Critical Care Research and Practice
Volume 2015 (2015), Article ID 491780, 7 pages
http://dx.doi.org/10.1155/2015/491780

Research Article

Incidence and Risk Factors for Delirium among Mechanically Ventilated Patients in an African Intensive Care Setting: An Observational Multicenter Study

Arthur Kwizera,¹ Jane Nakibuuka,² Lameck Ssemogerere,¹ Charles Sendikadiwa,² Daniel Obua,¹ Samuel Kizito,³ Janat Tumukunde,¹ Agnes Wabule,¹ and Noeline Nakasujja⁴

¹Department of Anaesthesia, Makerere University College of Health Sciences, Mulago National Referral Hospital, P.O. Box 7051, Kampala, Uganda
²Department of Internal Medicine, Mulago Hospital Complex, Mulago Hill, P.O. Box 7051, Kampala, Uganda
³Department of Clinical Epidemiology and Biostatistics, Makerere University College of Health Sciences, Mulago National Referral Hospital, P.O. Box 7051, Kampala, Uganda
⁴Department of Psychiatry, Makerere University College of Health Sciences, Mulago National Referral Hospital, P.O. Box 7051, Kampala, Uganda

Received 4 March 2015; Revised 19 March 2015; Accepted 23 March 2015

Academic Editor: Marcus J. Schultz

Copyright © 2015 Arthur Kwizera et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Aim. Delirium is common among mechanically ventilated patients in the intensive care unit (ICU). There are little data regarding delirium among mechanically ventilated patients in Africa. We sought to determine the burden of delirium and associated factors in Uganda. Methods. We conducted a multicenter prospective study among mechanically ventilated patients in Uganda. Eligible patients were screened daily for delirium using the confusional assessment method (CAM-ICU). Comparisons were made using -test, chi-squares, and Fisher’s exact test. Predictors were assessed using logistic regression. The level of statistical significance was set at . Results. Of 160 patients, 81 (51%) had delirium. Median time to onset of delirium was 3.7 days. At bivariate analysis, history of mental illness, sedation, multiorgan dysfunction, neurosurgery, tachypnea, low mean arterial pressure, oliguria, fevers, metabolic acidosis, respiratory acidosis, anaemia, physical restraints, marital status, and endotracheal tube use were significant predictors. At multivariable analysis, having a history of mental illness, sedation, respiratory acidosis, higher PEEP, endotracheal tubes, and anaemia predicted delirium. Conclusion. The prevalence of delirium in a young African population is lower than expected considering the high mortality. A history of mental illness, anaemia, sedation, endotracheal tube use, and respiratory acidosis were factors associated with delirium.

1. Introduction

Delirium is especially common among mechanically ventilated patients and is associated with worse outcomes such as increased length of stay, higher costs of care, prolonged mechanical ventilation, and a higher mortality [1–3]. Numerous studies have incidences varying from 11 to 80% [3–5] depending on study population differences, methodology, and nature of study. ICU delirium as a concept is new in the African setting. With regard to Uganda, few ICU attending physicians are aware of it and as such its assessment is not routinely performed in this setting. In spite of the risks and outcomes, the number of mechanically ventilated patients is increasing due to increasing access to critical care even in low-income settings, placing more patients at risk for the aforementioned adverse outcomes and delirium [1, 6].

To the best of our knowledge, there is no data regarding delirium among mechanically ventilated patients in African intensive care units. We sought to determine the incidence, outcomes of delirium, and associated factors among patients admitted in Ugandan ICUs.

