BioMed Research International
Volume 2018 (2018), Article ID 1435302, 14 pages
https://doi.org/10.1155/2018/1435302

Review Article

Transarterial Radioembolization (TARE) Agents beyond ⁹⁰Y-Microspheres

C. Bouvry,1,2 X. Palard,1,3 J. Edeline,1,4 V. Ardisson,¹ P. Loyer,⁴ E. Garin,1,4 and N. Lepareur1,4

¹Comprehensive Cancer Centre Eugène Marquis, 35042 Rennes, France
²Univ Rennes, CNRS, ISCR (Institut des Sciences Chimiques de Rennes), UMR 6226, 35000 Rennes, France
³Univ Rennes, Inserm, LTSI (Laboratoire Traitement du Signal et de l’Image), UMR_S 1099, 35000 Rennes, France
⁴Univ Rennes, Inra, Inserm, Institut NUMECAN (Nutrition, Métabolismes et Cancer), UMR_A 1341, UMR_S 1241, 35000 Rennes, France

Correspondence should be addressed to N. Lepareur; n.lepareur@rennes.unicancer.fr

Received 5 October 2018; Accepted 19 December 2018; Published 31 December 2018

Academic Editor: Tapas Das

Copyright © 2018 C. Bouvry et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Liver malignancies, either primary tumours (mainly hepatocellular carcinoma and cholangiocarcinoma) or secondary hepatic metastases, are a major cause of death, with an increasing incidence. Among them, hepatocellular carcinoma (HCC) presents with a dark prognosis because of underlying liver diseases and an often late diagnosis. A curative surgical treatment can therefore only be proposed in 20 to 30% of the patients. However, new treatment options for intermediate to advanced stages, such as internal radionuclide therapy, seem particularly attractive. Transarterial radioembolization (TARE), which consists in the use of intra-arterial injection of a radiolabelled embolising agent, has led to very promising results. TARE with ⁹⁰Y-loaded microspheres is now becoming an established procedure to treat liver tumours, with two commercially available products (namely, SIR-Sphere® and TheraSphere®). However, this technology remains expensive and is thus not available everywhere. The aim of this review is to describe TARE alternative technologies currently developed and investigated in clinical trials, with special emphasis on HCC.

1. Introduction

Primary tumours (with hepatocellular carcinoma accounting for 75-80% of them) or secondary hepatic metastases are a major cause of death, with an increasing incidence [1, 2]. Hepatocellular carcinoma (HCC) is the fifth cancer in terms of incidence and the second leading cause of cancer death for men worldwide [3]. The vast majority of cases occurs in Southeast Asia [4], China alone representing half of the worldwide cases and deaths, and an increasing incidence in Europe. The presence of a cirrhosis, associated with various possible etiologies (such as hepatitis viral infections, alcohol, and haemochromatosis), is the primary risk factor. 73.4% of HCC can be attributed to hepatitis infections [5, 6], but the nature of the underlying disease mainly depends on geographical region or ethnic group. For instance, in Asia, 70-80% of all HCCs are attributable to hepatitis B virus (HBV) [4, 7], with the notable exception of Japan, where hepatitis C (HCV) is the main factor [4]. In the Western world, the main causes of HCC are alcoholism and nonalcoholic steatohepatitis (NASH), linked with a dramatic rise in obesity and diabetes occurrence, with also a strong increase in chronic hepatitis C [8, 9].

Despite the large range of treatment options developed over the years [10, 11], HCC prognosis remains dark, with a 5-year survival below 5%. The only really curative treatments are surgery (resection, transplantation) and ablative techniques (radiofrequency, cryotherapy, percutaneous alcohol injection). However, because of the underlying liver diseases (fibrosis, cirrhosis) and an often late diagnosis, a curative treatment can only be proposed in 20 to 30% of cases. Indeed, the presence of multiple foci, intraportal or extrahepatic metastases, and impaired hepatic functions are contraindications for liver transplantation or tumour resection. Additionally, even for such patients, recurrences are still likely to occur (up to 50% recurrence rate at 2 years for resection and, for transplantation, 10% within Milan criteria, but as high as 40% for patients outside Milan criteria) [12]. For nonoperable tumours, various palliative treatments may be proposed depending on the tumour staging. A large range of staging systems have been proposed [9, 13]. Most groups, especially in Europe, currently use the BCLC (Barcelona Clinic Liver Cancer), recommended by the EASL-EORTC (Figure 1). For intermediate stage HCCs, since external radiotherapy is of little use because of the high risk of hepatic toxicity, despite recent improvements in its efficacy and tolerance [14, 15], and systemic chemotherapy has not yet demonstrated effectiveness, with a low level of response without any improvement in survival [16], patients are generally proposed locoregional therapies [17]. For advanced HCCs, targeted treatment with sorafenib, and/or recently authorised regorafenib or other promising kinase inhibitors remains the only possibility [18, 19].

Figure 1: BCLC staging system and therapeutic strategy according to EASL-EORTC guidelines. © European Association for the Study of the Liver; European Organisation for Research and Treatment of Cancer. (Adapted from J Hepatol 2012; 56: 908-43.)

Due to both dual blood supply of the liver from the portal vein and the hepatic artery, and the sinusoidal cytoarchitecture of the liver parenchyma, the invasion of circulating tumour cells for establishing secondary hepatic metastatic foci is greatly favoured. 95% of hepatic malignancies are in fact secondary tumours [2]. So, for instance, liver metastases occur in approximately 50% of patients with colorectal carcinoma (CRC) [20], and in 44% of patients with neuroendocrine tumours (NET) [21]. Depending on volume and number of the metastases and histology of the original tumour, the median survival of patients with liver metastases ranges from 2 to 12 months [22]. To treat these intrahepatic metastases, surgery is considered the gold standard for CRC liver metastases [23] while its use remains controversial for metastases from non-colorectal primary tumours [21]. When surgery is not possible, because of the number of metastases, liver-directed therapies help in prolonging survival [17]. In the case of primary NET liver metastases, peptide-receptor radionuclide therapy (PRRT) with radiolabelled somatostatin analogues seems appealing [24–26].

Taking advantage of this dual blood supply and a rich vasculature, intra-arterially delivered treatments, such as transarterial chemoembolization (TACE) and transarterial radioembolization (TARE), appear as really attractive treatment modalities. TACE, consisting in intra-arterial injection of an emulsion of Lipiodol and a chemotherapeutic drug, followed by the occlusion of the feeding artery, is currently considered as the standard of care for intermediate stage HCCs and some metastases [27], but its effectiveness remains a matter of debate. In this context, the development of a well-tolerated treatment modality appears particularly attractive. TARE, consisting in the intra-arterial delivery of a radioactive material to the tumour, limiting systemic irradiation and preserving the healthy liver to a maximum extent, appears to be a promising alternative to TACE [28–31]. Different materials (Lipiodol, glass, resin, or polymer microspheres) and radioisotopes have been used [32]. Only a few radionuclides have suitable characteristics for the treatment of tumours, among them are ³²P, ⁹⁰Y, ¹³¹I, ¹⁶⁶Ho, ¹⁷⁷Lu, and 186/188Re, all of which are β-emitters (Table 1). ⁹⁰Y-loaded microspheres now have an established role and proved to be safe and effective in treating primary and secondary liver cancers, with favourable toxicity profile, with several tens of prospective or retrospective clinical studies completed or ongoing [15, 33–35]. There are, however, few Phase III studies, and published results are up to now disappointing [36, 37], but mostly because of suboptimal study designs or inadequate patient selection. Moreover, though this treatment modality has gained wide acceptance, it remains very expensive, especially for low-income countries, and is not available everywhere. Though not as common as TARE with ⁹⁰Y-microspheres, TARE alternative methods are under clinical investigation, either in primary or in secondary liver cancers and will be presented here.

Table 1: Radionuclides used for TARE.

Radionuclide
t1/2 (days)
(MeV) ()
(keV) ()
Tissue penetration range (mm)
Production method

³²P
14.3
1.71 (100)
/
7.9
Nuclear reactor

⁹⁰Y
2.7
2.284 (100)
/
12
⁹⁰Sr/⁹⁰Y generator

Nuclear reactor for microspheres labelling

¹³¹I
8
0.81 (90)
0.364 (81)
2
Nuclear reactor

¹⁶⁶Ho
1.1
1.84 (50.5)
81 (6.4)
8.7
Nuclear reactor

¹⁷⁷Lu
6.7
0.497 (79)
113 (6.4)
2.2
Nuclear ractor

208 (11)

¹⁸⁶Re
3.8
1.07 (72)
137 (9)
4.5
Nuclear reactor

¹⁸⁸Re
0.7
2.118 (72)
155 (15)
11
¹⁸⁸W/¹⁸⁸Re generator

Nuclear reactor

Note: t1/2 (days), radioisotope half-life in days; (MeV) (%), maximum particle energy and respective decay abundance shown in parentheses; (KeV) (%), gamma ray energy useful for imaging and respective abundance in total energy emission shown in parentheses; tissue penetration range (mm), maximum tissue penetration shown in millimeters.

2. TARE with Radiolabelled Microspheres

The idea to utilise radiolabelled microspheres to treat tumours, liver being the first organ successfully treated, dates back to the 1960s [38]. First isotopes used were phosphorus-32 ( = 1.71 MeV; t1/2 = 14.3 d, max tissue penetration = 8 mm) and yttrium-90 ( = 2.28 MeV; t1/2 = 64.0 h, max tissue penetration = 12 mm), two pure β-emitters. It then fell out of use, before being revived in the 1980s until present day. There are currently two commercially available ⁹⁰Y-labelled microspheres, based on different technologies [39]. One is based on glass microspheres (TheraSphere®, BTG International Ltd., London, United Kingdom); the other is made of ion-exchange resin (SIR-Sphere®, SIRTEX Medical Limited, North Sidney, New South Wales, Australia). Another TARE device, loaded with holmium-166 ( = 1.84 MeV; t1/2 = 26.8 h, max tissue penetration = 8.7 mm), has been recently made available (QuiremSpheres®, Quirem Medical BV, Utrecht, Netherlands) and is currently the subject of clinical trials in liver metastases. Besides these, numerous types of microspheres with various sizes and labelled with different isotopes have been developed and studied in humans [40].

