BioMed Research International
Volume 2020 (2020), Article ID 6492786, 6 pages
https://doi.org/10.1155/2020/6492786

Research Article

Deep Gray Matter Iron Content in Neuromyelitis Optica and Multiple Sclerosis

Adam Pudlac,¹ Andrea Burgetova,¹ Petr Dusek,² Petra Nytrova,² Manuela Vaneckova,¹ Dana Horakova,² Jan Krasensky,¹ and Lukas Lambert¹

¹Department of Radiology, First Faculty of Medicine, Charles University and General University Hospital in Prague, Katerinska 32, Prague 128 08, Czech Republic
²Department of Neurology and Centre of Clinical Neuroscience, First Faculty of Medicine, Charles University and General University Hospital in Prague, Katerinska 32, Prague 128 08, Czech Republic

Correspondence should be addressed to Andrea Burgetova; andrea.burgetova@vfn.cz

Received 4 September 2019; Accepted 29 April 2020; Published 19 May 2020

Academic Editor: Rosario Sanchez-Pernaute

Copyright © 2020 Adam Pudlac et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. Neuromyelitis optica (NMO) and multiple sclerosis (MS) are often presenting with overlapping symptoms. The aim of this study was to determine whether and how NMO and MS differ regarding cerebral iron deposits in deep gray matter (DGM) and the correlation between iron deposition and clinical severity as well as to regional atrophy of the DGM. Methods. We analyzed 20 patients with NMO, 40 patients with a relapsing-remitting (RR) form of MS, and 20 healthy controls with 1.5T MRI. Quantitative susceptibility mapping (QSM) was performed to estimate iron concentration in the DGM. Results. Patients with NMO have higher magnetic susceptibility values in the substantia nigra compared to healthy controls. RRMS patients have lower magnetic susceptibility values in the thalamus compared to healthy controls and NMO patients. Atrophy of the thalamus, pulvinar, and putamen is significant both in RRMS compared to NMO patients and healthy controls. A correlation was found between the disability score (EDSS) and magnetic susceptibility in the putamen in RRMS. Conclusions. This study confirms that a disturbed cerebral iron homeostasis in patients with NMO occurs in different structures than in patients with RRMS. Increased magnetic susceptibility in substantia nigra in NMO and decreased magnetic susceptibility within the thalamus in RRMS were the only significant differences in the study sample. We could confirm that iron concentration in the thalami is decreased in RRMS compared to that in the HC group. Positive association was found between putaminal iron and EDSS in RRMS.

1. Introduction

MS and neuromyelitis optica (NMO) are inflammatory diseases of the central nervous system presenting with overlapping symptoms; therefore, their differential diagnosis cannot be based on clinical examination alone. The presence of aquaporin-4 immunoglobulin G (AQP4-IgG) in sera of NMO patients definitely distinguishes these two diseases [1]. Aquaporin-4 (AQP4) as a target antigen is expressed on the cell membrane of astrocytes and ependymal cell. Binding of AQP4-IgG to AQP4 can cause complement activation with subsequent cell destruction or internalization of AQP4 resulting in an impairment of osmotic balance. The majority of NMO patients have brain lesions, especially in areas with a high expression of AQP4 (diencephalic lesions surrounding the third ventricles and cerebral aqueduct, dorsal brainstem lesions adjacent to the fourth ventricle, etc.); however, their morphology and location differ from lesions typically found in MS [2, 3]. Both entities also differ in pathology, in autoimmune mechanisms, and in the response to some immunotherapies. Neuroinflammatory and neurodegenerative changes in multiple sclerosis (MS) are associated with changes in cerebral iron accumulation as documented in MRI and neuropathological studies [4, 5]. Abnormal iron deposits have been detected in the deep gray matter (DGM), i.e., in the putamen, caudate nucleus, and globus pallidus and in a subset of white matter (WM) lesions using iron-sensitive MR techniques such as R2 relaxometry, magnetic field correlation imaging, phase imaging, and quantitative susceptibility mapping (QSM) [6–8]. On the contrary, WM lesions in NMO patients do not contain increased iron deposits [9]. Previous studies brought inconsistent results as to whether there are any differences in the iron content of DGM structures between MS and NMO [4, 10].

