Behavioural Neurology
Volume 2015 (2015), Article ID 356476, 10 pages
http://dx.doi.org/10.1155/2015/356476

Research Article

Long-Term Neuropsychological Sequelae in HIV-Seronegative Cryptococcal Meningoencephalitis Patients with and without Ventriculoperitoneal Shunts: A Cine MRI Study

Meng-Hsiang Chen,¹ Cheng-Hsien Lu,2,3 Hung-Chen Wang,⁴ Hsiu-Ling Chen,1,5 Nai-Wen Tsai,² Shau-Hsuan Li,⁶ Nai-Wen Hsu,⁷ Wei-Ming Lin,⁸ Chia-Te Kung,⁹ and Wei-Che Lin¹

¹Department of Diagnostic Radiology, Kaohsiung Chang Gung Memorial Hospital, Chang Gung University College of Medicine, Kaohsiung 83305, Taiwan
²Department of Neurology, Kaohsiung Chang Gung Memorial Hospital, Chang Gung University College of Medicine, Kaohsiung 83305, Taiwan
³Department of Biological Science, National Sun Yat-Sen University, Kaohsiung 804, Taiwan
⁴Department of Neurosurgery, Kaohsiung Chang Gung Memorial Hospital, Chang Gung University College of Medicine, Kaohsiung 83305, Taiwan
⁵Department of Biomedical Imaging and Radiological Sciences, National Yang-Ming University, Taipei 11221, Taiwan
⁶Department of Medicine, Kaohsiung Chang Gung Memorial Hospital, Chang Gung University College of Medicine, Kaohsiung 83305, Taiwan
⁷Department of Radiology, Yuan’s General Hospital, Kaohsiung 802, Taiwan
⁸Department of Radiology, Chiayi Chang Gung Memorial Hospital, Chiayi 613, Taiwan
⁹Department of Emergency Medicine, Kaohsiung Chang Gung Memorial Hospital, Chang Gung University College of Medicine, Kaohsiung 83305, Taiwan

Received 13 November 2014; Revised 9 March 2015; Accepted 20 March 2015

Academic Editor: João Quevedo

Copyright © 2015 Meng-Hsiang Chen et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. Hydrocephalus in cryptococcal meningoencephalitis is most commonly managed with a ventriculoperitoneal shunt. This study applied cine magnetic resonance imaging (MRI) to evaluate initial disease severity on long-term cerebrospinal fluid (CSF) flow dynamics and associated neuropsychological sequelae in cryptococcal meningoencephalitis patients with and without ventriculoperitoneal shunts. Methods. Eighteen human immunodeficiency virus-seronegative cryptococcal meningoencephalitis patients (10 with shunts versus 8 without shunts) were compared with 32 age- and sex-matched healthy volunteers. All subjects underwent complete neurologic examination and neuropsychological testing. Cine MRI was conducted to evaluate CSF flow parameters. Initial CSF laboratory analysis and imaging findings were correlated with present CSF flow parameters and neuropsychological scores. Results. Patients without shunts had higher average flow than controls, suggesting chronic hydrocephalus. Initial Evans ratios and CSF glucose levels were associated with CSF peak velocity and flow. Worsening CSF flow parameters correlated with decreased neuropsychological performance. Conclusions. CSF flow parameter differences between the cryptococcal meningoencephalitis patients both with and without ventriculoperitoneal shunts could be detected by cine MRI and correlated with acute stage disease severity and chronic stage neuropsychological results. Cine MRI is useful for assessing the chronic hydrocephalus that may lead to neuropsychological deficits in cryptococcal meningoencephalitis patients.

1. Background

Cryptococcal meningoencephalitis is the most frequently encountered manifestation of cryptococcal infection. It has a high rate of neurologic sequelae despite antifungal therapy [1–3]. Hydrocephalus is an occasional complication. Delays in hydrocephalus diagnosis and treatment are directly related to poor outcomes, including various degrees of residual neurologic sequelae [4–7].

Ventriculoperitoneal shunt placement is a helpful intervention to avoid fatal acute stage complications caused by hydrocephalus. However, shunt placement for hydrocephalus does not always result in a good outcome [5, 6]. Cryptococcal meningoencephalitis patients without hydrocephalus do not initially require a shunt procedure. However, chronic reinfection or delayed increases of intracranial pressure may occur and lead to clinical deterioration. The long-term dynamics of cerebrospinal fluid (CSF) in cryptococcal meningoencephalitis are unclear, and the effects of cryptococcal meningoencephalitis on long-term neuropsychological sequelae likewise remain unknown. Improved treatment strategies may help, however, to increase the understanding of cognitive impairment that occurs in such patients.

Cine magnetic resonance imaging (MRI) has been applied to a variety of clinical uses [7] because of its ability to noninvasively evaluate flow characteristics inside the body. It can help determine the possible pathophysiology of normal pressure hydrocephalus using peak velocity and flow parameters. The current study primarily sought to test the hypothesis that changes in CSF dynamics occur in chronic cryptococcal meningoencephalitis patients during long-term follow-up irrespective of whether they receive a ventriculoperitoneal shunt. The study also used neuropsychological testing to examine the relationships among initial presentations, alterations in CSF dynamics, and cognitive function.

2. Methods

2.1. Subjects

In Taiwan, the majority of patients with cryptococcal meningitis are HIV-negative [8], although the condition is associated with diabetes mellitus (18.9%), liver cirrhosis (7%), and iatrogenic Cushing syndrome (7%) [9]. At Kaohsiung Chang Gung Memorial Hospital, there were 64 patients over a period of 13 years (1998–2010) who were retrospectively identified as having cryptococcal meningoencephalitis. Among these 64 patients, there were 21 patient deaths. In the group of 43 survivors, there were 25 patients who received regular follow-ups. All these patients were followed up at the hospital’s neurology outpatient clinic for more than one year after complete antifungal therapy, and none of them had impairment of the body’s immune system. The initial CSF laboratory presentations, acute stage MRI, and follow-up examinations (including brain cine MRI and neuropsychological tests) were then analyzed. The hospital’s ethics committee approved this retrospective study (IRB 101-2469B).

