BioMed Research International
Volume 2017 (2017), Article ID 7961494, 9 pages
https://doi.org/10.1155/2017/7961494

Research Article

Diagnostic Method of Diabetes Based on Support Vector Machine and Tongue Images

Jianfeng Zhang,¹ Jiatuo Xu,¹ Xiaojuan Hu,² Qingguang Chen,³ Liping Tu,² Jingbin Huang,¹ and Ji Cui¹

¹Basic Medical College, Shanghai University of Traditional Chinese Medicine, Shanghai 201203, China
²Shanghai Innovation Center of TCM Health Service, Shanghai University of Traditional Chinese Medicine, Shanghai 201203, China
³Department of Endocrinology, Shuguang Hospital Affiliated to Shanghai University of Traditional Chinese Medicine, Shanghai 201203, China

Correspondence should be addressed to Jiatuo Xu; xjt@fudan.edu.cn

Received 26 August 2016; Revised 24 November 2016; Accepted 12 December 2016; Published 4 January 2017

Academic Editor: Zexuan Ji

Copyright © 2017 Jianfeng Zhang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Objective. The purpose of this research is to develop a diagnostic method of diabetes based on standardized tongue image using support vector machine (SVM). Methods. Tongue images of 296 diabetic subjects and 531 nondiabetic subjects were collected by the TDA-1 digital tongue instrument. Tongue body and tongue coating were separated by the division-merging method and chrominance-threshold method. With extracted color and texture features of the tongue image as input variables, the diagnostic model of diabetes with SVM was trained. After optimizing the combination of SVM kernel parameters and input variables, the influences of the combinations on the model were analyzed. Results. After normalizing parameters of tongue images, the accuracy rate of diabetes predication was increased from 77.83% to 78.77%. The accuracy rate and area under curve (AUC) were not reduced after reducing the dimensions of tongue features with principal component analysis (PCA), while substantially saving the training time. During the training for selecting SVM parameters by genetic algorithm (GA), the accuracy rate of cross-validation was grown from 72% or so to 83.06%. Finally, we compare with several state-of-the-art algorithms, and experimental results show that our algorithm has the best predictive accuracy. Conclusions. The diagnostic method of diabetes on the basis of tongue images in Traditional Chinese Medicine (TCM) is of great value, indicating the feasibility of digitalized tongue diagnosis.

1. Introduction

Resulting from a variety of factors, diabetes is a metabolic disorder mainly characterized by chronic high blood glucose. The number of patients diagnosed with diabetes has been increasing at a rapid rate worldwide. Among them, Chinese patients increase at the highest rate. The overall prevalence of diabetes in the adult population of China grew from 0.67% in 1980 to 11.6% by 2010 [1], and it greatly influences people’s life.

Traditional Chinese Medicine (TCM) diagnosis is based on the information obtained from four diagnostic processes, that is, looking, listening and smelling, asking, and touching. The most common tasks are taking the pulse and inspecting the tongue [2]. Studies demonstrate that tongue images have relatively strong correlation with diabetes in TCM [3–5]. Traditionally, doctors diagnose diseases and identify patterns by inspecting, describing, and experiences. Thus, the results are easily affected by doctors’ own professional skills and surrounding environment. Without objective assessment criteria, the precision of pattern identification and the repeatability of verification are unclear. Thus, a workable solution is to apply computer techniques and image processing, guided by TCM theory, to make tongue diagnosis standard, objective, and quantitative.

Fortunately, computational methods for digital image processing techniques in tongue have been developed, which achieve promising results [6–8]. Based on the results above, various machine learning methods have been used in tongue manifestation recognition or classification, such as support vector machine (SVM) [9–11], Nearest Neighbor (-NN) [12, 13], Naive Bayes [11], Decision Tree [11], and Neural Network [9, 14]. Throughout all mentioned works on the inspection, the popular machine learning algorithms, such as -NN and SVM, are still the first choice in current literature [15]. Though the identification and classification of tongue image have made certain achievements in the past researches, there still existed some issues, firstly, a standard lighting source environment is needed in the tongue image collection, and an effective method is necessary in the tongue image analysis. Moreover, for a successful SVM model, the selection of its kernel parameter and optimization of the data set is of great importance.

