Canadian Journal of Gastroenterology and Hepatology
Volume 2017 (2017), Article ID 5478068, 4 pages
https://doi.org/10.1155/2017/5478068

Research Article

Normal Uptake of ¹¹C-Acetate in Pancreas, Liver, Spleen, and Suprarenal Gland in PET

Bogdan Malkowski,1,2 Pawel Wareluk,³ Tomasz Gorycki,⁴ Katarzyna Skrobisz,⁴ and Michal Studniarek3,4

¹Department of Nuclear Medicine, Oncological Center of Bydgoszcz, Bydgoszcz, Poland
²Department of PET and Molecular Imaging, Collegium Medicum, University of Nicolaus Copernicus, Bydgoszcz, Poland
³Department of Diagnostic Imaging, Medical University of Warsaw, Warsaw, Poland
⁴Department of Radiology, Medical University of Gdańsk, Gdańsk, Poland

Correspondence should be addressed to Katarzyna Skrobisz; kskrobisz@gumed.edu.pl

Received 13 March 2017; Revised 20 July 2017; Accepted 6 August 2017; Published 27 September 2017

Academic Editor: Yousuke Nakai

Copyright © 2017 Bogdan Malkowski et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Purpose. -Acetate is radiotracer being considered an alternative to ¹⁸F-fluorodeoxyglucose. Evaluation of -acetate biodistribution in human parenchymal organs is described. Methods and Materials. 60 consecutive patients referred to -acetate PET CT suspected of renal or prostate cancer relapse with negative results (no recurrent tumor) were included in the study. Acquisition from the base of skull to upper thigh was made 20 min after i.v. injection of 720 MBq of -acetate. The distribution was evaluated by measuring the uptake in pancreas (uncinate process and body separately), liver, spleen, and left suprarenal gland. Clinical data of included patients showed no abnormalities in these organs. Results. Biodistributions of -acetate radiotracer were compared in different organs. Standardized uptake values of ¹¹C-acetate were significantly higher in pancreatic parenchyma (SUV mean 6,4) than in liver (SUV mean 3,3), spleen (SUV mean 4,5), or suprarenal gland (SUV mean 2,7) tissues. No significant difference was found between pancreatic head (SUV mean 6,4) and body (SUV mean 5,9) uptake. In case of all aforementioned organs, there were no differences either between both sexes or between formerly diagnosed tumors (renal and prostate). Conclusions. Evaluation of -acetate uptake differences in parenchymal organs will allow establishing normal patterns of distribution. High pancreatic uptake may be used in quantitative assessment of organ function in diffuse nonneoplastic pathology.

1. Introduction

labelled acetate was a radiotracer first used for the assessment of myocardial viability over two decades ago [1]. Since then it has been evaluated as a promising tracer, mainly in oncological research, and also as a possible alternative to ¹⁸F-fluorodeoxyglucose (FDG). However, -acetate is not as widely used in clinical practice and investigated as FDG. Relatively short half-life of approximately 20 minutes is one of the reasons for the above. Currently, positron emission tomography (PET) examinations with the use of -acetate are performed mostly in the fields of oncology, urology, and cardiology, with reports of unusual, rare tumor findings such as thymoma or cerebellopontine angle schwannoma [2].

The purpose of this study was to evaluate distribution of -acetate in human parenchymal organs during whole body PET examination combined with computed tomography (CT). Uptake of radiotracer was measured in pancreas (uncinate process and body separately), liver, spleen, and left suprarenal gland.

2. Methods and Materials

60 consecutive patients (22 women, 38 men) referred to -acetate PET CT suspected of renal or prostate cancer relapse with negative results (no recurrent tumor) were included in the study. 56 patients had kidney cancer and 7 patients had prostate cancer (three had both of them).

PET/CT study were made using Biograph mCT 128. -Acetate was produced in our laboratory using Explora Acetate module according to the manufacturer instruction and GMP standards.

Acquisition was made 20 min after i.v. injection of 720 MBq of acetate. The acquisition from the base of skull to 1/3 upper thigh was performed. The parameters of the acquisition and reconstruction are presented in Table 1.