2.1. Phosphorus-32 Microspheres

Phosphorus-32 was among the first isotopes used for therapeutic purposes, thanks to its suitable properties. In the middle of the 1960s, Caldarola et al. [41] used ³²P-labelled resin microspheres for intra-arterial treatment of tumours. In 1979, Grady used ³²P-CrPO₄ colloids to treat intrahepatic metastases in a pilot study [38]. During the time of follow-up (2 years), 3 out of 4 patients were doing well, without significant side effects. However, with the rise of ⁹⁰Y, ³²P fell out of use [42], except in China where 44 patients with unresectable liver cancer were treated with moderate results with ³²P-glass microspheres [43] and in Iran where 39 patients suffering from primary or secondary liver cancer were recently treated with intra-arterial injection of ³²P-CrPO₄ colloids [44]. This study was, however, based on imaging parameters and no result on the outcome of the patients is given.

2.2. Holmium-166 Microspheres

Compared with ⁹⁰Y, ¹⁶⁶Ho has the advantage of possessing a γ emission (81 keV) suitable for SPECT imaging. Moreover, holmium is highly paramagnetic, thus enabling MRI imaging and quantification [45, 46]. It has a 26.8 h half-life, resulting in a high dose-rate, and can be produced pure upon neutron bombardment, since natural holmium-165 has a 100% abundance and a large cross section [47]. ¹⁶⁶Ho-loaded microspheres have been prepared using synthetic polymers [48], natural polymers [49], phosphate [50], resin [51], or glass [52].

2.2.1. Glass Microspheres

Glass is relatively resistant to radiation damage and nontoxic. Glass microspheres can easily be spheroidized in uniform sizes and can generally be produced with minimal radionuclidic impurities [53]. Holmium doped (Ho₂O₃) aluminium silicate glasses were “melted in an alumina crucible at 1600°C in a crucible type electric furnace. The liquid was held at this temperature for 2 hours and stirred each 30 min by using a silica rod to assure the liquid homogenization and gas release”. Brown et al. [54] prepared ¹⁶⁶Ho-loaded glass particles with a small size of 2-5 μm for direct injection into mammary carcinoma tumours in mice, which led to an effective deposition of intense β-radiation. It could therefore be an effective modality for use in localised internal radionuclide therapy. Yet, no further studies were reported. In 2009, Costa et al. reported the preparation of 20-50 μm diameter glass particles (considered to be the ideal particle size to reach the arterioles of the liver), loaded with a specific activity up to 224 GBq/g of microsphere, suitable for therapeutic applications [52]. Their reported microspheres however contained more than 20% of ¹⁷⁷Lu, because of the presence of lutetium oxide in the initial material.

2.2.2. Resin Microspheres

Compared with glass microspheres, ion-exchange resin-based microspheres present with the advantage of a lower density and commercial availability. Schubiger investigated different resins with ⁹⁰Y and found that Bio-Rex 70 (Bio-Rad Inc, Hercules CA, USA) was the most suitable one [55]. Bio-Rex resin is made from acrylic polymer, with carboxylic groups used to bind the radiometal. Subramanian et al. recently investigated the feasibility of using Bio-Rex 70 with ¹⁶⁶Ho [56]. ¹⁶⁶Ho-labeled microspheres were obtained in high-yield (94.53% at pH 8.5), demonstrated high in vivo stability and showed very good retention in the liver (94.94 ± 1.51% at 72 h pi.). Besides Bio-Rex resins, Aminex resins (Bio-Rad Inc, Hercules CA, USA) were also explored. Aminex A-5, based on styrene divinylbenzene copolymer with sulphonic acid functional groups, was used [51]. Biodistribution in pigs demonstrated a reproducible fixation in the liver and dosimetry study, based on SPECT, allowed determining the required radiation absorbed dose to the liver to be 25 Gy to reach a therapeutic activity.

2.2.3. Polymer Microspheres

Polymer-based microspheres present with the advantage of near-plasma density, biodegradability, and biocompatibility [48]. However, this material is not able to withstand high thermal neutron fluxes [57, 58]. To circumvent this problem, microspheres can be loaded with holmium after neutron irradiation, like Suzuki et al. with chitosan microspheres [59] or Zielhuis et al. with alginate microspheres [49]. An alternative is to use additives and to select carefully the irradiation parameters (like avoiding any traces of water, < 1h irradiation in a high-flux reactor) [47, 60]. Another important parameter is the stability of the holmium-166 inside the polymer matrix. Mumper et al. showed that β-diketone chelates and particularly acetylacetonate (AcAc) formed strong complexes with holmium and that it moreover had a strong melting point amenable to withstand the heat inside the reactor without melting [61]. He thus developed poly-(L-lactic acid) (PLA or sometimes PLLA) microspheres for the prospective treatment of liver tumours, prepared by a simple solvent evaporation technique [62]. This method was soon used and furthered by a team from Utrecht [60]. Briefly, [¹⁶⁵Ho]-AcAc complex and PLA are dissolved in chloroform, a volatile and water immiscible solvent, and subsequently added to polyvinyl alcohol aqueous solution. The resulting solution is emulsified by stirring, thus forming small organic droplets until the organic solvent evaporates. As chloroform evaporates, the droplets harden, forming microspheres, which can be collected through filtration. Microsphere size can be tuned through speed of stirring. The resulting microspheres, after drying, are then irradiated into a nuclear reactor to yield the desired ¹⁶⁶Ho-loaded microspheres. Chloroform is a toxic solvent and should be avoided in patients. It has however been demonstrated that irradiation resulted in the complete removal of chloroform from the microspheres [63]. Holmium-loaded PLA-microspheres produced by this method (Figure 2) have been extensively characterised [47, 58, 64, 65] and are now produced under Good Manufacturing Practices [66]. Biodistribution studies demonstrated an effective tumour targeting in rats, with a 6.1 ± 2.9 tumour-to-liver ratio at one day after administration [67]. Animal studies have also established a low toxicity profile in rats followed up to 18 months, with only slight chronic inflammation, and no release of holmium load, as assessed with MRI [68]. They also demonstrated that correct administration of the microspheres was a critical step [69] and that it was feasible to quantify the dose through MR imaging [70, 71] and to predict dosimetry with the use of a scout dose of ¹⁶⁶Ho-PLLA-microspheres [72].

Figure 2: Scanning-electron microscope image of Holmium-PLA microspheres (from [73]).

A phase I trial for the treatment of unresectable, chemorefractory, liver metastases was consequently initiated [73]. 15 patients were treated with escalating aimed whole-liver absorbed doses of 20, 40, 60, and 80 Gy. At 6 weeks, treatment response was 1 partial response (PR), 7 stabilised disease (SD), and 7 disease progression (DP). At 12 weeks, treatment response was 1 PR, 1 SD, and 13 DP. The only PR was obtained for a patient treated with 20 Gy to the liver. Results from this trial showed “¹⁶⁶Ho-radioembolization is feasible and safe for the treatment of patients with liver metastases” and enables image-guided treatment [74]. Maximum tolerated dose was determined to be 60 Gy. MRI and SPECT-based dosimetry were compared and found to be equivalent, with overall T/N ratios ranging from 0.9 to 2.7 with SPECT and 1.1 to 3.1 with MRI [75]. Use of a scout dose ¹⁶⁶Ho-microspheres to assess lung shunting and predict dosimetry was demonstrated to be more accurate than Tc-MAA imaging [76] and proven to be safe, as possible extrahepatic deposition of the microspheres was estimated to have a low incidence of 1.3% [77]. Based on these promising results, a phase II study was launched, with a fixed aimed whole-liver dose of 60 Gy (or 3.8 GBq/kg of liver tissue, including the scout dose), in patients with liver metastases refractory to systemic therapy and ineligible for surgical resection (38 patients were included, one of whom was not evaluable). Besides ¹⁶⁶Ho-scout dose to calculate dosimetry, a scout dose of Tc-MAA was administered to assess the lung shunts prior to treatment. In the recently published results [78], the target lesions showed complete response, partial response, or stabilised disease at 3 months for 27 patients (95% confidence interval [CI], 57% – 85%). The median overall survival was 14.5 months (95% CI, 8.6 – 22.8 months). The toxicity profile was acceptable. Compared to ⁹⁰Y-microspheres TARE, the presence of γ-emission does increase radiation exposure to some extent, but only patients treated with more than 7 GBq of ¹⁶⁶Ho and released within 6 h after treatment (instead of 24 h) would require contact restrictions. In all other cases, patients can be released without contact restrictions [79]. This study thus demonstrated clinical efficacy and further studies should be undergone. Another clinical study is currently ongoing, comparing a newly developed anti-reflux catheter to standard microcatheter for radioembolization of patients with liver-dominant colorectal metastases [80].

In parallel to the development of ¹⁶⁶Ho-PLLA-microspheres for liver metastases, ¹⁶⁶Ho-chitosan microspheres were investigated for HCC treatment [59]. Chitosan is a chitin derivative which can chelate metals and solidifies at alkaline pH. A phase IIb trial evaluated percutaneous injection of this device in 40 patients with small HCC [81], while another phase II trial investigated transarterial injection in 54 patients with a single large HCC [82]. Both studies reported good results, with survival rates at 1, 2, and 3 years of 87.2%, 71.8%, and 65.3%, respectively, in the first study and tumour necrosis achieved in 77.5% of patients with HCC < 3cm and 91.7% of patients with HCC < 2 cm. In the second study, where tumour size ranged from 3 to 13 cm, response rate was 78%, with 31 patients having a complete response for a 27-month median duration. Two treatment-related deaths were reported. Authors nonetheless found the toxicity to be acceptable, but patients should be carefully selected. When categorising patients according to their tumour size, it was found that patients with tumours of an intermediate size (3–5 cm) were the optimal candidates for this treatment. Phases III trials are therefore justified.

2.3. Rhenium-188 Microspheres

Rhenium-188 ( = 2.12 MeV; Eγ = 155 keV (15%); t1/2 = 16.9 h, max tissue penetration = 11 mm), available through a ¹⁸⁸W/¹⁸⁸Re generator, offers cost-effective convenient on-site availability, short half-life, energetic β-particle, and emission of γ-photons suitable for imaging [83, 84]. It is thus a promising isotope for radionuclide therapy, especially treatment of liver malignancies. Various particle materials have been considered for ¹⁸⁸Re-microspheres preparation [85], but, so far, only albumin microspheres have been investigated in human.