In this study, tongue images were collected by the TDA-1 digital tongue instrument, which can create a stable light source environment for tongue image acquisition. Research on tongue image mainly focuses on two parts: tongue body and tongue coating. The segmentation of these two parts is an important step in tongue diagnosis since it provides a premise for analyzing the color and texture. This study adopted division-merging method and chrominance-threshold method to distinguish tongue body from tongue coating and then to obtain the parameters of each part [16].

Among commonly used data mining methods, SVM [17] is widely applied due to its excellency in generalization and nonlinear function fitting, and it also presents a lot of advantages in dealing with small sample studies [18]. For a successful SVM model, kernel parameters of SVM are the most important factors affecting the prediction accuracy. Therefore, with its kernel parameters optimized by genetic algorithm (GA), we designed a genetic-based SVM (GA-SVM) model, which was adopted to establish a diagnosis model for diabetes on the basis of tongue images. In our study, techniques for collecting and analyzing information were employed to achieve interdisciplinary research and application in TCM, which will promote the construction of assessment system supported by information acquired from TCM four diagnostic methods in the future for medical treatment in communities and individual health management.

2. Materials and Methods

2.1. Subjects

This study included 827 subjects with informed consent from outpatients and physical examination centers at Shuguang Hospital Affiliated to Shanghai University of Traditional Chinese Medicine (SHUTCM) and TCM Hospital of Baoshan Area in Shanghai, from July 2013 to June 2015. Among them, 296 (159 males and 137 females, average age: ) were diagnosed with diabetes; 531 (191 males and 340 females, average age: ) had no diabetes.

2.2. Inclusion and Exclusion Criteria

Inclusion criteria for diabetes group signed with informed consent were from World Health Organization (WHO) in 1999 [19], which include (1) symptoms of high blood sugar and random plasma glucose ≥11.1 mmol/L (200 mg/dL); (2) fasting plasma glucose level ≥7.0 mmol/L (126 mg/dL); (3) plasma glucose ≥ 11.1 mmol/L (200 mg/dL) two hours after a 75 g oral glucose load as in a glucose tolerance test.

Exclusion criteria include (1) those diagnosed with other severe diseases such as tumor and diseases of immune and hematological systems; (2) those who cannot make a clear description or cooperate with the imaging collection due to mental disorders; (3) those who refuse to sign informed consent.

2.3. Tongue Image Collection and Analysis Methods

2.3.1. Collection Instrument

Developed by the research team handling intelligent processing of TCM diagnosis information in SHUTCM, the TDA-1 digital tongue instrument was applied to collect images. This apparatus (Figure 1) is made up with an Eolane digital camera, a LED3 light, a removable collection ring, a circuit board, and a hand. The main technical parameters are Charge-coupled device: Eolane A12; light: cold white LED light; color temperature: 6466 K; luminance: 23541 ux [20].

Figure 1: TDA-1 tongue instrument.

2.3.2. Collection Methods

The TDA-1 tongue instrument was used to collect tongue images in the morning before breakfast. With build-in light on, parameters were set into a manual mode with an aperture of 13, a shutter speed of 1/60 s, microlens, and no flash. Subjects were asked to take a seat, look at the front horizontally, and extend tongue with tongue tip hanging naturally at a 60-degree angle to the horizontal line. The chin was supported by the inferior margin of the collection ring so that the face was closely attached to the ring. With flat surface, 1/2 to 2/3 part of the tongue was protruded. Then, the OK button was pressed. After closing the build-in light, the collected images were checked. If these images did not conform to the requirements mentioned above, collect it again.

