydrodynamic size of about 281 nm, the hydrodynamic diameter increased to 513 nm after loading, indicating that a very thick Cu shell may have been deposited.

Figure 4: Particle size distribution of magnetic nanoparticles with or without copper.

Copper is easily identified in the energy dispersive X-ray spectra of selected surfaces in Cu-MNPs (Figure 5). Remarkably, the particles are more than 40% Cu by weight (Table 1), implying that a large amount of the metal was immobilized, and corroborating the previous result that copper-loaded nanoparticles are larger than unloaded particles.

Table 1: Elemental analysis of Cu-MNPs by energy-dispersive X-ray spectroscopy.

Element
Mass percentage (%)

C
21.49

N
0.51

O
19.74

Fe
10.89

Co
2.61

Cu
44.75

Total
100

Figure 5: Energy dispersive X-ray spectrum of Cu-MNPs.

Vibrating sample magnetometry at room temperature indicated that the saturation magnetization value was 60 emu g⁻¹ and 48.0 emu g⁻¹ for unloaded and copper-loaded magnetic nanoparticles, respectively (Figure 6). Although magnetization slightly decreased after copper loading, the remaining magnetic strength was sufficient to allow easy separation of copper-loaded particles from aqueous solutions in less than 30 s by applying an external magnetic field.

Figure 6: Vibrating sample magnetometry curves of u P-MNPs and Cu-MNPs.

The survey and the respective element XPS of Cu-MNPs are given in Figure 7. The binding energies of O (1s, 529.88 eV), C (1s, 284.07 eV), Fe (2p, 710.3 eV), Co (2p, 781.09 eV), and Cu (2p, 931.78 eV) are obviously observed. XPS shows that the oxidation state of copper was a mixture of oxidized forms including two states (Cu⁰, Cu¹⁺ and Cu²⁺). The strong peak at 931.78 can be ascribed to Cu⁰ and/or Cu¹⁺ while the small peak around 937.6 can be ascribed to Cu²⁺. It has been reported that Cu⁰ and Cu¹⁺ are hard to distinguish owing to that there is about 0.3 eV between them in binding energy [30]. The small peak at 943.6 reveals a Cu²⁺ oxidized form. In addition, the presence of the dominant peak at 951.7 can be assigned to Cu⁰ and/or Cu¹⁺. The proportion of Cu⁰ and/or Cu¹⁺: Cu²⁺ can be deduced to be about 8 : 1 by integrating the area in the XPS. Based on above results shown in XPS, it can therefore be reasonably concluded that the deposition of metallic Cu⁰ species on the magnetic nanoparticle surface occurred due to the reduction of Cu²⁺ to metallic Cu⁰ by NaBH₄. On the other hand, the existence of Cu¹⁺ and Cu²⁺ species on the magnetic nanoparticle surface was due to the fact that many metallic Cu⁰ species subsequently were reoxidized back Cu¹⁺ and Cu²⁺ species in an aqueous environment resulting in a mixture of oxidized forms. A similar phenomenon was observed by Wang and colleagues [31]. Importantly, a high density of Cu²⁺on the magnetic nanoparticle surface will contribute to protein adsorption by Cu²⁺-chelate affinity chromatography.

Figure 7: XPS spectra of the Cu-MNPs.

In FT-IR spectra of magnetic nanoparticles coated with or without polyacrylic acid and copper (Figure 8), the strong IR band at 580 cm⁻¹ is attributed to Fe-O vibrations, whereas bands at 2927, 1032, and 1647 cm⁻¹ are associated with C-H stretching, aliphatic C-N stretching, and C-O stretching vibrations due to polyacrylic acid, respectively (Figure 8, curves a, b, and c) [24, 30], confirming that the nanoparticles were successfully functionalized with polyacrylic acid during synthesis.

Figure 8: FT-IR spectra of MNPs, P-MNPs, and Cu-MNPs.

3.3. The Stability of Cu-MNPs

The amount of BHb adsorbed to Cu-MNPs as a function of time was measured to evaluate the stability of copper shell. As shown in Figure 9, the amount of BHb adsorbed to Cu-MNPs gradually increased with day, indicating that the content of Cu¹⁺or Cu²⁺ on copper shell increased, which was attributed to the continuing oxidation of copper shell. This phenomenon would result in two different effects. On the one hand, an increased density of Cu¹⁺or Cu²⁺ may contribute to protein adsorption. On the other hand, the continuing oxidation of copper shell would reduce stability of Cu-MNPs.