Cryptococcal meningitis was diagnosed according to previously published data [1]. In addition, cryptococcal meningoencephalitis was defined as (1) isolation of Cryptococcus neoformans in one or more CSF cultures, positive CSF cryptococcal-antigen titer, or positive CSF India ink staining, along with clinical features of meningitis or (2) isolation of C. neoformans in blood culture with clinical presentations and typical CSF features of meningitis [10].

Cryptococcal meningoencephalitis patients were excluded if they had any of the following: (1) age of <20 years or >75 years; (2) evidence of alcoholism, known sedative or neuroleptic use related to affective or psychiatric disease or any other addictive disorders; (3) known neurologic disorders potentially affecting the central nervous system or severe recent life events possibly interfering with neuropsychological testing; (4) poor neuroimaging quality. Among the 25 patients, one was excluded due to age, three were excluded due to alcoholism, two were excluded due to medication for insomnia, and one was excluded due to poor imaging quality resulting from noncooperation during MR acquisition. As such, a final total of 18 cryptococcal meningoencephalitis patients were enrolled in this retrospective study. Two of them had diabetes mellitus, one had liver cirrhosis, and another had a history of idiopathic thrombocytopenia with steroid exposure. The 18 patients finally included were divided into two groups according to whether or not they received ventriculoperitoneal shunts.

All of the patients underwent complete medical and neurologic examinations, as well as neuropsychological testing. Neurologists integrated both the clinical manifestations and neuropsychological findings. A cohort of 32 sex- and age-matched healthy subjects was recruited to serve as the control group; none of these subjects had any neurological disease and all had similar educational statuses.

2.2. MRI Study

2.2.1. Initial Assessment

Cranial CT scans and/or MRI studies were performed on the patients upon admission. Repeat CT and/or MRI scans were conducted if there was any clinical deterioration before discharge. The following imaging characteristics were evaluated: (1) meningeal/gyral enhancement, (2) basal ganglia infarction/Virchow-Robin space dilatation, (3) hydrocephalus, and (4) focal cerebritis. Hydrocephalus was diagnosed by the presence of a dilated temporal horn of the lateral ventricle, without obvious brain atrophy and/or an Evans ratio of >0.3 on CT or MRI at admission. The Evans ratio refers to the ratio of the bilateral frontal horn ventricular width to the maximum biparietal diameter [11]. Hydrocephalus patients received a ventriculoperitoneal shunt upon evidence of either increased intracranial pressure or clinical deterioration.

2.2.2. Follow-Up Examination

A follow-up MRI was performed using a 3 T unit (Signa Excite HD 12.0 Twin Speed 8-channel scanner; GE Medical Systems, Milwaukee, WI, United States) with a maximum slew rate of 150 T/m/s and a maximum gradient amplitude in each orthogonal plane of 50 mT/m. Intracranial lesions were evaluated using axial T1-weighted images, T2-weighted images, and T1-weighted enhanced images.

CSF flow quantification was performed using a cine phase contrast velocity-encoded pulse-gated single slice gradient echo sequence with a TE/TR of 7.5/33 msec, a slice thickness of 5 mm, a velocity encoding of 20 cm/s, and 32 phases acquired corresponding to the cardiac cycle. Other relevant scan parameters included a 20° flip angle, an FOV of 10.0 cm, and a phase FOV of 100%. All subjects underwent MRI examination at approximately the same time of day (i.e., the afternoon) to control for circadian variations [12].

2.2.3. Evaluation of Cine MRI

The CSF flow data were processed using GE ReportCard software (version .3.0: General Electric Medical Systems, Waukesha, WI, United States), and all the parameters were recorded, including peak positive velocity (PPV), peak negative velocity (PNV), average flow (AF), average positive flow (APF), and average negative flow (ANF). Measurement biases were avoided through a discussion establishing a consensus among the authors. The ROIs were placed manually by two radiologists who were aided by a cursor and graphic display device; they covered the entire aqueduct, avoiding the brain parenchymal, CSF, and basilar-vertebral vessels, as demonstrated in Figure 1. The measurements were performed by investigators blinded to the patient’s name, clinical findings, and other imaging data.

(a)

(b)

(c)

Figure 1: The original phase contrast imaging is shown in (a) and amplified in (b). The ROIs were placed manually to circulate through the whole aqueduct. The control reference of periaqueductal brain parenchymal matter is shown in (c) as a “C-shape” circulation area that avoided the basilar-vertebral vessel system.

The mean values of the CSF flow parameters for each assessment were averaged from three repeated measurements. Intraobserver reproducibility (M.H.C.) was high for all the CSF flow parameters (1, 1, 0.927, 0.997, and 0.993 for PPV, PNV, AF, APF, and ANF, resp.). There was also high interobserver reproducibility (between M.H.C and W.C.L) for all CSF flow parameters (1, 1, 0.988, 0.998, and 0.994 for PPV, PNV, AF, APF, and ANF, resp.).

2.3. Neuropsychological Testing during Follow-Up

A clinical psychologist blinded to the patients’ exposure status performed the neuropsychological tests. The patients completed a test battery which was assembled to assess executive function, attention, and memory. The neuropsychological evaluation was performed using Wechsler Adult Intelligence Scale-III subtests [13]. These included information measuring general knowledge, digit span, vocabulary (i.e., ability to define 35 words), arithmetic, letter-number sequencing, comprehension, similarities, picture completion, matrix reasoning, block design, picture arrangement, digit symbol, and object assembly.