Table 1: The parameters of acquisition and reconstruction.

¹¹C-Acetate

CT WB

Topogram
Standard

Eff mAs
Care dose 4D

kV
120

Slice
5.0 mm

Acq
32 × 1.2 mm

Pitch
0.8

Direction
Craniocaudal

Kernel
B30f

FoV
780 mm

Increment
3.0 mm

PET WB

Isotope
C-11

Pharm
Acetate

Scan range
Match CT range

Scan duration/bed
2.0 min

PET recon 1

Output image
Corrected

Recon meth
TrueX + tof (UltraHD-PET)

Iteration
2

Subset
21

Image size
200

Filter
Gaussian

Zoom
1.0

FWHM
2.0

PET recon 2

Output image
Uncorrected

Recon meth
Iterative + tof

Iteration
2

Subset
24

Image size
200

Filter
Gaussian

Zoom
1.0

FWHM
2.0

+
Standard AC recon

-Acetate distribution was evaluated by placing the spherical 10 mm VOI and measuring the uptake values with isocontour tool. SUVs (max, peak, and mean) were recorded for pancreas (head and body separately), liver, spleen, and left suprarenal gland (Figure 1). The position of VOIs was the same for all patients and anatomical imagining (CT) was used to allocate them. Right suprarenals were not taken into account because of overlapping radioactivity from the liver. Clinical data of included patients showed no abnormalities in the all organs studied.

Figure 1: The dominant organ uptake of ¹¹C-acetate is seen in the pancreas.

Statistical calculations were performed using STATISTICA (ver. 12.0, StatSoft Inc., 2014) statistical package and Excel (Microsoft) spreadsheet. Quantitative variables were characterized by the arithmetic mean, standard deviation, median, minimum and maximum values (range), and 95% CI (confidence interval). In contrast, the qualitative variables were presented using frequencies and percentages. To check whether a quantitative variable came from a normally distributed population, Shapiro-Wilk test was used. Leven (Brown-Forsythe) test was used to test the hypothesis of equal variances. The significance of differences between the two groups (unpaired model) was examined with the following tests: Student’s -test (or Welch -test, in the absence of homogeneity of variance) or Mann–Whitney test. The significance of differences between more than two groups was tested by an test (ANOVA) or Kruskal-Wallis test (when ANOVA was inapplicable). If statistically significant differences between groups were present, post hoc tests (Tukey test for , Dunn test for Kruskal-Wallis) were applied. In all the calculations the level of significance was set at = 0.05.

3. Results

Of all analyzed organs the head of the pancreas had highest SUVs values (SUV max 9.3, SUV peak 7.9, and SUV mean 6.4). However no statistically significant difference was found between pancreatic head (SUV mean 6,4) and body (SUV mean 5,9) uptake (Table 1). Standardized uptake values of -acetate were significantly higher in pancreas (SUV mean of 6,4 for head and 5.9 for body) than in liver (SUV mean 3,3), spleen (SUV mean 4,5), or left suprarenal gland (SUV mean 2,7) (Table 2). In all organs there were no differences either between both sexes or between formerly diagnosed tumors (kidney and/or prostate cancer). The results were presented as an abstract and discussed at ECR 2016 Congress in Vienna [3].

Table 2: Comparison of ¹¹C-acetate uptake by organ.

Pancreas
Pancreas
Liver

Spleen

Suprarenal gland

value

head
body

SUV max

Mean (SD)
9,3 (2,6)
9,0 (2,8)
5,2 (1,7)
6,4 (1,6)
4,2 (1,8)
0,001

Range
4,6–15,9
4,0–16,1
2,6–9,1
3,5–10,6
2,2–15,3

Median
9,0
8,4
4,8
6,2
4,0

95% CI
[8,6; 10,0]
[8,3; 9,7]
[4,7; 5,6]
[5,9; 6,8]
[3,8; 4,7]

