BioMed Research International
Volume 2020 (2020), Article ID 4630218, 6 pages
https://doi.org/10.1155/2020/4630218

Research Article

The Value of Enhanced MR Radiomics in Estimating the IDH1 Genotype in High-Grade Gliomas

Lei Niu,¹ Wei-hua Feng,¹ Chong-feng Duan,¹ Ying-chao Liu,² Ji-hua Liu,¹ and Xue-jun Liu¹

¹Radiology Department, The Affiliated Hospital of Qingdao University, Qingdao 266000, China
²Neurosurgery Department, Shandong Provincial Hospital Affiliated to Shandong First Medical University, Jinan, China, 250021

Correspondence should be addressed to Xue-jun Liu; bncz@sina.com

Received 22 May 2020; Accepted 17 July 2020; Published 24 October 2020

Academic Editor: Enzo Terreno

Copyright © 2020 Lei Niu et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. The prognosis of IDH1-mutant glioma is significantly better than that of wild-type glioma, and the preoperative identification of IDH mutations in glioma is essential for the formulation of surgical procedures and prognostic assessment. Purpose. To explore the value of a radiomic model based on preoperative-enhanced MR images in the assessment of the IDH1 genotype in high-grade glioma. Materials and Methods. A retrospective analysis was performed on 182 patients with high-grade glioma confirmed by surgical pathology between December 2012 and January 2019 in our hospital with complete preoperative brain-enhanced MR images, including 79 patients with an IDH1 mutation (45 patients with WHO grade III and 34 patients with WHO grade IV) and 103 patients with wild-type IDH1 (33 patients with WHO grade III and 70 patients with WHO grade IV). Patients were divided into a primary dataset and a validation dataset at a ratio of 7 : 3 using a stratified random sampling; radiomic features were extracted using A.K. (Analysis Kit, GE Healthcare) software and were initially reduced using the Kruskal-Wallis and Spearman analyses. Lasso was finally conducted to obtain the optimized subset of the feature to build the radiomic model, and the model was then tested with cross-validation. ROC (receiver operating characteristic curve) analysis was performed to evaluate the performance of the model. Results. The radiomic model showed good discrimination in both the primary dataset (, 95% CI: 0.754 to 0.855, , , , , and ) and the validation dataset (, 95% CI: 0.690 to 0.913, , , , , and ). Conclusion. The radiomic model, based on the preoperative-enhanced MR, can effectively predict the IDH1 genotype in high-grade glioma.

1. Introduction

Glioma is one of the most common primary malignant tumors in the brain and one of the most lethal malignant tumors in humans. An accurate preoperative diagnosis and definite characterization are very important for the selection of surgical options. In 2008, Parsons et al. [1], for the first time, found a mutation in isocitrate dehydrogenase-1 (IDH1) in the study of glioblastoma. Subsequently, a large number of studies showed significant differences in prognosis between IDH1-mutant and wild-type gliomas. The prognosis of IDH1-mutant glioma is significantly better than that of wild-type glioma [2–9]. However, at present, conventional imaging and functional magnetic resonance imaging (such as DWI, ASL, and DCE) could not predict the glioma genotypes before surgery and could not evaluate the glioma genotypes before clinical surgery. Only through the results of immunohistochemistry after surgery can we classify the tumor genes and judge the effect of surgery, predict the prognosis of patients, and even fine tune the later treatment plan. Therefore, an accurate preoperative assessment of the IDH1 genotype is of great significance for clinical treatment and prognosis evaluation.

As a new research method, radiomics can assess the phenotypes of tumors that cannot be seen by the naked eye and carry out objective and quantitative analyses to excavate the internal information of tumors and quantitatively analyze tumor heterogeneity. At present, radiomics has been verified that it can effectively improve the diagnostic accuracy [10] and has been widely used in the study of multiple organ diseases in humans.

In this study, we investigated the value of radiomics in predicting the IDH1 genotype of high-grade glioma by studying the radiomic prediction model of preoperative-enhanced MR images.