2. Materials and Methods

We conducted a prospective multicenter observational study in 4 intensive care units in Kampala, Uganda, for 18 months from 2013 to mid-2014. Mulago Hospital is a 1500-bed facility with a twelve-bed ICU previously described in the literature [7]. International Hospital Kampala, Case Hospital, and Kadic Hospital are private hospitals in the capital of Kampala with combined 20 ICU beds. All ICUs use the closed model, and are staffed by anaesthesiologists and internists. They nurse to patient ratio on average is 1 : 2. They handle a case mix of patients from all over the country since they comprise 90% of the country’s ICU capacity. Services offered include mechanical ventilation and intermittent haemodialysis. Eligible participants were expected (according to the admitting intensivist) to require mechanical ventilation for at least 48 hours. We excluded patients who were younger than 18 years old, patients who were brain dead, patients whose next of kin refused to consent, those paralyzed at time of assessment, and those extubated before day of initial assessment. Patients who were sedated were monitored against the Richmond Agitation-Sedation Scale (RASS) of −3 to 0 to maintain arousable state. The clinical teams decided on sedation regimen and routes of administration and whether administration was by bolus or infusion. All other managements were at the discretion of the ICU staff.

2.1. Delirium Screening

Various study tools are available for assessing delirium [8]. We chose the confusional assessment method (CAM-ICU) tool for our study due to its proven use and translatability across all ICU patients [9–11]. Briefly, CAM evaluates the four key delirium features: (1) acute onset and fluctuating course, (2) inattention, (3) disorganized thinking, and (4) altered level of consciousness. Delirium is considered present if features (1) and (2) were present in addition to either feature (3) or (4). Before the start of the study, 2 study assistants (ICU nurses) received training to explain the aim of the study and use of the study tools for delirium detection. The study assistants gave oral and written information about the study and delirium in general to attendants of patients admitted to the ICU. Upon obtaining informed consent, all patients were screened daily for delirium at the bedside using the CAM-ICU. To conduct the inattention (feature 2) part of the CAM-ICU in patients who had difficulty with the alphabet, numbers were used (ten random numbers where the number 3 was repeated four times). In assessing for inattention, the patients were asked to squeeze the assessor’s hand once they heard the number 3, in any language. This was practiced once with the patient. The assessor then mentioned a string of 10 numbers with 4 of them being “threes” and 6 of them being other single digit numbers. We deemed the patient to be inattentive if he/she got less than 8 correct squeezes or nonsqueezes.

The tool was administered daily during the study period (day or night). CAM-ICU was conducted if patients were in a RASS range of −2 to +1 (lightly sedated). We classified the patient as delirium positive or not. Patients were followed from ICU admission until death or discharge. Patients were considered coma and delirium free if they had a RASS above −3 with a negative CAM-ICU score and were exited from the study. Administration details and dosage of all sedative, analgesic, and adjunct medications (intravenous infusion or bolus) were collected daily.

2.2. Data Collection and Outcome Measures

We collected patient demographics at enrollment. Medicosociohistory included smoking history, psychiatric history, alcohol intake, education level, modified early warning score (MEWS), and acute physiological and chronic health evaluation (APACHE). Clinical characteristics included organ dysfunction, surgical status, comorbidities, and biochemical and haematological values. Treatment characteristics included sedation drugs, use of restraints, endotracheal intubation, mode of ventilation, chest X-ray findings, and route of administration of feeds. Primary outcome was presence of delirium. Secondary outcomes were death and length of ICU stay.

2.3. Ethical Considerations

The study was approved by the Research and Ethics Committee of the School of Medicine, College of Health Sciences, Makerere University, as well as the Uganda National Council of Science and Technology according to the ethical standards laid down in the 1964 Declaration of Helsinki and its later amendments. All study participants or their next of kin gave informed consent to participate in the study.

2.4. Statistical Analysis

To be able to detect with 95% power a 10% difference in incidence in our hospitals from the previously reported incidence in hospitalized patients who required mechanical ventilation [1], a sample size of 160 was required. All data were analyzed using STATA (StataCorp. 2011. Stata Statistical Software: Release 12. College Station, TX: StataCorp LP).