2.3.3. Analysis Methods

To obtain parameters of tongue images, tongue body and coating need to be separated, and the color and texture of both body and coating need to be analyzed and recognized [16]. The method has been developed into a Tongue Diagnosis Analysis System (TDAS) by the TCM diagnosis Intelligent Information Processing Laboratory of Shanghai University of TCM (Figure 2). The upper part of the system is the toolbar, including settings, projects, analysis, data, and print; the left side is the module of tongue manifestation analysis, including new data, tongue manifestation segmentation and results. The middle part is tongue body and tongue coating picture. Manual and automatic analyses can be used in color and texture. Because manual analysis can be based on the experience of TCM experts to choose different points and boundaries, we choose the combination of manual and automatic analyses according to experience. The data view window shows the color of the tongue body, the tongue coating, and texture parameters. The bottom right part shows the results of tongue manifestation analysis (Figure 2, light red tongue; light yellow coating).

Figure 2: Tongue diagnosis analysis system.

Segmentation of Tongue Body and Coating. The identification of tongue body and coating is an important procedure in tongue diagnosis since it is the premise for analyzing the color and texture features of body and coating. The biggest distinction between tongue body and coating lies in the color: with red as the dominant hue, the color of the tongue body can be presented as light white, light red, crimson red, and purple. For tongue coating, the color can be white, yellow, grey, and black. Due to different color attributes and value ranges, division-merging algorithm based on the color of body and coating was adopted. For images with typical color of body and coating, this method achieves good results. But when tongue coating is thin, the color of tongue body overlaps with that of tongue coating. In this case, this approach fails to separate two colors. Therefore, chrominance-threshold method was adopted too. In this study, the division-merging algorithm and chrominance-threshold method were combined to separate the tongue body and tongue coating. Detailed algorithm was referred to the relevant literature [16]. The tongue images after segmentation were shown in Figure 3.

Figure 3: The segmentation of tongue body and coating.

Acquisition of Features in Color and Texture. After separating the area of tongue body and coating, RGB color values of the pixels in tongue body and coating were calculated and then the values of total pixels were averaged. Considering the visualization of color and the feasibility and practicability of classification, we transformed RGB chroma space into LAB and HIS [21]. The texture of tongue contains rough tongue, tender tongue, greasy coating, and rough coating. Among them, tender tongue body and greasy coating are fine and smooth. The changes of texture mainly lie in the variations of gray level. Thus, this study applied gray scale differential algorithm to describe the texture of body and coating. The obtained parameters included contrast (CON), angle second moments (ASM), entropy (ENT), and mean [22].

2.4. Study Design and Setting

The data, mainly including color feature and texture feature, were derived from tongue images of diabetes group and nondiabetes group. These feature parameters were input as independent variables in the preprocessing. Whether the subject has diabetes or not (dependent variable) was considered as the classified variable. 80% specimens were used for training, while 20% for test. The model is illustrated in Figure 4.

Figure 4: Map of classification model.

2.4.1. Sample Equalization

The sample size of diabetes group and nondiabetes group differs a lot. To avoid the influences of unequal sample size on classification model, Synthetic Minority Oversampling Technique (SMOTE) was adopted to equalize samples. SMOTE, proposed by Chawla et al. in Artificial Intelligence in 2002 [23], is a solution based on oversampling. In this study, the equalization was achieved by DMwR package in R Language.

2.4.2. Feature Normalization

Due to the differences of feature parameters in magnitude orders, to eliminate the negative effects of these differences, the value ranges were scaled and mapped into the range between −1 and 1.

2.4.3. Dimension Reduction of Features

The increase in the number of variables will make the SVM more complicated. In addition, variables may have relevance between each other. Thus, in our study, principal component analysis (PCA), the classic approach to reduce dimensions, was adopted to process the acquired raw features of tongue images so that the information integrity can be maintained as much as possible in the process of dimension reduction.

2.4.4. Optimization of Kernel Parameters for SVM by GA

GA, first proposed by American professor Holland in 1962 [24], is a computational model for optimization with parallel search that simulates genetic mechanism and biological evolution in nature. In the study, the penalty parameter and kernel function parameter were optimized by GA. The accuracy of training sample prediction was considered as the fitness function value of GA. The process of algorithm is shown in Figure 5 [25, 26].