2.3.1. Glass Microspheres

Chemically durable yttrium alumino–silicate (YAS) microspheres, incorporating more than 50 wt% of rhenium oxide (ReO₂), have been prepared and neutron-irradiated in high-flux nuclear reactor [86]. These microspheres were investigated in hepatoma bearing rats, following intra-arterial injection, where they proved to be safe and effective in diminishing tumour growth [87]. However, low-cost and highly available natural rhenium consists of two neutron activatable radioisotopes (¹⁸⁵Re and ¹⁸⁷Re, both having large cross-sections for neutrons, yielding therapeutic amounts within a few h), thus producing a mixture of ¹⁸⁶Re and ¹⁸⁸Re, both β- and γ-emitting radionuclides, with different energies and different half-lives (cf. Table 1). The major disadvantage is that dosimetric calculations are complicated because of the two radioisotopes that must be considered. The alternative would be to use enriched ¹⁸⁷Re, but at a much higher cost.

2.3.2. Resin Microspheres

There is only one example in the literature of resin-based microspheres loaded with ¹⁸⁸Re [88]. Aminex A-27 resin (Bio-Rad Inc, Hercules CA, USA) was labelled by “adding [¹⁸⁸Re]-perrhenate and SnCl₂ to vacuum-dried resin particles. The mixture was boiled and centrifuged and microspheres were separated and resuspended in saline”. They were tested in hepatoma-bearing rats by direct intra-tumoural injection. “Survival over 60 days was significantly better in the treated versus control group (80% versus 27%)”. The same team compared this method with percutaneous ethanol injection in VX2 rabbit model [89]. Mean survival was 38.8 ± 6.2 days for the control group (rabbits treated with saline injection), 55.8 ± 11.8 days for the percutaneous ethanol injection group, and 68 ± 9.8 days for the rabbits treated with ¹⁸⁸Re-microspheres. They thus concluded intra-tumoural injection of ¹⁸⁸Re-microspheres could be an alternative to percutaneous ethanol injection and to intra-arterial injection.

2.3.3. Polymer Microspheres

Diverse natural and synthetic polymers have been tested to prepare ¹⁸⁸Re-microspheres [85]. Poly(L-lactic acid) was mixed with jet-milled rhenium powder and the microspheres were prepared with the solvent evaporation similar to the method described above with holmium. 22 μm microspheres were neutron-activated for 3 h to give ¹⁸⁸Re-PLA-microspheres [90]. Unfortunately, these biodegradable microspheres were damaged by the high neutron fluxes needed to achieve sufficiently high specific activity required for the treatment of liver tumours. This strategy was therefore abandoned. An alternative way to load PLA microspheres is to encapsulate a ¹⁸⁸Re-labelled chelate inside the polymeric microspheres. Shukla et al. [91] encapsulated ¹⁸⁸Re-DMSA, with a low 20-30% yield, while Yu et al. [92] derivatised PLA with a poly(histidine) tag to attach the [¹⁸⁸Re(CO)₃(H₂O)₃]⁺ complex directly onto the polymer chains. They thus reported a radiolabelling efficiency of 92%. Recently, encapsulation of ¹⁸⁸Re-sulfur colloids in PLA microspheres by an oil in‐water (O/W) emulsion solvent extraction procedure was reported [93]. The 13-48 μm particles were labelled with over 99% efficiency and were injected intravenously into mice, showing high lung uptake. ¹⁸⁸Re-colloids were also encapsulated in poly(L-lactide-co-glycolide) (PLGA) microparticles, along with doxorubicin, and used for transarterial chemoradioembolization in F344 rats [94]. ¹⁸⁸Re/DOX@MS showed stronger tumour inhibition than ¹⁸⁸Re@MS and DOX@MS alone.

Biodegradable starch microspheres have been proposed as an embolization agent to protect healthy liver tissue during TARE with ⁹⁰Y-microspheres [95]. Verger et al. [96] proposed to chemically modify starch so that it could chelate ¹⁸⁸Re and developed a cold-kit labelling method to prepare ¹⁸⁸Re-starch-based microspheres with > 95% labelling yield. When injected in DENA-induced rats, the activity was essentially located in the tumorous parts of the liver. In the same way, human serum albumin (HSA) labelled with technetium-99m has been used for years for lung perfusion imaging, and Tc-labelled macroaggregates of albumin (MAA) are the current method of choice to assess lung shunts and predict ⁹⁰Y-microspheres dosimetry [97]. In 2000, Wunderlich et al. proposed to label HSA with ¹⁸⁸Re [98]. They found that HSA B20 (ROTOP Pharmaka GmbH, Dresden, Germany) gave uniform microparticles with a mean 25 μm diameter and were easily and stably labelled with generator-produced ¹⁸⁸ReO₄Na in the presence of tin chloride and HSA. They also demonstrated high in vivo stability, with a preferential lung uptake when injected intravenously in rats. A cold kit method was subsequently developed [99]. The proposed kit, consisting of three vials, enabled an almost quantitative labelling yield and minimum handling. The preparation was recently further optimised by Chen et al., using microwave heating, thus shortening the reaction time from 1 h to 3 min [100]. Tumour volume in the normal saline treated group was 1803.2 mm³ at 54 days after tumour inoculation, while tumour volumes in the 103.6 MBq and 240.5 MBq of ¹⁸⁸Re-HSA microspheres treated groups were 381 and 267.4 mm³ (P = 0.001 and 0.004), respectively, demonstrating the high therapeutic efficacy of this modality.

¹⁸⁸Re-HSA microspheres have been investigated in a feasibility study in 10 patients with HCC (3) or colorectal liver metastases (7) [101]. Patients were given0 13.6 ± 4.7 GBq of ¹⁸⁸Re-microspheres selectively in the feeding artery of the tumour. The urinary excretion rate was low (8.9 ± 3.8%IA within 96 h). Response was assessed on CT: 2 patients had PR, 5 patients had SD, and 3 patients had DP. The treatment was well tolerated, with an acceptable rate of toxicity (30% of grades I and II, and 10% of grade III toxicity), which was reversible in most patients within 14 days after treatment. This treatment could thus represent a therapeutic option in these patients, but it is not possible to draw any firm conclusions, because of the small size and heterogeneity of the patient group. A larger patient cohort is necessary. A second study using ¹⁸⁸Re-HSA microspheres was described by Nowicki et al. [102]. This study included 13 patients with progressive primary or secondary liver tumours. They received 3.8–12.4 GBq. The urinary excretion rate was low (6.5 ± 2.3%IA within 48 h). Mean overall survival was 7.1 months, and progression free survival was 5.1 months. Treatment adverse events were at an acceptable level, with 4 patients having grade 3 toxicity, mostly due to cancer progression. This study confirms the results of the first study and ¹⁸⁸Re-HSA microspheres deserve to be further investigated.

3. TARE with radiolabelled Lipiodol

The most used vector for intrahepatic administration is Lipiodol. Lipiodol is an ethyl ester of iodinated fatty acids derived from poppy seeds with a proportion of iodine of approximately 38% by weight (i.e., 475 mg/mL). This iodised oil was discovered in 1901 by Guerbet and is the first organic iodinated contrast agent used for X-ray, in lymphography. Nakakuma et al. have shown that Lipiodol is selectively captured by hepatoma and by certain hepatic metastases, of colonic, neuroendocrine and mammary origin [103]. Lipiodol has therefore been used for the detection of HCC, then also for vectorising chemotherapeutic substances. Intratumour retention time has also been shown to be significantly greater than retention time in healthy liver, with retention in tumour cells up to several months [104]. Replacement of cold iodine with iodine-131, by an exchange reaction on Lipiodol [105], makes it possible to obtain radiolabelled Lipiodol, ¹³¹I-Lipiodol, which was successfully used for the treatment of nonoperable HCC [106, 107]. Still, Iodine-131 possesses a high energy gamma emission and long half-life ( = 0.81 MeV; Eγ = 364 keV (81%); t1/2 = 8.02 d) requiring hospitalisation in a radioprotected room for several days, thus limiting its potential. Other therapeutic nuclides, such as Yttrium-90 [108] and Rhenium-188 [109], have been proposed to advantageously replace it. Radiolabelling and clinical application of Lipiodol with Rhenium-188 have been extensively reviewed elsewhere [110].

3.1. Lipiodol Radiolabelling

Initial trials to covalently label Lipiodol with ¹⁸⁸Re and ⁹⁰Y revealed unsuccessful [111–113]. Solubilisation of a lipophilic radiocomplex into Lipiodol was suggested as more suitable [114]. Several such ¹⁸⁸Re-labelled complexes [115–127] were subsequently proposed (Figures 3 and 4).

Figure 3: Ligands investigated with radiometals (¹⁸⁸Re and ⁹⁰Y/¹⁶⁶Ho/¹⁷⁷Lu) for Lipiodol labelling.

Figure 4: ¹⁸⁸Re-chelates used to label Lipiodol and evaluated in human.

Lipiodol was also labelled with lipophilic chelates of yttrium-90 and radiolanthanides, although literature is scarce compared with rhenium-188. Oxine (8-hydroxyquinoline) forms a lipid-soluble complex with trivalent metals and has been used since the 1970s with indium-111 to label leukocytes [128]. Based on this, it has been proposed to label Lipiodol with yttrium-90 [129], holmium-166 [130], and lutetium-177 [131]. The procedure was however rather time-consuming and the resulting complex lacked sufficient stability, leading to undesirable bone uptake. Using the same analogy with ¹¹¹In-labelled leukocytes, ⁹⁰Y-tropolonate has been investigated to label Lipiodol [132]. The radiotracer showed increased stability compared to oxinate and high tumour uptake, but its stability was not satisfactory enough. Other compounds mentioned in the literature include dithiocarbamate/phenanthroline ⁹⁰Y-complex [133] and di(2-ethylhexyl) orthophosphoric acid (P204), initially developed for solvent extraction of metals [134], with no biological data. Ligands used are summarised in Figure 3.

Since handling of high activities of beta-emitting therapeutic radionuclides can lead to a high radiation burden to the staff performing the preparations [135, 136], remote-controlled procedures were developed [137–139]. This led to a significant reduction of the received dose [140], in addition to a more GMP-compliant preparation.

