BioMed Research International
Volume 2020 (2020), Article ID 2054293, 8 pages
https://doi.org/10.1155/2020/2054293

Research Article

A2AR Antagonists Upregulate Expression of GS and GLAST in Rat Hypoxia Model

Jun Yu,¹ Yan Yan,2,3 Yiye Chen,¹ Yan Zheng,¹ Xiaoyan Yu,⁴ Jialu Wang,¹ Yafu Wang,¹ Anken Wang,¹ Xiaoli Kang,¹ Jie Cen,¹ Lingyan Dong,¹ Li Li,⁵ and Peiquan Zhao¹

¹Department of Ophthalmology, Xinhua Hospital, School of Medicine, Shanghai Jiao Tong University, Shanghai 200092, China
²Department of Ophthalmology, Stanford University School of Medicine, Stanford, California 94303, USA
³Department of Ophthalmology, Renji Hospital, School of Medicine, Shanghai Jiao Tong University, Shanghai 200127, China
⁴Department of Ophthalmology, The Fifth People’s Hospital of Shanghai, Shanghai 200240, China
⁵Department of Ophthalmology, Shanghai Tenth People’s Hospital, Affiliated Tongji University, Shanghai 200072, China

Correspondence should be addressed to Jie Cen; cenjie@xinhuamed.com.cn, Lingyan Dong; donglingyan@xinhuamed.com.cn, Li Li; lili1-28@126.com, and Peiquan Zhao; zhaopeiquan2011@126.com

Received 29 June 2020; Revised 1 August 2020; Accepted 20 August 2020; Published 28 October 2020

Guest Editor: Xin Cao

Copyright © 2020 Jun Yu et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. The aim of this study was to research the effects of glutamine synthetase (GS) and glutamate aspartate transporter (GLAST) in rat Müller cells and the effects of an adenosine A2AR antagonist (SCH 442416) on GS and GLAST in hypoxia both in vivo and in vitro. Methods. This study used RT-PCR and Western blotting to quantify the expressions of GS and GLAST under different hypoxic conditions as well as the expressions of GS and GLAST at different drug concentrations. A cell viability assay was used to assess drug toxicity. Results. mRNA and protein expression of GS and GLAST in hypoxia Group 24 h was significantly increased. mRNA and protein expressions of GS and GLAST both increased in Group 1 μM SCH 442416 compared with other groups. One micromolar SCH 442416 could upregulate GS and GLAST’s activity in hypoxia both in vivo and in vitro. Conclusions. Hypoxia activates GS and GLAST in rat retinal Müller cells in a short time in vitro. (2) A2AR antagonists upregulate the activity of GS and GLAST in hypoxia both in vivo and in vitro.

1. Introduction

The glymphatic system is a recently discovered waste clearance system in the brain that has been described as unique system of perivascular channels that are formed by astroglial cells. The glymphatic system promotes efficient elimination of soluble proteins and metabolites from the central nervous system (CNS) [1]. Additionally, the glymphatic system may help distribute non-waste compounds, such as glucose, amino acids, and neurotransmitters, that is related to volume transmission. As the chief astroglial cells in the retina, Müller cells play an important role. Müller cells are the predominant neuron-supporting glial cells in the retina; they span the entire retina and play an important role in the homeostasis of the retina by regulating the volume of the extracellular space, ion, water, and neurotransmitters, such as glutamate [2–4].

Glutamate is known to be a major excitatory neurotransmitter. However, under some pathological conditions (hypoxia, elevated intraocular pressure, ischemia, oedema, injury, etc.), increased glutamate accumulation will induce toxicity, which promotes death and degeneration of retinal ganglion cells (RGCS) [1, 4, 5]. Therefore, the balance of glutamate in the retina is crucial, and glutamate regulation depends on the glutamine cycle. Müller cells play a key role in this cycle. Excessive extracellular glutamate undergoes glutamate aspartate transporter- (GLAST-) mediated uptake into Müller cells and is detoxicated to glutamine quickly via glutamine synthetase (GS), a major enzyme in glutamate metabolism. Then, the atoxic glutamine is transported back to the external environment for glutamate resynthesis [4, 6].