2. Materials and Methods

2.1. Patient Selection

The data were collected from our institution, a university-affiliated hospital. An approval from the institutional review board was obtained, and a written informed consent was waived due to the retrospective nature. Between December 2012 and January 2019, a total of 182 glioma patients were reviewed, and all tumors were confirmed by a histopathological examination. The subjects included 79 patients with an IDH1 mutation (45 patients with WHO grade III and 34 patients with WHO grade IV; age range, 24-62 years; mean age, ; gender, 49 males and 30 females) and 103 patients with wild-type IDH1 (33 patients with WHO grade III and 70 patients with WHO grade IV; age range, 9-78 years; mean age, ; gender, 38 males and 65 females). A total of 182 glioma patients were divided into the primary dataset (mutant IDH1, 55; wild-type IDH1, 72) and the validation dataset (mutant IDH1, 24; wild-type IDH1, 31) at a ratio of 7 : 3 using a stratified random sampling.

The inclusion criteria of this study were as follows: (1) all lesions were histopathologically confirmed by surgery, and an immunohistochemical analysis was performed, which included determining the IDH1 genotype (mutant/wild-type). All patients underwent a contrast-enhanced examination with a GE3.0T scanner (GEHC MRHDXT). The exclusion criteria were as follows: previous intracranial surgery, radiotherapy, injury, and incomplete preoperative MRI data.

2.2. MRI Acquisition

All patients were examined using the same scanner (GE SIGNA 3.0T). Contrast-enhanced T1-weighted imaging (CE-T1WI) was performed in the sagittal, coronal, and axial planes after the intravenous administration of 0.1 mmol/kg Gd-DTPA (field of view, ; matrix size, ; slice thickness, 5 mm; 90° flip angle; TR, 2250 mm; and TE, 24 ms). All images were digitally stored in a Picture Archiving and Communication Systems (Centricity PACS Radiology RA1000 Workstation, General Electric, Milwaukee, WI, USA) and could be remotely accessed.

2.3. MR Image Analysis and Feature Extraction

2.3.1. MR Image Feature Extraction

2D image slices from CE-T1WI of the largest tumor cross-section were loaded into AK software (Analysis Kit, GE Healthcare) for radiomic analysis. Two radiology specialists (NL and LXJ), with 10 and 15 years of experience in medical images, reviewed each patients’ images from CE-T1WI independently, and the two reviewers were blinded to the patients’ IDH1 mutation status.

Each tumor was manually delineated using the “polygon mode” tool; contrast-enhanced tissue and intratumoral necrosis and cystic degeneration were included in the segmentation, whereas peritumoral edema was excluded. After drawing, the two investigators together reexamined all the segmentations, and modifications were made when both agreed. A total of 396 features were extracted from T1-weighted contrast MR images, including histogram parameters, texture parameters (gray-level cooccurrence matrix (GLCM) parameters, run length matrix (RLM) parameters, and gray-level size zone matrix (GLSZM)), and form factor parameters (Figure 1).

Figure 1: Flow chart of the radiomic analysis of glioma. The original image was imported into GE A.K. (Analysis-Kinetics) analysis software, and the ROI was manually outlined to extract the radiomic features.

2.3.2. Feature Selection and Radiomic Signature Establishment

Radiomic features were extracted using A.K. software, and feature dimensionality reduction was conducted with the Kruskal-Wallis and Spearman analyses. The least absolute shrinkage and selection operator (Lasso) method was used to select the most useful predictive features from the primary dataset. The radiomic signature (rad score) was calculated for each patient via a linear combination of the selected features weighed by their respective coefficients.

2.3.3. Model Validation

ROC analysis was performed to evaluate the differentiating value of the identified variables, and the sensitivity, specificity, positive predictive value, and negative predictive value were calculated.

2.3.4. Statistical Analysis

All data were recorded in a Microsoft Excel (Microsoft Corp., Redmond, WA) file. Statistical analyses were performed using IBM SPSS version 23.0 (IBM Corp., Armonk, NY) and R statistics software (version 3.5.0, https://www.r-project.org). The age of the IDH1-mutant and IDH1 wild-type glioma patients was tested for normality and homogeneity of variance. The difference between the two groups was compared by an independent sample -test (). A Kruskal-Wallis nonparametric test and a Spearman correlation analysis were used to remove redundancy among the radiomic features. The area under the ROC curve was used to evaluate the diagnostic performance of the radiomic model (the diagnostic efficiency of was low, was medium, and was high).