The primary goal of this study was to compare iron content in DGM among patients with MS, NMO, and healthy subjects using QSM. The secondary goals were to investigate the correlation between iron deposition and clinical severity and to assess regional atrophy of the DGM using volumetric analysis in both patient groups.

2. Materials and Methods

This cross-sectional study was performed in accordance with the Declaration of Helsinki, it was approved by the Ethics Committee of the General Faculty Hospital and First Medical Faculty, Charles University, and all participants signed informed consent. Between December 2013 and March 2015, 20 patients with NMO underwent MRI of the brain.

2.1. Study Subjects

An age- and sex-matched cohort of 20 healthy controls (1 : 1) and 40 patients with a relapsing-remitting (RR) form of MS (1 : 2) was examined within the same time frame. The group of RR MS and controls is partially overlapping with subjects included in our previous study [7]. All patients with RRMS fulfilled the revised McDonald criteria [11], and the diagnosis of NMO was based on Wingerchuk’s diagnostic criteria [12]. Patients were examined by a specialist in demyelinating disorders. Neurological disability was evaluated by Kurtzke disability status scale (EDSS). All 20 NMO patients were AQP4-IgG positive; all samples were tested by commercially available immunofluorescence cell-based assay (CBA) using recombinant human M1-AQP4 (Euroimmun, Lübeck, Germany). Demographic data of the patients are shown in Table 1.

Table 1: Demographic and clinical data in NMO, RRMS, and HC groups.

NMO
RRMS
HC
p

No. of subjects
20
40
20
—

Gender (male)
4 (20%)
8 (20%)
4 (20%)
1.0

Age (years)

0.54

Disease duration (years)

—
0.25

EDSS (points)
a
a
a
<0.0001

Annual relapse rate
0.5 (0-3)b
0.0 (0-2)b

0.058

aAll between-group difference significant (pairwise comparison), bmedian (range). Abbreviations: NMO: neuromyelitis optica; RRMS: remittent-relapsing multiple sclerosis; HC: healthy controls; EDSS: expanded disability status scale. Unless otherwise indicated, data are presented as .

2.2. MRI

The examinations were performed using a 1.5T MR imaging system (Gyroscan NT; Philips Healthcare, Best, the Netherlands); a standard quadrature head coil was used. The protocol included FLAIR (150 axial sections, TR 1000 ms, TE 140 ms, TI 2600 ms, spatial resolution  mm³, scan duration 10 minutes and 16 seconds), T1-weighted imaging (fast-field echo/3D, 150 axial sections, TR 25 ms, TE 5.01 ms, spatial resolution  mm³, scan duration 12 minutes and 48 seconds), and susceptibility-weighted imaging (fast-field echo/3D, 100 axial sections, TR 48.1 ms, TE 33.2 ms, spatial resolution  mm³, scan duration 6 minutes and 30 seconds) pulse sequences.

2.3. Image Analysis

QSM images were reconstructed using a total generalized variation method as previously described [13]. Briefly, the reconstruction consisted of Laplacian unwrapping, background field removal, and dipole inversion by using the total generalized variation regularization in a single integrated step. QSM images were rigidly aligned with the T1-weighted images [7, 14]. Measurements of the volume and regional median bulk susceptibilities in parts per billion (ppb) were performed in the following regions of interest (ROIs) segmented on the T1-weighted images using the automated algorithm included in FreeSurfer, version 4.5 (http://surfer.nmr.mgh.harvard.edu/): globus pallidus (GP), putamen (Put), caudate nucleus (CN), and thalamus (Thal) (Figure 1). Additionally, the volume of the following structures was manually segmented on anonymized QSM images by a senior radiologist blinded to the diagnosis: pulvinar thalami (PT), nucleus ruber (NR), and the substantia nigra (SN); median bulk susceptibilities were extracted (Figure 2). QSM values were adjusted to a manually drawn ROI in the occipital white matter avoiding any lesions. The volume of cerebral structures was normalized using the residual approach method, which uses linear regression between the volume of the structure and the brain envelope [15].