Figure 5: Flow chart of GA-SVM.

2.4.5. Development Platform

The study was performed in MATLAB platform by the toolbox of LIBSVM-FarutoUltimate [27] that adds some auxiliary functions on the basis of LIBSVM [28].

3. Results

3.1. Results of Sample Equalization

In SMOTE, by confirming the frequency of sampling, the samples of both groups were equalized. The result is shown in Table 1.

Table 1: Samples before and after equalization.

Samples
Diabetes group
Nondiabetes group

Original
296
531

Equalized
531
531

3.2. Results of Dimension Reduction of Features

There were 23 input parameters, which include personal information (gender, age, and BIM) and parameters of tongue color and texture. PCA was applied to reduce the dimensions of raw data on the condition that the 95% information was maintained. The result is shown in Figure 6.

Figure 6: Result of PCA.

3.3. Optimized SVM Parameters

In the training process of SVM model, the penalty parameter and kernel function parameter were optimized by GA. With population size set as 20, evolutionary generations as 100, and other parameters of LIBSVM toolbox as the default, the precision of sample tests with 10-fold cross-validation was considered as fitness and the accuracy of cross-validation in the training process grew from 72% or so to 83.06%, which is shown in Figure 7.

Figure 7: Fitness curve of SVM parameters optimized by GA.

3.4. Results of Prediction with GA-SVM Model

We established three GA-SVM classifiers on different datasets which are raw data, normalized data, and normalized data after PCA, respectively. The result shown in Table 2 demonstrates that the classifier on normalize data after PCA yields a better accuracy than other two datasets, which is 1.89% higher than that of raw data at 79.72%.

Table 2: SVM classification before and after data processing.

Datasets
Accuracy of cross-validation (%)
Accuracy of training samples (%)
Accuracy of test samples (%)
Running time (s)

Raw data
81.65
100.00
77.83
817.86

Normalized data
84.35
99.53
78.77
747.40

Normalized data with PCA
83.06
99.88
79.72
465.52

A receiver operating characteristic (ROC) curve is a graphical plot that illustrates the performance of a binary classifiers system. The curve is created by plotting the true positive rate (TPR) against the false positive rate (FPR) at various threshold settings. Sensitivity is also known as TPR, which means the probability that true judgement is made for having diabetes. Specificity is equal to true negative rate, which means the probability that true judgement is made for not having the disease. The area under ROC curve (AUC) is most commonly used as precision index. When the sensitivity and specificity reached 1, the area under ROC curve is obtaining a perfect precision. The best possible prediction method would generate a point on the upper left corner in ROC space, representing 100% sensitivity (no false negatives) and 100% specificity (no false positives) [29].

In this study, we used sensitivity, specificity, ROC, and AUC to assess the performance of classifiers. As shown in Figures 8–10, the ROC curves in three figures are for the classifiers using different datasets. Blue curves represent the ROC curve of the nondiabetic class, while other curves represent the ROC curve of the diabetic class. The AUC values for the classifiers using different datasets are 0.8773, 0.9065, and 0.9037, which indicates that the classifier is effective in distinguishing the two classes of objects. We can know from Table 3 that the performance of third classifier (normalized data with PCA) has higher sensitivity and specificity than that of the first two (raw data and normalized data). Although the AUC of the third classifier is lower than the second by 0.3%, it substantially saves the average training time as shown in Table 2.

Table 3: Specificity, sensitivity, and AUC of SVM classification before and after data processing.

Datasets
Specificity (%)
Sensitivity (%)
AUC

Raw data
81.05
75.21
0.8773

Normalized data
82.80
75.63
0.9065

Normalized data with PCA
83.16
76.92
0.9037

Figure 8: The ROC curve (raw data).

Figure 9: The ROC curve (normalized data).