SUV peak

Mean (SD)
7,9 (2,5)
7,2 (2,4)
4,2 (1,4)
5,4 (1,4)
3,5 (1,6)
0,001

Range
3,9–15,0
2,7–13,3
2,1–7,4
2,6–9,2
1,5–13,3

Median
7,6
7,0
4,1
5,3
3,2

95% CI
[7,3; 8,5]
[6,6; 7,8]
[3,9; 4,6]
[5,1; 5,8]
[3,0; 3,9]

SUV mean

Mean (SD)
6,4 (2,0)
5,9 (1,9)
3,3 (1,1)
4,5 (1,2)
2,7 (1,3)
0,001

Range
3,0–12,3
2,3–10,8
1,6–5,7
2,1–7,7
1,4–10,8

Median
6,2
5,8
3,1
4,3
2,6

95% CI
[5,9; 6,9]
[5,4; 6,3]
[3,0; 3,6]
[4,2; 4,8]
[2,4; 3,1]

4. Discussion

Acetate (CH3COO−) is an ion formed from acetic acid (CH3COOH) by losing hydrogen ion. Physiologically, in human organism acetate is converted into acetyl-CoA and, depending on a cell type, involved in two main different metabolic pathways. The first is tricarboxylic acid cycle, resulting in energy, carbon dioxide, and water. The second, on the contrary, is anabolic pathway, leading to synthesis of cholesterol and fatty acids, which are later incorporated in the form of phospholipids into cell membranes [4]. Both pathways are also important in oncogenesis, as atypical, rapidly dividing cells are in need of energy and substrates for creating cell membranes. On this account the potential intracellular acetate utilization could be monitored in diagnostic and perhaps therapeutic applications in oncology [5]. Until now it was mainly used for imaging of renal, prostate, and bladder cancers.

For diagnostic purposes in nuclear medicine, acetate is labelled with carbon isotope produced from nitrogen by proton bombardment in a cyclotron. The labelling process requires considerable effort to convert gaseous precursors (radioactive CO2 and methane) into more reactive molecules suitable for reaction with acetate [6]. After that, complete radiotracer is prepared for intravenous injection. Seltzer et al. evaluated -acetate estimated absorbed doses for healthy volunteers with pancreas, bowels, liver, kidneys, and spleen getting highest doses [7]. The radiotracer is not excreted in urine under normal circumstances. Few theories exist regarding distribution of -acetate, for example, its high concentration in pancreas which may correspond with increased lipid synthesis in acinar cells [7], incorporating into zymogens or generating hydrogen carbonate ions [8]. A recent study showed also potential of evaluating pancreatic exocrine function as -acetate activity increased in duodenum after secretin administration [9].

This study’s purpose of evaluating -acetate uptake pattern in selected abdominal parenchymal organs has been undertaken only a few times before. The results are convergent with previous findings, stating the pancreas as an organ receiving highest absorbed doses [7]. Other organs (liver, spleen, and left suprarenal gland) showed significantly lower uptake of radiotracer, with spleen being second after pancreas. To our knowledge no study up to date tried to evaluate distribution of -acetate in different parts of pancreas, based on the fact that the uncinate process and the head have different embryological origins. No statistically significant differences were found in radiotracer uptake in body and uncinate process of pancreas in this study. Inclusion criteria in our study required no previous history of pancreas pathology and normal lab test results, but as other studies show [9, 10] it is possible to use -acetate in evaluating pancreas exocrine function.

In some forms of hereditary chronic pancreatitis, that is, coexisting with cystic fibrosis, there are no clinical symptoms of pancreatic exocrine or endocrine insufficiency [11]. The high risk of cancer development in these patients needs more radical treatment, but the patients usually do not accept the proposition until the pancreatic insufficiency is evident. Then ¹¹C-acetate PET/CT could be potentially decision-making tool. There is a need to develop more convenient tests to diagnose exocrine pancreatic insufficiency and monitor the disease progression.

The patients included had a history of kidney or/and prostate cancer but there was no difference in radiotracer distribution in both groups, as well as between male and female subjects.

-Acetate uptake in suprarenal glands seems to be another interesting subject, as it was mentioned in only one study [12] regarding adrenal adenomas. Our results show that suprarenals had lowest uptake of examined organs. However it may be difficult to investigate right suprarenal glands due to problems with overlapping radioactivity from the liver.