(a)

(b)

(c)

Figure 1: Example axial MR image slice depicting gradient-echo magnitude (a), raw phase (b), and quantitative susceptibility map (c). Magnetic susceptibility scale in ppb is shown.

Figure 2: Comparison of axial images at the level of mesencephalon; gradient-echo magnitude (a) and quantitative susceptibility map (b) of a typical healthy control (upper row) and typical age-matched neuromyelitis optica patient (bottom row). The substantia nigra is denoted by white arrowhead. Magnetic susceptibility scale in ppb is shown.

2.4. Statistical Analysis

Statistical analysis was performed using SPSS 19 (IBM Corp., Armonk, NY) and R (the R Foundation for Statistical Computing, Vienna, Austria). Matching of the groups was performed using the MatchIt function in R. To test for statistical significance among the study groups, we used ANOVA with Tukey’s HSD post hoc tests, the Kruskal-Wallis test with Dunn’s post hoc tests, and test as appropriate. Correlation between EDSS and QSM was expressed as Spearman’s rho coefficient. Two-tailed values below 0.05 were considered significant.

3. Results and Discussion

3.1. Comparison of Magnetic Susceptibility among NMO, RRMS, and HC

NMO had higher bulk magnetic susceptibility values in the SN () compared to healthy controls (, ) but not to RRMS (, ). RRMS had lower susceptibility in the thalamus () compared to NMO (, ) and HC (, ) (Table 2).

Table 2: Mean adjusted magnetic susceptibility (in ppb) in deep gray matter structures.

Mean susceptibility (±SD) (ppb)

Post hoc tests

HC
NMO
RRMS

HC-NMO
HC-RRMS
NMO-RRMS

Globus pallidus

0.21

Nucleus ruber

0.60

Caudate nucleus

0.59

Pulvinar thalami

0.44

Putamen

0.34

Substantia nigra

0.030
0.032
0.69
0.081

Thalamus

0.0019
0.90
0.011
0.0086

Abbreviations: NMO: neuromyelitis optica; RRMS: remittent-relapsing multiple sclerosis; HC: healthy controls.

3.2. Volume of DGM, Comparison of NMO, RRMS, and HC

The volume of the thalamus was smaller in RRMS patients ( ml) compared to HC ( ml, ) and NMO ( ml, ). Significantly decreased volume in RRMS patients was also noted in the putamen and pulvinar, compared to NMO and RR (Table 3).

Table 3: Adjusted volume (ml) of the deep gray matter structures.

Mean volume (±SD) (ml)

Post hoc tests

HC
NMO
RR

HC-NMO
HC-RRMS
NMO-RRMS

Globus pallidus

0.062

Nucleus ruber

0.122

Caudate nucleus

0.864

Pulvinar thalami

0.0008
0.847
0.0136
0.0023

Putamen

0.0026
0.900
0.0194
0.0079

Substantia nigra

0.124

Thalamus

0.0032
0.900
0.0094
0.023

Abbreviations: NMO: neuromyelitis optica; RRMS: remittent-relapsing multiple sclerosis; HC: healthy controls.

3.3. Association between Magnetic Susceptibility and Age

There was a significant correlation of magnetic susceptibility values with age in the nucleus ruber (, ), the caudate nucleus (, ), and the putamen (, ) in RRMS. In NMO, the correlation of magnetic susceptibility with age was not significant in any of the evaluated structures.