Adenosine is a natural chemical messenger that is widely found in intracellular and extracellular fluids. Adenosine binds to G-protein-linked receptors which can be classified into the A₁, A2A, A2B, and A₃, 4 subtypes. It has been confirmed that all the four types of adenosine receptors exist in the retina [7–9]. Previous studies have demonstrated that A2A receptor (A2AR) promotes the release of glutamate and that A2AR antagonists decrease its release. It has been suggested that A2AR antagonists might provide neuroprotection because they reduce the concentration of extracellular glutamate [9]. Our previous study also found that an A2AR antagonist (SCH 442416) upregulates GS and GLAST in Müller cells to improve the clearance of extracellular glutamate at elevated hydrostatic pressure in vitro [2].

In our present study, we investigate [1] the effect of GS and GLAST in rat retinal Müller cells in hypoxia and [2] the effect of an A2AR antagonist (SCH 442416) on GS and GLAST in hypoxia both in vivo and in vitro.

2. Materials and Methods

2.1. Cell Culture

The eyes of the Sprague-Dawley (new-born 0-3 days) rats were obtained from Shanghai Laboratory Animal Center CAS China (SLACCAS China). The method to prepare retinal tissue could is described our previous studies [2, 4, 7]. All retinal tissue was dissected and stored in phosphate buffer saline (PBS) (HyClone Beijing USA) on ice. The tissue was dissociated and incubated for 15 min in PBS containing 0.125% trypsin (Gibco USA) at 37°C and then added to Dulbecco’s Modified Eagle Media: Nutrient Mixture F-12 (DMEM/F12) medium (Gibco USA), which contained glutamine (2 mM), streptomycin (100 μg/mL), and penicillin (100 U/mL). Ten percent foetal bovine serum (FBS) (HyClone USA) was used to terminate the digestion. The tissue was cultured in 10 mm dishes (in air containing 5% carbon dioxide, at 37°C) in an incubator (Thermo Germany). After the first outgrowth, Müller cells are one type of strong adherent cells. Other cell types (such as microglial cells and retinal ganglion cells) are poor adherents and could be rinsed off by exposure to PBS. Using this method, we obtained highly purified Müller cells. The medium was refreshed every 48 h.

Eight to ten days later, the cells were routinely cultured at 37°C and were transferred to a culture for a 2nd passage. Experiments were performed after the second passage when the confluence was 75–80%.

2.2. Hypoxia In Vitro

2.2.1. Hypoxia Model

Hypoxia was initiated in a special chamber that had a controlled flow of a gas mixture (37°C, 94% nitrogen, 1% oxygen, and 5% carbon dioxide) (Thermo Germany).

2.3. Cultured Cell Treatment

2.3.1. Searching for a Suitable Time-Point of GS and GLAST Activity

All of the cultures were added to six-well plates at in serum-free DMEM (HyClone USA) for 6 h under normal condition (37°C, 20% oxygen, and 5% carbon dioxide). This method was used to homogenize the cells. Then, the hypoxia group cultures were placed in hypoxia model chambers for different times (12 h, 24 h, 36 h, and 48 h). The cultures of the normoxia groups were exposed to normal conditions (37°C, 20% oxygen, 5% carbon dioxide) for 48 h.

2.3.2. Searching for a Suitable Drug Concentration for Animal Experiments

All of the cultures were added to six-well plates at in serum-free DMEM (HyClone USA) for 6 h under normal conditions (37°C, 20% oxygen, 5% carbon dioxide). Then, the culture groups were placed in a hypoxia model chamber with different drug (SCH 442416) concentrations (0.1, 1, and 10 μM) for a suitable amount of time to assess GS and GLAST activity.

2.4. Cell Viability Assay

The cells were cultured in 96-well culture plates. The density was cells/well. After 24 h, Cell Counting Kit-8 (CCK-8) (10 μM/well) (Beyotime Shanghai China) was added to each well and incubated for 4 h. The absorbance at 450 nm was measured using a microplate reader. There were 8 groups (drug concentrations of control, 0.1, 1, and 10 μM and normoxia or hypoxia).

2.5. Hypoxia In Vivo

2.5.1. Hypoxia Model

A special plastic box was designed. A plastic box was used to construct the hypoxia mechanism (Figure 1). Nitrogen was pumped into the box to adjust the concentration of oxygen (10–12%). An oxygen meter was used to monitor the oxygen concentration.