The Cognitive Ability Screening Instrument [14] was obtained in all subjects for a brief screening cognitive assessment test comparing Asian and American populations. The test consists of nine domains of cognitive function (i.e., attention, concentration, orientation, short- and long-term memory, language ability, visual construction, word list generation, abstraction, and judgment), with scores ranging from 0 (worst) to 100 (best).

2.4. Statistical Analysis

The age and educational levels of the subjects in the three groups were analyzed using Student’s -test. Sex differences were analyzed by Fisher’s exact test. Laboratory data that fit the Gaussian distribution were analyzed using the one-way analysis of covariance model with the patient’s age, sex, and educational level as covariates. The laboratory data that did not have a Gaussian distribution were analyzed using the nonparametric independent samples test. The neuropsychological test scores between patients and control subjects were estimated by the one-way analysis of covariance model with the patient’s age, sex, and education level as covariates.

Each of the CSF flow parameters for the three groups was estimated by one-way analysis of covariance models with the patient’s age and sex as covariates; the Bonferroni correction was performed as a post hoc analysis. Secondary partial correlation analyses (two-tailed) were performed between CSF flow parameters and initial presentation in the acute stage and between CSF flow parameters and neuropsychological tests during follow-up; these tests were performed after controlling for age, sex, and educational level, demonstrating differences among the groups. Statistical significance was defined at . All statistical analyses were performed using SPSS software, version 17.0 (SPSS Inc., Chicago, IL, United States).

3. Results

3.1. Baseline Characteristics and Imaging Findings

At the time of admission, all 18 patients received complete laboratory tests and conventional CT and/or MRI studies to assess the disease. At the time of long-term follow-up, all 18 patients received complete neuropsychological testing, conventional MRI, and cine MRI for CSF flow parameter acquisition.

The baseline characteristics and initial clinical data of all subjects (i.e., patients and controls) are listed in Table 1. There were no significant differences among the three groups in terms of sex, age, or educational attainment. On average, the patients with shunts had a longer duration of hospitalization (), higher initial CSF lactate concentration (), and higher maximum CSF lactate concentration () during the acute stage compared to patients without shunts.

Table 1: Demographic data of cryptococcal meningitis patients and controls.

Demographics
Patients with shunts
Patients without shunts
Normal
or

Gender (male/female)
9/1
7/1
28/4
0.022
0.978

Age at follow-up
53.70 ± 14.30
54.00 ± 9.87
51.47 ± 13.30
0.190
0.827

Education
9.30 ± 5.46
10.63 ± 4.63
12.56 ± 4.22
2.184
0.124

Duration of follow-up (months)a
73.5 (21.25, 113.25)
116 (38.5, 130.75)
—
−1.289
0.197

Hospitalization duration (days)a
53 (33.5, 60.5)
25 (17, 43)
—
−2.398
0.016

Glasgow Coma Scale at admissiona
15 (13.75, 15)
15 (14, 15)
—
−0.304
0.761

Glasgow Coma Scale at dischargea
15 (13.75, 15)
15 (15, 15)
—
−0.853
0.394

CSF Cryptococcal Ag titer at admissiona
1024 (320, 1536)
384 (96.5, 2816)
—
−0.842
0.400

Max CSF Cryptococcal Ag titer during hospitalizationa
1024 (320, 2560)
1024 (96.5, 2816)
—
−0.311
0.756

CSF white cell count (/mm³)a
10 (43.75, 400.5)
152 (40.5, 290)
—
−0.245
0.806

CSF protein at admission (g/L)a
201.5 (96.75, 355.43)
156 (91.6, 189)
—
−1.073
0.283

CSF protein max during hospitalization (g/L)a
210.4 (130.5, 504)
169.5 (91.6, 317)
—
−1.429
0.153

CSF lactate at admission (mmol/L)a
28.6 (22.85, 52.175)
18.1 (9.1, 24)
—
−2.197
0.028

CSF lactate max during hospitalization (mmol/L)a
41.7 (29.9, 75.4)
24 (20.1, 51.8)
—
−2.064
0.039

CSF glucose at admission (mmol/L)a
45.5 (18.25, 58.75)
36 (22, 49)
—
−0.976
0.329

CSF glucose max during hospitalization (mmol/L)a
48 (30.5, 125.5)
53 (25, 70)
—
−0.582
0.560

Serum sodium (mmol/L)
138.90 ± 3.76
137.86 ± 2.55
—
0.446
0.516

Creatinine level at discharge (mol/L)
1.0867 ± 0.27
1.22 ± 0.33
—
1.125
0.312

Evan ratio in admission
27.11 ± 3.04
27.96 ± 5.34
—
0.065
0.802

Evan ratio in follow-up
27.13 ± 2.86
26.12 ± 2.52
—
0.877
0.365

Nonparametric independent samples test was used for the non-Gaussian distribution of data. Bold-faced values represent significant differences between groups ().

Table 2 lists the acute stage neuroimaging findings and CSF cryptococcal-antigen titers on admission for each patient, along with their follow-up CT and/or MRI findings. Baseline studies were normal in five of the patients, all of whom were in the patient group without shunts.

Table 2: Neuroimaging findings of the patients in the acute stage and at follow-up.