3.4. Association between Magnetic Susceptibility and Disability

A weak correlation was found between the EDSS disability score and magnetic susceptibility in the putamen (, ) in RRMS only (Table 4).

Table 4: Associations of EDSS with adjusted magnetic susceptibility values.

NMO

RRMS

Globus pallidus
0.077
0.747

0.033
0.839

Nucleus ruber
0.109
0.647

0.245
0.128

Caudate nucleus
0.095
0.692

0.215
0.182

Pulvinar thalami
0.062
0.794

-0.090
0.580

Putamen
0.142
0.550

0.317
0.046

Substantia nigra
0.010
0.967

0.059
0.718

Thalamus
-0.064
0.789

0.120
0.462

 = Spearman’s correlation coefficient;  =  value. Abbreviations: NMO: neuromyelitis optica; RRMS: remittent-relapsing multiple sclerosis.

This study showed that patients with NMO have higher magnetic susceptibility values in the substantia nigra compared to healthy subjects. RRMS patients have lower magnetic susceptibility values in the thalamus and greater atrophy of the putamen, thalamus, and pulvinar compared to healthy subjects and NMO patients. A positive correlation was found between the disability score (EDSS) and magnetic susceptibility in the putamen in RRMS.

In this work, we have confirmed that the pattern of iron deposition is different in NMO compared to RRMS patients. Notably, NMO patients have higher magnetic susceptibility in SN whereas other basal ganglia in NMO patients have susceptibility values comparable to healthy subjects. On the contrary to our result, Chen et al. [4] observed increased iron deposition in the bilateral SN in MS patients compared to the NMO and control groups. There are several possible reasons for this discrepancy. Firstly, compared to previous studies, NMO patients in our study are considerably older with longer disease duration. In the theoretical case of a steeper slope of age-related iron accumulation in NMO, the difference between patients and healthy controls may be apparent only in older subjects. Secondly, QSM may be superior in detecting abnormal iron deposits compared to other MR methods, such as phase imaging or R2 relaxometry, used in some previous studies [16]. Lastly, there is a difference between SN pars reticulata and pars compacta which have distinct iron levels and its concentration is regulated differently in these subregions [17]. Our segmentation based on QSM images also included the caudal layers of SN and could thus theoretically contain more of SN pars compacta. NMO is a relatively rare disorder, and therefore, previous studies targeting iron homeostasis in NMO included low number of patients. Doring et al. found in a retrospective study of 6 female and 6 male patients with NMO that susceptibility values were decreased in the nucleus ruber with a greater difference in older subjects [10]. In our study, which included higher number of NMO patients with longer disease duration and which was better balanced in terms of the gender prevalence of MS, we were only able to account for age-dependent changes but could not confirm any between-group differences in magnetic susceptibility of the nucleus ruber. Unfortunately, Doring et al. did not include SN in their analysis. Nevertheless, previous studies using diffusion tensor imaging (DTI) also suggested gray matter abnormalities in NMO [18] and abnormal pattern of movement-associated cortical activations in NMO depicted by a functional MRI study supported gray matter involvement in the disease [19].

Iron metabolism might reflect the chronic oxidative injury in NMO patients. It is still unclear whether iron metabolism is implicated in the pathogenesis of NMO [19]. The finding of isolated iron accumulation in SN resembles the pattern observed in Parkinson’s disease (PD). Interestingly, recent animal study showed high perivascular density of AQP4 in the SN that was further increased in the 1-methyl-4-phenyl-1,2,3,6-tetrahydropyridine (MPTP) model of PD [20].

In this study, we confirmed that iron concentration in the thalami is decreased in RRMS compared to the HC group. This is consistent with the results of recently published works [7, 8, 21].

Apart from the brain disease and its variants, course, and duration [21], numerous other factors that result in iron deposition abnormalities have been identified including gene polymorphisms associated with iron regulation [22, 23]. Moreover, mere magnetic susceptibility of the tissue does not perfectly account for its iron content because iron occurs in forms with different magnetic properties. However, correlation between tissue magnetic susceptibility and iron concentration has been established in ex vivo studies comparing MR, histopathologic sections, and measurement of iron concentration [16].