Figure 9: The amount of BHb adsorbed to Cu-MNPs as a function of time.

3.4. Effect of pH

As can be seen in Figure 10, adsorption of BHb to Cu-MNPs was strongly pH-dependent, with maximum adsorption at about pH 8.5. Adsorption decreased below and above pH 8.5, in line with previous studies indicating that the optimal pH is between 8.0 and 9.0 [21]. With an isoelectric point near pH 7.0, BHb should be negatively charged above pH 7.0 [31]. This was in favor of BHb adsorption by the as-synthesized nanoparticles which carried a lot of positive charges due to the existence of a large amount of Cu²⁺ and Cu¹⁺ on the surface. The pH of the buffer has profound effect on the adsorption process owing that it can affect the charge of protein and the surface charge status of adsorbents [32, 33]. Accordingly, buffers at pH 8.5 were used in all subsequent experiments to preserve the electrostatic status of the target protein and the nanoparticles.

Figure 10: Effect of pH on adsorption of BHb to Cu-MNPs.

3.5. Effect of Contact Time and Adsorption Kinetics

Protein adsorption is widely interpreted in terms of well-established kinetic models [25]. As illustrated in Figure 11, adsorption of BHb to copper magnetic particles sharply increased from 0 to 30 min due to a large number of available sorption sites. However, adsorption tapered off thereafter and reached equilibrium in 90 min. Accordingly, all subsequent adsorption experiments were allowed to proceed for 90 min. Kinetic data were then fit to pseudo-first-order and pseudo-second-order kinetic models. The data fit to a pseudo-first-order model reasonably well, with equation (2) and determination coefficient () 0.9727. On the other hand, the data fit significantly better to a pseudo-second-order model with equation (3) and determination coefficient 0.9976.

Figure 11: Time course of BHb adsorption to Cu-MNPs.

3.6. Effect of Initial Protein Concentration and Isothermal Adsorption

Figure 12 shows the effects of initial protein concentration on the amount of BHb adsorbed to Cu-MNPs in 90 min. Adsorption increased with initial protein concentration up to 1.0 mg mL⁻¹. Accordingly, the adsorption capacity for BHb was determined to be 670 mg g⁻¹, which is higher than previously reported for similar devices [34, 35]. Presumably, this is due to the extremely high density of immobilized Cu²⁺ ions. We note that adsorption of proteins to Cu-MNPs is attributable to metal affinity, as well as to electrostatic and hydrophobic interactions. Indeed, immobilized Cu²⁺ ions in nanoparticles interact strongly with protein electron donor groups such as histidine residues. In addition, proteins like BHb are negatively charged in basic aqueous solutions and thus can electrostatically interact with positively charged bodies like Cu-MNPs [21].

Figure 12: Effect of initial protein concentration on the amount of BHb adsorbed to Cu-MNPs in 90 min.

Experimental isothermal data were fit to the Langmuir and Freundlich models as shown in Figure 12. Fitting to the Langmuir model yielded the equation (4) , with determination coefficient 0.9986. Based on this equation, the maximum adsorption capacity () was calculated to be 666 mg g⁻¹, which is very close to the experimental value of about 670 mg g⁻¹. On the other hand, fitting to the Freundlich model yielded equation (5); a significantly lower determination coefficient () of 0.8889 was obtained. Thus, isothermal data fit the Langmuir model significantly better, indicating that BHb interacts with Cu-MNPs by monolayer adsorption [21].

3.7. Selectivity

Due to similarities in abundance, molecular weight, and volume [36], BSA was used as a model competitor to evaluate the selectivity of Cu-MNPs for BHb. BSA and hemoglobin produce characteristic peaks at 280 nm and 406 nm in the UV-visible range (Figure 13), respectively. Thus, these peaks were also used to estimate their respective concentrations. The peak at 406 nm sharply decreased and nearly disappeared from the supernatant after BHb was incubated with Cu-MNPs by itself (Figure 13(a)), indicating efficient and selective adsorption. In contrast, the peak at 280 nm did not significantly decrease after adsorption of solutions containing BSA, by itself or in combination with BHb (Figures 13(b) and 13(c)), indicating negligible adsorption. Accordingly, the adsorption rate was calculated to be 87% for BHb and 25% for BSA (Figure 13(e)). In addition, solutions containing BHb, by itself or in combination with BSA, turned from reddish brown to a light color after incubation with Cu-MNPs (Figure 13(f)), indicating specific adsorption of hemoglobin. Taken together, these results show that Cu-MNPs selectively adsorb BHb, likely because it contains 24 surface histidine residues, while BSA contains only two accessible histidines [37, 38]. Thus, BHb is much easier to capture than albumin by affinity to immobilized metal ions.