3. Results

3.1. Clinical Data of the Primary Dataset and the Validation Dataset

The pathological results of all patients were detected by immunohistochemistry, including GFAP, Olig-2, IDH1, S-100, NeuN, and Ki-67. The IDH1 gene type was used as the grouping standard; the result was 79 patients with an IDH1 mutation (45 patients with WHO grade III and 34 patients with WHO grade IV; age range, 24-62 years; mean age, ; gender, 49 males and 30 females) and 103 patients with wild-type IDH1 (33 patients with WHO grade III and 70 patients with WHO grade IV; age range, 9-78 years; mean age, ; gender, 38 males and 65 females) (Table 1).

Table 1: Clinical data.

Group
Grade
Gender

III
IV
M
F

IDH1-mutant (79)
45
34
49
30

Wild-type (103)
33
70
38
65

There was a significant difference in age between IDH1-mutant and IDH1 wild-type glioma patients (Table 2).

Table 2: Statistical analysis of age in IDH1-mutant and IDH1 wild-type glioma patients.

Group
Age (y)
-test

IDH1-mutant

IDH1wild-type

3.2. Feature Selection and Radiomic Signature Building

A Lasso logistic regression model was used to screen 396 radiomic features, and 13 nonzero coefficients of radiomic features were obtained. A linear combination of the product of the corresponding weight coefficients was used to form radiomic labels for each patient (Figures 2(a)–2(c)).

(a)

(b)

(c)

Figure 2: Radiomic feature selection using the Lasso logistic regression model. (a) Selection in the Lasso model used 10-fold cross-validation via minimum criteria to screen the feature set with the best efficiency. (b) A convergence graph of feature coefficients in the Lasso model for feature selection using a 10-fold cross-validation method. (c) Thirteen nonzero coefficients of the radiomic features.

3.3. Diagnostic Validation of the Radiomic Model

In this study, a biclassification model was established to evaluate IDH1-mutant and IDH1 wild-type gliomas by combining radiomic label features with histopathology. The prediction model showed good discrimination in both the primary dataset (, 95% CI: 0.754 to 0.855, , , , , and ) and the validation dataset (, 95% CI: 0.690 to 0.913, , , , , and ) (Figures 3 and 4, Table 3).

Figure 3: The ROC curve of the primary dataset.

Figure 4: The ROC curve of the validation dataset.

Table 3: Diagnostic validation of the radiomic model.

Group
ACC
Sensitivity
Specificity
PPV
NPV

Primary dataset
0.798
0.855
0.754
0.734
0.867

Validation dataset
0.789
0.913
0.690
0.700
0.909

Note: ACC: accuracy; PPV: positive predictive value; NPV: negative predictive value.

4. Discussion

Glioma is the most common primary central nervous system neoplasm in the brain, and strong invasiveness, a poor prognosis, recurrence and aggravation of malignancy, and a high fatality rate comprise its remarkable characteristics. The new WHO classification of central nervous system tumors in 2016 added molecular features to the histological basis and renamed them using histological and molecular features; for example, glioma can be classified into IDH-mutant and wild-type based on the IDH gene mutation. Numerous studies have shown that IDH1 mutations are early molecular changes in diffuse astrocytoma and oligodendroglioma [11], and approximately 70% of grade II-III glioma and secondary glioblastomas harbor an IDH1 mutation [12, 13]. Moreover, studies have shown that IDH1-mutant and wild-type gliomas are different disease entities [14]. IDH1-mutant glioma grows slower than wild-type glioma and is associated with longer overall survival and progression-free survival and with a better prognosis and survival rate [2–9]. This prognostic difference has no significant relationship with the grade of the glioma itself [15]. In addition, studies have shown that [16, 17] an IDH1-specific titanium vaccine can antagonize IDH1-expressing tumor cells and reduce the growth of intracranial tumors. Another line of research [18] has suggested that triptolide can serve as a potent Nrf2 inhibitor, which exhibited selective cytotoxicity to patient-derived IDH1-mutated glioma cells in vitro and in vivo, and can as a valuable therapeutic approach for IDH1-mutated malignancies by targeting the Nrf2-driven glutathione synthesis pathway. Therefore, the preoperative assessment of IDH1 gene mutations in glioma has important clinical predictive value for the diagnosis and prognosis of glioma patients.