The magnetic susceptibility is not just a marker of the disease, but it is also independently associated with the clinical disability in MS patients. We showed that increased susceptibility in the putamen in RRMS patients is associated with higher EDSS. The correlation between iron concentration in putamen and clinical severity in MS is consistent with the results in previously published studies [24–26]. In contrast, Zivadinov et al. found a correlation between iron accumulation and disability only in globus pallidus [21]. Furthermore, he reported an association between disability and decreased iron in the thalamus.

This study showed that patients with MS have smaller volumes of the putamen, thalamus, and pulvinar compared to NMO and HC. Several studies have identified reduction in DGM volume in NMO patients [27–29]. The studies comparing regional GM atrophy in NMO and MS are rare and have inconsistent results. Although some studies found DGM atrophy in NMO restricted to the thalamus, the difference in our study was not significant [30, 31]. Nevertheless, patients with cognitive impairment exhibit a more severe atrophy. Decreased volume of the thalamus in NMO was shown in the study of Fan et al.; volume was smaller in the AQP4 (−) group and the MS group than that in the HC group [32]. Duan et al. found atrophy in NMO patients in several regions of frontal, temporal, parietal lobes, and insula but not in the DGM [27].

This study has several limitations. Firstly, the number of NMO patients enrolled in the study is relatively small given the paucity of this autoimmune disease. Secondly, we did not evaluate susceptibility changes in inflammatory lesions as has been previously done by other research groups using a 7T MR [2]. Thirdly, cross-sectional design provides no information regarding the temporal dynamics of iron accumulation. Iron deposition within white matter and inflammatory lesions should be the focus of further investigations as well as longitudinal settings of the study.

4. Conclusions

Our study confirms that a disturbed cerebral iron homeostasis in patients with NMO occurs in different structures than in patients with RRMS. Increased magnetic susceptibility in substantia nigra in NMO and decreased magnetic susceptibility within the thalamus in RRMS were the only significant differences in the study sample. We could confirm that iron concentration in the thalami is decreased in RRMS compared to that in the HC group. Positive association was found between putaminal iron and EDSS in RRMS. The iron metabolism might reflect the chronic oxidative injury. It is still unclear whether iron metabolism is implicated in the pathogenesis of NMO. The magnetic susceptibility is not just a marker of the disease, but it is also independently associated with the clinical disability; positive association was found between putaminal iron and EDSS in RRMS. However, as thalamic iron concentration shows a specific pattern of evolution in time, only longitudinal studies may support this association.

Data Availability

“The data used to support the findings of this study are available from the corresponding author upon request.”

Disclosure

This work was presented as a poster at ECTRIMS congress 2019, Stockholm.

Conflicts of Interest

The authors declare that there is no conflict of interest regarding the publication of this work.

Acknowledgments

This study was supported by the Czech Ministry of Health grant (NV18-08-00062, 15-25602A, and RVO VFN64165) and by the Charles University in Prague grant (PROGRES Q27).

References

V. A. Lennon, D. M. Wingerchuk, T. J. Kryzer et al., “A serum autoantibody marker of neuromyelitis optica: distinction from multiple sclerosis,” The Lancet, vol. 364, no. 9451, pp. 2106–2112, 2004.

T. Sinnecker, S. Schumacher, K. Mueller et al., “MRI phase changes in multiple sclerosis vs neuromyelitis optica lesions at 7T,” Neurology-Neuroimmunology Neuroinflammation, vol. 3, no. 4, p. e259, 2016.

H. J. Kim, F. Paul, M. A. Lana-Peixoto et al., “MRI characteristics of neuromyelitis optica spectrum disorder: an international update,” Neurology, vol. 84, no. 11, pp. 1165–1173, 2015.