Categorical data has been presented as percentages and continuous data as means with standard deviations. Comparisons were made between participants who developed delirium and those who did not. For the categorical variables, Pearson tests or Fisher’s exact test was used. For the continuous data, Student’s -test or Wilcoxon rank sum test was used for the normally and skewed data, respectively. Unadjusted logistic models were used to examine the effect of various factors independently on delirium presence (age, gender, admission diagnosis, history of mental illness, history of alcohol intake, length of ICU stay, use of restraints, type of airway, sedation schedule, drugs, and metabolic abnormalities). Variables with were included in a multivariable logistic regression model. The level of statistical significance was set at .

3. Results

There were 160 eligible participants assessed for delirium. The mean age was 36.6 years; the majority was male and had some level of education (Table 1). The commonest admission diagnosis (50%) was traumatic brain injury (TBI) followed by ARDS (acute respiratory distress syndrome) 16.8% (Table 2). Patients were mostly on pressure-controlled ventilation (PCV) and had tracheostomies (Table 3). The main mode of feeding was enteral. The mean APACHE score was 27 (Table 4). Overall ICU/hospital mortality was 69% (Table 3). Delirium was in 81/160 (50.94%) and resolved in 32% of sufferers among survivors (Table 3). Predictors of delirium at bivariate analysis (Table 5) were a history of mental illness (0.043), having multiorgan dysfunction (), neurosurgery (), a high respiratory rate (), a higher average PEEP (0.001), a higher mean arterial pressure (MAP) (), oliguria (), fevers (), acidosis (), hypercapnia (), anaemia (), sedation (), and endotracheal tube use () (Table 3). Use of tracheostomy, not having had surgery, and having no sedation seemed to be protective. At multivariable logistic regression, patients who had a history of mental illness, endotracheal tubes, anaemia, respiratory acidosis, a higher average PEEP, and sedation were likely to have delirium (Table 5).

Table 1: Baseline demographic characteristics.

Variable
Categories
No delirium
Delirium
value

(percentage)
(percentage)

Sex
Male
50 (47.62)
55 (52.38)
0.239

Female
20 (37.04)
34 (62.96)

Marital status
Single
23 (33.33)
46 (66.67)
0.009

Married
47 (54.65)
39 (45.35)

Education level
None
7 (30.43)
16 (69.57)
0.336

Some
62 (53.13)
75 (46.87)

Mental illness history
Yes
11 (68.75)
5 (31.25)
0.036

No
59 (41.26)
84 (58.74)

Alcohol intake history
Yes
13 (38.24)
21 (61.76)
0.614

No
47 (43.12)
62 (56.88)

Smoking history
Yes
19 (54.29)
16 (45.71)
0.166

No
51 (41.13)
73 (58.87)

Table 2: Baseline admission characteristics.

Variable
Categories
No delirium
Delirium
value

(percentage)
(percentage)

Admission diagnosis
ARDS
12 (44.44)
15 (55.56)
0.056

Cardiac
12 (70.59)
5 (29.41)

TBI
32 (39.02)
50 (60.98)

Sepsis
4 (25.00)
12 (75.00)

Polytrauma
9 (56.25)
7 (43.75)

Multiorgan dysfunction
TBI
6 (50.00)
6 (50.00)
0.000

HIV
24 (70.59)
10 (29.41)

Diabetes
4 (40.00)
6 (60.00)

AKI
6 (100.00)
0 (00.00)

ARDS
6 (21.43)
22 (78.57)

Sepsis
6 (18.18)
27 (81.82)

Urine output
Normal
50 (53.46)
43 (46.24)
0.003

Oliguria
20 (30.30)
46 (69.70)

Temperature
Normal
44 (55.00)
36 (45.00)
0.005

Fevers
26 (32.91)
89 (55.97)

PH
Normal
10 (27.78)
26 (72.22)
0.273

Acidosis
37 (40.66)
54 (59.34)

Hemoglobin
Normal
28 (70.00)
12 (30.00)
0.000

Anemia
42 (35.29)
77 (64.71)

Creatinine
Normal
53 (44.54)
66 (55.46)
0.822

High
17 (42.50)
23 (47.50)

Urea
Normal
44 (49.44)
45 (50.56)
0.392

High
21 (38.18)
34 (61.82)

Table 3: ICU treatment characteristics.