Figure 10: The ROC curve (normalized data with PCA).

3.5. Comparison with Other Algorithms

In order to evaluate efficacy for established GA-SVM model, three distinct prediction models, -NN, Naive Bayes, and Backpropagation Neural Network (BP-NN), were employed to compare with GA-SVM model. The three classification model using -NN, Naive Bayes, and BP-NN methods are established in MATLAB. As shown in Table 4, accuracy, specificity, and AUC of GA-SVM models are higher than other algorithms, except for sensitivity a little lower than -NN. Combined with the results above, it can be concluded that our algorithm has a better established classification model for tongue manifestation.

Table 4: Result compared with other algorithms.

Algorithms
Accuracy (%)
Specificity (%)
Sensitivity (%)
AUC

-NN
78.77
80.18
77.36
0.8471

Naive Bayes
75.94
78.30
73.58
0.8248

BP-NN
75.00
73.58
76.42
0.8285

GA-SVM
79.72
83.16
76.92
0.9037

4. Discussion

Over the past 3000 years, tongue diagnosis has been proved to be one of the most valuable and the most extensively applied TCM diagnostic approaches in clinical practice. The color, moisture, size, shape, and texture of tongue reveal the overall health condition and dysfunctions of specific organs. Tongue color and coating have long been key parameters in differentiating diseases. In this research, we took photos of tongues with the TDA-1 tongue instrument, which segmented the tongue body and coating. After obtaining color parameters of RGB, HIS, and LAB and texture parameters of CON, ASM, ENT, and MEAN, with these data, a diabetes diagnosis model was established on the basis of SVM.

Sample imbalance is a problem that must be faced in many computational problems in medical research. For unbalanced samples between two groups, SMOTE was adopted to equalize the data. Due to the differences of feature parameters in magnitude orders, to eliminate the negative effects of these differences, the value ranges of input variables were scaled and mapped into the range between −1 and 1. After processing, the accuracy of test samples was slightly increased from 77.83% to 78.77%, and the AUC was increased from 0.8773 to 0.9065.

In addition, in the training process of SVM model, the penalty parameter and kernel function parameter in SVM model were optimized by GA. As shown in Figure 7, the accuracy of cross-validation in training process grew from 72% or so to 83.06%, indicating the significance of parameter optimization in improving the precision of classification.

To handle multiple input variables, PCA was adopted to decrease the number of variables from 29 to 8 on the condition that 95% information was retained. The results show the accuracy of classification was not reduced and it substantially saved the training time.

With standardized tongue image parameters, we developed a novel model to search the optimal values of SVM parameters, to increase the accuracy of prediction. In order to evaluate efficacy for the established GA-SVM model, -NN, Naive Bayes, and BP-NN model were applied to our datasets. From Table 4, the results show that the GA-SVM model performs the best, implying that the hybrid system has a high potential to dramatically increase the predictive accuracy when integrating GA with traditional SVM model. As shown in Figure 7, the accuracy of cross-validation in training process has greatly increased after SVM parameters optimized by GA. The diabetes is of varied TCM syndromes for its clinical manifestations, such as the deficiency of qi and yin syndrome, yin-deficiency and fire-hyperactivity syndrome, and different syndromes manifest with different tongue image features. However it is difficult for the traditional statistical methods to identify the diabetes through its tongue image automatically, so it is essential to find a method which is suitable for the diagnosis of diabetes via its tongue images. By comparison with other algorithms and internal validation of the model, it is indicated that the SVM classification model we established had a fair effect in this study.

5. Conclusion

In this paper, with tongue images, SVM was used to establish the classification model for diabetes, which achieves good classification results. It indicates the feasibility of using the information science method to carry out TCM diagnosis. Data preprocessing and parameter optimization directly impact the results. Feature dimension reduction is a double-edged sword. On the one hand, it can accelerate the training speed and avoid overfitting; on the other hand, it may cause the loss of useful information. GA can find the optimal option without going through the whole search space and can also be used for feature selection in other studies.