X. Chen, C. Zeng, T. Luo et al., “Iron deposition of the deep grey matter in patients with multiple sclerosis and neuromyelitis optica: a control quantitative study by 3D-enhanced susceptibility-weighted angiography (ESWAN),” European Journal of Radiology, vol. 81, no. 4, pp. e633–e639, 2012.

S. Du, S. K. Sah, C. Zeng et al., “Iron deposition in the gray matter in patients with relapse-remitting multiple sclerosis: a longitudinal study using three-dimensional (3D)-enhanced T2-weighted angiography (ESWAN),” European Journal of Radiology, vol. 84, no. 7, pp. 1325–1332, 2015.

D. Cobzas, H. Sun, A. J. Walsh, R. M. Lebel, G. Blevins, and A. H. Wilman, “Subcortical gray matter segmentation and voxel-based analysis using transverse relaxation and quantitative susceptibility mapping with application to multiple sclerosis,” Journal of Magnetic Resonance Imaging, vol. 42, no. 6, pp. 1601–1610, 2015.

A. Burgetova, P. Dusek, M. Vaneckova et al., “Thalamic iron differentiates primary-progressive and relapsing-remitting multiple sclerosis,” AJNR. American Journal of Neuroradiology, vol. 38, no. 6, pp. 1079–1086, 2017.

F. Schweser, A. L. R. D. Martins, J. Hagemeier et al., “Mapping of thalamic magnetic susceptibility in multiple sclerosis indicates decreasing iron with disease duration: a proposed mechanistic relationship between inflammation and oligodendrocyte vitality,” NeuroImage, vol. 167, pp. 438–452, 2018.

S. Chawla, I. Kister, J. Wuerfel et al., “Iron and non-iron-related characteristics of multiple sclerosis and neuromyelitis optica lesions at 7T MRI,” American Journal of Neuroradiology, vol. 37, no. 7, pp. 1223–1230, 2016.

T. M. Doring, V. Granado, F. Rueda et al., “Quantitative susceptibility mapping indicates a disturbed brain iron homeostasis in neuromyelitis optica - a pilot study,” PloS One, vol. 11, no. 5, article e0155027, 2016.

C. H. Polman, S. C. Reingold, B. Banwell et al., “Diagnostic criteria for multiple sclerosis: 2010 revisions to the McDonald criteria,” Annals of Neurology, vol. 69, no. 2, pp. 292–302, 2011.

D. M. Wingerchuk, V. A. Lennon, S. J. Pittock, C. F. Lucchinetti, and B. G. Weinshenker, “Revised diagnostic criteria for neuromyelitis optica,” Neurology, vol. 66, no. 10, pp. 1485–1489, 2006.

C. Langkammer, K. Bredies, B. A. Poser et al., “Fast quantitative susceptibility mapping using 3D EPI and total generalized variation,” NeuroImage, vol. 111, pp. 622–630, 2015.

A. Burgetova, Z. Seidl, J. Krasensky, D. Horakova, and M. Vaneckova, “Multiple sclerosis and the accumulation of iron in the basal ganglia: quantitative assessment of brain iron using MRI T<sub>2</sub> relaxometry,” European Neurology, vol. 63, no. 3, pp. 136–143, 2010.

O. Voevodskaya, A. Simmons, R. Nördenskjold et al., “The effects of intracranial volume adjustment approaches on multiple regional MRI volumes in healthy aging and Alzheimer’s disease,” Frontiers in Aging Neuroscience, vol. 6, 2014.

C. Langkammer, T. Liu, M. Khalil et al., “Quantitative susceptibility mapping in multiple sclerosis,” Radiology, vol. 267, no. 2, pp. 551–559, 2013.

D. E. Huddleston, J. Langley, P. Dusek et al., “Imaging Parkinsonian Pathology in Substantia Nigra with MRI,” Current Radiology Reports, vol. 6, no. 4, p. 15, 2018.