Patient number
Antigen titer
Acute MRI finding
MRI f/u finding
Image f/u interval (months)

Patients with shunts

1
1 : 1024
Meningeal enhancement, mild
Hyperintensity over thalamus
Meningeal enhancement, progression
Hyperintensity over bilateral frontal and cerebellum
4

2
1 : 1024+
Meningeal enhancement, diffuse
Dilated lateral left frontal ventricle
98

3
1 : 512
Meningeal enhancement, diffuse
VR dilatation, right side
Hyperintensity over right BG
Meningeal enhancement, regressive change
Hyperintensity over bilateral frontoparietal, basal ganglia, and thalami
24

4
1 : 1024
Meningeal enhancement, diffuse
Hyperintensity over bilateral occipital, right high frontal, and parietal, right genus of corpus callosum
Meningeal enhancement, diffuse
Hyperintensity over right genus of corpus callosum and bilateral occipital lesion regression
13

5
Negative
Dilated bilateral ventricles (CT)
Hyperintensities over bilateral frontoparietal area
124

6
>1 : 1024
Meningeal enhancement, diffuse
Hyperintensity over suprasellar area
Complete regression
50

7
1 : 128
Meningeal enhancement, diffuse
Hyperintensity over bilateral cerebellum and bilateral BG
Dilated lateral ventricles
Hyperintensity over bilateral cerebellum
35

8
Negative
Prominent ventricles
Hyperintensity over bilateral BG
Complete regression
111

9
1 : 8
Meningeal enhancement, diffuse
VR dilatation, right side
Meningeal enhancement, diffuse
VR dilatation, right side
120

10
1 : 2048
Hyperintensity over left frontoparietal area
Dilated bilateral ventricles
Complete regression
97

Patients without shunts

11
1 : 8+
VR dilatation, bilateral
Complete regression
117

12
1 : 8
No active lesion
No active lesion
132

13
1 : 256+
No active lesion
No active lesion
97

14
Negative
No active lesion (CT)
No active lesion
115

15
1 : 128
Meningeal enhancement over posterior fossa and perivascular space of supratentorium,
VR dilatation, bilateral
Complete regression
12

16
None
No active lesion (CT)
No active lesion
127

17
1 : 256
Meningeal enhancement over
right occipital and bilateral central sulci
Hyperintensity over right occipital and bilateral parietal area
Dilated lateral ventricles
19

18
Negative
No active lesion (CT)
Dilated lateral ventricles
168

During follow-up, the evolution of interval imaging studies was compared lesion by lesion. There was imaging abnormality resolution in nine of 18 patients (50%), including three patients (30%) in the shunt group and six patients (75%) in the group without shunts. There was a persistent abnormality in nine (50%) patients as follows: seven were in the patients with shunts (70%) group and two were in the patients without shunts (25%) group. Among the patients with shunts, five had parenchymal hyperintensity (50%), four had meningeal/gyral enhancement (40%), two had ventricular dilatation (20%), and one had Virchow-Robin space dilatation (10%). There were two patients with persistent abnormalities who had ventricular dilatation (25%) in the group without shunts.

3.2. Neuropsychological Testing

Patient neuropsychological tests were performed in the chronic disease stage, with the results compared with corresponding results for the controls. All the data are presented in Table 3. Each cryptococcal meningoencephalitis patient scored lower on the vocabulary, similarity, comprehension, digit span, picture complete, block design, and digit symbol coding tests of the Wechsler Adult Intelligence Scale-III than the healthy subjects did. The cryptococcal meningoencephalitis patients also scored more poorly on the orientation, abstract thinking, mental manipulation, short-term memory, and semantic fluency tests of the Cognitive Ability Screening Instrument than the healthy subjects did.

Table 3: Neuropsychological rating scores among groups.

Neuropsychological tests
All patients
Patients with shunts
Patients without shunts
Normal

Wechsler Adult Intelligence Scale-III

Information
9.06 ± 2.46
9.33 ± 2.00
8.75 ± 3.01
11.18 ± 2.85
2.810
0.101
2.239
0.119

Vocabulary
9.47 ± 3.36#
8.44 ± 3.21
10.62 ± 2.82
12.06 ± 2.79
4.057
0.050
3.131
0.054

Similarity
8.41 ± 3.69#
7.55 ± 3.04
9.37 ± 4.30
11.50 ± 2.03
10.059
0.003
6.153
0.004

Comprehension
8.94 ± 3.83#
8.33 ± 3.50
9.62 ± 4.30
11.96 ± 3.08#
4.946
0.031
2.618
0.085

Arithmetic
9.41 ± 3.14
9.33 ± 2.91
9.50 ± 3.58
10.96 ± 2.49
1.785
0.188
0.875
0.424

Digit span
8.71 ± 3.16#
8.33 ± 3.96
9.12 ± 2.10
12.28 ± 3.64#
7.019
0.011
3.471
0.040

Letter-number sequencing
7.88 ± 4.61
8.11 ± 4.22
7.62 ± 5.23
10.68 ± 3.55
3.156
0.085
1.606
0.216

Picture complete
8.06 ± 2.66#
7.66 ± 2.00
8.50 ± 3.33
10.53 ± 2.89#
6.549
0.014
3.481
0.040

Block design
8.47 ± 3.83#
8.77 ± 3.52
8.12 ± 4.35
11.90 ± 3.10
9.280
0.004
4.772
0.013

Matrix reasoning
8.94 ± 2.97
9.00 ± 2.64
8.87 ± 3.48
10.81 ± 3.51
1.085
0.303
0.594
0.556

Digit symbol coding
8.06 ± 3.58#
7.55 ± 2.50
8.62 ± 4.62
11.53 ± 2.67
9.507
0.004
4.809
0.013

Picture arrangement
8.71 ± 3.31
9.11 ± 3.14
8.25 ± 3.65
10.65 ± 2.96
1.709
0.198
1.262
0.293

Cognitive Ability Screening Instrument

Attention
7.23 ± 1.09
6.77 ± 1.37
7.75 ± 0.46&
7.84 ± 0.44
3.870
0.055
6.475
0.003