Figure 1: The hypoxia mechanism: It was a plastic box. Nitrogen was pumped for adjusting the concentration of oxygen (10–12%) in the box. An oxygen meter was put for monitoring.

2.5.2. Intravitreal Injection

All of the described experiments comply with the National Institutes of Health Guidelines for Care and Use of Laboratory Animals. This study was approved by the animal ethics committee of Xinhua Hospital (Shanghai, China). Male Sprague-Dawley rats (200–250 g) were obtained from Shanghai Laboratory Animal Center CAS (Shanghai China) and were raised in a routine animal room. Rats were anesthetised with an intraperitoneal injection of xylazine (7.4 mg/mL) and ketamine hydrochloride (5 mg/kg) (Jiangsu Hergrui Medicine Co. Ltd) (Lianyungang China). The pupils of the rats were dilated with a tropicamide drop (Santen Japan). A 2 μL solution (SCH 442416 or saline) was injected into the rat vitreous space (/group). Then, rats were seeded in a hypoxic box for 1 d, 3 d, and 5 d. Control group rats were intravitreally injected with the same amount of saline and were then seeded for 5 d.

2.6. Immunofluorescent Staining

2.6.1. Cells

Expression of GS was determined with immunofluorescent staining. The cover slides were flushed first with PBS and fixed using sodium phosphate buffer (100 mM, pH 7.4), which contained 4% paraformaldehyde, for 10 min at 4°C. The cells were cultured with primary GS antibodies (Abcam British, 1 : 5000, polyclonal rabbit anti-GS antibody) overnight at 4°C. The cover slips were probed with fluorescein isothiocyanate Cy3- (BioLegend USA, 1 : 200) linked anti-rabbit IgG for 1 h at room temperature. The slides were cleared and photographed using an Axio microscope (Zeiss Germany).

2.6.2. Rats

Rats were perfused with normal saline and a 4% paraformaldehyde (PFA) solution. The right eyes were covered with a 4% PFA solution for 4 h for fixation. Retinal tissue was vertically sectioned to thickness of 7.5 μm, and then, 0.01 M PBS was added. The slices were blocked with 4% goat serum (Binyuntian China), 0.25% bovine serum albumin (HyClone USA), and 0.2% Triton X-100 (Binyuntian China) in PBS at room temperature for 2 h. The slices were incubated with a goat polyclonal anti-GLAST primary antibody (Santa Cruz USA, 1 : 200) and rabbit polyclonal anti-GS primary antibody (Santa Cruz USA, 1 : 400) at 4°C for 48 h. The retina slices were immunolabeled with fluorescein isothiocyanate (Invitrogen 1 : 200) or Cy3 (BioLegend USA, 1 : 200). Immunofluorescence images were generated with an imager laser-scanning microscope (Zeiss Germany).

2.7. Western Blotting Analysis

The method of handling retinal tissue has been described previously [2, 4, 7]. In brief, (1) extracted proteins extracted were boiled and centrifuged. (2) Proteins were separated and transferred to polyvinyl difluoride (PVDF) membranes (Millipore USA). (3) The membranes were soaked in Tris-buffered saline, which contained 5% skimmed milk and 0.1% Tween-20, for 1 h at room temperature. The primary antibodies used were for GS (Abcam British, 1 : 5000) and GLAST (Abcam British, 1 : 3000). The blots were incubated with primary antibodies overnight at 4°C. An anti-β actin antibody (Abcam British, 1 : 3000) was used as a reference to normalize the intensities of the immunoreactions with different antibodies. The membranes were incubated with a secondary antibody (Invitrogen USA, 1 : 10000) for 1 h at room temperature in darkness. The band intensities were quantified by scanning and densitometry with an Image Quant Las 4000 (GE USA).

2.8. Real-Time PCR Analysis

2.8.1. RNA Extraction

The RNA extraction method has been described previously [2, 4, 7]. Total RNA from cultures was isolated by TRIzol reagent (Gibco USA) according to the manufacturer’s instructions. RNA was treated with RNase-free DNase (Sangon Biotech China) to remove any genomic DNA contamination. The isolated RNA had an optical density (OD) 260/280 ratio of ≥2.0.