In this study, 396 radiomic features were extracted from T1W-enhanced images of 182 patients with glioma. A Lasso logistic regression model was used to screen 13 nonzero coefficients of radiomic features, and the radiomic label and model were established. The prediction model showed good discrimination in both the primary dataset () and the validation dataset (). It is concluded that the model has a good predictive effect on differentiating and predicting IDH1-mutant and wild-type gliomas before an operation, and the combination of imaging and genomics can effectively improve the preoperative diagnostic level [19]. In addition, previous study has shown that [20] the radiomic model can accurately predict the IDH1 mutation status of WHO grade II and III glioma by analyzing DTI images. In this study, the IDH1 mutation in WHO grade III and grade IV glioma-enhanced images was studied, which not only confirms the reliability of radiomics in the study of IDH1 mutations in gliomas of different grades but also broadens its application scope. In addition, this study showed that the age of IDH1-mutant glioma patients was younger than that of wild-type glioma patients, and the difference was statistically significant, consistent with previous studies, suggesting that young patients are more likely to suffer from IDH1-mutant glioma and that their postoperative survival and clinical prognosis may be more optimistic.

Our study has some limitations. This study was a retrospective study; data on glioma patients only from our research center were studied, and the model for differentiating IDH-mutant from wild-type glioma needs more research institutes for participation and validation to obtain better promotion and application value. Next, we will conduct more extensive and in-depth research with other research centers to verify the reliability of the model. In addition, some new imaging techniques have been used to predict IDH genotypes in gliomas, such as quantitative imaging of D-2-hydroxyglutarate [21] and MRI-based deep learning method [22]; these noninvasive highly accurate methods for the determination of IDH status can predict IDH status thereby facilitating clinical translation. However, our research is only based on the radiomic model for noninvasive prediction of glioma IDH genotypes, lacking of multiparameter deep learning method. In the next step, we will cooperate with other research centers to carry out multiparameter MRI deep learning method of glioma genotypes, so as to further improve the sensitivity, specificity, and accuracy of preoperative glioma genotype prediction.

In conclusion, the radiomic prediction model based on preoperative-enhanced MR can effectively predict the IDH1 genotype of high-grade glioma before an operation, thus predicting the prognosis and therapeutic effect of glioma, and it can be used as a routine evaluation method before treatment, especially for patients who can undergo only radiotherapy and chemotherapy without surgical resection.

Data Availability

The datasets generated and/or analyzed for the current study are available at the Affiliated Hospital of Qingdao University. The datasets used or analyzed during the current study are available from the corresponding author on reasonable request.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Acknowledgments

This study was supported by the Qingdao Civic Science and Technology Project (14-2-3-7-nsh) and the Taishan Scholars Fund Project (No. tsqn20161070).

References

D. W. Parsons, S. Jones, X. Zhang et al., “An integrated genomic analysis of human glioblastoma multiforme,” Science, vol. 321, no. 5897, pp. 1807–1812, 2008.

S. Han, Y. Liu, S. J. Cai et al., “IDH mutation in glioma: molecular mechanisms and potential therapeutic targets,” British Journal of Cancer, vol. 122, no. 11, pp. 1580–1589, 2020.

Z. Li, Y. Wang, J. Yu, Y. Guo, and W. Cao, “Deep learning based radiomics (DLR) and its usage in noninvasive IDH1 prediction for low grade glioma,” Scientific Reports, vol. 7, no. 1, article 5467, 2017.

J. B. Qin, Z. Liu, H. Zhang et al., “Grading of gliomas by using radiomic features on multiple magnetic resonance imaging (MRI) sequences,” Medical Science Monitor, vol. 23, pp. 2168–2178, 2017.

J. Beiko, D. Suki, K. R. Hess et al., “IDH1 mutant malignant astrocytomas are more amenable to surgical resection and have a survival benefit associated with maximal surgical resection,” Neuro-Oncology, vol. 16, no. 1, pp. 81–91, 2014.

N. Sabha, C. B. Knobbe, M. Maganti et al., “Analysis of IDH mutation, 1p/19q deletion, and PTEN loss delineates prognosis in clinical lowgrade diffuse gliomas,” Neuro-Oncology, vol. 16, no. 7, pp. 914–923, 2014.