A. Pichiecchio, E. Tavazzi, G. Poloni et al., “Advanced magnetic resonance imaging of neuromyelitis optica: a multiparametric approach,” Multiple Sclerosis Journal, vol. 18, no. 6, pp. 817–824, 2012.

L. Zhang, Z. Hong, X. Chen et al., “Iron metabolism in neuromyelitis optica patients,” Journal of the Neurological Sciences, vol. 347, no. 1–2, pp. 214–218, 2014.

A. Prydz, K. Stahl, M. Puchades et al., “Subcellular expression of aquaporin-4 in substantia nigra of normal and MPTP-treated mice,” Neuroscience, vol. 359, pp. 258–266, 2017.

R. Zivadinov, E. Tavazzi, N. Bergsland et al., “Brain iron at quantitative MRI is associated with disability in multiple sclerosis,” Radiology, vol. 289, no. 2, pp. 487–496, 2018.

D. Gemmati, G. Zeri, E. Orioli et al., “Polymorphisms in the genes coding for iron binding and transporting proteins are associated with disability, severity, and early progression in multiple sclerosis,” BMC Medical Genetics, vol. 13, no. 1, p. 70, 2012.

J. Hagemeier, M. Ramanathan, F. Schweser et al., “Iron-related gene variants and brain iron in multiple sclerosis and healthy individuals,” NeuroImage: Clinical, vol. 17, pp. 530–540, 2018.

C. W. Tjoa, R. H. B. Benedict, B. Weinstock-Guttman, A. J. Fabiano, and R. Bakshi, “MRI T2 hypointensity of the dentate nucleus is related to ambulatory impairment in multiple sclerosis,” Journal of the Neurological Sciences, vol. 234, no. 1–2, pp. 17–24, 2005.

Y. Zhang, L. M. Metz, V. W. Yong, and J. R. Mitchell, “3 T deep gray matter T2 hypointensity correlates with disability over time in stable relapsing–remitting multiple sclerosis: A 3-year pilot study,” Journal of the Neurological Sciences, vol. 297, no. 1–2, pp. 76–81, 2010.

S. Ropele, I. D. Kilsdonk, M. P. Wattjes et al., “Determinants of iron accumulation in deep grey matter of multiple sclerosis patients,” Multiple Sclerosis Journal, vol. 20, no. 13, pp. 1692–1698, 2014.

Y. Duan, Y. Liu, P. Liang et al., “Comparison of grey matter atrophy between patients with neuromyelitis optica and multiple sclerosis: a voxel-based morphometry study,” European Journal of Radiology, vol. 81, no. 2, pp. e110–e114, 2012.

J.-B. Chanson, J. Lamy, F. Rousseau et al., “White matter volume is decreased in the brain of patients with neuromyelitis optica,” European Journal of Neurology, vol. 20, no. 2, pp. 361–367, 2013.

F. von Glehn, S. Jarius, R. P. C. Lira et al., “Structural brain abnormalities are related to retinal nerve fiber layer thinning and disease duration in neuromyelitis optica spectrum disordersMultiple Sclerosis Journal,” vol. 20, no. 9, pp. 1189–1197, 2014.

Q. Wang, N. Zhang, W. Qin et al., “Gray matter volume reduction is associated with cognitive impairment in neuromyelitis optica,” AJNR. American Journal of Neuroradiology, vol. 36, no. 10, pp. 1822–1829, 2015.

J.-W. Hyun, G. Park, K. Kwak et al., “Deep gray matter atrophy in neuromyelitis optica spectrum disorder and multiple sclerosis,” European Journal of Neurology, vol. 24, no. 2, pp. 437–445, 2017.

M. Fan, Y. Fu, L. Su et al., “Comparison of brain and spinal cord magnetic resonance imaging features in neuromyelitis optica spectrum disorders patients with or without aquaporin-4 antibody,” Multiple Sclerosis and Related Disorders, vol. 13, pp. 58–66, 2017.