2.8.2. Real-Time PCR

Two micrograms of total RNA was reverse-transcribed to a cDNA probe. The primer sequences were as follows: GS, sense 5-ccgctcttcgtctcgttc-3, antisense 5-ctgcttgatgcctttgtt-3; GLAST, sense 5-cctatgtggcagtcgttt3, antisense 5-ctgtgatgggctggctaa3; β-actin, sense 5-cccatctatgagggttacgc-3, antisense 5-tttaatgtcacgcacgatttc-3. Real-time PCR was performed using a LightCycler instrument (ABI 7500 USA) with a SYBR-Green PCR Master mix (Takara Japan), according to the manufacturer’s instructions.

2.9. Statistical Analysis

Data are presented as the mean ± standard error of the mean (SEM) ( each group). The data were analysed by ANOVA or Student’s test with the SPSS 18.0 software, and a value < 0.05 was defined as significant.

3. Results

3.1. GS and Müller Cell

GS is a specific molecular marker for Müller cells. Figure 2 shows positive labelling for GS (Figure 2). GS is a specific molecular marker for Müller cells [1, 8–10]. In the present study, we found that >90% of culture cells were positive for GS, indicating that all of the cultured cells were Müller cells.

Figure 2: Identification of Müller cells. GS (red) was used to label Müller cells (×63).

3.2. The Effect of Hypoxia on Expression of GS and GLAST

From Western blotting analysis, we found that (1) protein expression of GS increased in hypoxia groups compared with the control group (normoxia), especially in the Group 24 h, and (2) although the protein expression of GLAST was weak, we also found that expression in Group 24 h was more obvious compared with that of other groups (Figure 3(a)).

(a)

(b)

(c)

Figure 3: (a) GS and GLAST protein expression of Müller cells in different hypoxia groups. (b) GS mRNA expression of Müller cells in different hypoxia groups. (c) GLAST mRNA expression of Müller cells in different hypoxia groups.

PCR showed that GS mRNA fluctuated in the different hypoxia groups. All of the GS mRNA in the hypoxia groups (12 h, 24 h, 36 h, and 48 h) was increased compared with that of the control group (, , , and ). The disparity of Group 24 h was the most obvious compared with other hypoxia groups (Figure 3(b)).

Unfortunately, we did not obtain a better result with GLAST mRNA (, , , and ). Figure 3(c) shows that GLAST mRNA decreased in Group 12 h; then, GLAST mRNA began to increase in Group 24 h. GLAST mRNA decreased later in Group 36 h and Group 48 h. Although the data were not significant, we found a trend indicating that hypoxia induced an increase in mRNA expression of GLAST in Group 24 h.

According to data analysis, we believed that hypoxic cell culture for 24 h was a suitable time-point for observing the activity of GS and GLAST.

3.3. The Effect of Concentration of SCH442416 on Expression of GS and GLAST in hypoxia

From Western blotting analysis, we found that the GS and GLAST proteins both increased in Group 1 μM (Figure 4(a)). PCR showed that GS and GLAST mRNA fluctuated at different drug concentrations. Group 1 μM led to a higher mRNA concentration than the other groups (GS: , , and . GLAST: , , and ) (Figures 4(b) and 4(c)).

(a)

(b)

(c)

Figure 4: (a) GS and GLAST protein expression of Müller cells in different drug concentration groups. (b) GS mRNA expression of Müller cells in different drug concentration groups. (c) GLAST mRNA expression of Müller cells in different drug concentration groups.

A 1 μM SCH 442416 solution was intravitreally injected into the right of rats. Rats were sacrificed at 1 d, 3 d, and 5 d. From the immunohistochemical experiments, compared with the control group that was injected with saline, GS and GLAST protein expression in group SCH 442416 in the retina increased over days (Figure 5).

(a)

(b)

Figure 5: GS and GLAST protein expression.

3.4. The Drug Toxicity Test of SCH442416 for Müller Cells

The drug toxicity test showed that there was no significant difference in the SCH442416 groups (drug concentrations of 0.1, 1, and 10 μM or normoxia or hypoxia) (normoxia: , , and . Hypoxia: , , and ). Thus, the concentrations of SCH442416 (0.1, 1, and 10 μM) used in our tests could not induce death of Müller cells.