P. Kickingereder, F. Sahm, A. Radbruch et al., “IDH mutation status is associated with a distinct hypoxia/angiogenesis transcriptome signature which is non-invasively predictable with rCBV imaging in human glioma,” Scientific Reports, vol. 5, no. 1, article 16238, 2015.

K. Yamashita, A. Hiwatashi, O. Togao et al., “MR imaging-based analysis of glioblastoma multiforme: estimation of IDH1 mutation status,” AJNR. American Journal of Neuroradiology, vol. 37, no. 1, pp. 58–65, 2016.

D. N. Louis, A. Perry, G. Reifenberger et al., “The 2016 World Health Organization classification of tumors of the central nervous system: a summary,” Acta Neuropathologica, vol. 131, no. 6, pp. 803–820, 2016.

P. Lambin, E. Rios-Velazquez, R. Leijenaar et al., “Radiomics: extracting more information from medical images using advanced feature analysis,” European Journal of Cancer, vol. 48, no. 4, pp. 441–446, 2012.

T. Watanabe, S. Nobusawa, P. Kleihues, and H. Ohgaki, “IDH1 mutations are early events in the development of astrocytomas and oligodendrogliomas,” The American Journal of Pathology, vol. 174, no. 4, pp. 1149–1153, 2009.

H. R. Madala, S. R. Punganuru, V. Arutla, S. Misra, T. Thomas, and K. Srivenugopal, “Beyond brooding on oncometabolic havoc in IDH-mutant gliomas and AML: current and future therapeutic strategies,” Cancers, vol. 10, no. 2, 2018.

N. Chen, T. Yu, J. Gong et al., “IDH1/2 gene hotspot mutations in central nervous system tumours: analysis of 922 Chinese patients,” Pathology, vol. 48, no. 7, pp. 675–683, 2016.

M. E. Berens, A. Sood, J. S. Barnholtz-Sloan et al., “Multiscale, multimodal analysis of tumor heterogeneity in IDH1 mutant vs wild-type diffuse gliomas,” PLoS One, vol. 14, no. 12, article e0219724, 2019.

C. Houillier, X. Wang, G. Kaloshi et al., “IDH1 or IDH2 mutations predict longer survival and response to temozolomide in low-grade gliomas,” Neurology, vol. 75, no. 17, pp. 1560–1566, 2010.

T. Schumacher, L. Bunse, S. Pusch et al., “A vaccine targeting mutant IDH1 induces antitumour immunity,” Nature, vol. 512, no. 7514, pp. 324–327, 2014.

K. Tateishi, H. Wakimoto, A. J. Iafrate et al., “Extreme vulnerability of IDH1 mutant cancers to NAD+ depletion,” Cancer Cell, vol. 28, no. 6, pp. 773–784, 2015.

Y. L. Di Yu, Y. Zhou, V. Ruiz-Rodado, M. Larion, G. Xu, and C. Yang, “Triptolide suppresses IDH1-mutated malignancy via Nrf2-driven glutathione metabolism,” Proceedings of the National Academy of Sciences of the United States of America, vol. 117, no. 18, pp. 9964–9972, 2020.

S. Liang, R. Zhang, D. Liang et al., “Multimodal 3D DenseNet for IDH genotype prediction in gliomas,” Genes, vol. 9, no. 8, 2018.

P. Eichinger, E. Alberts, C. Delbridge et al., “Diffusion tensor image features predict IDH genotype in newly diagnosed WHO grade II/III gliomas,” Scientific Reports, vol. 7, no. 1, article 13396, 2017.

V. Tiwari, T. Mashimo, Z. An et al., “In vivo MRS measurement of 2-hydroxyglutarate in patient-derived IDH-mutant xenograft mouse models versus glioma patients,” Magnetic Resonance in Medicine, vol. 84, no. 3, pp. 1152–1160, 2020.

C. G. B. Yogananda, B. R. Shah, M. Vejdani-Jahromi et al., “A novel fully automated MRI-based deep learning method for classification of IDH mutation status in brain gliomas,” Neuro-Oncology, vol. 22, no. 3, pp. 402–411, 2020.