BioMed Research International
Volume 2019 (2019), Article ID 7679319, 7 pages
https://doi.org/10.1155/2019/7679319

Clinical Study

A Comparison between Primary and Secondary Flap Coverage in Ridge Preservation Procedures: A Pilot Randomized Controlled Clinical Trial

Majdi A. Aladmawy,1,2 Zuhair S. Natto,³ Bjorn Steffensen,² Paul Levi,² Wai Cheung,² Matthew Finkelman,⁴ Yumi Ogata,² and Yong Hur²

¹Department of Periodontology, Johns Hopkins Aramco Healthcare, Dhahran, Saudi Arabia
²Department of Periodontology, Tufts University School of Dental Medicine, USA
³Department of Dental Public Health, School of Dentistry, King Abdulaziz University, Jeddah, Saudi Arabia
⁴Department of Public Health and Community Service, Tufts University School of Dental Medicine, USA

Correspondence should be addressed to Majdi A. Aladmawy; majdi.aladmawy@jhah.com

Received 14 March 2019; Accepted 9 July 2019; Published 20 August 2019

Academic Editor: Ayhan Cömert

Copyright © 2019 Majdi A. Aladmawy et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Aims. To assess the bone dimensional changes after extraction and alveolar ridge preservation (ARP) using primary coverage (closed flap technique, CFT) or healing by secondary intention (open flap technique, OFT). Materials and Methods. Ten patients (split mouth design) were planned for extraction and ARP. All sites received ARP with freeze-dried bone allograft (FDBA) and nonresorbable membrane after extraction. Clinical standardized measurements were used to assess the dimensional alterations of the alveolar ridge. Results. All patients completed the study, and a total of 20 sites were randomized to CFT or OFT group. Center height (mean difference of 8.1 mm, SD =1.9 CFT, and 7.5 mm, SD= 1.8 OFT) and buccal height (mean difference of 0.8 mm, SD =1.0 CFT, and 0.3 mm, SD= 1.1 OFT) were significantly different within the same group. However, there was no statistically significant difference between groups. In the OFT group, the keratinized tissue width was higher and the pain VAS scores at 24 hours were lower compared with the CFT (p = 0.004 and p = 0.006, respectively). Conclusions. Leaving the flap open did not have any effects on the dimensional changes of bone height or width. However, there was a wider band of keratinized tissue and less pain with the CFT compared with the OFT. The study protocol was registered at ClinicalTrials.gov, Identifier NCT03136913.

1. Introduction

When a clinician treatment plans for a tooth extraction only, bony changes follow as a consequence. The changes might result in unfavorable bone resorption with diverse volumetric patterns, due to different responses from osteoclastic and osteoblastic activity around the extraction socket. This can have an impact when planning to restore the extracted site, which might cause aesthetic or functional concerns in the site planned for implant therapy [1–6].

It has been reported in the literature that more bone is resorbed on the buccal than on the lingual side [7]. The main cause for this loss is the lack of bony plate thickness on the buccal/facial site. This thin bony plate also increases the chance of buccal dehiscence when teeth are still present, a most commonly encountered problem in implant dentistry [8]. The occurrence of a dehiscence is comparable to the occurrence of a three-wall bone defect. The fewer the bony walls that exist, the less the chance to maintain a blot clot provided by the extraction socket itself. Subsequently, the use of membranes will increase the regeneration process in dehiscence defects [9, 10].