Variable
Categories
No delirium
Delirium
value

(percentage)
(percentage)

Sedation
Sedation
23 (28.40)
58 (71.60)
0.000

None
47 (60.26)
31 (39.74)

Sedative given
Benzodiazepine
34 (37.36)
57 (62.64)
0.183

Propofol
11 (55.00)
9 (45.00)

Opioid
19 (51.35)
18 (48.65)

Endotracheal tube
Yes
54 (48.65)
57 (51.35)
0.112

No
16 (34.78)
30 (65.22)

Tracheostomy tube
Yes
15 (33.33)
30 (66.67)
0.072

No
55 (49.11)
57 (50.89)

Restraints
Yes
10 (20.41)
39 (79.59)
0.000

No
60 (55.05)
49 (44.95)

Mode
PVC
26 (44.07)
33 (55.93)
0.584

VCV
21 (42.00)
29 (58.00)

SIMV
20 (52.63)
18 (47.37)

Enteral feeding
Good
48 (41.03)
69 (58.97)
0.203

Not good
22 (52.38)
20 (47.62)

Outcome
Discharge
21 (42.86)
28 (57.14)
0.843

Death
49 (44.55)
61 (55.45)

Table 4: Clinical characteristics of patients with and without delirium by univariate analysis.

Variable
Delirium ()
No delirium ()
value

Mean
SD
Mean
SD

Age
35.202
14.170
38.429
16.215
0.183

APACHE II
27.360
6.231
25.686
6.437
0.506

Heart rate
104.191
20.764
99.000
20.253
0.116

Respiratory rate
23.247
7.146
20.143
6.212
0.003

Mean arterial pressure
79.011
25.886
70.914
18.667
0.029

Blood sugar
8.439
2.196
8.349
1.867
0.786

PO₂
69.697
27.179
62.329
36.142
0.144

PCO₂
48.258
15.611
40.200
19.781
0.005

SPO₂
90.854
9.794
87.429
20.077
0.160

HC
18.546
4.995
16.701
5.450
0.028

White blood cell
14.666
7.071
16.086
10.032
0.297

GCS
7.888
2.846
7.686
3.142
0.672

FiO₂
55.539
27.269
53.214
25.876
0.586

Length of stay
9.878
8.907
8.843
6.792
0.464

Table 5: Significant predictors for delirium among ICU patients on mechanical ventilation at bivariate and multivariate analysis.

Variable
Bivariate analysis
Multivariate analysis

OR ratio
95% CI
value
OR ratio
95% CI
value

Mental illness history
3.132
1.034–9.488
0.043
0.18
0.05–0.59
0.005

Multiorgan dysfunction

    TBI
1
—

1
—

    HIV
0.42
0.11–1.61
0.204
0.52
0.08–3.38
0.493

    DM
1.50
0.27–8.19
0.640
2.65
0.18–38.82
0.477

    HTN
3.00
0.42–21.30
0.272
4.16
0.31–55.60
0.281

    ARDS
3.67
0.86–15.59
0.079
6.44
0.86–48.30
0.070

    Sepsis
4.50
1.07–18.92
0.040
3.64
0.51–25.76
0.196

Had neurosurgery
0.419
0.217–0.810
0.010

Higher respiratory rate
1.076
1.024–1.130
0.004

Higher MAP
1.016
1.001–1.030
0.031
1.01
0.98–1.04
0.574

Oliguria
2.674
1.376–5.199
0.004
1.94
0.54–6.89
0.307

Fevers
2.491
1.309–4.742
0.005

Respiratory acidosis
1.027
1.008–1.046
0.006
1.04
1.01–1.08
0.018

Metabolic acidosis
1.071
1.007–1.139
0.030
1.07
0.94–1.21
0.312

Anaemia
4.278
1.973–9.274
0.000
5.65
1.57–20.36
0.008

Sedation
0.262
0.135–0.507
0.000
0.18
0.05–0.59
0.005

PEEP
1.345
1.120–1.616
0.002
1.38
1.04–1.83
0.024

Endotracheal intubation
1.78
0.87–3.62
0.114
6.89
1.65–28.71
0.008

Surgery
0.42
0.22–0.81
0.010
0.29
0.07–1.22
0.092

There was no association between delirium and mortality.