With information collecting and analyzing techniques, this interdisciplinary study researches on the informatization of TCM and its application and provides a reference for designing more effective data analysis and processing algorithms. In future researches, other pieces of TCM diagnostic information can be integrated to improve the precision of classification.

Competing Interests

The authors declare that there are no competing interests regarding the publication of this paper.

Acknowledgments

This work is partially supported by the National Natural Science Foundation of China (no. 81373556), National Science and Technology Support Program during the Twelfth Five-Year Plan Period (no. 2012BAI37B06), “Shu Guang” Project Supported by Shanghai Municipal Education Commission and Shanghai Education Development Foundation (no. 12SG36), and Basic Subject Innovation Fund Supported by Shanghai Municipal Education Commission (no. A2-P1600317).

References

X. Zhao, Z. Zhen, J. Guo et al., “Assessment of the reporting quality of placebo-controlled randomized trials on the treatment of Type 2 diabetes with traditional Chinese medicine in mainland China: a PRISMA-compliant systematic review,” Medicine, vol. 95, no. 3, Article ID e2522, 9 pages, 2016.

R. Kanawong, T. Obafemi-Ajayi, T. Ma, D. Xu, S. Li, and Y. Duan, “Automated tongue feature extraction for ZHENG classification in Traditional Chinese Medicine,” Evidence-based Complementary and Alternative Medicine, vol. 2012, Article ID 912852, 14 pages, 2012.

J. Xu, J. T. Xu, Y. H. Zhu et al., “Exploration on correlation between glycometabolism and digital tongue picture in diabetic patients,” Shanghai Journal of Traditional Chinese Medicine, vol. 48, no. 11, pp. 11–17, 2014.

H. He, S. Yan, L. Yang et al., “Correlation of tongue and laboratory parameters in 5930 cases of type 2 diabetes,” Journal of Traditional Chinese Medicine, vol. 54, no. 23, pp. 2031–2034, 2013.

P.-C. Hsu, Y.-C. Huang, J. Y. Chiang, H.-H. Chang, P.-Y. Liao, and L.-C. Lo, “The association between arterial stiffness and tongue manifestations of blood stasis in patients with type 2 diabetes,” BMC Complementary and Alternative Medicine, vol. 16, no. 1, article 324, 7 pages, 2016.

J. Ning, D. Zhang, C. Wu, and F. Yue, “Automatic tongue image segmentation based on gradient vector flow and region merging,” Neural Computing and Applications, vol. 21, no. 8, pp. 1819–1826, 2012.

M. Zhu, J. Du, and C. Ding, “A comparative study of contemporary color tongue image extraction methods based on HSI,” International Journal of Biomedical Imaging, vol. 2014, Article ID 534507, 2014.

N. D. Kamarudin, C. Y. Ooi, T. Kawanabe, and X. Mi, “Tongue's substance and coating recognition analysis using HSV color threshold in tongue diagnosis,” in SPIE Proceedings of the 1st International Workshop on Pattern Recognition, Tokyo, Japan, May 2016.

R. Kanawong, T. Obafemi-Ajayi, J. Yu, D. Xu, S. Li, and Y. Duan, “ZHENG classification in Traditional Chinese Medicine based on modified specular-free tongue images,” in Proceedings of the 2012 IEEE International Conference on Bioinformatics and Biomedicine Workshops (BIBMW '12), pp. 288–294, IEEE, Philadelphia, Pa, USA, October 2012.

M.-C. Hu, M.-H. Cheng, and K.-C. Lan, “Color correction parameter estimation on the smartphone and its application to automatic tongue diagnosis,” Journal of Medical Systems, vol. 40, no. 1, article 18, 11 pages, 2016.

C. H. Siu, Y. He, and D. T. C. Thach, “Machine learning for tongue diagnosis,” in 2007 6th International Conference on Information, Communications and Signal Processing, ICICS, sgp, December 2007.