The majority of bone loss occurs in the first month after extraction [6]. The amount of bone loss in the first three years after tooth extraction varies around 40-60% [11, 12]. The technique to preserve the alveolar ridge volume by incorporating foreign materials into a human extraction socket was initially described in the mid-80s [13, 14]. The clinician aims to preserve or gain a sufficient width and height of bone when teeth are removed. By evaluating the width of the ridge, Schropp et al. found a reduction of the width by approximately 50% from 12 to 5.9 mm [6]. Two-thirds of the bone loss occurred during the first three months of healing. The percentage of bone-width reduction has been found to be larger in the molar regions than in the premolar regions, and in the mandible compared to the maxilla [15]. Between the three- and the six-month evaluation, only minor bone changes were observed [16, 17]. Equally, only minor bone changes were observed between the six- and the twelve-month evaluation [16, 17]. The maximum bone loss evaluated close to the adjacent teeth of the extraction socket after 12 months was found to be 1.2 mm. A mean vertical loss of 1 mm could be determined in this study [16, 17]. Tiefengraber et al. found in a prospective split mouth study with a low number of evaluated patients that much more horizontal bone width could be preserved after extraction, when only a Gore-Tex membrane was placed over the extraction socket. After approximately 6 weeks the guided bone regeneration (GBR) site lost 1.1 mm in the buccal-lingual dimension, while the control site had lost 3.2 mm in the horizontal dimension. The radiologic examination of the vertical bone loss did not show any difference in this particular study [18].

There are two techniques that are commonly used for extraction and alveolar ridge preservation (ARP), either to close the wound of the extracted tooth by primary closure (i.e., closed flap technique, CFT) or to leave the extraction socket wound heal by secondary intention (i.e., open flap technique, OFT) [17, 19]. Primary closure is the approximation of the flap edges into close intimate contact via sutures (covering the membrane) whereas healing by secondary intention leaves the flaps in their original location following extraction with the membrane exposed [20, 21]. Iasella et al. presented clinical success of the procedure when they left the membrane exposed without primary coverage. They found the sites treated with bone grafts and resorbable membrane had lower bone loss following extraction when compared to sites without bone grafts and membrane [2].

On the other hand, Lekovic and coworkers reported on extraction and ARP with primary coverage. They found that the closed flap technique reduced the alveolar bone dimensional changes following extraction when compared with the sites without site preservation [3].

There are a few studies comparing the open and closed flap techniques in site preservation procedures [22–26]. However, the current literature is lacking in evidence to indicate which technique is superior. The limitations of those studies are (A) having one continuous surgical flap on open and closed techniques [26] and (B) lack of split mouth design utilizing a nonresorbable membrane [22, 23]. Moreover, surgical techniques in ARP procedures performed with d-PTFE (high-density polytetrafluoroethylene) membrane have not been thoroughly studied.

Therefore, the current pilot trial was conducted to compare the outcomes of the two surgical techniques, open and closed flap in ARP, using clinical and pain/discomfort analysis. This study is considered as a pilot study because the data are lacking in information regarding the standard deviation and the use of nonresorbable membrane that compares both open flap technique and closed flap technique following extractions.

2. Materials and Methods

This study was a single center pilot study, randomized controlled clinical trial, split mouth designed. It was performed from January 2015 to January 2016. The study protocol was registered at ClinicalTrials.gov (NCT03136913) and approved by the Tufts Health Sciences Institutional Review Board, Boston, Massachusetts (#11441). Subjects were recruited from Tufts University dental clinics.

2.1. Participants

Patients with a bilateral extraction (canine to molar) sites of teeth located on the same arch and having a treatment plan of extraction and ARP were included in the study. Additional inclusion criteria included the following: at least 18 years of age, no medical or dental contraindications, existence of at least 3 intact walls and half of the fourth bony wall as determined by bone sounding, no pregnancy, and no smoking. A consultation visit was conducted to determine the subject’s eligibility, and a written informed consent was obtained prior to enrollment. All subjects were enrolled in the study following completion of phase I periodontal therapy (e.g., oral hygiene instructions, scaling and root planning, and prophylaxis). Phase I therapy was performed for all patients until a plaque score of < 15% and bleeding score of <10% were achieved.