3.2. Clinical Outcome

¹³¹I-labelled Lipiodol (Lipiocis®) dates back to the 1980s [141, 142]. Since then, many feasibility studies and a few Phase III trials have been carried out, essentially for the management of inoperable HCCs [107, 110, 143]. Three small randomised controlled trials were carried out for the palliative treatment of HCC with portal vein thrombosis (PVT) and without PVT, and adjuvant treatment after surgery, with respectively 129, 27, and 43 patients. Despite encouraging results, because of the suboptimal properties of ¹³¹I and a more than expected lung toxicity [144], Lipiocis® is not commercially available anymore in Europe. In-house labelled ¹³¹I-Lipiodol is however still under use in some countries, like for instance India [139]. To date, besides ¹³¹I-Lipiodol, only ¹⁸⁸Re-labelled Lipiodol has been assessed in human. No ⁹⁰Y- or radiolanthanide-labelled Lipiodol has been thus far investigated in clinics. Four ¹⁸⁸Re-chelates have been evaluated to prepare clinical ¹⁸⁸Re-labelled Lipiodol [110], i.e., ¹⁸⁸Re-TDD [115], ¹⁸⁸Re-HDD (now rebadged HTDD) [117], ¹⁸⁸ReN-DEDC [125], and ¹⁸⁸Re-SSS [126] (Figure 4). Except one nonconclusive case report with ¹⁸⁸Re-TDD/Lipiodol [145], and two dose-escalation studies with ¹⁸⁸ReN-DEDC/Lipiodol [125] and ¹⁸⁸Re-SSS/Lipiodol [146], which both demonstrated promising preliminary outcomes, most clinical studies were carried out with ¹⁸⁸Re-HDD/Lipiodol [147–158]. Despite high urinary excretion [150] and difficulties to obtain high activities because of low labelling yields [118], ¹⁸⁸Re-HDD/Lipiodol demonstrated favourable responses and appeared to be well tolerated in dose escalation trials [148, 149], and in various feasibility studies in more advanced forms of the disease [151, 152], as well as in second-line therapy after relapse following a curative treatment [153, 154].

Following these encouraging results, an international IAEA-sponsored multicentric Phase II trial was launched [156–158]. 185 patients were included, receiving 1 to 4 treatment doses, with activities ranging from 0.78 to 13.45 GBq. The outcome of this study was 25% objective response (with 3% CR), 53% stabilised disease and 22% tumour progression, with a median follow-up of 455 days. One- and two-year survivals were, respectively, 46 and 23%. Tolerance was good. In view of these results, a larger randomised Phase III study appears to be required.

3.2.1. Other Therapeutic Applications

Lipiocis® had received marketing authorisation for the treatment of HCC with PVT. ¹³¹I-Lipiodol was however also investigated in other indications, such as in adjuvant and neoadjuvant settings, where it, respectively, led to an increase in overall and disease-free survivals [159] and to a decreased risk of recurrence before transplantation or resection [160, 161]. To date, only one preliminary study (with 5 patients) used ¹⁸⁸Re-Lipiodol to stabilise patients awaiting liver transplantation, demonstrating its feasibility [162]. The advantage of ¹⁸⁸Re-Lipiodol, compared to ¹³¹I-Lipiodol, is the shorter half-life of ¹⁸⁸Re, making patients eligible for transplantation after 1 week, while they had to wait for 4 weeks when treated with ¹³¹I-Lipiodol. More patients are needed to be able to conclude on its potential use in this indication.

Besides HCC, liver can be home to other primary and secondary tumours, for which TACE with Lipiodol has shown its efficiency and tolerability [163, 164]. Limited studies using TARE with ¹³¹I-lipiodol have been published though. Contradictory results have been obtained in pilot studies with cholangiocarcinoma (CCA) [165, 166] and TARE is thus not recommended [167], while treatment of hepatic metastases could prove to be valuable [168, 169]. It would therefore be interesting to assess the potential interest of ¹⁸⁸Re-Lipiodol in these indications, for which radiolabelled microspheres (with either ⁹⁰Y, ¹⁶⁶Ho, or ¹⁸⁸Re) have proven their safety and efficacy.

4. Conclusions

Research on treatments for primary or secondary liver tumours has been particularly active, at the preclinical and clinical levels, following the successful introduction of ⁹⁰Y-microspheres in the therapeutic armamentarium. Among the many methods to be investigated, ¹⁸⁸Re-Lipiodol appears as a relatively economical, safe, and attractive alternative to ⁹⁰Y-microspheres for the treatment of HCC. ¹⁶⁶Ho-microspheres also look particularly appealing, thanks to the multimodal properties of holmium-166, and initial clinical findings, especially for liver metastases. Large randomised Phase III trials now need to take place, to confirm these encouraging Phase I/II results. In order to be able to define the place of TARE in treatment decision plans, comparisons with other existing treatment modalities, notably targeted therapies and newly developed immunotherapies, must be undertaken. It is most probable that future treatment strategies may rely on the combination with one or another of these therapies. Ultimately, choice of the TARE modality will be made based on local expertise and availability. Besides, many aspects of TARE still remain a challenge, such as optimisation of specific activity, determination of embolic distribution, microdosimetry, and personalised dosimetry (pre- and post-injection), as well as predictive response factors, requiring further clinical and preclinical studies.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Acknowledgments

This work was supported in part by Labex IRON [Grant no. ANR-11-LABX-0018].

References

W. T. London and K. A. McGlynn, “Liver cancer,” in Cancer Epidemiology and Prevention, D. Schottenfeld and J. Fraumeni, Eds., pp. 763–786, Oxford University Press, New York, NY, USA, 3rd edition, 2006.

I. Ahmed and D. N. Lobo, “Malignant tumours of the liver,” Surgery (Oxford), vol. 27, no. 1, pp. 30–37, 2009.

L. A. Torre, F. Bray, R. L. Siegel, J. Ferlay, and J. Lortet-Tieulent, “Global cancer statistics, 2012,” CA: A Cancer Journal for Clinicians, vol. 65, no. 2, pp. 87–108, 2015.

R. X. Zhu, W.-K. Seto, C.-L. Lai, and M.-F. Yuen, “Epidemiology of hepatocellular carcinoma in the Asia-Pacific region,” Gut and Liver, vol. 10, no. 3, pp. 332–339, 2016.

M. Plummer, C. de Martel, J. Vignat, J. Ferlay, F. Bray, and S. Franceschi, “Global burden of cancers attributable to infections in 2012: a synthetic analysis,” The Lancet Global Health, vol. 4, no. 9, pp. e609–e616, 2016.

C. de Martel, D. Maucort-Boulch, M. Plummer, and S. Franceschi, “World-wide relative contribution of hepatitis B and C viruses in hepatocellular carcinoma,” Hepatology, vol. 62, no. 4, pp. 1190–1200, 2015.

G. S. Bhattacharyya, K. Govind Babu, H. Malhotra, A. A. Ranade, S. Murshed, and D. Datta, “Hepatocellular carcinoma in India,” Chinese Clinical Oncology, vol. 2, no. 4, 2013.

G. Baffy, E. M. Brunt, and S. H. Caldwell, “Hepatocellular carcinoma in non-alcoholic fatty liver disease: an emerging menace,” Journal of Hepatology, vol. 56, no. 6, pp. 1384–1391, 2012.

G. Bertino, S. Demma, A. Ardiri et al., “Hepatocellular carcinoma: Novel molecular targets in carcinogenesis for future therapies,” BioMed Research International, vol. 2014, 2014.

N. Goutté, P. Sogni, N. Bendersky, J. C. Barbare, B. Falissard, and O. Farges, “Geographical variations in incidence, management and survival of hepatocellular carcinoma in a Western country,” Journal of Hepatology, vol. 66, no. 3, pp. 537–544, 2017.

M. Schwartz, S. Roayaie, and M. Konstadoulakis, “Strategies for the management of hepatocellular carcinoma,” Nature Clinical Practice Oncology, vol. 4, no. 7, pp. 424–432, 2007.

M. B. Thomas and A. X. Zhu, “Hepatocellular carcinoma: The need for progress,” Journal of Clinical Oncology, vol. 23, no. 13, pp. 2892–2899, 2005.

S. Subramanian, R. K. Kelly, and A. P. Venook, “A review of hepatocellular carcinoma (HCC) staging systems,” Chinese Clinical Oncology, vol. 2, no. 4, pp. 33–44, 2013.

F. K. Keane, J. Y. Wo, A. X. Zhu, and T. S. Hong, “Liver-Directed Radiotherapy for Hepatocellular Carcinoma,” Liver Cancer, vol. 5, no. 3, pp. 198–209, 2016.

R. Gallicchio, A. Nardelli, P. Mainenti et al., “Therapeutic strategies in HCC: Radiation modalities,” BioMed Research International, vol. 2016, 2016.

M. A. Wörns, A. Weinmann, M. Schuchmann, and P. R. Galle, “Systemic therapies in hepatocellular carcinoma,” Digestive Diseases, vol. 27, no. 2, pp. 175–188, 2009.

C. A. Arciero and E. R. Sigurdson, “Liver-directed therapies for patients with primary liver cancer and hepatic metastases,” Current Treatment Options in Oncology, vol. 7, no. 5, pp. 399–409, 2006.

S. Medavaram and Y. Zhang, “Emerging therapies in advanced hepatocellular carcinoma,” Experimental Hematology and Oncology, vol. 7, no. 77, 2018.

J. Raoul, M. Kudo, R. S. Finn, J. Edeline, M. Reig, and P. R. Galle, “Systemic therapy for intermediate and advanced hepatocellular carcinoma: Sorafenib and beyond,” Cancer Treatment Reviews, vol. 68, pp. 16–24, 2018.

M. Ronot, A. K. Clift, V. Vilgrain, and A. Frilling, “Functional imaging in liver tumours,” Journal of Hepatology, vol. 65, no. 5, pp. 1017–1030, 2016.

A. J. Page, M. J. Weiss, and T. M. Pawlik, “Surgical management of noncolorectal cancer liver metastases,” Cancer, vol. 120, no. 20, pp. 3111–3121, 2014.

R. Fernandez, S. G. Pappas, and D. J. Bentrem, “Clinical Features of Metastatic Hepatic Malignancies,” Cancer Treatment and Research, vol. 168, pp. 185–202, 2016.

M. G. Zampino, E. Magni, P. S. Ravenda et al., “Treatments for colorectal liver metastases: A new focus on a familiar concept,” Critical Review in Oncology/Hematology, vol. 108, pp. 154–163, 2016.

A. Filice, A. Fraternali, A. Frasoldati et al., “Radiolabeled somatostatin analogues therapy in advanced neuroendocrine tumors: A single centre experience,” Journal of Oncology, 2012.