(a)

(b)

(c)

(d)

(e)

(f)

Figure 13: Selectivity of Cu-MNPs for BHb, as assessed visually (f) and by UV-Visible spectrophotometry.

3.8. Depletion of Hemoglobin from Human Blood Samples

To assess potential utility in the clinic, a fresh sample of human blood was diluted 100-fold and incubated with Cu-MNPs. The characteristic hemoglobin peak at 406 nm clearly diminished after adsorption, along with the red color of the sample. Indeed, about 87% of hemoglobin was removed (Figure 13(e)). SDS-PAGE analysis (Figure 14) also indicated that the nanoparticles adsorbed hemoglobin, but not other proteins. Consequently, hemoglobin was recovered from nanoparticles after elution with 10, 20, and 100 mM imidazole (lanes 1, 3, and 4 in Figure 14). Collectively, the data indicate that Cu-MNPs may be used to effectively remove target proteins and have potential value in clinical testing of human blood.

Figure 14: SDS-PAGE analysis of a human blood sample incubated with Cu-MNPs. Lane M, protein marker; lane 1, elution with 100 mM imidazole; lane 2, human blood diluted 100-fold; lane 3, elution with 10 mM imidazole; lane 4, elution with 20 mM imidazole; lane 5, supernatant after adsorption.

4. Conclusions

In conclusion, we present a facile route to deposit hierarchical copper shells on magnetic nanoparticles, which can then be used to capture hemoglobin. We note that after deposition, copper shells undergo partial reoxidation to Cu²⁺ and Cu¹⁺, resulting in a mixture of copper oxidized forms. This mixture both protects the magnetic core and provides a high density of Cu²⁺ ions that strongly adsorb histidine-rich proteins. Indeed, UV-visible spectrophotometry and SDS-PAGE analysis demonstrated that Cu-MNPs specifically capture BHb due to strong interactions between Cu²⁺ and histidine residues. Kinetic adsorption data followed pseudo-second-order kinetics, while isothermal data were described well by the Langmuir model. Importantly, the nanoparticles specifically depleted hemoglobin from human blood, demonstrating that the nanocomposites have potential application in removing highly abundant histidine-rich proteins from complex samples.

Competing Interests

The authors declare that they have no competing financial interests.

Acknowledgments

This work was generously supported by the Graduate Innovation Program (no. YJSCX201518Y) of Xinxiang Medical University, by the Youth Backbone Teacher Training Program (no. 2016GGJS-104) and the Nature Science Plan Program (no. 12B180030) of the Education Department of Henan Province, and by the National Natural Science Foundation of China (no. U1304302).

References

A. Romero and C. Schal, “Blood constituents as phagostimulants for the bed bug Cimex lectularius L.,” Journal of Experimental Biology, vol. 217, no. 4, pp. 552–557, 2014.

M. Iranifam, “Analytical applications of chemiluminescence-detection systems assisted by magnetic microparticles and nanoparticles,” Trends in Analytical Chemistry, vol. 51, pp. 51–70, 2013.

A. Vallée-Bélisle, F. Ricci, T. Uzawa, F. Xia, and K. W. Plaxco, “Bioelectrochemical switches for the quantitative detection of antibodies directly in whole blood,” Journal of the American Chemical Society, vol. 134, no. 37, pp. 15197–15200, 2012.

N. Zolotarjova, P. Mrozinski, H. Chen, and J. Martosella, “Combination of affinity depletion of abundant proteins and reversed-phase fractionation in proteomic analysis of human plasma/serum,” Journal of Chromatography A, vol. 1189, no. 1-2, pp. 332–338, 2008.

X. Zhu, M. Lv, H. Wang, and W. Guan, “Identification of circulating microRNAs as novel potential biomarkers for gastric cancer detection: a systematic review and meta-analysis,” Digestive Diseases and Sciences, vol. 59, no. 5, pp. 911–919, 2014.

E. K. M. Ueda, P. W. Gout, and L. Morganti, “Current and prospective applications of metal ion–protein binding,” Journal of Chromatography A, vol. 988, no. 1, pp. 1–23, 2003.