2.2. Clinical Measurements

Design and fabrication of standardized stents for clinical measurements have been described in detail in a previously published study [27]. Briefly, two impressions were taken for each patient. The stent had 4 standardized holes: mid-buccal area just above the buccal crestal bone height (BH), center of the extraction socket (CH), and width at 3mm (CW) and 5mm (AW) apical to the bone crest margin (Figure 1). The measurement of the bone width was done with a UNC-15 periodontal probe that passed through the hole until it came into contact with buccal bone. The following clinical parameters were recoded: plaque index (PI), bleeding index (BI), and keratinized tissue width (KTW). All these parameters were measured twice at baseline and 6 months.

Figure 1: Stent used to calculate crestal bone height and width. Blue arrow: mid-socket bone height measurement (CH). White arrow: buccal bone height measurement (BH). Green arrow: width at 3 mm from crestal bone height (CW). Yellow arrow: width at 5 mm from crestal bone height (AW). Red line: keratinized tissue width (KTW).

All measurements were recorded by one calibrated examiner (MA). Intraexaminer calibration was carried out by 10 fellow residents at two different sites twice. All the measurements were approximated to the nearest 0.5 mm.

2.3. Surgical Procedure

The randomization was generated using the statistical package software (R Version 2.11.1) to determine which side was in CFT or OFT group. Atraumatic extraction using periotome instruments and extraction forceps was performed. For multirooted teeth, the roots were sectioned first before extraction, and then each root was extracted as a single rooted tooth. Attention was given to the maintenance of the buccal alveolar wall to minimize the amount of forces applied to buccal bone.

In the CFT group and after the lingual releasing incision, a buccal flap with two vertical releasing incisions and a trapezoidal shape flap were conducted at the closest line angles of the neighboring teeth mesially and distally. The incision was allowed for a full thickness flap and passed the mucogingival junction (MGJ). Then, a split thickness dissection was made apical to the MGJ to allow for coronal repositioning of the flap. In the OFT group, intrasulcular incisions were made and extended on the buccal and on the lingual sides to involve at least one tooth adjacent to the planned extraction tooth. The papilla and buccal attached gingiva were preserved and undermined to allow space for membrane adaptation.

Once all the measurements were done, both groups received freeze-dried bone allograft (FDBA, BioHorizons MinerOss™) after being hydrated, following manufacturer’s instructions. A d-PTFE nonresorbable membrane (Osteogenics Biomedical Cytoplast™ TXT-200) was trimmed to the correct dimensional width of the alveolar ridge and extended 3 mm apical to the cementoenamel junction (CEJ), underneath the flap margins. After that, flaps were repositioned to cover the membrane in the CFT by the use of sutures (Ethicon Coated VICRYL®, polyglactin 910), while in the OFT group, the flaps were repositioned and the membrane was left exposed. Sutures were placed to stabilize the membrane in both groups.

At the end of the surgery, the participants were given a VAS pain questionnaire on a scale of 0-10 (with 0 being no pain at all and 10 being the worst possible pain). The subjects were asked to rate their pain at 24 hours and rate each side separately.

2.4. Postoperative Instructions

Patients received the following: amoxicillin (500 mg tid) for one week, chlorhexidine (3m Peridex™ Chlorhexidine Gluconate 0.12%, 1oz, bid) for 10 days, and ibuprofen (Pfizer Advil®, 600mg tid for three days) given to manage postsurgical discomfort and inflammation.

Another VAS pain questionnaire was given at 14-day follow-up to evaluate pain on each side of the surgical procedure separately at that time.

2.5. Sample Size and Statistical Analysis

No formal sample size calculation was performed because this is a pilot study. Ten subjects were recruited and completed the study. Descriptive statistics (e.g., means, standard deviations, median, and interquartile ranges) were computed for each group. The primary outcome was to evaluate the difference in alveolar bone height and width changes between groups. The Wilcoxon signed-rank test was used to assess statistical significance. P-values less than 0.05 were considered statistically significant. SPSS version 22 (IBM Inc., Armonk, NY, USA) was used in the analysis.

3. Results

3.1. Demographics

Demographic characteristics were the same for both groups due to design of the study. Out of 10 patients, 8 were males and 2 were females. The average age was 56.4 years old (SD = 9.1), and the range was 46 to 71 years old (Table 1). The study had 1 canine, 6 premolars, and 3 molars paired to each other on the contralateral side (a total of 20 sites). Three patients had contiguous sites that needed extraction and ARP on each side.