S. P. Thang, M. S. Lung, G. Kong et al., “Peptide receptor radionuclide therapy (PRRT) in European Neuroendocrine Tumour Society (ENETS) grade 3 (G3) neuroendocrine neoplasia (NEN) - a single-institution retrospective analysis,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 45, no. 2, pp. 262–277, 2018.

K. I. Alexandraki, A. Karapanagioti, I. Karoumpalis, G. Boutzios, and G. A. Kaltsas, “Advances and Current Concepts in the Medical Management of Gastroenteropancreatic Neuroendocrine Neoplasms,” BioMed Research International, vol. 2017, 2017.

P. Giunchedi, M. Maestri, E. Gavini, P. Dionigi, and G. Rassu, “Transarterial chemoembolization of hepatocellular carcinoma-agents and drugs: An overview. Part 2,” Expert Opinion on Drug Delivery, vol. 10, no. 6, pp. 799–810, 2013.

K. W Burak and N. M Kneteman, “An Evidence-Based Multidisciplinary Approach to the Management of Hepatocellular Carcinoma (HCC): The Alberta HCC Algorithm,” Canadian Journal of Gastroenterology & Hepatology, vol. 24, Article ID 410574, 8 pages, 2010.

M. F. Bozkurt, B. V. Salanci, and Ö. Uǧur, “Intra-arterial radionuclide therapies for liver tumors,” Seminars in Nuclear Medicine, vol. 46, no. 4, pp. 324–339, 2016.

P. Hilgard, S. Müller, M. Hamami et al., “Selective internal radiotherapy (radioembolization) and radiation therapy for HCC - Current status and perspectives,” Zeitschrift für Gastroenterologie, vol. 47, no. 1, pp. 37–54, 2009.

J.-L. Raoul, E. Boucher, Y. Rolland, and E. Garin, “Treatment of hepatocellular carcinoma with intra-arterial injection of radionuclides,” Nature Reviews Gastroenterology & Hepatology, vol. 7, no. 1, pp. 41–49, 2010.

J. Burrill, U. Häfeli, and D. M. Liu, “Advances in radioembolization - embolics and isotopes,” Journal of Nuclear Medicine Radiation Therapy, vol. 2, no. 1, pp. 107–112, 2011.

R. Salem and K. G. Thurston, “Radioembolization with yttrium-90 microspheres: A state-of-the-art brachytherapy treatment for primary and secondary liver malignancies - Part 3: Comprehensive literature review and future direction,” Journal of Vascular and Interventional Radiology, vol. 17, no. 10, pp. 1571–1593, 2006.

N. Khajornjiraphan, N. A. Thu, and P. K. Chow, “Yttrium-90 microspheres: a review of its emerging clinical indications,” Liver Cancer, vol. 4, no. 1, pp. 6–15, 2015.

J. R. Kallini, A. Gabr, R. Salem, and R. J. Lewandowski, “Transarterial Radioembolization with Yttrium-90 for the Treatment of Hepatocellular Carcinoma,” Advances in Therapy, vol. 33, no. 5, pp. 699–714, 2016.

B. S. Sangha, H. Nimeiri, R. Hickey, R. Salem, and R. J. Lewandowski, “Radioembolization as a Treatment Strategy for Metastatic Colorectal Cancer to the Liver: What Can We Learn from the SIRFLOX Trial?” Current Treatment Options in Oncology, vol. 17, no. 6, 2016.

V. Vilgrain, H. Pereira, E. Assenat et al., “Efficacy and safety of selective internal radiotherapy with yttrium-90 resin microspheres compared with sorafenib in locally advanced and inoperable hepatocellular carcinoma (SARAH): an open-label randomised controlled phase 3 trial,” The Lancet Oncology, vol. 18, no. 12, pp. 1624–1636, 2017.

E. D. Grady, “Internal radiation therapy of hepatic cancer,” Diseases of the Colon & Rectum, vol. 22, no. 6, pp. 371–375, 1979.

M. A. Westcott, D. M. Coldwell, D. M. Liu, and J. F. Zikria, “The development, commercialization, and clinical context of yttrium-90 radiolabeled resin and glass microspheres,” Advances in Radiation Oncology, vol. 1, no. 4, pp. 351–364, 2016.

J. F. W. Nijsen, A. D. van het Schip, W. E. Hennink, D. W. Rook, P. P. van Rijk, and J. M. H. de Klerk, “Advances in nuclear oncology: Microspheres for internal radionuclide therapy in liver tumours,” Current Medicinal Chemistry, vol. 9, no. 1, pp. 73–82, 2002.

L. Caldarola, U. Rosa, F. Badellino, S. Sosi, and A. Cavalli, “Preparation of 32-p labelled resin microspheres for radiation treatment of tumours by intra-arterial injection,” Minerva nucleare, vol. 55, pp. 169–174, 1964.

S. Vinjamuri and S. Ray, “Phosphorus-32: the forgotten radiopharmaceutical?” Nuclear Medicine Communications, vol. 29, no. 2, pp. 95–97, 2008.

L. Yan, Z. Li, L. Li et al., “The relationship between effects and radiation doses of intra-arterial phosphorus-32 glass microspheres embolization therapy for patients with advanced liver cancer,” Chinese journal of surgery, vol. 38, no. 11, pp. 837–840, 2000.

E. Pirayesh, M. Amoui, S. Akhlaghpoor et al., “Technical Considerations of Phosphorous-32 Bremsstrahlung SPECT Imaging after Radioembolization of Hepatic Tumors: A Clinical Assessment with a Review of Imaging Parameters,” Radiology Research and Practice, vol. 2014, Article ID 407158, 7 pages, 2014.

P. R. Seevinck, G. H. Van De Maat, T. C. De Wit, M. A. D. Vente, J. F. W. Nijsen, and C. J. G. Bakker, “Magnetic resonance imaging-based radiation-absorbed dose estimation of166Ho microspheres in liver radioembolization,” International Journal of Radiation Oncology Biology Physics, vol. 83, no. 3, pp. e437–e444, 2012.

G. H. Van De Maat, P. R. Seevinck, C. Bos, and C. J. G. Bakker, “Quantification of holmium-166 loaded microspheres: Estimating high local concentrations using a conventional multiple gradient echo sequence with S 0-fitting,” Journal of Magnetic Resonance Imaging, vol. 35, no. 6, pp. 1453–1461, 2012.

M. A. D. Vente, J. F. W. Nijsen, R. de Roos et al., “Neutron activation of holmium poly(L-lactic acid) microspheres for hepatic arterial radioembolization: A validation study,” Biomedical Microdevices, vol. 11, no. 4, pp. 763–772, 2009.

R. J. Mumper and M. Jay, “Biodegradable radiotherapeutic polyester microspheres: optimization and in-vitro/in-vivo evaluation,” Journal of Controlled Release, vol. 18, no. 3, pp. 193–203, 1992.

S. W. Zeilhuis, J. H. Seppenwoolde, C. J. G. Bakker et al., “Characterization of holmium loaded alginate microspheres for multimodality imaging and therapeutic applications,” Journal of Biomedical Materials Research Part A, vol. 82, no. 4, pp. 892–898, 2007.

A. Arranja, W. Hennink, A. Denkova, R. Hendrikx, and J. Nijsen, “Radioactive holmium phosphate microspheres for cancer treatment,” International Journal of Pharmaceutics, vol. 548, no. 1, pp. 73–81, 2018.

J. H. Turner, P. G. Claringbold, P. F. B. Klemp et al., “¹⁶⁶Ho-microsphere liver radiotherapy: A preclinical SPECT dosimetry study in the pig,” Nuclear Medicine Communications, vol. 15, no. 7, pp. 545–553, 1994.

R. F. Costa, M. MB, N. Nascimento, F. F. Sene Martinelli, and J. A. Osso, “Production of microspheres labeled with holmium-166 for liver cancer therapy: the preliminary experience at IPEN-CNEN/SP,” in Proceedings of the International Nuclear Atlantic Conference - INAC, 2009.

G. J. Ehrhardt and D. E. Day, “Therapeutic use of 90Y microspheres,” International Journal of Radiation Applications and Instrumentation. Part B. Nuclear Medicine and Biology, vol. 14, no. 3, pp. 233–242, 1987.

R. F. Brown, L. C. Lindesmith, and D. E. Day, “166Holmium-containing glass for internal radiotherapy of tumors,” International Journal of Radiation Applications and Instrumentation. Part B. Nuclear Medicine and Biology, vol. 18, no. 7, pp. 783–790, 1991.

P. A. Schubiger, H.-F. Beer, L. Geiger et al., “90Y-resin particles-Animal experiments on pigs with regard to the introduction of superselective embolization therapy,” International Journal of Radiation Applications and Instrumentation. Part B. Nuclear Medicine and Biology, vol. 18, no. 3, pp. 305–311, 1991.

S. Subramanian, K. V. Vimalnath, and A. Dash, “Preparation and preliminary in vivo evaluation of 166Ho-labeled microspheres for possible use in radioembolic therapy of liver cancer,” Journal of Labelled Compounds and Radiopharmaceuticals, vol. 61, no. 6, pp. 509–514, 2018.

R. J. Mumper and M. Jay, “Poly(L-lactic Acid) Microspheres Containing Neutron-Activatable Holmium-165: A Study of the Physical Characteristics of Microspheres Before and After Irradiation in a Nuclear Reactor,” Pharmaceutical Research: An Official Journal of the American Association of Pharmaceutical Scientists, vol. 9, no. 1, pp. 149–154, 1992.

S. W. Zielhuis, J. F. W. Nijsen, R. Figueiredo et al., “Surface characteristics of holmium-loaded poly(L-lactic acid) microspheres,” Biomaterials, vol. 26, no. 8, pp. 925–932, 2005.

Y. S. Suzuki, Y. Momose, N. Higashi et al., “Biodistribution and kinetics of holmium-166-chitosan complex (DW-166HC) in rats and mice,” Journal of Nuclear Medicine, vol. 39, no. 12, pp. 2161–2166, 1998.

J. F. W. Nijsen, B. A. Zonnenberg, J. R. W. Woittiez et al., “Holmium-166 poly lactic acid microspheres applicable for intra-arterial radionuclide therapy of hepatic malignancies: Effects of preparation and neutron activation techniques,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 26, no. 7, pp. 699–704, 1999.

R. J. Mumper and M. Jay, “Formation and stability of lanthanide complexes and their encapsulation into polymeric microspheres,” The Journal of Physical Chemistry C, vol. 96, no. 21, pp. 8626–8631, 1992.