Orientation
15.88 ± 3.69#
16.55 ± 3.24
15.12 ± 4.22
17.71 ± 0.77
4.076
0.050
3.413
0.042

Abstract thinking
9.35 ± 2.32#
8.88 ± 2.20
9.87 ± 2.47
10.78 ± 1.26#
4.560
0.038
2.889
0.067

Mental Manipulation
8.41 ± 1.80#
8.44 ± 1.42
8.37 ± 2.26
9.31 ± 1.17#
4.174
0.047
2.042
0.142

Short-term memory
8.48 ± 3.33#
8.85 ± 3.36
8.06 ± 3.47
10.71 ± 1.76
5.49
0.024
3.376
0.043

Long-term memory
9.65 ± 0.79
9.77 ± 0.66
9.50 ± 0.92
9.93 ± 0.35
1.426
0.239
1.606
0.212

Language
9.73 ± 0.50
9.60 ± 0.59
9.87 ± 0.35
9.85 ± 0.54
0.506
0.481
1.308
0.281

Semantic fluency
6.94 ± 2.75#
6.66 ± 3.20
7.25 ± 2.31
8.93 ± 1.47#
5.835
0.020
2.869
0.068

Drawing
9.06 ± 1.60
8.77 ± 1.78
9.37 ± 1.40
9.81 ± 0.592
3.828
0.057
2.606
0.085

Total score
84.74 ± 14.51#
84.34 ± 14.73
85.18 ± 15.24
94.91 ± 4.74#
8.945
0.005
4.377
0.019

and represent comparison between all patients and the controls.

and represent comparison among the patients with/without shunts and controls.

Significant difference between all patients and the controls.

Significant difference between the patients with shunts and controls.

Significant difference between the patients without shunts and controls.

Significant difference between the patients with and without shunts.

Bold-faced values represent significant differences ().

For most items, the patients with shunts received poorer neuropsychological scores than both the patients without shunts and the control subjects. Through one-way analysis of covariance after adjustments for age, sex, and education, the patients with shunts showed significantly poorer vocabulary, similarity, and digit symbol coding test results for the Wechsler Adult Intelligence Scale-III, as well as poorer attention test results for the Cognitive Ability Screening Instrument, than the controls.

However, the patients without shunts exhibited significantly lower block design results for the Wechsler Adult Intelligence Scale-III, as well as lower orientation and short-term memory results for the Cognitive Ability Screening Instrument, than the controls. Moreover, these results were even lower than those for the patients who had shunts.

3.3. CSF Flow Parameters

The patient CSF flow parameters for all the patients were acquired in the chronic stage and then compared with those of the controls. CSF flow parameter differences among the three groups are shown in Figure 2. The AF () of the patients without shunts was significantly higher than that of the controls. However, there was no significant AF difference between the patients with shunts and the controls. The PPV (), PNV (), and APF () of the patients with shunts were significantly lower than those of the controls. There were no significant differences, however, between the patients without shunts and the controls for these parameters.

Figure 2: Cine MRI parameters of patients with and without shunts as compared with healthy controls. Significant difference between the patients with shunts and controls. Significant difference between the patients without shunts and controls ().

3.4. Relationship between Initial Clinical Data and CSF Flow Parameters

Due to dynamic changes in CSF caused by the ventriculoperitoneal shunts, we only analyzed patients without shunts for the relationships between the initial clinical data and the CSF parameters. This was done to avoid the influence of ventriculoperitoneal shunt intervention. The higher PPV (, ) and PNV (, ) were positively associated with a higher Evans ratio. The higher APF (, ) and ANF (, ) were negatively associated with a lower initial glucose level. The higher APF (, ) and ANF (, ) were also negatively associated with a lower maximum CSF glucose level in the acute stage.

3.5. Relationship between CSF Flow Parameters and Neuropsychological Function

All patients and controls were included in the partial correlation analysis to assess the relationship between CSF parameters and neuropsychological function. Higher AF was negatively associated with poorer picture arrangement test results (, ) on the Wechsler Adult Intelligence Scale-III, as well as poorer short-term memory (, ) and draw (, ) results on the Cognitive Ability Screening Instrument. Higher ANF was negatively associated with poorer short-term memory results (, ) for the Cognitive Ability Screening Instrument.

4. Discussion

Cryptococcal meningoencephalitis is the most frequently encountered manifestation of cryptococcal infection. The most common symptoms are headache (89%), fever (56%), personality change (17%), and limb weakness (11%), all of which are compatible with brain imaging findings. In this study, the patients with shunts had mostly poorer neuropsychological test scores than the patients without shunts, a finding which was consistent with the initial imaging findings. This may have been caused, however, by confounding factors of disease severity, including hospitalization (, ) and both initial (, ) and maximum (, ) CSF lactate concentrations; results for all three of these variables were significantly poorer in the patients with shunts than in the patients without shunts. These findings suggest that long-term sequelae are, in some respects, established during the initial phase of the disease insofar as patients do not recover from initial problems over time, even with early ventriculoperitoneal shunt placement.

The cine MRI is a highly reproducible [15] and reliable method for taking flow measurements, whether it is performed in vivo [16] or in vitro [17]. Wide applications of cine MRI have been reported for arachnoid cysts, syringomyelia, Chiari 1 malformation, neuroendoscopic third ventriculostomy, ventriculoperitoneal shunt evaluation, and normal pressure hydrocephalus [18]. Our study results showed that the AF in the control subjects was 25.6 ± 12.9 μL/beat, consistent with previous reports [19, 20].

