BioMed Research International
Volume 2018 (2018), Article ID 6723963, 1 page
https://doi.org/10.1155/2018/6723963

Corrigendum

Corrigendum to “Patient-Specific CT-Based Instrumentation versus Conventional Instrumentation in Total Knee Arthroplasty: A Prospective Randomized Controlled Study on Clinical Outcomes and In-Hospital Data”

Andrzej Kotela,1,2 Jacek Lorkowski,¹ Marek Kucharzewski,³ Magdalena Wilk-Frańczuk,⁴ Zbigniew Śliwiński,⁵ Bogusław Frańczuk,⁶ Paweł Łęgosz,² and Ireneusz Kotela1,7

¹Department of Orthopedic Surgery and Traumatology, Central Research Hospital of Ministry of Interior, Wołoska 137, 02-507 Warsaw, Poland
²Department of Orthopaedics and Traumatology of Musculoskeletal System, 1st Faculty of Medicine, Medical University of Warsaw, ul. Lindleya 4, 02-005 Warsaw, Poland
³School of Medicine with the Division of Dentistry in Zabrze, Chair and Department of Descriptive and Topographic Anatomy, Medical University of Silesia, ul. Jordana 19, 41-808 Zabrze, Poland
⁴Department of Kinesiotherapy and Manual Therapy, Faculty of Health Sciences, Vincent Pol University in Lublin, ul. Choiny 2, 20-816 Lublin, Poland
⁵Head of Institute of Physiotherapy, The Jan Kochanowski University of Humanities and Sciences, al. IX Wieków 19, 25-317 Kielce, Poland
⁶Department of Physiotherapy, Faculty of Health and Medicine Science, Andrzej Frycz Modrzewski Cracow University, ul. Gustawa Herling Grudzińskiego 1, 30-705 Kraków, Poland
⁷Department of Physiotherapy, The Jan Kochanowski University of Humanities and Sciences, al. IX Wieków 19, 25-317 Kielce, Poland

Correspondence should be addressed to Andrzej Kotela; andrzejkotela@gmail.com

Received 14 August 2018; Accepted 19 August 2018; Published 12 September 2018

Copyright © 2018 Andrzej Kotela et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Patient-Specific CT-Based Instrumentation versus Conventional Instrumentation in Total Knee Arthroplasty: A Prospective Randomized Controlled Study on Clinical Outcomes and In-Hospital Data” [1], an acknowledgment should be added as follows:

A very special gratitude goes to Professor Jarosław Deszczyński, Head of the Department of Orthopaedics and Rehabilitation, 2nd Faculty of Medicine, Medical University of Warsaw, for all help and sharing his pearls of wisdom.

We would also like to thank all our colleagues from Department of Orthopaedics and Rehabilitation, 2nd Faculty of Medicine, Medical University of Warsaw, who provided insight and expertise that assisted the research.

The results presented were part of the Ph.D. research partially supported by the Foundation for the Development of Fracture Stabilization Techniques “Dynastab”.

References

A. Kotela, J. Lorkowski, M. Kucharzewski et al., “Patient-specific CT-based instrumentation versus conventional instrumentation in total knee arthroplasty: a prospective randomized controlled study on clinical outcomes and in-hospital data,” BioMed Research International, vol. 2015, Article ID 165908, 8 pages, 2015.