BioMed Research International
Volume 2017 (2017), Article ID 9539385, 1 page
https://doi.org/10.1155/2017/9539385

Retraction

Retracted: Exogenous IL-4-Expressing Bone Marrow Mesenchymal Stem Cells for the Treatment of Autoimmune Sensorineural Hearing Loss in a Guinea Pig Model

BioMed Research International

Received 1 March 2017; Accepted 1 March 2017; Published 13 July 2017

Copyright © 2017 BioMed Research International. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

BioMed Research International has retracted the article titled “Exogenous IL-4-Expressing Bone Marrow Mesenchymal Stem Cells for the Treatment of Autoimmune Sensorineural Hearing Loss in a Guinea Pig Model” [1]. Figures (a) and (b) in this article are identical to Figures (a) and (b) in the published article by Chang-qiang Tan, Xia Gao, Wen-jun Cai, Xiao-yun Qian, Ling Lu, and He Huang, “Experimental Study of Local Inner Ear Gene Therapy for Controlling Autoimmune Sensorineural Hearing Loss,” BioMed Research International, vol. 2014, Article ID 134658, 10 pages, 2014. doi: 10.1155/2014/134658, but they represent different experiments.

References

C.-Q. Tan, X. Gao, L. Guo, and H. Huang, “Exogenous IL-4-expressing bone marrow mesenchymal stem cells for the treatment of autoimmune sensorineural hearing loss in a guinea pig model,” BioMed Research International, vol. 2014, Article ID 856019, 10 pages, 2014.