R. J. Mumper, U. Y. Ryo, and M. Jay, “Neutron-activated holmium-166-Poly(L-lactic acid) microspheres: A potential agent for the internal radiation therapy of hepatic tumors,” Journal of Nuclear Medicine, vol. 32, no. 11, pp. 2139–2143, 1991.

S. W. Zielhuis, J. F. W. Nijsen, L. Dorland, G. C. Krijger, A. D. van het Schip, and W. E. Hennink, “Removal of chloroform from biodegradable therapeutic microspheres by radiolysis,” International Journal of Pharmaceutics, vol. 315, no. 1-2, pp. 67–74, 2006.

W. Bult, R. Varkevisser, F. Soulimani et al., “Holmium nanoparticles: Preparation and in vitro characterization of a new device for radioablation of solid malignancies,” Pharmaceutical Research, vol. 27, no. 10, pp. 2205–2212, 2010.

S. W. Zielhuis, J. F. W. Nijsen, G. C. Krijger, A. D. van het Schip, and W. E. Hennink, “Holmium-loaded poly(L-lactic acid) microspheres: In vitro degradation study,” Biomacromolecules, vol. 7, no. 7, pp. 2217–2223, 2006.

S. W. Zielhuis, J. F. W. Nijsen, R. De Roos et al., “Production of GMP-grade radioactive holmium loaded poly(L-lactic acid) microspheres for clinical application,” International Journal of Pharmaceutics, vol. 311, no. 1-2, pp. 69–74, 2006.

F. Nijsen, D. Rook, C. Brandt et al., “Targeting of liver tumour in rats by selective delivery of holmium-166 loaded microspheres: A biodistribution study,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 28, no. 6, pp. 743–749, 2001.

S. W. Zielhuis, J. F. W. Nijsen, J.-H. Seppenwoolde et al., “Long-term toxicity of holmium-loaded poly(l-lactic acid) microspheres in rats,” Biomaterials, vol. 28, no. 31, pp. 4591–4599, 2007.

M. A. D. Vente, J. F. W. Nijsen, T. C. De Wit et al., “Clinical effects of transcatheter hepatic arterial embolization with holmium-166 poly(L-lactic acid) microspheres in healthy pigs,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 35, no. 7, pp. 1259–1271, 2008.

J. F. W. Nijsen, J.-H. Seppenwoolde, T. Havenith, C. Bos, C. J. G. Bakker, and A. D. Van Het Schip, “Liver Tumors: MR Imaging of Radioactive Holmium Microspheres - Phantom and Rabbit Study,” Radiology, vol. 231, no. 2, pp. 491–499, 2004.

J.-H. Seppenwoolde, J. F. W. Nijsen, L. W. Bartels, S. W. Zielhuis, A. D. Van Het Schip, and C. J. G. Bakker, “Internal radiation therapy of liver tumors: Qualitative and quantitative magnetic resonance imaging of the biodistribution of holmium-loaded microspheres in animal models,” Magnetic Resonance in Medicine, vol. 53, no. 1, pp. 76–84, 2005.

M. A. D. Vente, T. C. De Wit, M. A. A. J. Van Den Bosch et al., “Holmium-166 poly(L-lactic acid) microsphere radioembolisation of the liver: Technical aspects studied in a large animal model,” European Radiology, vol. 20, no. 4, pp. 862–869, 2010.

M. L. J. Smits, J. F. W. Nijsen, M. A. A. J. van den Bosch et al. et al., “Holmium-166 radioembolization for the treatment of patients with liver metastases: design of the phase I HEPAR trial,” Journal of Experimental & Clinical Cancer Research, vol. 29, no. 70, 2010.

M. L. J. Smits, J. F. W. Nijsen, M. A. A. J. van den Bosch et al., “Holmium-166 radioembolisation in patients with unresectable, chemorefractory liver metastases (HEPAR trial): A phase 1, dose-escalation study,” The Lancet Oncology, vol. 13, no. 10, pp. 1025–1034, 2012.

M. L. J. Smits, M. Elschot, M. A. A. J. Van Den Bosch et al., “In vivo dosimetry based on SPECT and MR imaging of 166Ho- microspheres for treatment of liver malignancies,” Journal of Nuclear Medicine, vol. 54, no. 12, pp. 2093–2100, 2013.

M. Elschot, J. F. Nijsen, M. G. Lam et al., “99mTc-MAA overestimates the absorbed dose to the lungs in radioembolization: a quantitative evaluation in patients treated with 166Ho-microspheres,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 41, no. 10, pp. 1965–1975, 2014.

J. F. Prince, R. van Rooij, G. H. Bol, H. W. de Jong, M. A. van den Bosch, and M. G. Lam, “Safety of a Scout Dose Preceding Hepatic Radioembolization with 166Ho Microspheres,” Journal of Nuclear Medicine, vol. 56, no. 6, pp. 817–823, 2015.

J. F. Prince, M. A. A. J. Van Den Bosch, J. F. W. Nijsen et al., “Efficacy of radioembolization with 166Ho-Microspheres in salvage patients with liver metastases: A phase 2 study,” Journal of Nuclear Medicine, vol. 59, no. 4, pp. 582–588, 2018.

J. F. Prince, M. L. J. Smits, G. C. Krijger et al., “Radiation emission from patients treated with holmium-166 radioembolization,” Journal of Vascular and Interventional Radiology, vol. 25, no. 12, pp. 1956–1963.e1, 2014.

A. F. van den Hoven, J. F. Prince, R. C. G. Bruijnen et al., “Surefire infusion system versus standard microcatheter use during holmium-166 radioembolization: Study protocol for a randomized controlled trial,” Trials, vol. 17, no. 1, 2016.

J. K. Kim, K.-H. Han, J. T. Lee et al., “Long-term clinical outcome of phase IIb clinical trial of percutaneous injection with holmium-166/chitosan complex (milican) for the treatment of small hepatocellular carcinoma,” Clinical Cancer Research, vol. 12, no. 2, pp. 543–548, 2006.

J. H. Sohn, H. J. Choi, J. T. Lee et al., “Phase II study of transarterial holmium-166-chitosan complex treatment in patients with a single, large hepatocellular carcinoma,” Oncology, vol. 76, no. 1, pp. 1–9, 2008.

Maria Argyrou, Alexia Valassi, Maria Andreou, and Maria Lyra, “Rhenium-188 Production in Hospitals, by W-188/Re-188 Generator, for Easy Use in Radionuclide Therapy,” International Journal of Molecular Imaging, vol. 2013, Article ID 290750, 7 pages, 2013.

F. Knapp, “Continued Availability of the Tungsten-188/Rhenium-188 Generator to Enhance Therapeutic Utility of 188Re,” International Journal of Nuclear Medicine Research, no. Special - 2017, 2017.

G. Wunderlich, J. Pinkert, M. Stintz, and J. Kotzerke, “Labeling and biodistribution of different particle materials for radioembolization therapy with 188Re,” Applied Radiation and Isotopes, vol. 62, no. 5, pp. 745–750, 2005.

S. D. Conzone, U. O. Häfeli, D. E. Day, and G. J. Ehrhardt, “Preparation and properties of radioactive rhenium glass microspheres intended for in vivo radioembolization therapy,” Journal of Biomedical Materials Research Part B: Applied Biomaterials, vol. 42, no. 4, pp. 617–625, 1998.

U. O. Häfeli, S. Casillas, D. W. Dietz et al., “Hepatic tumor radioembolization in a rat model using radioactive rhenium (186RE/188RE) glass microspheres,” International Journal of Radiation Oncology Biology Physics, vol. 44, no. 1, pp. 189–199, 1999.

S.-J. Wang, W.-Y. Lin, M.-N. Chen et al., “Intratumoral injection of rhenium-188 microspheres into an animal model of hepatoma,” Journal of Nuclear Medicine, vol. 39, no. 10, pp. 1752–1757, 1998.

Y.-C. Lin, S.-C. Tsai, G.-U. Hung, J.-C. Lee, Y.-S. Huang, and W.-Y. Lin, “Direct injection of 188Re-microspheres in the treatment of hepatocellular carcinoma. Compared with traditional percutaneous ethanol injection: An animal study,” Nuklearmedizin / Nuclear Medicine, vol. 44, no. 3, pp. 76–80, 2005.

U. O. Häfeli, W. K. Roberts, G. J. Pauer, S.-K. Kraeft, and R. M. Macklis, “Stability of biodegradable radioactive rhenium (Re-186 and Re-188) microspheres after neutron-activation,” Applied Radiation and Isotopes, vol. 54, no. 6, pp. 869–879, 2001.

J. Shukla, G. P. Bandopadhyaya, and I. K. Varma, “188Rhenium(V)-dimercaptosuccinic acid loaded poly(lactic-co-glycolic)acid microspheres for targeted radiotherapy: Production and effectivity,” Die Pharmazie, vol. 60, no. 8, pp. 583–587, 2005.

J. Yu, U. O. Häfeli, J. Xia et al., “Radiolabelling of poly(histidine) derivatized biodegradable microspheres with the 188Re tricarbonyl complex [188Re(CO)3(H2O)3]+,” Nuclear Medicine Communications, vol. 26, no. 5, pp. 453–458, 2005.

M. Jamre, M. Shamsaei, M. Erfani, S. Sadjadi, and M. Ghannadi Maragheh, “Preparation and evaluation of,” Journal of Labelled Compounds and Radiopharmaceuticals, vol. 61, no. 8, pp. 586–594, 2018.

P. Chiang, C. Peng, Y. Shih et al., “Biodegradable and Multifunctional Microspheres for Treatment of Hepatoma through Transarterial Embolization,” ACS Biomaterials Science & Engineering, vol. 4, no. 9, pp. 3425–3433, 2018.

C. Meyer, C. C. Pieper, S. Ezziddin, K. E. Wilhelm, H. H. Schild, and H. Ahmadzadehfar, “Feasibility of temporary protective embolization of normal liver tissue using degradable starch microspheres during radioembolization of liver tumours,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 41, no. 2, pp. 231–237, 2014.

E. Verger, P. Drion, G. Meffre et al., “68Ga and 188Re starch-based microparticles as theranostic tool for the hepatocellular carcinoma: Radiolabeling and preliminary in vivo rat studies,” PLoS ONE, vol. 11, no. 10, 2016.