L. Rong, G. Chen, and W. Zhao, “Immobilized metal ion affinity chromatography methods, principles, characteristics and applications for protein separation,” Chemistry Bulletin, vol. 68, no. 5, pp. 352–360, 2005.

X. Chen, S. Chen, J. Liu, and J. Wang, “Isolation of hemoglobin from human blood using solid phase extraction with lanthanum(III) modified zeolite,” Microchimica Acta, vol. 165, no. 1-2, pp. 217–222, 2009.

S. Wang, N. Xiong, X.-Y. Dong, and Y. Sun, “A novel nickel-chelated surfactant for affinity-based aqueous two-phase micellar extraction of histidine-rich protein,” Journal of Chromatography A, vol. 1320, pp. 118–124, 2013.

S.-H. Huang and R.-S. Juang, “Biochemical and biomedical applications of multifunctional magnetic nanoparticles: a review,” Journal of Nanoparticle Research, vol. 13, no. 10, pp. 4411–4430, 2011.

A.-H. Lu, E. L. Salabas, and F. Schüth, “Magnetic nanoparticles: synthesis, protection, functionalization, and application,” Angewandte Chemie—International Edition, vol. 46, no. 8, pp. 1222–1244, 2007.

R. A. Frimpong and J. Z. Hilt, “Magnetic nanoparticles in biomedicine: synthesis, functionalization and applications,” Nanomedicine, vol. 5, no. 9, pp. 1401–1414, 2010.

H. Rui, R. Xing, Z. Xu, Y. Hou, S. Goo, and S. Sun, “Synthesis, functionalization, and biomedical applications of multifunctional magnetic nanoparticles,” Advanced Materials, vol. 22, no. 25, pp. 2729–2742, 2010.

M. Zhang, X. He, L. Chen, and Y. Zhang, “Preparation and characterization of iminodiacetic acid-functionalized magnetic nanoparticles and its selective removal of bovine hemoglobin,” Nanotechnology, vol. 22, no. 6, Article ID 065705, 2011.

X. Guo, F. Mao, W. Wang, Y. Yang, and Z. Bai, “Sulfhydryl-modified Fe₃O₄@SiO₂ core/shell nanocomposite: synthesis and toxicity assessment in vitro,” ACS Applied Materials and Interfaces, vol. 7, no. 27, pp. 14983–14991, 2015.

J. Wang, S. Zheng, Y. Shao, J. Liu, Z. Xu, and D. Zhu, “Amino-functionalized Fe₃O₄@SiO₂ core–shell magnetic nanomaterial as a novel adsorbent for aqueous heavy metals removal,” Journal of Colloid and Interface Science, vol. 349, no. 1, pp. 293–299, 2010.

S. Ayyappan, J. Philip, and B. Raj, “Effect of digestion time on size and magnetic properties of spinel CoFe₂O₄ nanoparticles,” Journal of Physical Chemistry C, vol. 113, no. 2, pp. 590–596, 2009.

S. Ayyappan, S. Mahadevan, P. Chandramohan, M. P. Srinivasan, J. Philip, and B. Raj, “Influence of Co²⁺ Ion concentration on the size, magnetic properties, and purity of CoFe₂O₄ Spinel ferrite nanoparticles,” Journal of Physical Chemistry C, vol. 114, no. 14, pp. 6334–6341, 2010.

G. Jian, Y. Liu, X. He, L. Chen, and Y. Zhang, “Click chemistry: a new facile and efficient strategy for the preparation of Fe₃O₄ nanoparticles covalently functionalized with IDA-Cu and their application in the depletion of abundant protein in blood samples,” Nanoscale, vol. 4, no. 20, pp. 6336–6342, 2012.

M. Zhang, X. He, L. Chen, and Y. Zhang, “Preparation of IDA-Cu functionalized core–satellite Fe₃O₄/polydopamine/Au magnetic nanocomposites and their application for depletion of abundant protein in bovine blood,” Journal of Materials Chemistry, vol. 20, no. 47, pp. 10696–10704, 2010.

C. Ding, X. Ma, X. Yao, and L. Jia, “Facile synthesis of copper(II)-decorated magnetic particles for selective removal of hemoglobin from blood samples,” Journal of Chromatography A, vol. 1424, pp. 18–26, 2015.