4. Discussion

This multicenter prospective cohort study was conducted to determine the incidence of delirium among mechanically ventilated patients in an African setting. Our study is the first to explore delirium among critically ill patients in an African population.

We determined that delirium was present in 51% of mechanically ventilated patients, in agreement with multiple studies conducted in other settings [1, 2, 4, 12]. This incidence maybe low taking into account the high APACHE score reported in our study. This is due to several reasons. Firstly, a single daily assessment was performed; this meant that delirium by its nature, a fluctuating condition, was missed on some occasion. Secondly, a delirium expert or psychiatrist did not always monitor our study assistants to ensure strict assessment of RASS/delirium. Lastly, we were unable to either stratify for the depth/severity of delirium nor measure the duration of delirium in those that recovered, so we may have missed “hypoactive delirium.”

The patient demographics in our study are similar to what has been previously reported for this setting [7]. The high APACHE scores in our study possibly arose from the demand for the few ICU beds in our setting and therefore relatively higher mortality than that reported in the literature. A significant majority of our study population were young single males, who sustained traumatic brain injuries (TBI) following motorcycle road traffic accidents. The commonest reason for intensive care admissions as had been found in other low-income country ICUs is traumatic brain injuries sustained during road traffic accidents, a common feature in this setting [7].

In this study, delirium screening was performed using the CAM-ICU because it has been previously validated in mechanically ventilated patients and has good predictive value [1, 13]. The CAM-ICU has been found to have good interrater reliability and is easily translatable as reported from numerous studies [8, 9, 11, 14]. With regard to the use of numerals for analphabetic patients, we left this to the discretion of the study nurses who found it much easier to perform than the standard tool. In addition, we did not plan to look at differences with literate patients and therefore did not document this. However, a vernacular based study is commencing and we plan to validate this with a hypothesis that the use of numbers maybe more sensitive compared to the use of words in the general population.

At bivariate analysis, notable predictors of delirium were a positive history of mental illness, having multiorgan dysfunction, neurosurgery for traumatic brain injuries, fevers, acidosis, hypercapnia, anemia, sedation, and endotracheal tube use. Many of these have been documented as predictors of delirium in other studies [2, 4, 5, 7, 15–17].

At multivariate analysis, however, a history of mental illness, endotracheal tubes use, anaemia, respiratory acidosis, having a higher PEEP, and having had sedation were associated with delirium in agreement with other studies [4, 5, 18, 19].

The use of endotracheal tubes is an independent predictor of delirium and maybe associated with higher sedation requirements [20] and as earlier observed use of sedatives was associated with delirium.

Sedation is given to ensure comfort and to minimize distress but is linked to delirium and immobility [21]. Early deep sedation has been associated with adverse outcomes [22]. Furthermore, a strategy of no sedation in critically ill patients undergoing mechanical ventilation has been reported to result in fewer mechanical ventilation days and shorter ICU/hospital length of stay compared to a standard sedation strategy [6, 23].

We were unable to document sedation dosage among patients with endotracheal tubes though benzodiazepines were the only intermittent sedatives given in this setting.

Benzodiazepines have high affinity for gamma-aminobutyric acid (GABAA) receptors, whose activation can alter levels of numerous neurotransmitters believed to be deliriogenic [21]. Additionally, they impair the quality of sleep via slow-wave sleep suppression, thus possibly contributing to delirium [24, 25]. Opioids common in our setting such as morphine, tramadol, remifentanil, and fentanyl, alternatives to benzodiazepines, have offered better outcomes [26–28].