Table 1: Summary of demographic data.

Variable
results

Age, Mean (SD)
56.4 (9.1)

Age Range
46 to 71

Male, n (%)
8(80)

Female, n (%)
2(20)

Paired Canine, n (%)
1(10)

Paired Premolar, n (%)
6(60)

Paired Molar, n (%)
3(30)

Contiguous extraction pairs, n (%)
3(30)

3.2. Changes in Clinical Measurements

Table 2 shows the clinical measurements changes after 6 months of healing. There were no statistically significant differences in plaque index (PI) and bleeding index (BI) between baseline and 6 months for the subjects (p = 0.643 and p = 0.809, respectively) (Table 2 and Figure 2). There was a significant increase in center height when compared to the baseline within both groups (p = 0.005 for both groups) (Table 3 and Figure 2). CFT had a mean difference of 8.1 mm, SD=1.9, more than the OFT group (mean gain of 7.5 mm, SD=1.8). There were no statistically significant differences within the same group regarding BH and bone width at 3 mm and 6mm subcrestal to the mid-buccal surface. When comparing the bone gain difference in CH, BH, or bone width at 3 mm and 6mm subcrestal in CFT against OFT, there was no statistically significant difference between the groups (p = 0.389) (Table 3 and Figure 2).

Table 2: Means and standard deviations for plaque and bleeding scores at baseline following phase 1 therapy and at 6 months after extraction and ridge preservation.

Variables
Mean±SD
Median (IQR)
P-Value

Plaque at baseline
16.2±2.2
16.5(3.3)
0.643

Plaque at 6 months
16.0±3.3
15.5(4.8)

Bleeding at baseline
14.9±2.3
14.5(2.8)
0.809

Bleeding at 6 months
15.0±2.9
14.0(4.0)

Table 3: Stent measurement at baseline and 6 months following extraction and ridge preservation.

Variables
CFT
OFT
p value

Mean±SD
Median (IQR)
Mean±SD
Median (IQR)

bone height at center
Baseline
13.8±2.8
15(5)
14.2±3.1
15(5)
0.551

6 months following Sx
5.7±2
5.5(3)
6.7±2.9
6(4)
0.034

Difference
8.1±1.9
8(3)
7.5±1.8
7(3)
0.389

p Value

0.005

0.005

bone height at mid-buccal (BH)
Baseline
6.2±2.3
6(3)
6.1±1.7
6(2)
0.763

6 months following Sx
5.4±2.3
5.5(3)
5.8±1.7
6(2)
0.157

Difference
0.8±1
1(2)
0.3±1.1
0.5(1)
0.096

p Value

0.046

0.429

bone width at 3 mm sub-crestal
Baseline
3.4±1.4
3(1)
4.2±2
4(4)
0.071

6 months following Sx
3.5±1.1
3(1)
4.6±1.5
4.5(2)
0.031

Difference
-0.1±1.1
0(1)
-0.4±1.6
-0.5(2)
0.257

p Value

0.783

0.389

bone width at 5 mm sub-crestal
Baseline
3.3±1.3
3(2)
3.6±1.2
4(3)
0.366

6 months following Sx
3.2±1.1
3(2)
3.7±1
3.5(2)
0.132

Difference
0.1±0.3
0(0)
-0.1±0.5
0(0)
0.317

p Value

0.317

0.564

Keratinized tissue width (KTW)
Baseline
3.7±1.2
4(2)
3.4±1.2
3.5(2)
0.18

6 months following Sx
2±0.9
2(1)
3.4±1.2
3.5(2)
0.011

Difference
1.7±0.6
2(1)
0±0
0(0)
0.004

p Value

0.004

0.946

Pain (VAS scale 0-10)
24 hours following Sx
3±0.8
3(2)
1.1±0.5
1(0)
0.006

2 weeks following Sx
0.8±0.9
1(1)
0.4±0.5
0(1)
0.132

Difference
2.2±1.2
1(1)
0.7±0.4
0(1)
0.023

p Value

0.006

0.008

p value <0.05

Note. CFT: closed flap technique, OFT: open flap technique, Sx: surgery.