The patients without shunts had significantly higher AF than the control subjects, suggesting the persistence of chronic hydrocephalus even at the long-term follow-up (Figure 3). Meanwhile, the patients with shunts had significantly lower PPV, PNV, and APF than the controls, resulting in a similar CSF flow wave form, but on a much smaller scale than that of the patients without shunts (Figure 3). Shunt pathways appear to play important roles in dynamic changes of CSF flow. There were also correlations between initial lab data, CSF flow parameters, and neuropsychological scores, suggesting that CSF flow parameters gathered by cine MRI may be associated with long-term neuropsychological sequelae and correspond to initial disease severity.

(a)

(b)

(c)

(d)

(e)

(f)

Figure 3: The MR imaging in (a) the acute stage and (b) at follow-up for a 27-year-old male who received a shunt and had a follow-up duration of 98 months showed no interval changes in ventricular size. (c) CSF flow patterns at follow-up showed normal wave form but a smaller longitudinal scale. The MR imaging in (d) the acute stage and (e) at follow-up for a 45-year-old male without a shunt procedure and with a follow-up duration of 97 months showed a mildly increased ventricular size. His CSF flow pattern (f) shows a more extremely increased AF than that of either the controls or the patients without shunts.

The causes of chronic hydrocephalus in cryptococcal meningoencephalitis patients remain unclear; however, some clues in the changes of CSF dynamics may be helpful for finding answers. The elevated AF in patients without shunts indicates chronic hydrocephalus after long-term follow-up. In addition to CSF malabsorption, decreased intracranial compliance may lead to restricted arterial pulsations and increased capillary pulsations [21], thereby causing chronic hydrocephalus. The CSF flow dynamics are usually classified as hypermotile/hyperdynamic, normal, or hypomotile/hypodynamic according to CSF flow parameters in cine MRI [18, 22]. Typical hypomotile CSF flow diseases are Chiari I malformation [23] and aqueductal stenosis [24], with decreased average flow. In contrast, the chronic phase of cryptococcal meningoencephalitis, during which patients without shunts exhibit increased AF and patients with shunts exhibit normal AF, suggests totally different CSF flow dynamics.

In the patients without shunts, the AF was 39.013 ± 13.699 μL/beat, which was significantly higher (, ) than the AF for the controls (25.6 ± 12.9 μL/beat). A similar result has been noted in patients with normal pressure hydrocephalus, which is a well-known disease with hypermotile CSF flow [25]. These patients have decreased intracranial compliance and, thus, present with hypermotile CSF flow [26].

In the patients without shunts, the increased AF was accomplished with both decreased PPV and PNV. Similar findings have also been observed in normal pressure hydrocephalus patients without shunts. In the early stage of communicating hydrocephalus, the same brain mass expands inward, compressing the ventricle and causing much greater outflow volume and flow velocity [27]. In the chronic phase, brain atrophy with parenchymal tissue loss may result in decreased arterial inflow during systole, the primary force behind the CSF pump, causing a subsequent decrease in aqueduct CSF flow velocity [27]. In normal pressure hydrocephalus, progressive AF reduction with worsening clinical symptoms is a sign of progressive cerebral ischemic injury rendering normal pressure hydrocephalus irreversible [28]. The findings of increased AF with decreased PPV and PNV in cryptococcal meningoencephalitis patients without shunts similarly imply persistent or irreversible inflammatory processes and brain atrophy.

In the patients with shunts, normal AF and lower PPV and PNV findings are consistent with a previous study on communicating hydrocephalus after placement of ventriculoperitoneal shunts. These results suggest that CSF flow is effectively shifted to the pathway created by the ventriculoperitoneal shunt and that a normal AF in the aqueduct is maintained by adjusting the peak velocities [29]. Early intervention has been proven to stop hydrocephalus in normal and cryptococcal meningoencephalitis, providing a favorable prognosis [30]. However, the patients with shunts received lower scores on most tests than the patients without shunts. These results suggest that most neuropsychological sequelae occur in the acute stage according to disease severity and are irreversible, despite the continuous normal CSF dynamics pattern.

Patients with bacterial meningitis often suffer from neurologic and neuropsychological sequelae [31, 32]. The impaired cognitive functioning of patients with cryptococcal meningoencephalitis, especially with regard to short-term and working memory, is also observed in patients with bacterial and viral meningitis [33]. Interestingly, in the block design, orientation, and short-term memory tests, the patients with shunts had higher scores than the patients without shunts, in spite of the fact that they also had more severe initial presentations. This implies that ventriculoperitoneal shunts not only save patients’ lives but also protect patients from certain specific aspects of cognitive function injury. Similar results have also been reported for idiopathic normal pressure hydrocephalus patients, with both “frontal” executive functions and “posterior cortical” functions being preserved after shunt surgery [34].

A cryptococcal meningoencephalitis patient without a ventriculoperitoneal shunt usually has a better prognosis in the acute infective stage. However, explorations of the correlations between bacterial burden from CSF analysis and long-term CSF dynamics have found that a lower glucose concentration and higher Evans ratio in the acute stage are associated with chronic hypermotile CSF dynamics. Worse results on neuropsychological tests, including picture arrangement and short-term memory, can be predicted by CSF parameters via cine MRI. Further validation of cine MRI for both the early prediction of long-term outcomes and the monitoring of meningitis treatment responses should be conducted.

This retrospective study has some limitations. First, cryptococcal meningoencephalitis is a rare disease for a person with normal immunity. Thus, only 18 HIV-seronegative patients were included in this study. As a result, both the disease follow-up duration and the initial image modality were difficult to control. Second, gaps still exist between the causal relationships of chronic hydrocephalus and cryptococcal meningoencephalitis pathogenesis. The study did not answer whether or not cognitive impairment resulted from the bacterial burden alone or from the stress pressure caused by hydrocephalus; both may result in white matter changes that can alter cognitive function. Finally, it is impossible to examine the effects of preexisting major psychiatric illnesses and their corresponding anatomic defects that result in cognition deficits.