Patients with anemia (Hb less than 10 g/dL) were likely to suffer delirium in our study. Low hemoglobin levels have been reported along with low oxygen saturation and low haematocrit as being part of the oxidative stressors linked to delirium [18].

Our study shows that higher PEEPs were associated with development of delirium. At multivariate analysis, we noted that ARDS has a weak association with the development of delirium. A possible association between mechanical ventilation and delirium has been attributed to aberrant vagal sensory induced apoptosis in that brain area within 90 min of commencing MV without causing hypoxia, oxidative stress, or inflammatory responses [2].

The association between the development of delirium and respiratory acidosis in this study is similar to what has been reported in physiologic and psychiatric studies in both healthy subjects and critically ill patients [29, 30].

In this study, delirium resolved in 32% of sufferers. This was probably due to the use of haloperidol or modification of risk factors by the attending physicians. Haloperidol is one of antipsychotics used to treat delirium [24] but studies have not supported its use as prophylaxis [31].

There was no relationship between delirium and mortality in our study but we believe the study was not prospectively powered to determine a definitive relationship between delirium and mortality. Moreover, this finding is similar to what was reported in a recent meta-analysis looking at randomized interventions to treat delirium [32].

Our study had several limitations in addition to its observational nature. Due to the method of record keeping, we were unable to accurately document sedation dosages.

We did not study interrater reliability of the CAM-ICU. However, during the study preparatory phase adequate training and practice on the instrument were achieved. Our study was not designed to prove a cause-and-effect relationship between delirium and clinical outcomes and since we only followed patients until death or discharge, our mortality analysis was not as comprehensive as previous studies that followed patients for longer periods.

5. Conclusion

Our study is the first to report delirium among African ICU patients. The study was conducted in 4 busy tertiary medical centers, which included a broad range of patients with both medical and surgical conditions. We believe our admission diagnoses represent demographics of most busy ICUs in Africa; however, this may not apply to higher income settings. Additionally the associated factors found in this study have also been previously reported in the literature. While the incidence may have been deceptively low due to limitations in study protocol, it does not mask the fact that there is a need to implement staff education and patient focused strategies as well as prevention of delirium especially in a resource limited setting.

Key Messages

This paper demonstrates the presence of delirium among African ICU patients. Factors associated with delirium in this setting are similar to those in higher income countries. Awareness regarding delirium must be initiated among staff in African ICUs.

Conflict of Interests

The authors declare that they have no competing interests.

Authors’ Contribution

Arthur Kwizera conceived the study. Arthur Kwizera, Jane Nakibuuka, and Noeline Nakasujja performed the study design and drafted the paper. Lameck Ssemogerere, Charles Sendikadiwa, Daniel Obua, Janat Tumukunde, Agnes Wabule, and Samuel Kizito performed data collection and paper drafting. Arthur Kwizera, Noeline Nakasujja, and Samuel Kizito performed statistical analysis. All authors read and approved the final paper.

Acknowledgments

The project was supported by the MESAU MEPI Programmatic Award (no. 1R24TW008886) from the Fogarty International Center. The content is solely the responsibility of the authors and does not necessarily represent the official views of the Fogarty International Center or the National Institutes of Health. The authors also express their appreciation to the study nurses and clinical teams at the hospitals for participating in the research.

References

E. W. Ely, S. K. Inouye, G. R. Bernard et al., “Delirium in mechanically ventilated patients: validity and reliability of the confusion assessment method for the intensive care unit (CAM-ICU),” The Journal of the American Medical Association, vol. 286, no. 21, pp. 2703–2710, 2001.

A. González-López, G. M. Albaiceta, and K. Talbot, “Newly identified precipitating factors in mechanical ventilation-induced brain damage: implications for treating ICU delirium,” Expert Review of Neurotherapeutics, vol. 14, no. 6, pp. 583–588, 2014.

M. I. Figueroa-Ramos, C. M. Arroyo-Novoa, K. A. Lee, G. Padilla, and K. A. Puntillo, “Sleep and delirium in ICU patients: a review of mechanisms and manifestations,” Intensive Care Medicine, vol. 35, no. 5, pp. 781–795, 2009.