Figure 2: Net difference gain between baseline and 6 months (CFT: closed flap technique, OFT: open flap technique).

3.2.1. Changes in Keratinized Tissue Width (KTW) and VAS Pain Score

There was a statistically significant loss in keratinized tissue width within CFT group only of about 1.7 mm, SD= 0.6 mm. OFT had a significantly higher KTW at 6 months (mean of 3.4 mm, SD= 1.2, median of 3.5 mm, IQR= 2) compared to CFT (mean of 2 mm, SD= 0.9, median of 2 IQR= 1) (p = 0.011) (Table 3 and Figure 2).

OFT had a statistically significant lower pain score at 24 hours compared with CFT (a mean of 1.1 mm, SD= 0.5 OFT, and mean of 3 mm, SD= 0.8: CFT) (Table 3 and Figure 2). At 2 weeks following extraction, there was no statistically significant difference between CFT and OFT in the pain scale (p = 0.132). Both groups had a statistically significant reduction in pain when comparing 24 hours following surgery to 2 weeks following surgery (p = 0.006 and 0.008, respectively) (Table 3 and Figure 2).

4. Discussion

The current study evaluated two surgical techniques after extraction and ARP. Both sites had FDBA and a nonreinforced d-PTFE (high-density polytetrafluoroethylene) membrane. The present findings confirm that complete preservation of the ridge after tooth extraction is unlikely to be achievable and leaving the flap open (OFT) did not have any effects on the dimensional changes of bone width or height. It may have a positive effect on keratinized tissue width and postoperative pain compared with closing the extraction socket with a flap (CFT).

Several ARP techniques have reported some bone loss, even if extensive variations were used [2, 4]. Among the different regeneration techniques, the present study used corticocancellous FDBA substitute and a nonreinforced d-PTFE membrane. Two different surgical techniques were consequently implemented: complete coverage of the membrane (CFT) or a flapless procedure leaving the membrane exposed (OFT). Certainly there are several factors affecting dimensional alterations following tooth extraction. However, one factor which may play a significant role is the type surgical procedure performed: flap or flapless tooth extraction. Fickl et al. observed that, on a canine model, OFT group had a less bone loss compared with the CFT [28]. Conversely, Araujo and Lindhe [29] reported that raising a flap during extraction may had an effect on the short-term only. However, the difference between the two techniques was insignificant after 6 months.

In the current study, the two surgical procedures had similar results regarding bone changes when compared with each other. Both techniques had statistically significant difference in the center of the socket height (CH) within the same group. The CH will always be different and changed compared to the baseline in grafted or nongrafted sites [30]. There was an interesting finding in the present study in the mid-buccal socket wall height, that is, more bone height at 6 months compared with baseline in the CFT group.

In general, the vertical bone augmentation is more unpredictable compared with the horizontal bone augmentation [31, 32]. Several studies found that the use of grafting materials in socket spaces will minimize the bone loss in width and height compared with extraction only [27, 30, 33, 34]. However, it remains uncertain whether the successful outcome is influenced by the presence or absence of a primary wound closure [35, 36]. Aimetti et al. [37] who used a different bone graft, OFT and secondary closure techniques, reported a mean buccolingual width loss of 1.6 mm and height loss of 0.8 mm for the test group. Aimetti’s report of remodeling was greater than the alveolar ridge height remodeling recorded in this paper, with a mean width loss of 0.1 mm in the CFT and 0.4 mm in the OFT.