B. Zhang, X. Wang, J. You, and D. Zhang, “Tongue color analysis for medical application,” Evidence-based Complementary and Alternative Medicine, vol. 2013, Article ID 264742, 11 pages, 2013.

B. Huang and N. Li, “Pixel based tongue color analysis,” in Medical Biometrics, vol. 4901 of Lecture Notes in Computer Science, pp. 282–289, Springer, Berlin, Germany, 2007.

L. Zhi, D. Zhang, J.-Q. Yan, Q.-L. Li, and Q.-L. Tang, “Classification of hyperspectral medical tongue images for tongue diagnosis,” Computerized Medical Imaging and Graphics, vol. 31, no. 8, pp. 672–678, 2007.

C. Zhao, G.-Z. Li, C. Wang, and J. Niu, “Advances in patient classification for traditional chinese medicine: a machine learning perspective,” Evidence-based Complementary and Alternative Medicine, vol. 2015, Article ID 376716, 18 pages, 2015.

J. Xu, L. Tu, Z. Zhang, L. Zhang, and C. Zhou, “The region partition of quality and coating for tongue image based on color image segmentation method,” in Proceedings of the IEEE International Symposium on IT in Medicine and Education (ITME '08), pp. 817–821, Xiamen, China, December 2008.

V. N. Vapnik, The nature of statistical learning theory, Springer-Verlag, New York, NY, USA, 1995.

W. Liu, J. Wang, and C. Zhang, “Study of bioelectrical impedance analysis methods for visceral fat estimation using SVM,” Journal of Electronic Measurement And Instrument, vol. 25, no. 7, pp. 648–653, 2011.

World Health Organization, Definition, Diagnosis and Classification of Diabetes Mellitus and its Complications Report of A who Consultation. Part 1 Diagnosis and Classification of Diabetes Mellitus, World Health Organization, Geneva, Switzerland, 1999.

J. T. Xu, Z. F. Zhang, and L. P. Tu, “Miniaturized handheld tongue picture acquisition device,” CN. 201020543888.0, 2010

J. T. Xu, C. L. Zhou, Z. F. Zhang et al., “Computerized analysis and recognition of tongue and its coating color in tongue diagnosis,” Journal of Shanghai University of Traditional Chinese Medicine, vol. 18, no. 3, pp. 43–47, 2004.

J. T. Xu, Y. Sun, Z. F. Zhang et al., “Analysis and discrimination of tongue texture characteristics by difference statistics,” Journal of Shanghai University of Traditional Chinese Medicine, vol. 17, no. 3, pp. 55–58, 2003.

N. V. Chawla, K. W. Bowyer, L. O. Hall, and W. P. Kegelmeyer, “SMOTE: synthetic minority over-sampling technique,” Journal of Artificial Intelligence Research, vol. 16, pp. 321–357, 2002.

J. H. Holland, Adaptation in Natural and Artificial Systems, University of Michigan Press, Ann Arbor, Mich, USA, 1975.

C.-H. Wu, G.-H. Tzeng, Y.-J. Goo, and W.-C. Fang, “A real-valued genetic algorithm to optimize the parameters of support vector machine for predicting bankruptcy,” Expert Systems with Applications, vol. 32, no. 2, pp. 397–408, 2007.

X.-L. Liu, X.-S. Zhao, F. Lu, and W.-B. Sun, “A GA-SVM based model for throwing rate prediction in the open-pit cast blasting,” Journal of the China Coal Society, vol. 37, no. 12, pp. 1999–2005, 2012.

Y. Li, “A toolbox with implements for support vector machines based on libsvm,” Software, 2011, http://www.matlabsky.com

C. C. Chang and C. J. Lin, LIBSVM-a library for support vector machines, Version 3.12, https://www.csie.ntu.edu.tw/~cjlin/libsvm/

J. Jaworek-Korjakowska, “Computer-aided diagnosis of micro-malignant melanoma lesions applying support vector machines,” BioMed Research International, vol. 2016, Article ID 4381972, 8 pages, 2016.