BioMed Research International
Volume 2018 (2018), Article ID 3252078, 1 page
https://doi.org/10.1155/2018/3252078

Corrigendum

Corrigendum to “Effect of Lead on Human Middle Ear Epithelial Cells”

Shin Hye Kim,1,2 Sun Hwa Shin,¹ Yoon Young Go,¹ Sung-Won Chae,¹ and Jae-Jun Song¹

¹Department of Otorhinolaryngology-Head and Neck Surgery, Korea University Medical Center, Korea University College of Medicine, Seoul, Republic of Korea
²Department of Otorhinolaryngology-Head and Neck Surgery, Haeundae Paik Hospital, Inje University College of Medicine, Busan, Republic of Korea

Correspondence should be addressed to Jae-Jun Song; jjsong23@gmail.com

Received 5 July 2018; Accepted 16 July 2018; Published 9 August 2018

Copyright © 2018 Shin Hye Kim et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Effect of Lead on Human Middle Ear Epithelial Cells” [1], there was a missing affiliation for the first author. The corrected authors’ list and affiliations are shown above.

References

S. H. Kim, S. H. Shin, Y. Y. Go, S.-W. Chae, and J.-J. Song, “Effect of lead on human middle ear epithelial cells,” BioMed Research International, vol. 2018, Article ID 5058729, 11 pages, 2018.