5. Conclusions

The highest SUV max, SUV mean, and SUV peak values in pancreatic tissue in comparison to liver, spleen, and left suprarenal gland most probably indicate that specific organ function, that is, synthesis of hydrocarbonates or fatty acids, plays significant role in ¹¹C-acetate pancreatic uptake. It has to have a diagnostic potential in chronic pancreatic diseases. High pancreatic uptake may be used in the quantitative assessment of organ function in diffuse nonneoplastic pathology. Evaluation of - acetate uptake differences in parenchymal organs will allow establishing normal patterns of distribution and should lead to further studies of uptake changes in pancreatic disorders.

Conflicts of Interest

The authors declare that there are no conflicts of interest.

Authors’ Contributions

B. Malkowski contributed to the idea and experimental organization. P. Wareluk contributed to the evaluation of the PET studies (1st evaluator). T. Gorycki contributed to the evaluation of the PET studies (2nd evaluator). K. Skrobisz contributed to the overwork of the results and preparing of the manuscript. M. Studniarek contributed to the overwork of the results and preparing of the manuscript and was the coordinator of the results.

References

A. Luna, J. C. Vilanova, H. Da Cruz Jr., and S. E. LC Rossi, Functional Imaging in Oncology, Springer-Verlag, Berlin Heidelberg, 2014.

I. Grassi, C. Nanni, V. Allegri et al., “The clinical use of PET with 11C-acetate,” American Journal of Nuclear Medicine and Molecular Imaging, vol. 2, no. 1, pp. 33–47, 2012.

B. Malkowski, P. Wareluk, K. Skrobisz, and M. Studniarek, “Normal uptake of 11C-acetate in pancreas, liver, spleen and suprarenal gland in PET,” in Proceedings of the Conference: ECR 2016, 2016.

J. V. Swinnen, P. P. Van Veldhoven, L. Timmermans et al., “Fatty acid synthase drives the synthesis of phospholipids partitioning into detergent-resistant membrane microdomains,” Biochemical and Biophysical Research Communications, vol. 302, no. 4, pp. 898–903, 2003.

L. M. Deford-Watts, A. Mintz, and S. J. Kridel, “The potential of 11C-acetate pet for monitoring the fatty acid synthesis pathway in tumors,” Current Pharmaceutical Biotechnology, vol. 14, no. 3, pp. 300–312, 2013.

N. Long, W. T. Wong, and E. H. Immergut, The Chemistry of Molecular Imaging, vol. 12, John Wiley and Sons, 2014.

M. A. Seltzer, S. A. Jahan, R. Sparks et al., “Radiation dose estimates in humans for 11C-acetate whole-body PET,” Journal of Nuclear Medicine, vol. 45, no. 7, pp. 1233–1236, 2004.

P. D. Shreve and M. D. Gross, “Imaging of the pancreas and related diseases with PET carbon-11-acetate,” Journal of Nuclear Medicine, vol. 38, no. 8, pp. 1305–1310, 1997.

J. Hyun O, M. A. Lodge, S. Jagannath, J. M. Buscaglia, Y. Olagbemiro, and R. L. Wahl, “An exocrine pancreatic stress test with11C-acetate PET and secretin stimulation,” Journal of Nuclear Medicine, vol. 55, no. 7, pp. 1128–1131, 2014.

G. Karanikas and M. Beheshti, “11C-acetate PET/CT imaging: physiologic uptake, variants, and pitfalls,” PET Clinics, vol. 9, no. 3, pp. 339–344, 2014.

D. Lew, E. Afghani, and S. Pandol, “Chronic pancreatitis: current status and challenges for prevention and treatment,” Digestive Diseases and Sciences, vol. 62, no. 7, pp. 1702–1712, 2017.

D. Rubello, C. Bui, D. Casara, M. D. Gross, L. M. Fig, and B. Shapiro, “Functional scintigraphy of the adrenal gland,” European Journal of Endocrinology, vol. 147, no. 1, pp. 13–28, 2002.