However, we found that the cell activity in all of the hypoxia groups was stronger than that in the normoxia groups. We inferred that hypoxia could enhance Müller cell activity () (Figure 6).

Figure 6: Müller cell viability assay test.

4. Discussion

Our present results showed that hypoxia activated expression of GS and GLAST in rat retinal Müller cells. On base of the present and previous study, we found A2AR antagonists upregulated the expression of GS and GLAST in hypoxia both in vivo and in vitro.

Müller cells have be found accounted for 90% of the retinal gila [2–4]. And Müller cells span across the entire thickness of the retina. Müller cells constitute a link between the retinal neurons, the vitreous body, the retinal blood vessels, and the subretinal space anatomically and functionally. They have a wide array of responses to maintain homeostasis for neuronal and vascular elements. Just like a scavenger, they can maintain the integrity of the blood retinal barrier and clear metabolic waste in some pathological states (trauma, ischemia, high hydrostatic pressure, and hypoxia) [3, 4].

Retinal hypoxia plays a crucial role in a number of retinal diseases, such as diabetes, retinal oedema, retinal vascular disorders, and glaucoma [11]. Hypoxia is an important cause of CNS damage, which can result in excess excitatory amino acids, especially glutamate (a major neurotransmitter in the retina). Glutamate, which has a high concentration in retinal ganglion cells, leads to pathologic retinal ganglion cell death [11]. Some research found that hypoxia could induce upregulation of retinal glutamate uptake [12].

Glutamate is an important excitatory neurotransmitter and is also the primary mediator of excitatory synaptic transmission and excitotoxic neuronal injury in the retina. High concentrations of glutamate play a key role in retinal damage. Clearance of extracellular glutamate depends on the glutamate-glutamine cycle in Müller cells. GS and GLAST are the major enzymes in this cycle [13]. Thus, GS- and GLAST-mediated clearance of synaptic glutamate in Müller cells is critical because increased extracellular glutamate levels can lead to neurotoxicity through overstimulation of ionotropic glutamate receptors. GS and GLAST ultimately play an important role in regulating the balance between physiological signaling and pathological overactivation in the retina.

GS is a main enzyme in the metabolism of glutamate in glial cells. GS could catalyze the amidation of glutamate to glutamine, which is an important part of the circle of the transmitter pool of glutamate between neurons and glia. GS weak activity could lead to neuronal damage by allowing extracellular glutamate to accumulate. Decreased GS activity has also been reported after hypoxia or ischemia in the brain [4, 7]. GS can catalyze amidation of glutamate to glutamine in Müller cells. Krajnc et al. [14] found that GS mRNA remained elevated for over 6 h, but the activity of GS was low after more than 3 hours in the rat brain. Some studies reported that GS activity increased 24 h after hypoxia in vitro [15, 16]. In the present study, we found that hypoxia increased GS mRNA and protein in an earlier period in vitro. GS activity was highest at 24 h and later began to decrease.

Glutamate transporters are ultimately responsible for maintaining low extracellular glutamate concentration and thus play a crucial role in regulating the balance between physiological signaling and pathological overactivation. These five related glutamate transporters have been cloned: GLAST, GLT1 EAAC1, EAAT4, and EAAT5 [17]. GLAST is the main glutamate transporter for clearing excess glutamate from the extracellular milieu into Müller cells in the retina [17]. Previous research found that GLAST activity decreased in Müller cells in diabetic rat retina in vitro [18]. However, Mysona et al. [17] claimed that hyperglycaemia was insufficient to impair GLAST function in the short term. Some research indicated that GLAST was upregulated by hypoxia [19, 20], while other researchers presented the opposite results [21, 22]. Our present results suggested that although protein expression of GLAST was very weak, no significant difference was observed under different hypoxic conditions compared with GS. Hypoxia was also found to change the tendency of GLAST. Specifically, protein expression in group hypoxia 24 h was slightly higher than that of other hypoxia groups as was mRNA expression of GLAST. Thus, the suitable time-point of 24 h was determined for the A2AR antagonist (SCH 442416) experiments.