J.-W. Liu, T. Yang, L.-Y. Ma, X.-W. Chen, and J.-H. Wang, “Nickel nanoparticle decorated graphene for highly selective isolation of polyhistidine-tagged proteins,” Nanotechnology, vol. 24, no. 50, Article ID 505704, 2013.

I. S. Lee, N. Lee, J. Park et al., “Ni/NiO core/shell nanoparticles for selective binding and magnetic separation of histidine-tagged proteins,” Journal of the American Chemical Society, vol. 128, no. 33, pp. 10658–10659, 2006.

X. Liu, Q. Hu, Z. Fang, Q. Wu, and Q. Xie, “Carboxyl enriched monodisperse porous Fe₃O₄ nanoparticles with extraordinary sustained-release property,” Langmuir, vol. 25, no. 13, pp. 7244–7248, 2009.

Y. Liu, M. Chen, and H. Yongmei, “Study on the adsorption of Cu(II) by EDTA functionalized Fe₃O₄ magnetic nano-particles,” Chemical Engineering Journal, vol. 218, pp. 46–54, 2013.

Y. S. Ho and G. Mckay, “Pseudo-second order model for sorption processes,” Process Biochemistry, vol. 34, no. 5, pp. 451–465, 1999.

B. H. Hameed and F. B. M. Daud, “Adsorption studies of basic dye on activated carbon derived from agricultural waste: hevea brasiliensis seed coat,” Chemical Engineering Journal, vol. 139, no. 1, pp. 48–55, 2008.

I. Langmuir, “The constitution and fundamental properties of solids and liquids. Part II. Liquids,” Journal of the American Chemical Society, vol. 38, no. 5, pp. 102–105, 1917.

Q. Gai, F. Qu, and Y. Zhang, “The preparation of BHb-molecularly imprinted gel polymers and its selectivity comparison to BHb and BSA,” Separation Science and Technology, vol. 45, no. 16, pp. 2394–2399, 2010.

P. Mondal, A. Sinha, N. Salam, A. S. Roy, N. R. Jana, and S. M. Islam, “Enhanced catalytic performance by copper nanoparticle–graphene based composite,” RSC Advances, vol. 3, no. 16, pp. 5615–5623, 2013.

H. Shirahama, K. Suzuki, and T. Suzawa, “Bovine hemoglobin adsorption onto polymer latices,” Journal of Colloid and Interface Science, vol. 129, no. 2, pp. 483–490, 1989.

Y. T. Zhou, C. Branfordwhite, H. L. Nie, and L. M. Zhu, “Adsorption mechanism of Cu²⁺ from aqueous solution by chitosan-coated magnetic nanoparticles modified with alpha-ketoglutaric acid,” Journal of Colloid and Interface Science, vol. 330, no. 1, pp. 29–37, 2009.

G. Sheng, J. Li, D. Shao et al., “Adsorption of copper(II) on multiwalled carbon nanotubes in the absence and presence of humic or fulvic acids,” Journal of Hazardous Materials, vol. 178, no. 1–3, pp. 333–340, 2010.

Z.-Y. Ma, Y.-P. Guan, X.-Q. Liu, and H.-Z. Liu, “Preparation and characterization of micron-sized non-porous magnetic polymer microspheres with immobilized metal affinity ligands by modified suspension polymerization,” Journal of Applied Polymer Science, vol. 96, no. 6, pp. 2174–2180, 2005.

M. Zhang, D. Cheng, X. He, L. Chen, and Y. Zhang, “Magnetic silica-coated sub-microspheres with immobilized metal ions for the selective removal of bovine hemoglobin from bovine blood,” Chemistry - An Asian Journal, vol. 5, no. 6, pp. 1332–1340, 2010.

Z. Lin, F. Yang, X. He, and Y. Zhang, “Organic–inorganic hybrid silica as supporting matrices for selective recognition of bovine hemoglobin via covalent immobilization,” Journal of Separation Science, vol. 32, no. 22, pp. 3980–3987, 2009.

G. E. Wuenschell, E. Naranjo, and F. H. Arnold, “Aqueous two-phase metal affinity extraction of heme proteins,” Bioprocess Engineering, vol. 5, no. 5, pp. 199–202, 1990.

E. S. Hemdan, Y. Zhao, E. Sulkowski, and J. Porath, “Surface topography of histidine residues: a facile probe by immobilized metal ion affinity chromatography,” Proceedings of the National Academy of Sciences of the United States of America, vol. 86, no. 6, pp. 1811–1815, 1989.