The bone loss in the horizontal dimension at 3mm and 5mm apical to bone crest was probably due to the exposed nonresorbable d-PTFE membrane (0.4 mm at 3mm and 0.1 mm at 5mm). This might be related to the difficulty in maintaining the area free of inflammation especially at the membrane margins. Compressive forces due to the sutures during the early healing process appeared to be less in the OFT group than with in the CFT group (0.4 mm SD=1.6 mm). Moreover, the primary closure accomplished by the CFT procedure seemed to maintain the vertical dimension better than the OFT group on the buccal aspect. The buccal site is the one more likely to be exposed due to bone changes.

In the OFT procedure, the d-PTFE membrane was left intentionally exposed to the oral cavity, and sutures were used mainly to stabilize the membrane. The progress of secondary wound healing appeared to be slower than the primary healing of the CFT group, regardless of the presence of the two release incisions. Difficulties were encountered due to the need for regular plaque removal of the ARP with OFT that could have played a significant role in bone loss.

Some of the limitations of this study were the convenience sample which is not representative and the total number of teeth included in the study. However, this is a pilot study, because we did not find any similar study using the same combination of bone graft and membrane. There were three patients with paired contiguous extraction sites, which confound the outcomes. Literature found that contiguous teeth extraction led to more bone loss compared with a single tooth extraction [38]. Moreover, the measurements were done using a stent at standardized points to directly measure the bone in a linear location relative to the stent hole. These data provide information at those sites only, as it lacks information on the volume. Further studies and analysis of other variables, such as defect size, and remaining walls condition are essential to confirm the current findings.

5. Conclusion

Within this pilot study’s limitations, the present findings confirm that complete preservation of the ridge after tooth extraction is unlikely to be achievable. It was found that leaving the flap open did not have any significant effects on center or buccal bone height, and 3mm or 5mm bone width. However, there was a wider band of keratinized tissue and less postoperative pain at 24 hours in the OFT compared with the CFT.

Data Availability

The clinical data used to support the findings of this study are restricted by the Institutional Review Board at Tufts Medical Center in order to protect patient privacy.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

References

G. Cardaropoli, M. Araújo, R. Hayacibara, F. Sukekava, and J. Lindhe, “Healing of extraction sockets and surgically produced—augmented and non-augmented—defects in the alveolar ridge. An experimental study in the dog,” Journal of Clinical Periodontology, vol. 32, no. 5, pp. 435–440, 2005.

J. M. Iasella, H. Greenwell, R. L. Miller et al., “Ridge preservation with freeze-dried bone allograft and a collagen membrane compared to extraction alone for implant site development: a clinical and histologic study in humans,” Journal of Periodontology, vol. 74, no. 7, pp. 990–999, 2003.

V. Lekovic, P. M. Camargo, P. R. Klokkevold et al., “Preservation of alveolar bone in extraction sockets using bioabsorbable membranes,” Journal of Periodontology, vol. 69, no. 9, pp. 1044–1049, 1998.

V. Lekovic, E. B. Kenney, M. Weinlaender et al., “A bone regenerative approach to alveolar ridge maintenance following tooth extraction. Report of 10 cases,” Journal of Periodontology, vol. 68, no. 6, pp. 563–570, 1997.

M. Nevins, M. Camelo, S. De Paoli et al., “A study of the fate of the buccal wall of extraction sockets of teeth with prominent roots,” International Journal of Periodontics & Restorative Dentistry, vol. 26, no. 1, pp. 19–29, 2006.

L. Schropp, A. Wenzel, L. Kostopoulos, and T. Karring, “Bone healing and soft tissue contour changes following single-tooth extraction: a clinical and radiographic 12-month prospective study,” International Journal of Periodontics and Restorative Dentistry, vol. 23, no. 4, pp. 313–323, 2003.

J. Pietrokovski and M. Massler, “Alveolar ridge resorption following tooth extraction,” The Journal of Prosthetic Dentistry, vol. 17, no. 1, pp. 21–27, 1967.

T.-J. Oh, S. J. Meraw, E.-J. Lee, W. V. Giannobile, and H.-L. Wang, “Comparative analysis of collagen membranes for the treatment of implant dehiscence defects,” Clinical Oral Implants Research, vol. 14, no. 1, pp. 80–90, 2003.