E. Garin, E. Boucher, and Y. Rolland, “99mTc-MAA-based dosimetry for liver cancer treated using 90Y-loaded microspheres: Known proof of effectiveness,” Journal of Nuclear Medicine, vol. 55, no. 8, pp. 1391-1392, 2014.

G. Wunderlich, J. Pinkert, M. Andreeff et al., “Preparation and biodistribution of rhenium-188 labeled albumin microspheres B 20: A promising new agent for radiotherapy,” Applied Radiation and Isotopes, vol. 52, no. 1, pp. 63–68, 2000.

G. Wunderlich, A. Drews, and J. Kotzerke, “A kit for labeling of [188Re] human serum albumin microspheres for therapeutic use in nuclear medicine,” Applied Radiation and Isotopes, vol. 62, no. 6, pp. 915–918, 2005.

L.-C. Chen, Y.-J. Chang, S.-J. Chen et al., “Imaging, biodistribution and efficacy evaluation of 188Re-human serum albumin microspheres via intraarterial route in an orthotopic hepatoma model,” International Journal of Radiation Biology, vol. 93, no. 5, pp. 477–486, 2017.

K. Liepe, C. Brogsitter, J. Leonhard et al., “Feasibility of high activity rhenium-188-microsphere in hepatic radioembolization,” Japanese Journal of Clinical Oncology, vol. 37, no. 12, pp. 942–950, 2007.

M. L. Nowicki, J. B. Ćwikła, A. J. Sankowski et al., “Initial study of radiological and clinical efficacy radioembolization using 188re-human serum albumin (HSA) microspheres in patients with progressive, unresectable primary or secondary liver cancers,” Medical Science Monitor, vol. 20, pp. 1353–1362, 2014.

K. Nakakuma, S. Tashiro, T. Hiraoka, K. Ogata, and K. Ootsuka, “Hepatocellular carcinoma and metastatic cancer detected by iodized oil,” Radiology, vol. 154, no. 1, pp. 15–17, 1985.

N. C. Fairlie and A. N. Adam, “Case report: Persistence of lipiodol for 13 months in metastatic deposits in the liver on computed tomography,” Clinical Radiology, vol. 44, no. 4, pp. 273-274, 1991.

J. Liebster and V. Kočandrle, “Exchange labelling of ‘lipiodol’ ultra fluids with lodine-131 and its intra-lymphatic administration with a fistula on the thoracic duct,” Nature, vol. 203, no. 4946, pp. 777-778, 1964.

A. Lintia-Gaultier, C. Perret, C. Ansquer, T. Eugène, F. Kraeber-Bodéré, and E. Frampas, “Intra-arterial injection of 131I-labeled Lipiodol for advanced hepatocellular carcinoma: a 7 years' experience,” Nuclear Medicine Communications, vol. 34, no. 7, pp. 674–681, 2013.

J.-L. Raoul, E. Boucher, Y. Roland, and E. Garin, “131-iodine Lipiodol therapy in hepatocellular carcinoma,” The Quarterly Journal of Nuclear Medicine and Molecular Imaging, vol. 53, no. 3, pp. 348–355, 2009.

M. T. Madsen, C. H. Park, and M. L. Thakur, “Dosimetry of iodine-131 ethiodol in the treatment of hepatoma,” Journal of Nuclear Medicine, vol. 29, no. 6, pp. 1038–1044, 1988.

B. Lambert, K. Bacher, and L. Defreyne, “Rhenium-188 based radiopharmaceuticals for treatment of liver tumours,” The Quarterly Journal of Nuclear Medicine and Molecular Imaging, vol. 53, no. 3, pp. 305–310, 2009.

N. Lepareur, “Transarterial Radionuclide Therapy with 188Re-Labelled Lipiodol,” International Journal of Nuclear Medicine Research, no. Special - 2017, 2017.

S.-J. Wang, W.-Y. Lin, M.-N. Chen et al., “Radiolabelling of Lipiodol with generator-produced 188Re for hepatic tumor therapy,” Applied Radiation and Isotopes, vol. 47, no. 3, pp. 267–271, 1996.

S.-J. Wang, W.-Y. Lin, M.-N. Chen et al., “Biodistribution of rhenium-188 Lipiodol infused via the hepatic artery of rats with hepatic tumours,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 23, no. 1, pp. 13–17, 1996.

S.-J. Wang, W.-Y. Lin, W.-Y. Lui, M.-N. Chen, Z.-T. Tsai, and G. Ting, “Hepatic artery injection of yttrium-90-lipiodol: biodistribution in rats with hepatoma,” Journal of Nuclear Medicine, vol. 37, no. 2, pp. 332–335, 1996.

T. W. Jackson, M. Kojima, and R. M. Lambrecht, “Rhenium Diamino Dithiol Complexes. III. Lipophilic Ligands for Endotherapeutic Radiopharmaceuticals,” Australian Journal of Chemistry, vol. 53, no. 12, p. 983, 2000.

J. M. Jeong, Y. J. Kim, and Y. S. Lee, “Lipiodol solution of a lipophilic agent, ¹⁸⁸Re-TDD, for the treatment of liver cancer,” Nuclear Medicine and Biology, vol. 28, no. 2, pp. 197–204, 2001.

Y. LEE, J. M. Jeong, Y. J. Kim et al., “Synthesis of 188Re-labelled long chain alkyl diaminedithiol for therapy of liver cancer,” Nuclear Medicine Communications, vol. 23, no. 3, pp. 237–242, 2002.

J. C. Paeng, J. M. Jeong, C. J. Yoon et al., “Lipiodol solution of 188Re-HDD as a new therapeutic agent for transhepatic arterial embolization in liver cancer: Preclinical study in a rabbit liver cancer model,” Journal of Nuclear Medicine, vol. 44, no. 12, pp. 2033–2038, 2003.

Y.-S. Lee, J. Min Jeong, Y. Joo Kim et al., “Development of acetylated HDD kit for preparation of 188Re-HDD/lipiodol,” Applied Radiation and Isotopes, vol. 65, no. 1, pp. 64–69, 2007.

V. K. Banka, S.-H. Moon, J. M. Jeong et al., “Development of 4-hexadecyl-4,7-diaza-1,10-decanedithiol (HDD) kit for the preparation of the liver cancer therapeutic agent Re-188-HDD/lipiodol,” Nuclear Medicine and Biology, vol. 42, no. 3, pp. 317–322, 2015.

T.-Y. Luo, B.-T. Hsieh, S.-J. Wang et al., “Preparation and biodistribution of rhenium-188 ECD/Lipiodol in rats following hepatic arterial injection,” Nuclear Medicine and Biology, vol. 31, no. 5, pp. 671–677, 2004.

T.-Y. Luo, Y.-H. Shih, C.-Y. Chen et al., “Evaluating the potential of 188re-ecd/lipiodol as a therapeutic radiopharmaceutical by intratumoral injection for hepatoma treatment,” Cancer Biotherapy and Radiopharmaceuticals, vol. 24, no. 5, pp. 535–541, 2009.

G.-Q. Wang, J. Zhang, S.-Z. Luo et al., “Synthesis and primary biological evaluation of 188ReN-NEMPTDD,” Journal of Radioanalytical and Nuclear Chemistry, vol. 277, no. 2, pp. 365–369, 2008.

I.-C. Tang, T.-Y. Luo, S.-W. Liu et al., “Synthesis and application of 188Re-MN-16ET/Lipiodol in a hepatocellular carcinoma animal model,” Nuclear Medicine and Biology, vol. 38, no. 7, pp. 1043–1052, 2011.

P.-W. Huang, S.-C. Tsai, T.-Y. Luo, C.-H. Kao, and W.-Y. Lin, “Therapeutic efficacy of 188Re-MN-16ET lipiodol in an animal model of hepatocellular carcinoma,” Annals of Nuclear Medicine, vol. 27, no. 6, pp. 532–537, 2013.

A. Boschi, L. Uccelli, A. Duatti et al., “A kit formulation for the preparation of re-lipiodol: preclinical studies and preliminary therapeutic evaluation in patients with unresectable hepatocellular carcinoma,” Nuclear Medicine Communications, vol. 25, no. 7, pp. 691–699, 2004.

N. Lepareur, E. Garin, N. Noiret, and J. Y. Herry, “A kit formulation for the labelling of lipiodol with generator-produced 188Re,” Journal of Labelled Compounds and Radiopharmaceuticals, vol. 47, no. 12, pp. 857–867, 2004.

N. Lepareur, V. Ardisson, N. Noiret, and E. Garin, “188Re-SSS/Lipiodol: development of a potential treatment for HCC from bench to bedside,” International Journal of Molecular Imaging, vol. 2012, Article ID 278306, 9 pages, 2012.

M. L. Thakur, A. W. Segal, L. Louis, M. J. Welch, J. Hopkins, and T. J. Peters, “Indium-111-labeled cellular blood components: mechanism of labeling and intracellular location in human neutrophils.,” Journal of Nuclear Medicine, vol. 18, no. 10, pp. 1022–1026, 1977.

J. Yu, U. O. Häfeli, M. Sands, and Y. Dong, “90Y-oxine-ethiodol, a potential radiopharmaceutical for the treatment of liver cancer,” Applied Radiation and Isotopes, vol. 58, no. 5, pp. 567–573, 2003.

T. Das, S. Chakraborty, H. D. Sarma, M. Venkatesh, and S. Banerjee, “Preparation of 166Ho-oxine-lipiodol and its preliminary bioevaluation for the potential application in therapy of liver cancer,” Nuclear Medicine Communications, vol. 30, no. 5, pp. 362–367, 2009.

S. Subramanian, T. Das, S. Chakraborty et al., “Preparation of 177Lu-labeled oxine in lipiodol as a possible agent for therapy of hepatocellular carcinoma: A Preliminary Animal Study,” Cancer Biotherapy and Radiopharmaceuticals, vol. 25, no. 5, pp. 539–543, 2010.

N. Lepareur, J. Edeline, N. Noiret, V. Ardisson, and E. Garin, “Preparation and preliminary evaluation of 90Y-tropolonate-Lipiodol as a potential radiopharmaceutical for hepatocellular carcinoma therapy,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 43, no. Suppl. 1, p. S454, 2016.

A. Lopez, N. Noiret, E. Garin, and N. Lepareur, “Mixed-ligand complexes of yttrium-90 dialkyldithiocarbamates with 1,10-phenanthroline as a possible agent for therapy of hepatocellular carcinoma,” Applied Radiation and Isotopes, vol. 94, pp. 241–246, 2014.