It was shown that all four subtypes of ARs (A₁, A2A, A2B, and A₃) were expressed in the retina. Blockade of A2AR affords robust neuroprotection in some noxious brain conditions, such as Huntington’s disease, ischemia, and Alzheimer’s disease [23, 24]. But there are no some reports about A2AR in retina. So we conducted a series of experiments. Our previous studies found that A2AR antagonists (SCH 442416) upregulate the expression of GLAST and GS in Müller cells and accelerate the clearance of extracellular glutamate at elevated hydrostatic pressure in vitro [2]. We observed similar outcomes in the present study, i.e., expression of GLAST and GS in Müller cells increased in hypoxia, not only in vitro but also in vivo.

In our animal hypoxia examination, we found that hypoxia induced the activity of GS and GLAST. Expression of GS and GLAST was further enhanced over days, indicating that A2AR antagonists increased the clearance of glutamate in the retina by strengthening the function of GS and GLAST. The time proceeded for 5 days after surgery. Although we studied changes in the retina during the early period, the time may have been too short for long-term observation.

5. Conclusions

In this study, hypoxia activates GS and GLAST in rat retinal Müller cells in a short period of time (12–48 hours) in vitro. Expression peaks at 24 hours. A2AR antagonists upregulate expression of GS and GLAST in hypoxia both in vivo and in vitro. And A2AR antagonists are safe for Müller cell. Hence, our results suggested A2AR antagonists might be a new drug for treatment of retinal diseases in the future.

Data Availability

The data used to support the findings of this study are available from the corresponding author upon request.

Conflicts of Interest

The authors declare that there are no conflicts of interest regarding the publication of this paper.

Authors’ Contributions

Jun Yu, Yan Yan, Yiye Chen, Yan Zheng, and Xiaoyan Yu contributed equally to this work.

References

H. Benveniste, X. Liu, S. Koundal, S. Sanggaard, H. Lee, and J. Wardlaw, “The glymphatic system and waste clearance with brain Aging: A Review,” Gerontology, vol. 65, no. 2, pp. 106–119, 2019.

J. Yu, Y. Zhong, X. Shen, Y. Cheng, J. Qi, and J. Wang, “In vitro effect of adenosine A2A receptor antagonist SCH 442416 on the expression of glutamine synthetase and glutamate aspartate transporter in rat retinal Müller cells at elevated hydrostatic pressure,” Oncology Reports, vol. 27, no. 3, pp. 748–752, 2011.

O. Kepeng, S. Mertsch, S. Theodoropoulou et al., “Müller cells stabilize microvasculature through hypoxic preconditioning,” Cellular Physiology and Biochemistry, vol. 52, no. 4, pp. 668–680, 2019.

J. Yu, X. Huang, Q. Wu, J. Wang, X. Yu, and P. Zhao, “Effect of A(2A) receptor antagonist (SCH 442416) on the mRNA expression of glutamate aspartate transporter and glutamine synthetase in rat retinal Müller cells under hypoxic conditions in vitro,” Experimental and Therapeutic Medicine, vol. 3, no. 5, pp. 803–806, 2012.

A. Grosche, T. Pannicke, J. Chen, P. Wiedemann, A. Reichenbach, and A. Bringmann, “Disruption of endogenous purinergic signaling inhibits vascular endothelial growth factor- and glutamate-induced osmotic volume regulation of Müller glial cells in knockout mice,” Ophthalmic Research, vol. 50, no. 4, pp. 209–214, 2013.

M. Dai, X. Xia, and S. Xiong, “BDNF regulates GLAST and glutamine synthetase in mouse retinal Müller cells,” Journal of Cellular Physiology, vol. 227, no. 2, pp. 596–603, 2012.

J. Yu, Y. Zhong, Y. Cheng, X. Shen, J. Wang, and Y. Wei, “Effect of high hydrostatic pressure on the expression of glutamine synthetase in rat retinal Müller cells cultured in vitro,” Experimental and Therapeutic Medicine, vol. 2, no. 3, pp. 513–516, 2011.

Y. Yafai, W. Eichler, I. Iandiev et al., “Thrombospondin-1 is produced by retinal glial cells and inhibits the growth of vascular endothelial cells,” Ophthalmic Research, vol. 52, no. 2, pp. 81–88, 2014.