S. Ouimet, B. P. Kavanagh, S. B. Gottfried, and Y. Skrobik, “Incidence, risk factors and consequences of ICU delirium,” Intensive Care Medicine, vol. 33, no. 1, pp. 66–73, 2007.

I. J. Zaal, J. W. Devlin, L. M. Peelen, and A. J. Slooter, “A systematic review of risk factors for delirium in the ICU,” Critical Care Medicine, vol. 43, no. 1, pp. 40–47, 2015.

T. Strøm and P. Toft, “Sedation and analgesia in mechanical ventilation,” Seminars in Respiratory and Critical Care Medicine, vol. 35, no. 4, pp. 441–450, 2014.

A. Kwizera, M. Dünser, and J. Nakibuuka, “National intensive care unit bed capacity and ICU patient characteristics in a low income country,” BMC Research Notes, vol. 5, article 475, 2012.

D. Gusmao-Flores, J. I. Figueira Salluh, R. T. Chalhub, and L. C. Quarantini, “The confusion assessment method for the intensive care unit (CAM-ICU) and intensive care delirium screening checklist (ICDSC) for the diagnosis of delirium: a systematic review and meta-analysis of clinical studies,” Critical Care, vol. 16, no. 4, article R115, 2012.

E. Tobar, C. Romero, T. Galleguillos et al., “Confusion assessment method for diagnosing delirium in ICU patients (CAM-ICU): cultural adaptation and validation of the Spanish version,” Medicina Intensiva, vol. 34, no. 1, pp. 4–13, 2010.

B. Riekerk, E. J. Pen, J. G. M. Hofhuis, J. H. Rommes, M. J. Schultz, and P. E. Spronk, “Limitations and practicalities of CAM-ICU implementation, a delirium scoring system, in a Dutch intensive care unit,” Intensive & Critical Care Nursing, vol. 25, no. 5, pp. 242–249, 2009.

U. Guenther, J. Popp, L. Koecher et al., “Validity and reliability of the CAM-ICU Flowsheet to diagnose delirium in surgical ICU patients,” Journal of Critical Care, vol. 25, no. 1, pp. 144–151, 2010.

S. Mehta, L. Burry, D. Cook et al., “Daily sedation interruption in mechanically ventilated critically ill patients cared for with a sedation protocol: a randomized controlled trial,” The Journal of the American Medical Association, vol. 308, no. 19, pp. 1985–1992, 2012.

M. Van Den Boogaard, P. Pickkers, A. J. C. Slooter et al., “Development and validation of PRE-DELIRIC (PREdiction of DELIRium in ICu patients) delirium prediction model for intensive care patients: observational multicentre study,” BMJ, vol. 344, no. 7845, article e420, 2012.

M. Neziraj, N. Sarac Kart, and K. Samuelson, “The intensive care delirium screening checklist: translation and reliability testing in a Swedish ICU,” Acta Anaesthesiologica Scandinavica, vol. 55, no. 7, pp. 819–826, 2011.

E. W. Ely, R. Margolin, J. Francis et al., “Evaluation of delirium in critically ill patients: validation of the Confusion Assessment Method for the Intensive Care Unit (CAM-ICU),” Critical Care Medicine, vol. 29, no. 7, pp. 1370–1379, 2001.

O. C. Kobusingye, D. Guwatudde, G. Owor, and R. R. Lett, “Citywide trauma experience in Kampala, Uganda: a call for intervention,” Injury Prevention, vol. 8, no. 2, pp. 133–136, 2002.

S. Jayaraman, J. R. Mabweijano, M. S. Lipnick et al., “Current patterns of prehospital trauma care in Kampala, Uganda and the feasibility of a lay-first-responder training program,” World Journal of Surgery, vol. 33, no. 12, pp. 2512–2521, 2009.

