BioMed Research International
Volume 2019 (2019), Article ID 2529153, 1 page
https://doi.org/10.1155/2019/2529153

Corrigendum

Corrigendum to “Effects of Combined Use of Ultrasonic Bone Scalpel and Hemostatic Matrix on Perioperative Blood Loss and Surgical Duration in Degenerative Thoracolumbar Spine Surgery”

Hou-Tsung Chen,¹ Chieh-Cheng Hsu,¹ Meng-Lin Lu,¹ Sung-Hsiung Chen,¹ Jing-Miao Chen,¹ and Re-Wen Wu1,2

¹Department of Orthopaedic Surgery, Kaohsiung Chang Gung Memorial Hospital, Kaohsiung, Taiwan
²Graduate Institute of Clinical Medical Sciences, Chang Gung University, Taiwan

Correspondence should be addressed to Re-Wen Wu; ray4595@gmail.com

Received 17 July 2019; Accepted 17 July 2019; Published 4 August 2019

Copyright © 2019 Hou-Tsung Chen et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Effects of Combined Use of Ultrasonic Bone Scalpel and Hemostatic Matrix on Perioperative Blood Loss and Surgical Duration in Degenerative Thoracolumbar Spine Surgery” [1], the IRB number was given incorrectly as (IRB201700086B0). The correct number should be (IRB201600834B0). Therefore, the second sentence in subsection “2.1. Patients” should be updated as follows:

The study was conducted with a waiver of patient consent and was approved by the Institutional Review Board of our hospital (IRB201600834B0).

References

H. Chen, C. Hsu, M. Lu, S. Chen, J. Chen, and R. Wu, “Effects of combined use of ultrasonic bone scalpel and hemostatic matrix on perioperative blood loss and surgical duration in degenerative thoracolumbar spine surgery,” BioMed Research International, vol. 2019, Article ID 6286258, 7 pages, 2019.