J. Douthitt, J. Gutmann, and D. Witherspoon, “Histologic assessment of healing after the use of a bioresorbable membrane in the management of buccal bone loss concomitant with periradicular surgery,” Journal of Endodontics, vol. 27, no. 6, pp. 404–410, 2001.

S. A. Jovanovic, R. K Schenk, M Orsini, and E. B. Kenney, “Supracrestal bone formation around dental implants: an experimental dog study,” International Journal of Oral & Maxillofacial Implants, vol. 10, no. 1, pp. 23–31, 1995.

P. J. Boyne, “Use of HTR in tooth extraction sockets to maintain alveolar ridge height and increase concentration of alveolar bone matrix,” General Dentistry, vol. 43, no. 5, pp. 470–473, 1995.

G. J. Christensen, “Ridge preservation: why not?” The Journal of the American Dental Association, vol. 127, no. 5, pp. 669-670, 1996.

J. H. Quinn, J. N. Kent, R. G. Hunter, and C. M. Schaffer, “Preservation of the alveolar ridge with hydroxylapatite tooth root substitutes,” The Journal of the American Dental Association, vol. 110, no. 2, pp. 189–193, 1985.

D. H. Bell, “Particles versus solid forms of hydroxyapatite as a treatment modality to preserve residual alveolar ridges,” The Journal of Prosthetic Dentistry, vol. 56, no. 3, pp. 322–326, 1986.

S. Jin, J. Park, N. Kim et al., “The thickness of alveolar bone at the maxillary canine and premolar teeth in normal occlusion,” Journal of Periodontal & Implant Science, vol. 42, no. 5, pp. 173–178, 2012.

V. Chappuis, M. G. Araújo, and D. Buser, “Clinical relevance of dimensional bone and soft tissue alterations post-extraction in esthetic sites,” Periodontology 2000, vol. 73, no. 1, pp. 73–83, 2017.

F. Van der Weijden, F. Dell'Acqua, and D. E. Slot, “Alveolar bone dimensional changes of post-extraction sockets in humans: a systematic review,” Journal of Clinical Periodontology, vol. 36, no. 12, pp. 1048–1058, 2009.

J. Tiefengraber, P. Diedrich, U. Fritz, and P. Lantos, “Orthodontic space closure in combination with membrane supported healing of extraction sockets (MHE). A pilot study,” Journal of Orofacial Orthopedics, vol. 63, no. 5, pp. 422–428, 2002.

G. Pagni, G. Pellegrini, W. V. Giannobile, and G. Rasperini, “Postextraction alveolar ridge preservation: biological basis and treatments,” International Journal of Dentistry, vol. 2012, Article ID 151030, 13 pages, 2012.

K. Khande, H. Saluja, and U. Mahindra, “Primary and secondary closure of the surgical wound after removal of impacted mandibular third molars,” Journal of Maxillofacial and Oral Surgery, vol. 10, no. 2, pp. 112–117, 2011.

A. Maria, M. Malik, and P. Virang, “Comparison of primary and secondary closure of the surgical wound after removal of impacted mandibular third molars,” Journal of Maxillofacial and Oral Surgery, vol. 11, no. 3, pp. 276–283, 2012.

A. Barone, V. Borgia, U. Covani, M. Ricci, A. Piattelli, and G. Iezzi, “Flap versus flapless procedure for ridge preservation in alveolar extraction sockets: a histological evaluation in a randomized clinical trial,” Clinical Oral Implants Research, vol. 26, no. 7, pp. 806–813, 2015.

A. Barone, P. Toti, A. Piattelli, G. Iezzi, G. Derchi, and U. Covani, “Extraction socket healing in humans after ridge preservation techniques: comparison between flapless and flapped procedures in a randomized clinical trial,” Journal of Periodontology, vol. 85, no. 1, pp. 14–23, 2014.