J. S. Seaman, J. Schillerstrom, D. Carroll, and T. M. Brown, “Impaired oxidative metabolism precipitates delirium: a study of 101 ICU patients,” Psychosomatics, vol. 47, no. 1, pp. 56–61, 2006.

A. M. Naidech, J. L. Beaumont, N. F. Rosenberg et al., “Intracerebral hemorrhage and delirium symptoms. Length of stay, function, and quality of life in a 114-patient cohort,” American Journal of Respiratory and Critical Care Medicine, vol. 188, no. 11, pp. 1331–1337, 2013.

M. C. Reade and S. Finfer, “Sedation and delirium in intensive care,” The New England Journal of Medicine, vol. 370, no. 16, p. 1567, 2014.

J. A. Frontera, “Delirium and sedation in the ICU,” Neurocritical Care, vol. 14, no. 3, pp. 463–474, 2011.

Y. Shehabi, R. Bellomo, M. C. Reade et al., “Early intensive care sedation predicts long-term mortality in ventilated critically ill patients,” American Journal of Respiratory and Critical Care Medicine, vol. 186, no. 8, pp. 724–731, 2012.

T. Strøm, T. Martinussen, and P. Toft, “A protocol of no sedation for critically ill patients receiving mechanical ventilation: a randomised trial,” The Lancet, vol. 375, no. 9713, pp. 475–480, 2010.

J. Devlin, G. Fraser, E. W. Ely, J. Kress, Y. Skrobik, and J. Dasta, “Pharmacological management of sedation and delirium in mechanically ventilated ICU patients: remaining evidence gaps and controversies,” Seminars in Respiratory and Critical Care Medicine, vol. 34, no. 2, pp. 201–215, 2013.

Y. Shehabi, R. Bellomo, M. C. Reade et al., “Early goal-directed sedation versus standard sedation in mechanically ventilated critically III patients: a pilot study,” Critical Care Medicine, vol. 41, no. 8, pp. 1983–1991, 2013.

M. J. Al, L. Hakkaart, S. S. Tan, and J. Bakker, “Cost-consequence analysis of remifentanil-based analgo-sedation vs. conventional analgesia and sedation for patients on mechanical ventilation in the Netherlands,” Critical Care, vol. 14, no. 6, article R195, 2010.

D. Breen, A. Karabinis, M. Malbrain et al., “Decreased duration of mechanical ventilation when comparing analgesia-based sedation using remifentanil with standard hypnotic-based sedation for up to 10 days in intensive care unit patients: a randomised trial [ISRCTN47583497],” Critical Care, vol. 9, no. 3, pp. R200–R210, 2005.

C. Baillard, Y. Cohen, P. Le Toumelin et al., “Remifentanil-midazolam compared to sufentanil-midazolam for ICU long-term sedation,” Annales Francaises d'Anesthesie et de Reanimation, vol. 24, no. 5, pp. 480–486, 2005.

M. Gill, M. J. Natoli, C. Vacchiano et al., “Effects of elevated oxygen and carbon dioxide partial pressures on respiratory function and cognitive performance,” Journal of Applied Physiology, vol. 117, no. 4, pp. 406–412, 2014.

A. K. Petridis, A. Doukas, S. Kienke et al., “The effect of lung-protective permissive hypercapnia in intracerebral pressure in patients with subarachnoid haemorrhage and ARDS. A retrospective study,” Acta Neurochirurgica, vol. 152, no. 12, pp. 2143–2145, 2010.

V. J. Page, E. W. Ely, S. Gates et al., “Effect of intravenous haloperidol on the duration of delirium and coma in critically ill patients (Hope-ICU): a randomised, double-blind, placebo-controlled trial,” The Lancet Respiratory Medicine, vol. 1, no. 7, pp. 515–523, 2013.

N. S. Al-Qadheeb, E. M. Balk, G. L. Fraser et al., “Randomized ICU trials do not demonstrate an association between interventions that reduce delirium duration and short-term mortality: a systematic review and meta-analysis,” Critical Care Medicine, vol. 42, no. 6, pp. 1442–1454, 2014.