5. Conclusion

In HIV-seronegative cryptococcal meningoencephalitis, cine MRI may be used to detect differences in CSF flow parameters between chronic disease stage patients with and without ventriculoperitoneal shunts. In the present study, these CSF flow parameters were correlated with the acute stage disease severity and chronic stage neuropsychological results. Using cine MRI for acquiring CSF parameters can help determine the presence of chronic hydrocephalus in cryptococcal meningoencephalitis patients. It may also determine the relationship between CSF parameters and neuropsychological sequelae.

Abbreviations

AF: | Average flow
ANF: | Average negative flow
APF: | Average positive flow
PNV: | Peak negative velocity
PPV: | Peak positive velocity.

Disclosure

The funders had no role in study design, data collection and analysis, publishing decisions, or the preparation of the paper.

Conflict of Interests

The authors declare that they have no conflict of interests.

Authors’ Contribution

Meng-Hsiang Chen and Wei-Che Lin were responsible for the study concepts. Meng-Hsiang Chen and Wei-Che Lin carried out the study design. Cheng-Hsien Lu, Hung-Chen Wang, Nai-Wen Tsai, Shau-Hsuan Li, and Chia-Te Kung were responsible for the data acquisition. Meng-Hsiang Chen, Hsiu-Ling Chen, Nai-Wen Hsu, Wei-Ming Lin, and Wei-Che Lin carried out the data analysis and interpretation. Meng-Hsiang Chen, Hsiu-Ling Chen, and Wei-Che Lin were responsible for the statistical analysis. Meng-Hsiang Chen and Hsiu-Ling Chen prepared the paper. Meng-Hsiang Chen and Wei-Che Lin edited the paper. Cheng-Hsien Lu and Wei-Che Lin were responsible for paper review. All authors read and approved the final paper.

Acknowledgment

This study was supported by Chang Gung Memorial Hospital (Chang Gung Medical Research Project Grant/CMRPG 870482 to Wei-Che Lin, CMRPG 870991 to Cheng-Hsien Lu, and CMRPG 890801 to Hsiu-Ling Chen).

References

C.-H. Lu, W.-N. Chang, H.-W. Chang, and Y.-C. Chuang, “The prognostic factors of cryptococcal meningitis in HIV-negative patients,” Journal of Hospital Infection, vol. 42, no. 4, pp. 313–320, 1999.

S.-H. Lan, W.-N. Chang, C.-H. Lu, C.-C. Lui, and H.-W. Chang, “Cerebral infarction in chronic meningitis: a comparison of tuberculous meningitis and cryptococcal meningitis,” QJM, vol. 94, no. 5, pp. 247–253, 2001.

P.-C. Liliang, C.-L. Liang, W.-N. Chang et al., “Shunt surgery for hydrocephalus complicating cryptococcal meningitis in human immunodeficiency virus-negative patients,” Clinical Infectious Diseases, vol. 37, no. 5, pp. 673–678, 2003.

S. H. Cornell and C. G. Jacoby, “The varied computed tomographic appearance of intracranial cryptococcosis,” Radiology, vol. 143, no. 3, pp. 703–707, 1982.

R. D. Diamond, J. E. May, M. A. Kane, M. M. Frank, and J. E. Bennett, “The role of the classical and alternate complement pathways in host defenses against Cryptococcus neoformans infection,” Journal of Immunology, vol. 112, no. 6, pp. 2260–2270, 1974.

T. L. Tjia, Y. K. Yeow, and C. B. Tan, “Cryptococcal meningitis,” Journal of Neurology Neurosurgery and Psychiatry, vol. 48, no. 9, pp. 853–858, 1985.

P. M. Richardson, A. Mohandas, and N. Arumugasamy, “Cerebral cryptococcosis in Malaysia,” Journal of Neurology, Neurosurgery, and Psychiatry, vol. 39, no. 4, pp. 330–337, 1976.

Y.-Y. Chen and C.-H. Lai, “Nationwide population-based epidemiologic study of cryptococcal meningitis in Taiwan,” Neuroepidemiology, vol. 36, no. 2, pp. 79–84, 2011.

C. W. Hung, W. N. Chang, C. T. Kung et al., “Predictors and long-term outcome of seizures in human immuno-deficiency virus (HIV)-negative cryptococcal meningitis,” BMC Neurology, vol. 14, article 208, 2014.

S.-F. Chen, C.-H. Lu, C.-C. Lui et al., “Acute/subacute cerebral infarction (ASCI) in HIV-negative adults with cryptococcal meningoencephalitis (CM): a MRI-based follow-up study and a clinical comparison to HIV-negative CM adults without ASCI,” BMC Neurology, vol. 11, article 12, 2011.

M. S. Greenberg, Hydrocephalus, Greenberg Graphics, Lakeland, Fla, USA, 4th edition, 1997.

C. Nilsson, F. Stahlberg, C. Thomsen, O. Henriksen, M. Herning, and C. Owman, “Circadian variation in human cerebrospinal fluid production measured by magnetic resonance imaging,” The American Journal of Physiology, vol. 262, no. 1, part 2, pp. R20–R24, 1992.

D. Wechsler, Wechsler Adult Intelligence Scale, Psychological Cooperation, New York, NY, USA, 1981.

K.-N. Lin, P.-N. Wang, C.-Y. Liu, W.-T. Chen, Y.-C. Lee, and H.-C. Liu, “Cutoff scores of the cognitive abilities screening instrument, Chinese version in screening of dementia,” Dementia and Geriatric Cognitive Disorders, vol. 14, no. 3-4, pp. 176–182, 2002.