D. Engler-Hamm, W. S. Cheung, A. Yen, P. C. Stark, and T. Griffin, “Ridge preservation using a composite bone graft and a bioabsorbable membrane with and without primary wound closure: a comparative clinical trial,” Journal of Periodontology, vol. 82, no. 3, pp. 377–387, 2011.

D. M. Kim, N. De Angelis, M. Camelo, M. L. Nevins, P. Schupbach, and M. Nevins, “Ridge preservation with and without primary wound closure: A case series,” International Journal of Periodontics and Restorative Dentistry, vol. 33, no. 1, pp. 71–78, 2013.

D. M. Kim, M. Nevins, Camelo M et al., “The feasibility of demineralized bone matrix and cancellous bone chips in conjunction with an extracellular matrix membrane for alveolar ridge preservation: a case series,” International Journal of Periodontics and Restorative Dentistry, vol. 31, no. 1, pp. 39–47, 2011.

Z. S. Natto, A. Parashis, B. Steffensen, R. Ganguly, M. D. Finkelman, and Y. N. Jeong, “Efficacy of collagen matrix seal and collagen sponge on ridge preservation in combination with bone allograft: A randomized controlled clinical trial,” Journal of Clinical Periodontology, vol. 44, no. 6, pp. 649–659, 2017.

S. Fickl, O. Zuhr, H. Wachtel, W. Bolz, and M. Huerzeler, “Tissue alterations after tooth extraction with and without surgical trauma: a volumetric study in the beagle dog,” Journal of Clinical Periodontology, vol. 35, no. 4, pp. 356–363, 2008.

M. G. Araújo and J. Lindhe, “Ridge alterations following tooth extraction with and without flap elevation: an experimental study in the dog,” Clinical Oral Implants Research, vol. 20, no. 6, pp. 545–549, 2009.

Z. Natto, W. Yaghmoor, R. Bannuru, and M. Nevins, “Identification and efficacy ranking of allograft and xenograft for extraction and ridge preservation procedures,” The International Journal of Periodontics & Restorative Dentistry, vol. 37, no. 5, pp. e253–e260, 2017.

J. A. Keestra, O. Barry, L. D. Jong, and G. Wahl, “Long-term effects of vertical bone augmentation: a systematic review,” Journal of Applied Oral Science, vol. 24, no. 1, pp. 3–17, 2016.

I. Rocchietta, F. Fontana, and M. Simion, “Clinical outcomes of vertical bone augmentation to enable dental implant placement: a systematic review,” Journal of Clinical Periodontology, vol. 35, no. 8, pp. 203–215, 2008.

I. Darby, S. Chen, and R. de Poi, “Ridge preservation: what is it and when should it be considered,” Australian Dental Journal, vol. 53, no. 1, pp. 11–21, 2008.

A. Jamjoom and R. E. Cohen, “Grafts for Ridge Preservation,” Journal of Functional Biomaterials, vol. 6, no. 3, pp. 833–848, 2015.

I. Darby, S. T. Chen, and D. Buser, “Ridge preservation techniques for implant therapy,” International Journal of Oral & Maxillofacial Implants, pp. 260–271, 2009.

A. Horváth, N. Mardas, L. A. Mezzomo, I. G. Needleman, and N. Donos, “Alveolar ridge preservation. A systematic review,” Clinical Oral Investigations, vol. 17, no. 2, pp. 341–363, 2013.

M. Aimetti, F. Romano, F. B. Griga, and L. Godio, “Clinical and histologic healing of human extraction sockets filled with calcium sulfate,” International Journal of Oral & Maxillofacial Implants, vol. 24, no. 5, pp. 902–909, 2009.

M. Al-Askar, R. O'Neill, P. C. Stark, T. Griffin, F. Javed, and K. Al-Hezaimi, “Effect of single and contiguous teeth extractions on alveolar bone remodeling: a study in dogs,” Clinical Implant Dentistry and Related Research, vol. 15, no. 4, pp. 569–575, 2013.