Z. Yang, P. Huang, X. Liu et al., “Effect of adenosine and adenosine receptor antagonist on Müller cell potassium channel in rat chronic ocular hypertension models,” Scientific Reports, vol. 5, no. 1, article 11294, 2015.

Y. Xu, C. Chen, N. Jin et al., “Müller glia cells activation in rat retina after optic nerve injury: spatiotemporal correlation with transcription initiation factor Iib,” Journal of Molecular Neuroscience, vol. 51, no. 1, pp. 37–46, 2013.

C. Chen, H. Chen, C. Xu, Y. Zhong, and X. Shen, “Role of interleukin-1β in hypoxia-induced depression of glutamate uptake in retinal Müller cells,” Graefe's Archive for Clinical and Experimental Ophthalmology, vol. 252, no. 1, pp. 51–58, 2014.

A. K. Toft-Kehler, D. M. Skytt, K. A. Poulsen et al., “Limited energy supply in Müller cells alters glutamate uptake,” Neurochemical Research, vol. 39, no. 5, pp. 941–949, 2014.

Y. Li, X. Liu, S. Huang, P. Huang, and Y. Zhong, “Effect of SCH442416 on glutamate uptake in retinal Müller cells at increased hydrostatic pressure,” Molecular Medicine Reports, vol. 12, no. 3, pp. 3993–3997, 2015.

Y. Wang, Q. Lu, S. Gao et al., “Pigment epithelium-derived factor regulates glutamine synthetase and l-glutamate/l-aspartate transporter in retinas with oxygen-induced retinopathy,” Current Eye Research, vol. 40, no. 12, pp. 1232–1244, 2014.

J. C. Lau, R. A. Kroes, J. R. Moskal, and R. A. Linsenmeier, “Diabetes changes expression of genes related to glutamate neurotransmission and transport in the Long-Evans rat retina,” Molecular Vision, vol. 19, pp. 1538–1553, 2013.

L. Xue, P. Ding, L. Xiao, M. Hu, and Z. Hu, “Nestin is induced by hypoxia and is attenuated by hyperoxia in Müller glial cells in the adult rat retina,” International Journal of Experimental Pathology, vol. 92, no. 6, pp. 377–381, 2011.

A. María López-Colomé, Z. Martínez-Lozada, A. M. Guillem, E. López, and A. Ortega, “Glutamate transporter-dependent mTOR phosphorylation in Müller glia cells,” ASN Neuro, vol. 4, no. 5, article e00095, 2012.

P. A. Borea, S. Gessi, S. Merighi, F. Vincenzi, and k. Varani, “Pharmacology of adenosine receptors: the state of the art,” Physiological Reviews, vol. 98, no. 3, pp. 1591–1625, 2018.

K. Zeng, N. Yang, D. Wang et al., “Resveratrol prevents retinal dysfunction by regulating glutamate transporters, glutamine synthetase expression and activity in diabetic retina,” Neurochemical Research, vol. 41, no. 5, pp. 1050–1064, 2016.

A. Reichenbach and A. Bringmann, “New functions of Müller cells,” Glia, vol. 61, no. 5, pp. 651–678, 2013.

A. Hosoki, H. Oku, T. Horie et al., “Changes in expression of nestin, CD44, vascular endothelial growth factor, and glutamine synthetase by mature Müller cells after dedifferentiation,” Journal of Ocular Pharmacology and Therapeutics, vol. 31, no. 8, pp. 476–481, 2015.

F. Chen, M. Mi, Q. Zhang et al., “Taurine buffers glutamate homeostasis in retinal cells in vitro under hypoxic conditions,” Ophthalmic Research, vol. 44, no. 2, pp. 105–112, 2010.

M. Mishina, K. Ishiwata, M. Naganawa et al., “Adenosine A(2A) receptors measured with [C]TMSX PET in the striata of Parkinson's disease patients,” PLoS One, vol. 6, no. 2, article e17338, 2011.

N. Rebola, A. P. Simões, P. M. Canas et al., “Adenosine A2A receptors control neuroinflammation and consequent hippocampal neuronal dysfunction,” Journal of Neurochemistry, vol. 117, no. 1, pp. 100–111, 2011.