P. Y. Mu, X. L. Jiang, J. Chen et al., “Research on extracted 90Y with P204 in lipiodol for liver cancer,” Journal of Radioanalytical and Nuclear Chemistry, vol. 272, no. 3, pp. 669–671, 2007.

M. Andreeff, G. Wunderlich, K. Behge, T. Schönmuth, and J. Kotzerke, “β-radiation exposure with 188Re-labelled pharmaceuticals,” Nuklearmedizin / Nuclear Medicine, vol. 44, no. 3, pp. 94–98, 2005.

A. Rimpler, I. Barth, P. Ferrari et al., “Extremity exposure in nuclear medicine therapy with 90Y-labelled substances - Results of the ORAMED project,” Radiation Measurements, vol. 46, no. 11, pp. 1283–1286, 2011.

L. Uccelli, M. Pasquali, A. Boschi, M. Giganti, and A. Duatti, “Automated preparation of Re-188 lipiodol for the treatment of hepatocellular carcinoma,” Nuclear Medicine and Biology, vol. 38, no. 2, pp. 207–213, 2011.

N. Lepareur, V. Ardisson, N. Noiret et al., “Automation of labelling of Lipiodol with high-activity generator-produced 188Re,” Applied Radiation and Isotopes, vol. 69, no. 2, pp. 426–430, 2011.

A. Mukherjee, S. Subramanian, R. Ambade, B. Avhad, A. Dash, and A. Korde, “Development of semiautomated module for preparation of 131I labeled lipiodol for liver cancer therapy,” Cancer Biotherapy and Radiopharmaceuticals, vol. 32, no. 1, pp. 33–37, 2017.

N. Lepareur, S. Laffont, V. Ardisson, N. Noiret, and E. Garin, “Reduction of β-radiation exposure during preparation of 188Re-labelled Lipiodol for hepatocellular carcinoma treatment,” Nuclear Medicine Communications, vol. 33, no. 2, pp. 205–208, 2012.

J.-L. Raoul, P. Bourguet, J.-F. Bretagne et al., “Hepatic artery injection of I-131-labeled lipiodol. Part I. Biodistribution study results in patients with hepatocellular carcinoma and liver metastases,” Radiology, vol. 168, no. 2, pp. 541–545, 1988.

C. H. Park, J. H. Suh, H. S. Yoo, J. T. Lee, and D. I. Kim, “Evaluation of intrahepatic I-131 ethiodol on a patient with hepatocellular carcinoma. Therapeutic feasibility study,” Clinical Nuclear Medicine, vol. 11, no. 7, pp. 514–517, 1986.

H. Ahmadzadehfar, A. Sabet, K. Wilhelm, H. J. Biersack, and J. Risse, “Iodine-131-lipiodol therapy in hepatic tumours,” Methods, vol. 55, no. 3, pp. 246–252, 2011.

E. Oger, A. Lavenu, E. Bellissant, E. Garin, and E. Polard, “Meta-analysis of interstitial pneumonia in studies evaluating iodine-131-labeled lipiodol for hepatocellular carcinoma using exact likelihood approach,” Pharmacoepidemiology and Drug Safety, vol. 20, no. 9, pp. 956–963, 2011.

F. X. Sundram, S. W. K. Yu, J. M. Jeong et al., “188Rhenium-TDD-lipiodol in treatment of inoperable primary hepatocellular carcinoma - A case report,” Annals, Academy of Medicine, Singapore, vol. 30, no. 5, pp. 542–545, 2001.

K. Delaunay, E. Garin, Y. Rolland et al., “Biodistribution and dosimetry assessments for hepatocellular carcinoma treated with 188Re-SSS Lipiodol: Preliminary results of the phase 1 trial Lip Re 1,” Journal of Nuclear Medicine, vol. 59, no. supplement 1, p. 602, 2018.

G. H. W. Keng, F. X. Sundram, S. W. K. Yu et al., “Preliminary experience in radionuclide therapy of hepatocellular carcinoma using hepatic intra-arterial radio-conjugates,” Annals, Academy of Medicine, Singapore, vol. 31, no. 3, pp. 382–386, 2002.

F. Sundram, T. C. M. Chau, P. Onkhuudai, P. Bernal, and A. K. Padhy, “Preliminary results of transarterial rhenium-188 HDD lipiodol in the treatment of inoperable primary hepatocellular carcinoma,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 31, no. 2, pp. 250–257, 2004.

B. Lambert, K. Bacher, L. Defreyne et al., “188Re-HDD/lipiodol therapy for hepatocellular carcinoma: An activity escalation study,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 33, no. 3, pp. 344–352, 2006.

B. Lambert, K. Bacher, L. Defreyne et al., “188Re-HDD/lipiodol therapy for hepatocellular carcinoma: A phase I clinical trial,” Journal of Nuclear Medicine, vol. 46, no. 1, pp. 60–66, 2005.

B. Lambert, K. Bacher, K. De Keukeleire et al., “188Re-HDD/lipiodol for treatment of hepatocellular carcinoma: A feasibility study in patients with advanced cirrhosis,” Journal of Nuclear Medicine, vol. 46, no. 8, pp. 1326–1332, 2005.

A. Kumar, C. Bal, D. N. Srivastava et al., “Transarterial radionuclide therapy with Re-188-HDD-lipiodol in case of unresectable hepatocellular carcinoma with extensive portal vein thrombosis,” European Journal of Radiology Extra, vol. 56, no. 2, pp. 55–59, 2005.

A. Kumar, D. N. Srivastava, and C. Bal, “Management of postsurgical recurrence of hepatocellular carcinoma with rhenium 188-HDD labeled iodized oil,” Journal of Vascular and Interventional Radiology, vol. 17, no. 1, pp. 157–161, 2006.

A. Kumar, C. Bal, D. N. Srivastava et al., “Management of multiple intrahepatic recurrences after radiofrequency ablation of hepatocellular carcinoma with rhenium-188-HDD-lipiodol,” European Journal of Gastroenterology & Hepatology, vol. 18, no. 2, pp. 219–223, 2006.

K. de Ruyck, B. Lambert, K. Bacher et al., “Biologic dosimetry of 188Re-HDD/lipiodol versus 131I-lipiodol therapy in patients with hepatocellular carcinoma,” Journal of Nuclear Medicine, vol. 45, no. 4, pp. 612–618, 2004.

P. Bernal, J.-L. Raoul, G. Vidmar et al., “Intra-arterial rhenium-188 lipiodol in the treatment of inoperable hepatocellular carcinoma: results of an IAEA-Sponsored Multination Study,” International Journal of Radiation Oncology Biology Physics, vol. 69, no. 5, pp. 1448–1455, 2007.

P. Bernal, J.-L. Raoul, J. Stare et al., “International atomic energy agency-sponsored multination study of intra-arterial rhenium-188-labeled lipiodol in the treatment of inoperable hepatocellular carcinoma: results with special emphasis on prognostic value of dosimetric study,” Seminars in Nuclear Medicine, vol. 38, no. 2, pp. S40–S45, 2008.

A. Kumar, D. N. Srivastava, T. T. M. Chau et al., “Inoperable hepatocellular carcinoma: Transarterial 188Re HDD-labeled iodized oil for treatment - Prospective multicenter clinical trial,” Radiology, vol. 243, no. 2, pp. 509–519, 2007.

R. Furtado, M. Crawford, and C. Sandroussi, “Systematic review and meta-analysis of adjuvant I131 lipiodol after excision of hepatocellular carcinoma,” Annals of Surgical Oncology, vol. 21, no. 8, pp. 2700–2707, 2014.

B. Brans, R. A. Dierckx, F. De Winter et al., “The anti-tumoral activity of neoadjuvant intra-arterial 131I-lipiodol treatment for hepatocellular carcinoma: A pilot study,” Cancer Biotherapy and Radiopharmaceuticals, vol. 16, no. 4, pp. 333–338, 2001.

J.-L. Raoul, M. Messner, E. Boucher, J.-F. Bretagne, J.-P. Campion, and K. Boudjema, “Preoperative treatment of hepatocellular carcinoma with intra-arterial injection of 131I-labelled lipiodol,” British Journal of Surgery, vol. 90, no. 11, pp. 1379–1383, 2003.

B. Lambert, M. Praet, P. Vanlangenhove et al., “Radiolabeled lipiodol therapy for hepatocellular carcinoma in patients awaiting liver transplantation: Pathology of the explant livers and clinical outcome,” Cancer Biotherapy and Radiopharmaceuticals, vol. 20, no. 2, pp. 209–214, 2005.

T. de Baere, Y. Arai, R. Lencioni et al., “Treatment of Liver Tumors with Lipiodol TACE: Technical Recommendations from Experts Opinion,” CardioVascular and Interventional Radiology, vol. 39, no. 3, pp. 334–343, 2016.

S. Herber, G. Otto, J. Schneider et al., “Transarterial chemoembolization (TACE) for inoperable intrahepatic cholangiocarcinoma,” CardioVascular and Interventional Radiology, vol. 30, no. 6, pp. 1156–1165, 2007.

J. H. Risse, F. Grünwald, H. Strunk, R. Kleinschmidt, H. Bender, and H. J. Biersack, “I-131-Lipiodol therapy in liver neoplasms,” Hybridoma, vol. 18, no. 1, pp. 83–85, 1999.

J. R. Novell, A. J. Green, A. J. W. Hilson, G. Dusheiko, R. Dick, and K. E. F. Hobbs, “Selective Radionuclide Localisation in Primary Liver Tumours,” HPB Surgery, vol. 7, Article ID 093101, 16 pages, 1994.

F. Giammarile, L. Bodei, C. Chiesa et al., “EANM procedure guideline for the treatment of liver cancer and liver metastases with intra-arterial radioactive compounds,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 38, no. 7, pp. 1393–1406, 2011.

G. Stansby, S. Bhattacharya, A. J. W. Hilson, D. M. Lane, and K. E. F. Hobbs, “Localization of Lipiodol-radioiodine in hepatic metastases from renal cell carcinoma,” British Journal of Radiology, vol. 67, no. 800, pp. 822–824, 1994.

R. A. M. Al-Mufti, R. B. Pedley, D. Marshall et al., “In vitro assessment of Lipiodol-targeted radiotherapy for liver and colorectal cancer cell lines,” British Journal of Cancer, vol. 79, no. 11-12, pp. 1665–1671, 1999.