A. Spilt, M. A. Frieke, R. J. van der Geest et al., “Reproducibility of total cerebral blood flow measurements using phase contrast magnetic resonance imaging,” Journal of Magnetic Resonance Imaging, vol. 16, no. 1, pp. 1–5, 2002.

C. J. G. Bakker, M. J. Hartkamp, and W. P. T. M. Mali, “Measuring blood flow by nontriggered 2D phase-contrast MR angiography,” Magnetic Resonance Imaging, vol. 14, no. 6, pp. 609–614, 1996.

C. J. G. Bakker, M. Kouwenhoven, M. J. Hartkamp, R. M. Hoogeveen, and W. P. T. M. Mali, “Accuracy and precision of time-averaged flow as measured by nontriggered 2D phase-contrast MR angiography, a phantom evaluation,” Magnetic Resonance Imaging, vol. 13, no. 7, pp. 959–965, 1995.

B. Battal, M. Kocaoglu, N. Bulakbasi, G. Husmen, H. T. Sanal, and C. Tayfun, “Cerebrospinal fluid flow imaging by using phase-contrast MR technique,” The British Journal of Radiology, vol. 84, no. 1004, pp. 758–765, 2011.

H. L. Jeong, K. L. Ho, K. K. Jae, J. K. Hyun, K. P. Ji, and G. C. Choong, “CSF flow quantification of the cerebral aqueduct in normal volunteers using phase contrast cine MR imaging,” Korean Journal of Radiology, vol. 5, no. 2, pp. 81–86, 2004.

M. E. Wagshul, J. J. Chen, M. R. Egnor, E. J. McCormack, and P. E. Roche, “Amplitude and phase of cerebrospinal fluid pulsations: experimental studies and review of the literature,” Journal of Neurosurgery, vol. 104, no. 5, pp. 810–819, 2006.

D. Greitz, “Radiological assessment of hydrocephalus: new theories and implications for therapy,” Neurosurgical Review, vol. 27, no. 3, pp. 145–165, 2004.

A. Stadlbauer, E. Salomonowitz, C. Brenneis et al., “Magnetic resonance velocity mapping of 3D cerebrospinal fluid flow dynamics in hydrocephalus: preliminary results,” European Radiology, vol. 22, no. 1, pp. 232–242, 2012.

M. J. McGirt, S. M. Nimjee, H. E. Fuchs, and T. M. George, “Relationship of cine phase-contrast magnetic resonance imaging with outcome after decompression for Chiari I malformations,” Neurosurgery, vol. 59, no. 1, pp. 140–145, 2006.

S. Stoquart-El Sankari, P. Lehmann, C. Gondry-Jouet et al., “Phase-contrast MR imaging support for the diagnosis of aqueductal stenosis,” The American Journal of Neuroradiology, vol. 30, no. 1, pp. 209–214, 2009.

P. H. Luetmer, J. Huston, J. A. Friedman et al., “Measurement of cerebrospinal fluid flow at the cerebral aqueduct by use of phase-contrast magnetic resonance imaging: technique validation and utility in diagnosing idiopathic normal pressure hydrocephalus,” Neurosurgery, vol. 50, no. 3, pp. 534–543, 2002.

M. Mase, K. Yamada, T. Banno, T. Miyachi, S. Ohara, and T. Matsumoto, “Quantitative analysis of CSF flow dynamics using MRI in normal pressure hydrocephalus,” Acta Neurochirurgica, Supplement, vol. 1998, no. 71, pp. 350–353, 1998.

W. G. Bradley Jr., “MR prediction of shunt response in NPH: CSF morphology versus physiology,” The American Journal of Neuroradiology, vol. 19, no. 7, pp. 1285–1286, 1998.

A. Scollato, R. Tenenbaum, G. Bahl, M. Celerini, B. Salani, and N. Di Lorenzo, “Changes in aqueductal CSF stroke volume and progression of symptoms in patients with unshunted idiopathic normal pressure hydrocephalus,” American Journal of Neuroradiology, vol. 29, no. 1, pp. 192–197, 2008.

P. Abbey, P. Singh, N. Khandelwal, and K. K. Mukherjee, “Shunt surgery effects on cerebrospinal fluid flow across the aqueduct of Sylvius in patients with communicating hydrocephalus,” Journal of Clinical Neuroscience, vol. 16, no. 4, pp. 514–518, 2009.

P. Petrou, S. Moscovici, R. R. Leker, E. Itshayek, J. M. Gomori, and J. E. Cohen, “Ventriculoperitoneal shunt for intracranial hypertension in Cryptococcal meningitis without hydrocephalus,” Journal of Clinical Neuroscience, vol. 19, no. 8, pp. 1175–1176, 2012.

M. L. Durand, S. B. Calderwood, D. J. Weber et al., “Acute bacterial meningitis in adults: a review of 493 episodes,” The New England Journal of Medicine, vol. 328, no. 1, pp. 21–28, 1993.

V. Bohr, N. Rasmussen, B. Hansen et al., “Pneumococcal meningitis: an evaluation of prognostic factors in 164 cases based on mortality and on a study of lasting sequelae,” The Journal of Infection, vol. 10, no. 2, pp. 143–157, 1985.

H. Schmidt, B. Heimann, M. Djukic et al., “Neuropsychological sequelae of bacterial and viral meningitis,” Brain, vol. 129, no. 2, pp. 333–345, 2006.

M. Saito, Y. Nishio, S. Kanno et al., “Cognitive profile of idiopathic normal pressure hydrocephalus,” Dementia and Geriatric Cognitive Disorders Extra, vol. 1, no. 1, pp. 202–211, 2011.